arXiv:physics/0703029v1 [physics.flu-dyn] 3 Mar 2007

Velocity contrasts enhancement for shear thinning solutions flowing in a rough fracture

H. Auradou^{a,b} A. Boschan^{a,b} R. Chertcoff^a S. Gabbanelli^a J.P. Hulin^b I. Ippolito^a

aGrupo de Medios Porosos, Facultad de Ingeniería, Universidad de Buenos Aires, Paseo Colón 850, Argentine.

bLaboratoire Fluides, Automatique et Systèmes Thermiques, UMR 7608, Universités Pierre et Marie Curie-Paris 6 et Paris-Sud, Bâtiment 502, Campus Paris Sud, 91405 Orsay Cedex, France

Abstract

Flow and transport are studied in transparent model fractures with rough complementary self-affine walls with a relative shear displacement ⃗u. The aperture field is shown to display long range correlations perpendicular to ⃗u: for flow in that direction, the width and geometry of the front of a dyed shear-thinning polymer solution displacing a transparent one have been studied as a function of the fluid rheology and flow rate. The front width increases linearly with distance indicating a convection of the fluids with a low transverse mixing between the flow paths. The width also increases with the flow-rate as the fluid rheology shifts from Newtonian at low shear rates γ̇ towards a shear thinning behaviour at higher γ̇ values. The width also increases with the polymer concentration at high flow-rates. These results demonstrate the enhancement of the flow velocity contrasts between different flow channels for shear thinning fluids. The relative widths at low and high γ̇ values for different polymer concentrations are well predicted by an analytical model considering the fracture as a set of parallel ducts of constant hydraulic apertures. The overall geometry of the experimental front geometry is also predicted by the theoretical model from the aperture map.

Key words:

1 Introduction

Transport and flow in porous media and fractured rocks are encountered in many engineering fields [1] and complex fluids such as polymer gels or surfactants are often involved. Applications include enhanced oil recovery (EOR),

Preprint submitted to Elsevier Received: date / Revised version: date drilling muds and heavy oil recovery. In EOR, for instance, polymer flooding reduce viscosity driven instabilities (a polymer solution is injected in the reservoir and followed by a water flood). When these complex fluids have shear thinning properties, experimental flow measurements (see [2]) display specific features such as permeability enhancements (or reductions of the effective viscosity) compared to the case of Newtonian fluids.

These effects may be strongly influenced by fractures which are frequently encountered in many reservoirs and generally display a broad range of characteristic length scales. While it is customary to visualize the fractures as parallel plates separated by a constant distance [3], this representation is rarely accurate: fracture wall surfaces are indeed rough and do not perfectly match [4]. This creates voids of various size resulting in spatial heterogeneities of the flow field [5,6].

The objective of the present work is to analyze experimentally and analytically these velocity contrasts for shear thinning solutions flowing in transparent models of single fractures with rough walls and to determine their dependence on the fluid rheology and on the flow velocity. The experiments have been realized in a configuration in which flow is strongly channelized as is frequently the case in actual fractures [1]: this will be shown to allow for analytic predictions of the relation between the flow distribution and the apertures and, also, of their dependence on the rheological characteristics of the fluids used in the experiments.

We have sought particularly in this work to reproduce the roughness of natural fractured rocks which is characterized by a broad distribution of the characteristic length scales [9]. More precisely, these surfaces can often be considered as self-affine [10], this means that they remain statistically invariant under the scaling transformation: h(λx, λy) = λ^ζ h(x, y), (1) where h(x, y) is the surface height and ζ is the roughness or self-affine exponent. For most materials including granite, ζ is close to 0.8 [11] but it is close to 0.5 for materials such as sandstone and sintered glass beads [12,13]. Many experiments suggest that ζ is independent on the orientation of profiles measured on the surface with respect to the direction of crack propagation (a slight anisotropy has however been recently observed experimentally on some materials [14]).

The rough surfaces used in the present work are transparent milled plexiglas plates with an isotropic self-affine geometry of characteristic exponent ζ = 0.8: they allow for optical flow observations by means of dyed fluids (practically, a transparent solution is displaced by a dyed one and the geometry of the front is determined by image analysis). For each fracture, two such complementary surfaces are realized and match perfectly when brought in contact: in the model, both a spacing normal to the mean fracture surface and a relative lateral shift ⃗u are introduced in order to create a mismatch and to obtain a variable aperture field [15].

