arXiv:physics/0504216v1 [physics.atom-ph] 28 Apr 2005

Studies of the^1S_0–^3P_0 transition in atomic ytterbium for optical clocks and qubit arrays

Tao Hong, Claire Cramer, Eryn Cook, Warren Nagourney, E. N. Fortson Department of Physics, University of Washington, Seattle, WA 98195-1560

Abstract

We report an observation of the weak 6^1S_0-6^3P_0 transition in^{171,173}Yb as an important step to establish Yb as a primary candidate for future optical frequency standards, and to open up a new approach for qubits using the^1S_0 and^3P_0 states of Yb atoms in an optical lattice.

PACS numbers:

Optical clocks show great promise as the next generation of precision frequency standards due to the high frequency and correspondingly high line-Q of weakly allowed atomic transitions. Thanks to femtosecond comb technology [1], clocks based on optical transitions in both single trapped ions and neutral atom clouds are poised to exceed the already very high precision set by microwave frequency standards [2]. A recent proposal combining the Lamb- Dicke confinement of single ion frequency standards with the high signal-to-noise of neutral atom clouds, and exploiting a highly forbidden transition insensitive to external magnetic fields and trap light polarization has the potential to do even better [3]. The scheme makes use of the^1S_0-^3P_0 electric dipole transition in alkaline-earth atoms, weakly allowed in odd isotopes by the hyperfine interaction of the nuclear spin and completely forbidden by a single-photon process in even isotopes. Trapping the atoms in a Stark-free optical lattice will allow a large ensemble of atoms to exhibit a spectrum free of Doppler and recoil shifts, leading to an estimated accuracy of a few parts in 10^{18} [4, 5]. As an additional application, the near absence of decoherence between the^1S_0 and^3P_0 states suggests forming a qubit from these states and creating an optical lattice array of such qubits for quantum information [6, 7].

Yb and Sr are both strong candidates for an optical lattice clock as well as for creating useful qubits. Both atoms have experimentally accessible optical transitions, allowing the atoms to be readily laser-cooled and trapped, and in the case of Yb, Bose-Einstein condensed [8]. While the Sr clock transition has been studied extensively, both in and out of an optical lattice [9, 10], the same transition in Yb has thus far remained unexplored experimentally. In this paper, we focus on the odd isotopes of Yb [12]. Here we report the direct excitation of the 578 nm^1S_0−^3P_0 transition in the odd isotopes^{171,173}Yb [11]. We also discuss the possible application of this type of transition in making qubits for quantum computation.

The level structure of Yb is shown in Fig. 1. The experiment is performed on a sample of cold atoms collected in a magneto-optical trap (MOT) operating on the strong^1S_0−^1P_1 transition at 399 nm. To excite the clock transition, we irradiate the cloud of atoms with a 578 nm probe, continuously monitoring 399 nm fluorescence from the atom cloud. As the probe laser frequency is scanned over the clock transition, there is an observable decrease in MOT fluorescence as atoms are excited into the metastable^3P_0 state and escape the trap.

The experimental apparatus is diagrammed in Fig. 2. The 399 nm transition is used to decelerate an atomic beam in a Zeeman slower and then capture either^{171}Yb or^{173}Yb in

FIG. 1: Yb energy levels, transition wavelengths, and lifetimes.

FIG. 2: Schematic of experimental setup: A frequency-doubled Ti:Sapphire laser is used for the MOT and Zeeman slower. The Zeeman slower beam is detuned 300 MHz below the atomic resonance using a double-pass AOM. Its frequency scan is calibrated with an I_2 saturated absorption cell. The blue MOT fluorescence is detected by a photomultiplier tube (PMT).

the MOT. The 399 nm output of a frequency-doubled Titanium:Sapphire laser (Coherent 899-21) is locked to the atomic resonance with an adjustable detuning to prevent slow frequency drift. Further details of the MOT and Zeeman slower are discussed elsewhere [13]. We probe the clock transition with a ring dye laser (Coherent 899-21) internally locked to a temperature stabilized Fabry-Perot cavity. A small fraction of the laser’s output is directed through an acousto-optic modulator (AOM) to an iodine saturated-absorption cell serving as a frequency reference. The main dye laser output is directed onto the MOT and

FIG. 3: (a) Normalized MOT blue fluorescence of^{171}Yb, showing the clock transition resonance, and (b) saturation spectrum of molecule iodine reference line 1852 vs detuning frequency of the probe laser. In (a), the probe beam has a power of 0.12 W and a diameter of 4 mm.

its frequency continuously scanned from iodine line 1852 through the Yb clock resonance. The MOT beams are chopped on and off at a rate of 2.5 kHz. Resonance data are taken either with the probe beam on continuously or with the probe and MOT beams chopped out of phase with each other. The latter procedure should completely avoid the shifts and broadening of the clock transition due to near-resonant 399 nm light while maintaining a steady-state MOT population. The MOT magnetic fields produce a negligible perturbation on the clock resonance because of the small g-factors of the^1S_0 and^3P_0 states [5].