While the surfaces are isotropic, previous laboratory measurements and numerical investigations [7,16,17,18,19] show that the lateral shift introduces an anisotropy of the permeability which is highest in the direction perpendicular to ⃗u. More precisely, flow channels perpendicular to ⃗u and with a length similar to the model appear as shown in a previous work [8]. As a result, for flow perpendicular to ⃗u, the overall geometry of the displacement front of a fluid by another of same rheological properties is well reproduced by modelling the fracture as a set of parallel ducts with an hydraulic aperture constant along the flow [8]: the present work deals exclusively with this configuration.

The fluids used here display at low shear rates γ̇ a“plateau” domain in which they behave as Newtonian fluids of constant viscosity μ while, at higher shear rates, μ decreases with γ̇ following a power law. Comparing the velocity contrasts between the different flow paths in the two regimes allows one therefore to estimate the influence of the rheology since the velocity contrasts should be enhanced in the shear thinning case. Finally, an analytical model predicting the influence of this Newtonian “plateau” on the dependence of the velocity contrasts on γ̇ will be derived and compared to experimental observations.

2 Experimental procedure

2.1 Characteristics of the model fracture

The model fracture is made of two complementary rough self-affine surfaces without contact points: both surfaces are obtained from a transparent material by means of a milling machine and their size is 85 mm × 170 mm. A detailed description of the procedure is given in [7]: a self-affine surface h(x, y) is first generated numerically using the mid-point algorithm [20] with a selfaffine exponent ζ = 0.8 as observed in many materials [11]. A second surface, complementary from the first one, is generated and then shifted numerically parallel to its mean plane by 0.33 mm. The milling tool is computer controlled and a complex tortuous path may be imposed to obtain the self-affine geometry. Moreover, the borders of two parallel sides of the surfaces rise above the rough surface: they are designed so that, when they are clamped against the matching border of the other surface, there is a void space in the remaining areas. The mean planes of the facing surfaces are parallel outside these borders with a mean distance: ā = 0.77 mm.

The local aperture a(x, y) at a location (x, y) in the fracture plane may be predicted from the mathematical surface h(x, y) by the relation: a(x, y) = h(x, y) − h(x, y + u) + ā, (2) where u is the lateral shift. Figure 1 shows the aperture field of the fracture

Fig. 1. Upper figure, gray scale representation of the aperture field. Field of view: 85 mm × 171 mm. Aperture field - mean value: ā = ⟨a(x, y)⟩_{(x,y)} = 0.77 mm; and the aperture fluctuation: σ_a = ⟨(a(x, y) − ā)^2⟩^{1/2}_{(x,y)} = 0.1 mm. Shift amplitude: u = 0.33 mm (oriented vertically on figure). In the present work, flow is parallel to x direction (horizontal on the figure). Lower image: binarized aperture field with a threshold value equal to the mean aperture (0.77 mm).

considered in this work: the binarized image (lower part of Fig.1) displays a clear anisotropy and a large correlation length perpendicular to the shift ⃗u. Quantitatively, this effect may be characterized by the following correlation function, also called semivariance [21]: γ(⃗δ) = ⟨(a(⃗r) − a(⃗r + ⃗δ))^2⟩, (3) measuring the spatial correlation of the aperture field between two points separated by a lag vector ⃗δ. Orientations of ⃗δ perpendicular (x − direction) and parallel (y − direction) to the shift are of special interest. Figure 2 displays

Fig. 2. Semivariograms normalized by 2σ^2_a as a function of lag distance ||⃗δ|| (mm) for the aperture field displayed in Fig.1. Dotted line: correlation along the direction y of the shear. Solid line: correlation along the perpendicular direction x (parallel to the flow in the rest of the paper).

variations of the semivariance in both directions. When the lag modulus ||⃗δ|| is larger than the correlation length of the aperture field, one expects γ to reach a constant value equal to 2σ^2_a, where σ^2_a = ⟨a(x, y) − ā⟩^2 is the variance of the aperture. The semivariance γ reaches this limit, but in a very different way for the two orientations of ⃗δ. In the direction y parallel to the shift, γ becomes of the order of (and sometimes larger than) 2σ^2_a for ||⃗δ|| > 8 mm. In the perpendicular direction x, γ never exceeds the saturation value and slowly increases towards it: these differences reflect the large scale anisotropic structure of the aperture field. Semivariograms have been computed on surface maps of epoxy casts of a fractured granite sample in a previous work [8] and display similar features: moreover, normalized curves γ/(2σ^2_a) corresponding to different values of u displayed a universal variation as a function of the normalized lag δ/u. This suggests that results obtained in the present work might be extrapolated to other values of u.

Finally it should be noted that the ratio S of the standard deviation of the aperture σ_a to the mean aperture ā is only of 0.13 (Fig. 1). This implies, as discussed by [22], that the fracture can be considered as ”hydraulically” smooth with relatively small velocity contrasts between and along flow lines. This keeps the trajectories of the preferential flow channels relatively straight and simplifies subsequent analysis.

2.2 Experimental set-up and procedures

The plexiglas model fracture is held vertically in a fixed position between a light panel and a 12 bits digital CCD camera with a high stability and dynamical range. Flow is induced by sucking a dyed solution from the top side while the lower side is slightly dipped into a bath containing a clear fluid. An appropriate calibration, described in reference [7], allows one to obtain from all pictures of each experiment the corresponding concentration map c(x, y, t). Here, we focus on the geometry of the iso concentration front c/c_0 = 0.5 which is determined by thresholding the concentration maps and which depends strongly on the flow heterogeneity.

2.3 Rheological characteristics of shear-thinning soltions

Fig. 3. Variation of the effective viscosity μ of the polymer solutions as a function of the shear rate γ̇ for two water-polymer solutions of different concentrations: 500 ppm (□) and 1000 ppm (∘). Dashed lines: Carreau functions corresponding to the sets of parameters of Table 1; continuous lines: truncated power law approximation.

In this work, we used shear thinning polymer solutions, more specifically water-scleroglucan solutions; they have been characterized using a Contraves LS30 Couette rheometer for shear rates γ̇ ranging from 0.016 s^{−1} up to 87 s^{−1}. Two different polymer concentrations equal to 500 ppm and 1000 ppm have been used. The rheological properties of the dyed and transparent solutions have been verified to be constant with time within experimental error over 3 days; the variation of the effective viscosity μ as a function of the shear rate γ̇ is displayed in Figure 3. The variation of μ with γ̇ is well adjusted by a Carreau function: μ = 1 (1 + (^{γ̇}_{γ̇0} )^2)^{1−n}2

(μ_0 − μ_∞) + μ_∞. (4)

The values of the corresponding rheological parameters for the polymer solutions characterized in the present work are listed in Table 1. μ_∞ is too low to be determined within the available range of shear rates (γ̇ ≤ 87 s^{−1}) and it has been taken equal to the viscosity of the solvent (i.e. water). In Eq.(4), γ̇_0 corresponds to a crossover between two behaviors. On the one hand, for γ̇ < γ̇_0, the viscosity μ tends towards the limiting value μ_0, and the fluid behaves as a Newtonian fluid. On the other hand, if γ̇ > γ̇_0, the viscosity follows a power law variation reflecting its shear thinning characteristics with μ ∝ γ̇^{(n−1)}. For each

Polymer Conc. n γ̇_0 μ_0 ppm s^{−1} mP a.s

1000 0.26 ± 0.02 0.026 ± 0.004 4490 ± 342

500 0.38 ± 0.04 0.077 ± 0.018 410 ± 33 Table 1 Rheological parameters of schleroglucan solutions used in the flow experiments.

experiment, the flow rate is kept constant at a value between 0.01 ml/min and 5 ml/min (corresponding mean flow velocities: 0.0003 ≤ v ≤ 0.14 mm.s^{−1}). Under such conditions the typical shear rate γ̇ ≃ v/a ranges between 4.10^{−4} s^{−1} and 0.18 s^{−1}. The latter value is far below the shear rate corresponding to the second Newtonian plateau (μ = μ_∞) and this limit will not be considered in this work. On the contrary, the lowest values of the typical shear rate are much lower than γ̇_0: the Newtonian “plateau” in the rheological curves may therefore have a crucial influence of the flow properties.

In order to obtain an analytical expression accounting for the effect of the fluid rheology on the velocity fluctuations, the rheological law of the fluids is approximated in section 4 by a truncated power law.

When γ̇ < γ̇_0, the viscosity μ(γ̇) is considered as constant and equal to μ_0; for γ̇ > γ̇_0, μ(γ̇) is assumed to follow a power law μ(γ̇) = mγ̇^{n−1} in which m = μ_0/γ̇_0^{n−1}. The parameters n, γ̇_0 and μ_0 are obtained from Tab.1.

3 Flow velocity dependence of front geometry

Two important features of the displacement front have been observed: (a) its geometry depends on the flow rate Q, and (b) its width parallel to the flow increases linearly with the distance from the injection side. The first point is illustrated by Figure 4 in which two fronts measured are compared during fluid displacements at two different flow rates, but for a same polymer concentration (1000 ppm): the front width parallel to the flow direction is clearly larger at the highest flow rate.