The resonant absorption cross-section for the λ = 578 nm photons may be written σ = ( √ ln2/πλ^2/2)(Γ/Δω) for the case of a Gaussian line shape, where Δω is the full width at half maximum, and the natural decay rate of the^3P_0 state is Γ ∼= 5 × 10^{−2} s^{−1} [5]. The fractional reduction in MOT fluorescence due to the clock transition is then R = σI/(σI + γ_{MOT} ), where γ_{MOT} is the rate at which atoms are lost from the MOT in the absence of the clock transition. Typically, γ_{MOT} ∼= 0.5 s^{−1}. With our intensity Ihc/λ of about 1 W/cm^2 and a Doppler broadening of about 1MHz at a MOT temperature of 1mK, the value of R is close to unity. Thus, by contrast with a similar method in Sr [9], we both expect and observe large fractional reduction in MOT fluorescence at the clock resonance.

The large MOT fluorescence reduction due to the clock resonance in^{171}Yb is shown in Fig. 3 (a). Here the resonance data are taken with the probe beam on continuously, and are subject to extra broadening of the clock transition in the presence of the MOT light. Data taken with the MOT and probe beams alternately chopped show similarly large resonances with widths comparable to the independently measured probe laser linewidth. Further study is required to understand and quantify the different sources of broadening in all our resonance data. The probe laser frequency is given by the detuning from a specific hyperfine resonance of the iodine line 1852[14], shown in Fig. 3 (b). A similar fluorescence reduction is also observed in the case of^{173}Yb. The two clock transitions in^{171}Yb and^{173}Yb are approximately 2.6 and 3.9 GHz below the lowest frequency hyperfine component of the iodine line 1852.

Qubits, as basic elements in quantum computation, are extensively investigated in order to break through the limit of classical computers. Decoherence of atomic qubits, often caused by external magnetic fields and collisions, is generally believed to be the largest obstacle in the way of building quantum computers. Atom collisions can be reduced by trapping atoms in optical lattices and keeping low densities, and in fact methods for entangling qubits in lattices have been proposed [6, 7]. However, magnetic field perturbations can be difficult and inconvenient to eliminate in experiments. Alkaline-earth atoms show intrinsic advantages in forming qubits in this respect because their metastable^3P_0 states and the^1S_0 ground states are insensitive to external magnetic fields. These states have negligible decoherence but reasonably large single-photon transition strengths, as shown by the large fractional fluorescence reduction even with the relatively broad linewidth in Fig. 3 (a). Thus, a qubit formed by a^1S_0 ground state and a metastable^3P_0 state can simply be flipped by a singlephoton transition instead of more complicated two-photon Raman transitions as for alkali atoms [6, 7].

In conclusion, we have observed the weak^1S_0-^3P_0 clock transition in cold^{171,173}Yb, which is an important step to establish Yb as one of the primary candidates for future optical frequency standards, and we have also discussed a new approach for qubits with this singlephoton transition.

We would like to thank Feng-Lei Hong and Reina Maruyama for helpful discussions. This work was supported by the National Science Foundation, Grant No. PHY 0099535.

[1] J. Stenger, H. Schnatz, C. Tamm, and H. Telle, Physical Review Letters 88, 073601 (2002). [2] S. R. Jefferts, T. P. Heavner, and E. A. Donley, Japanese Journal of Applied Physics 43, 2803 (2004).

[3] H. Katori, in Proceedings of the Sixth Symposium on Frequency Standards and Metrology (2001).

[4] H. Katori, M. Takamoto, V. Pla’chikov, and V. Ovsiannikov, Physical Review Letters 91, 173005 (2003).

[5] S. G. Porsev, A. Derevianko, and E. N. Fortson, Physical Review A 69, 021403 (2004). [6] J. K. Pachos and P. L. Knight, Physical Review Letters 91, 107902 (2003). [7] L. M. Duan, E. Demler, and M. D. Lukin, Physical Review Letters 91, 090402 (2003). [8] Y. Takasu, K. Maki, K. Komori, T. Takano, K. Honda, M. Kumakura, T. Yabuzaki, Y.

Takahashi, Physical Review Letters, 91, 040404 (2003).

[9] I. Courtillot, A. Quessada, R. P. Kovacich, A. Brusch, D. Kolker, J. J. Zondy, G. D. Rovera, P. Lemonde, Physical Review A 68, 030501(R) (2003).

[10] M. Takamoto and H. Katori, Physical Review Letters 91, 223001 (2003). [11] A group at NIST also has reported a recent observation of this transition: C. W. Hoyt, Z. W.

Barber, C. W. Oates, T. M. Fotier, S. A. Diddams, L. Hollberg, Arxiv: physics/0503240 (2005).

[12] Even isotopes might be used for a clock via multi-photon transitions: T.Hong, C. Cramer, W. Nagourney, and E. N. Fortson, Physical Review Letters 94, 050801 (2005); R. Santra, E. Arimondo, T. Ido, C. Greene, and J. Ye, Arxiv: physics/041197 (2005).

[13] R. Maruyama, R. Wynar, M. V. Romalis, A. Andalkar, M. D. Swallows, C. E. Pearson, E. N.

Fortson, Physical Review A 68, 011403 (2003).

[14] H. Kato, et al., Japan Society for the Promotion of Science (2000).