The broadening of the front may be characterized quantitatively from the variation of the mean square front width, σ_x(t) = ⟨(x(t) − x̄(t))^2⟩^{1/2}, as a function of the mean distance x̄(t) of the front from the injection side (Figure 5). For all values of Q, σ_x(t) increases linearly with x̄(t). In the next section, this will be shown to result directly from the underlying channelized structure of the aperture field. The width of the front after a transit time t corresponds then directly to the product tΔv where Δv is the velocity difference between the different channels (the transverse exchange between channels is too small to allow one to reach a diffusive spreading regime).

At all distances, the width σ_x(t) increases with the flow rate Q but with a particularly sharp variation between Q = 0.1 ml/min and Q = 0.5 ml/min. It will be seen that, at this transition flow-rate, the shear rate at the fracture walls becomes of the order of γ̇_0 (the threshold value above which the fluids display shear thinning characteristics).

4 Modelization

4.1 Flow between parallel plates with a constant gap

We compute the flow of the polymer solutions between parallel plates using the same approach as in reference [23]. The relation between the longitudinal pressure drop and the velocity profile in the gap is obtained by using the truncated power law model discussed in section 2.3. The flow field is unidirectional and parallel to x so that v_x(z) is the only non zero velocity component. The strain rate is given by: γ̇(z) = dv_x/dz.

At low pressure gradients, the fluids behave like a Newtonian fluid with a

Fig. 4. Displacement fronts at two different flow rates. (a) Q = 1 ml/min (v̄/v_c ≃ 100); (b) Q = 0.1 ml/min (v̄/v_c ≃ 10). Polymer concentration: 1000 ppm. Vertical mean flow. Front width perpendicular to mean flow: 85 mm. Front extension along the flow: 53 mm (top curve), 34 mm (bottom curve). Mean distance of the front from the inlet equal to half the fracture length.

Fig. 5. Variation of the mean front width σ_x(t) = ⟨(x(t) − x̄(t))^2⟩^{1/2} as a function of the mean distance x̄(t) from the inlet side of the model. Polymer concentration: 1000 ppm. Flow rates: Q = (△)2.0,(+) 0.5, (∘) 0.1, (□) 0.02 ml/min.

constant viscosity μ_0 and the resulting velocity profile is parabolic and symmetrical between the walls. Then, the shear rate is zero half way between the fracture walls and reaches a maximum at their surface where γ̇ = 6v/a (a is the distance between the plates). This value of γ̇ is proportional to the mean flow velocity or, equivalently, to the pressure drop.

As the flow rate keeps increasing, γ̇ becomes larger than γ̇_0 and the non Newtonian characteristics of the fluid modify the velocity profile. The mean flow velocity v_c corresponding to the transition between the two regimes satisfies: v_c = aγ̇_0/6 and the corresponding pressure gradient is: ∇P_c = 2μ_0γ̇_0/a. As v increases above v_c, the layer where the shear rate is higher than γ̇_0 becomes thicker and the velocity profile v_x(z) is no longer parabolic: the full expression may be derived analytically and is given in Eq. (5) of reference [23]. The mean velocity, v, can then be computed by integrating v_x(z) over the fracture gap, leading to: v = a^2 12(2n + 1)μ_0 ∇P. [ (1 − n)( ∇P ∇P_c )^{−3} + 3n( ∇P ∇P_c )^{1−nn} ] . (5)

We consider now the case of shear thinning fluids such that n > 0 and (1 − n)/n > −1. Then, the leading term in Eq.(5) is (∇P/∇P_c)^{(1−n)/n} and, therefore, when ∇P >> ∇P_c, Eq. (5) becomes:

v ≃ a^2 12 ( ∇P μ_{eff} ) 1_n , (6)

where μ_{eff} = μ_0 (2γ̇_0/a)^{1−n} ((2n + 1)/3n)^n. This is similar to the generalized version of Darcy’s law often applied to the flow of non Newtonian and, more specifically, to power law fluids in porous media [24,26,27].

4.2 Flow in rough fractures

In this part, we focus on the variations of the velocity in the plane (x, y) of the fracture and we assume therefore a two-dimensional flow field ⃗v(x, y) equal to the average of the fluid velocity profile over the gap with ⃗v(x, y) = ⟨⃗v(x, y, z)⟩_z. The development with time of the front (represented by the iso concentration lines c/c_0 = 0.5) will now be analyzed by assuming that its points move at the local flow velocity ⃗v(x, y) and an analytical model predicting the global front width will be developed.

This model is based on the results of a previous work [8] demonstrating that, in such systems, the aperture field is structured into channels perpendicular to the lateral shift ⃗u of the surfaces. For a mean flow parallel to these channels, the paths of the tracer particles have a weak tortuosity; also, the velocity variations along these paths are small compared to the velocity contrasts between the different channels. Under these assumptions, the velocity of a particle located at a distance y, perpendicular to the mean velocity, satisfies: ⃗v(x, y) ≈ v(y) ⃗e_x, (7) where ⃗e_x is the unit vector parallel to the mean flow. Note also that, in the geometry discussed in this section, there are no contact points between the walls of the fractures: this avoids to take into account the large tortuosity of the flow lines in their vicinity.

If the fluid is Newtonian with a constant viscosity, then, for each channel, the velocity is related to the pressure gradient ∇P by relation (6) with n = 1; a is now an equivalent (or hydraulic) aperture associated to each channel and noted a(y) and the equation represents the classical linear equivalent of Darcy’s law for fractures. Previous studies have shown that, for relatively small aperture fluctuations, this hydraulic aperture is well approximated by the geometrical aperture [5,22]: this suggests that a(y)^2 can be taken equal to the mean of the average of the square of the local apertures along the direction x i.e. a(y)^2 = ⟨a(x, y)^2⟩_x. The validity of this assumption has been tested numerically previously for a similar geometry [8] in the case of a Newtonian fluid: these simulations used the lattice Boltzmann method to determine the

2D front geometry at all times: except for fine scale details, the profile x(y, t) of the distance of the front from the inlet at a given time t follows very closely the variations of a(y)^2.

For a power law fluid such that n < 1, the velocity satisfies the non linear generalized relation (6). We seek now to generalize to this case the relation between the front geometry and the aperture variation established for the Newtonian fluids: the aperture field is still assumed to be strongly correlated in the flow direction, allowing one to consider the fracture as a set of parallel ducts.

We consider particles starting at t = 0 from the inlet of the model at different transverse distances y and moving at different velocities v(y). Then the distance x of the particles from the inlet at time t after the injection satisfies x(y, t) = v(y)t so that the mean distance of the front from the inlet side is x̄(t) = ⟨v(y)⟩_yt = v̄t and: x(y, t) x̄(t) = v(y) v̄ . (8)

Moreover, the mean square deviation σ_x(t) = ⟨(x(y, t) − x̄)^2⟩^{1/2} should satisfy: σ_x(t) = σ_vt where σ_v is the mean square deviation of the velocities in individual channels from their mean value v̄. Combining the previous relations leads to: σ_x(t) x̄(t) = σ_v v̄ . (9)

This equation shows that there is a direct relation between the front geometry and the variations of the velocity from one channel to another: for power law fluids, the latter are related to the variations of the hydraulic aperture by Eq. (6). In order to estimate these variations, we introduce a modified reduced aperture deviation S_h defined as the ratio between the standard deviation of the hydraulic aperture a(y) to its mean. The parameter S_h is equivalent to the reduced aperture deviation S defined in section 2.1 but the geometrical aperture is replaced by the hydraulic one. Here, we are interested in weakly fluctuating systems, i.e. for which both S and S_h are small compared to one. In addition, the hydraulic aperture a(y) is observed to follow a Gaussian distribution. Moreover, Eq. (6) shows that, for a given pressure gradient ∇P , v scales as a^{n+1/n} : together with the above assumptions, this leads to the following relation between the reduced velocity fluctuations σ_v /v̄ and S_h: σ_v v̄ = n + 1 n S_h. (10)

Combining Eqs. (9) and (10), leads to: σ_x(t) x̄(t) = n + 1 n S_h. (11)

5 Quantitative comparison between the experiments and the model

In the present experiments, the polymer solutions are expected to behave like Newtonian fluids as long as the shear rate γ̇ is everywhere lower than the critical value γ̇_0 (see Table 1). As the flow rate increases, the critical shear rate γ̇_0 is first reached at the wall of the fracture where γ̇ is highest. If the fracture is modeled as two parallel plates separated by the mean aperture ā, then γ̇ = γ̇_0 at the walls when the mean flow velocity is v_c = āγ̇_0/6. Above this velocity, the shear thinning properties of the fluids influence the flow and enhance the velocity fluctuations.

Fig. 6. Experimental variation of the ratio σ_v/v̄ = σ_x/x̄ in the model fracture (S_h ≃ 0.02) as a function of the normalized mean velocity v̄/v_c for shear thinning solutions of concentrations 1000 ppm (∘) and 500 ppm (□). Horizontal dotted lines: theoretical values of σ_v/v̄ computed from Eq.(11) for a Newtonian fluid (n = 1) and for 500 ppm (resp. 1000 ppm) polymer solutions (n = 0.38, resp. 0.26). Solid and dashed lines: variations of σ_v/v̄ a as function of v̄/v_c computed by integrating Eq. (5.)

Fig. 6 displays the experimental variations of the normalized velocity fluctuations (equal to the normalized front width σ_x(t)/x̄(t)) as a function of the reduced velocity v̄/v_c for both polymer solutions. The values predicted by Eq. (11) for a Newtonian fluid (n = 1) and for power law fluids with the same index as the two solutions are also plotted.

For v̄/v_c < 1 the experimental values are similar for both solutions and close to the theoretical prediction for n = 1 (horizontal dashed line). For v̄/v_c ≫ 1, σ_x(t)/x̄ tends toward values of the order of those predicted by Eq. (11) and increasing with the polymer concentration.

Eq. (11) provides therefore a good estimate of the velocity fluctuation inside the fracture both for low, i.e. v̄/v_c < 1, and high flow rates corresponding to v̄/v_c >> 1. The increase of σ_x(t)/x̄ between the Newtonian and shear thinning regimes and also, at high velocities, with the polymer concentration confirms the enhancement of the velocity contrasts between the channels for shear-thinning fluids.

Between the limiting values v̄/v_c < 1 and v̄/v_c ≫ 1, fluid velocity variations within the fracture may be estimated by applying Eq.(5) in each channel (assumed to be of constant hydraulic aperture): this equation takes into account the coexistence in the fracture gap of layers where the fluid has Newtonian and non Newtonian properties. The normalized velocity fluctuations σ_v/v̄ obtained by these computation are displayed in Fig.6 for the two polymer concentrations together with the experimental variations of the normalized front width σ_x(t)/x̄(t). In agreement with the theoretical curves, σ_x(t)/x̄(t) starts to increase when the velocity v̄ becomes larger than v_c (v̄/v_c > 1) for both polymer solutions. However, although the limiting value for v̄/v_c ≫ 1 is the same as predicted, the increase of σ_x(t)/x̄(t) above v_c is slower than expected: actually, the theoretical predictions represent an upper bound for the observations. This difference may be due in part to the use of a simplified version of the rheological curve displaying a transition sharper than the actual one between the Newtonian and shear thinning regimes. Also, the aperture of the parallel channels introduced in the model is assumed to be constant: this also leads to a transition between the Newtonian and power law regimes which is faster than the actual one.

A step further in the interpretation is the comparison of the experimental shape of the fronts with that estimated from the channel model. In section 4.2, the normalized distance x(y, t)/x̄(t) of the front from the inlet has been predicted to be equal to v(y)/v̄ (see Eq. 8). An experimental front profile normalized in this way is plotted in Fig. 7 as a function of the transverse distance y together with the variation of the theoretical normalized velocity v(y)/v̄. The velocity v(y) is estimated from Eq. 6 in which the aperture a is replaced by the mean value a(y) defined in section 4.2.

The most remarkable observation is the fact that both the experimental and theoretical fronts have not only the same width but also nearly the same geometry. These results are very similar to those of numerical simulations for Newtonian fluids [8]: they demonstrate the validity of the generalization in Eq. (6) of the Newtonian model. Fine scale details predicted by the theoretical model are however not observed in the experimental front: this difference may be due in part to viscous drag forces between parallel layers of fluid moving at different velocities in the fracture plane. These forces may smoothen the local velocity gradients and rub out small scale features of the front without changing the large scale velocity variations: this results in a bumpy front with a typical width of the structures of the order of 10 mm. This latter value is of the order of the correlation length in the direction perpendicular to the channels.

Fig. 7. Thick solid line: Experimental normalized front profile x(y, t)/x̄(t) as a function of the transverse distance y (mm) for v̄/v_c = 200 for a 1000 ppm shear thinning polymer solution. Dotted line: theoretical variation of the normalized velocity v(y)/v̄ in the parallel flow channel model. The front is displayed just before the displacing fluid starts to flow out of the fracture. Dashed lines: characteristic deviations of the distance x(y) from its mean value x̄.

6 Discussion and conclusions

In the present work the enhancement of velocity fluctuations for shear thinning fluids has been studied in a single fracture with rough, self-affine walls. The two wall surfaces are perfectly matched and are positioned with both a normal and a lateral shift. This results in an anisotropic aperture field well characterized quantitatively by the semivariograms of the aperture both in the direction of the shift and perpendicular to it. The characteristics of these semivariograms are in agreement with previous experimental measurements on granite samples [8]. Parallel to the shift, the aperture field is correlated over a distance of the order of 10 mm above which the value of the normalized semivariograms is of the order of 1. In the other direction, the correlation subsists over the full fracture length.

This observation has allowed us to model the fracture as a set of parallel ducts perpendicular to the shift and with an hydraulic aperture constant along their length. These assumptions lead to specific predictions on the dependence of the width and of the geometry of the front on the velocity of the fluid and its rheology: these predictions deal with the case of a mean flow parallel to the channels which was the configuration used in the present experiments. This model generalizes a previous one developed for Newtonian fluids and which has been validated by numerical simulations [8].

The variation of the front width with the velocity could first be predicted. At low flow rates, the viscosity of the solutions is constant (Newtonian “plateau”) but non Newtonian effects become important for faster flows: this results in an increase of the velocity fluctuations -and of the front width. This variation occurs when the shear rate at the fracture wall becomes larger γ̇_0, i.e. the shear rate corresponding to the crossover between the Newtonian plateau and the power law regimes: γ̇_0 is reached for a mean flow velocity v_c = aγ̇_0/6. At still higher flow velocities of the order of 100 × v_c, both the normalized velocity fluctuations and the normalized front width reach a new constant value with a good agreement between the experimental results and the theoretical expectations.

These results validate the prediction of an enhancement of velocity contrasts for shear thinning channelized flows in fractures. The experimental increase of the front width with the mean velocity v right above the threshold value v_c is however slower than the predictions. The origin of this discrepancy might be investigated by a more refined theory taking into account the full rheological characteristics of the fluid and aperture variations along the flow. The theoretical model also allows to reproduce well the experimental front geometry for length scales larger than 10 mm which represents the correlation length of the aperture field in the direction perpendicular to the flow channels. Future work should investigate the influence of transverse velocity gradients on the shape of the front for different types of fluids.

The results obtained in the present work demonstrate therefore clearly that approaches developed to analyze channelized Newtonian flows in fractures can be generalized to non Newtonian fluids and allow to predict, for instance, the variation of the velocity contrasts with the rheology.

Numerical studies in 2D networks [26,27] had similarly shown that the flow of shear thinning fluids is localized in a smaller number of preferential paths than for Newtonian ones. It has been suggested that these effects might account for the permeability enhancement for such fluids mentioned in the introduction: the results obtained in the present paper may therefore be usefully applicable to the numerical simulation of non Newtonian flows in fracture networks. A number of questions remain however open and need to be considered in future studies. First, the present experiments have been realized with a mean flow parallel to the channels created by the relative shift of the wall surfaces. It will be important to compare these results with the case of flow perpendicular to these channels: velocity fluctuations in the directions parallel and perpendicular to the flow should then be significantly different from those in the present experiments. Eq. 5 should, for instance, be modified. Also, the present experiments deal with relatively short path lengths such that transverse exchange between channels may be considered as negligible: the results obtained may therefore be different for longer path lengths. It is also possible that the spatial correlation of the velocity field will eventually decay at very long distances although this has not been observed in our experimental model.

7 Acknowledgements

We are indebted to G. Chauvin and R. Pidoux for their assistance in the realization of the experimental setup. This work was funded by E.E.C. through the STREP Pilot plant program SES6-CI-2003-502706 and by the CNRS- PNRH program. This research was also supported by a CNRS-CONICET Collaborative Research Grant (PICS CNRS 2178), by the ECOS A03-E02 program and by the I029 UBACyT programs.

References

[1] N. R. Council (Ed.), Rock fractures and fluid flow: Contemporary Understanding and Applications, National Academy Press, Washington, D.C., 1996.

[2] C. Perrin, P. Tardy, K. Sorbie, J. Crawshaw, Experimental and modeling study of newtonian and non-newtonian fluid flow in pore network micromodels, J. Colloid Interface Sci., 295 (2006) 542.

[3] J. Bodin, F. Delay, G. de Marsily, Solute transport in a single fracture with negligible matrix permeability: 1. fundamental mechanisms, Hydrogeology Journal, 11 (2003) 418.

[4] B. Vickers, S. Neuman, M. Sully, D. Evans, Reconstruction and geostatistical analysis of multiscale fracture apertures in a large block of welded tuff, Geophys. res. Lett., 19 (1992) 1029.

[5] S. Brown, Fluid flow through rock joints: the effect of surface roughness, J.

Geophys. Res., 92 (1987) 1337.

[6] Y. Tsang, C. Tsang, Flow channeling in a single fracture as a two-dimensional strongly heterogeneous permeable medium, Water Resour. Res., 25 (1989) 2076.

[7] A. Boschan, H. Auradou, I. Ippolito, R. Chertcoff, J. Hulin, Miscible displacement fronts of shear thinning fluids inside rough fractures., to be published in Water Resour. Res., (2007).

[8] H. Auradou, G. Drazer, A. Boschan, J. P. Hulin, J. Koplik, Flow channeling in a single fracture induced by shear displacement, (2006), Geothermics, 35 (2006) 576.

[9] C. Poon, R. Sayles, T. Jones, Surface measurement and fractal characterization of naturally fractured rocks, J. Phys. D: Appl. Phys., 25 (1992) 1269.

[10] B. Mandelbrot, Self-affine fractals and fractal dimension, Physica Scripta, 32 (1985) 257.

[11] E. Bouchaud, The morphology of fracture surfaces: A tool for understanding crack propagation in complex materials, Surface Review and Letters 10 (2003) 797.

[12] J. M. Boffa, C. Allain, J. P. Hulin, Experimental analysis of fracture rugosity in granular and compact rocks, Eur. Phys. J. Appl. Phys., 2 (1998) 281.

[13] L. Ponson, H. Auradou, P. Vie, J.-P. Hulin, Low self-affine exponents of fracture surfaces of glass ceramics, Phys. Rev. Lett., 97 (2006) 125501.

[14] L. Ponson, D. Bonamy, H. Auradou, G. Mourot, S. Morel, E. Bouchaud, C. Guillot, J. Hulin, Anisotropic self-affine properties of experimental fracture surfaces, Int. J. Frac., 140 (2006) 27.

[15] S. R. Brown, R. L. Kranz, B. P. Bonner, Correlation between the surfaces of natural rock joints, Geophys. Res. Lett., 13 (13) (1986) 1430.

[16] S. Gentier, E. Lamontagne, G. Archambault, J. Riss, Anisotropy of flow in a fracture undergoing shear and its relationship to the direction of shearing and injection pressure, Int. J. Rock Mech. & Min. Sci., 34 (1997) 412.

[17] I. Yeo, M. D. Freitas, R. Zimmerman, Effect of shear displacement on the aperture and permeability of a rock fracture, Int. J. Rock Mech. & Min. Sci., 35(1998) 1051.

[18] G. Drazer, H. Auradou, J. Koplik, J. P. Hulin, Self-affine fronts in self-affine fractures: Large and small-scale structure, Phys. Rev. Lett. 92 (2004) 014501.

[19] H. Auradou, G. Drazer, J. P. Hulin, J. Koplik, Permeability anisotropy induced by a shear displacement of rough fractured walls, Water Resour. Res., 40 (2005) W09423.

[20] R. Voss, Fundamental algorithms in computer graphics, Springer-Verlag, Berlin, (1985) 805.

[21] P. Kitanidis, Introduction to Geostatistics: Applications in Hydrogeology, Cambridge University Press, Cambridge (UK) (1997).

[22] R. Zimmerman, S. Kumar, G. Bodvarsson, Lubrification theory analysis of the permeability of rough-walled fractures, Int J. Rock Mech Min. Sci. Geomech Abstr. 28 (1991) 325.

[23] S. Gabbanelli, G. Drazer, J. Koplik, Lattice Boltzmann method for non- Newtonian (power-law) fluids, Phys. Rev E. 72 (2005) 046312.

[24] M. Balhoff, K. Thompson, A macroscopic model for shear-thinning flow in packed beds based on network modeling, Chemical Engineering Science, 61 (2006) 698.

[25] X. Lopez, P.H. Valvatne, M.J. Blunt, Predictive network modeling of singlephase non-Newtonian flow in porous media, J. Coll. Int. Sci., 264 (2003) 256.

[26] C. Shah, Y. Yortsos, Aspects of flow of power law fluids in porous media, AIChE Journal, 41 (1995) 1099.

[27] A. Fadili, P. Tardy, A. Pearson, A 3d filtration law for power-law fluids in heterogeneous porous media, J. Non-Newtonian Fluid Mech., 106 (2002) 121.