arXiv:nucl-ex/0402023v1 27 Feb 2004

Measurement of the π^− decay width of^5_ΛHe

S. Kameoka^a, S. Ajimura^b, K. Aoki^c, A. Banu^d, H. C. Bhang^e, T. Fukuda^f , O. Hashimoto^a, J. I. Hwang^e, B. H. Kang^e, E. H. Kim^e, J. H. Kim^e, M. J. Kim^e, T. Maruta^h, Y. Miura^a, Y. Miyake^b, T. Nagae^c, M. Nakamura^h, S. N. Nakamura^a, H. Noumi^c, S. Okada^g, Y. Okayasu^a, H. Outa^i, H. Park^j , P. K. Saha^f , Y. Sato^c, M. Sekimoto^c, T. Takahashi^a, H. Tamura^a, K. Tanida^i, A. Toyoda^c, K. Tsukada^a, T. Watanabe^a, H. J. Yim^e

aDepartment of Physics, Tohoku University, Miyagi, 980-8578, Japan bDepartment of Physics, Osaka University, Osaka, 560-0043, Japan cHigh Energy Accelerator Research Organization (KEK), Ibaraki, 305-0801, Japan dGesellschaft für Schwerionenforschung mbH (GSI), Darmstadt, 64291, Germany eDepartment of Physics, Seoul National University, Kwanak-gu, 151-742, Korea f Osaka Electro-Communication University, Osaka, 572-8530, Japan gDepartment of Physics, Tokyo Institute of Technology, Tokyo, 152-8551, Japan hDepartment of Physics, University of Tokyo, Tokyo, 113-0033, Japan iThe Institute of Physical and Chemical Research (RIKEN), Saitama, 351-0198, Japan jKorea Research Institute of Standards and Science (KRISS), Daejeon, 305-600, Korea

We have precisely measured Λ → pπ^− decay width of^5_ΛHe and demonstrated significantly larger α -Λ overlap than expected from the central repulsion α-Λ potential, which is derived from YNG Λ-nucleon interaction.

1. Introduction

It is known that hypernuclei mainly decay via mesonic decay(Λ → pπ^−, Λ → nπ^0) or non-mesonic decay(Λn → nn, Λp → np). Mesonic decay releases only some 40 MeV energy and undergoes Pauli suppression by the existence of other nucleons. Thus the mesonic decay rate is sensitive to the overlap of Λ wave function with nucleus, and reflects nucleus-Λ potential shape.

Motoba et al. constructed a Λ single particle potential in^5_ΛHe employing realistic ΛN interaction “YNG” with folding procedure.[ 1] This potential is characterized by a repulsive core, which has the effect to push Λ wave function toward the outside of nucleus and leads to an enhancement of the mesonic decay rate by the relaxation of Pauli suppression. They calculated mesonic decay rate of^5_ΛHe with the Λ wave function as an initial state, and compared it to the one derived from one-range Gaussian ΛN interaction “ORG”. The Λ → pπ^− decay width showed about 30% difference: Γ_π− (ORG) = 0.321 Γ_Λ, Γ_π− (YNG) = 0.393 Γ_Λ, where Γ_Λ denotes total decay width of free Λ. Kumagai-Fuse et al. also performed the same kind of calculation and reported similar results for^5_ΛHe.[ 2] However, existing experimental data, Γ_π− (Exp.) = 0.44 ± 0.11 Γ_Λ, has large error and cannot distinguish above two potentials.[ 3] It should be noted that both of the interactions are determined to reproduce Λ binding energy of^5_ΛHe, and could not be distinguished without measuring the difference in the mesonic decay rate. Therefore, precise measurement of pionic decay rate is important to check the validity of the YNG interaction.

The π^− decay width is obtained by dividing the branching ratio by the lifetime. Thus, both of these observables need to be measured with high precision.

2. Experiment and analysis

The experiment was performed using K6 beam line of KEK 12 GeV proton synchrotron. 6Li target was bombarded with 1.05 GeV/c π^+ beam and^5_ΛHe hypernucleus were produced via^6Li(π^+, K^+)^6_ΛLi,^6_ΛLi →^5_Λ He + p reaction. The incoming pion and outgoing kaon momenta were measured by means of magnetic spectrometers and missing mass was reconstructed. A couple of detector system was installed around the target so as to measure trajectories and velocities of hypernuclear decay products. The decay counter comprises 4 mm-thick plastic scintillators named T2, 2 cm-thick ones named T3, six layers of 5 cm-thick ones named T4, and a drift chamber placed between T2 and T3.

π^− decay branching ratio

Figure 1 shows PID function of charged particles emitted from the decay of^5_ΛHe, which is derived from particle velocity, dE/dx and total energy deposit in sequentially fired scintillators. A tail on positive side of the pion peak is attributed to an extra energy deposit caused by nuclear pion absorption.

Figure 2 shows the excitation spectra of^6Li(π^+, K^+) reaction. Hypernuclear formation events were successfully separated as a peak structure in both (up) inclusive and (down) pion coincidence spectra. The region between dotted lines represents the events accepted as^5_ΛHe production. Use of (π^+, K^+)reaction enabled low background hypernuclear spectroscopy, while the previous measurement using (K^−, π^−)reaction suffers serious background from beam kaon decay and could not avoid large ambiguity in determination of π^− emission ratio.

We cannot well identify such decay particles as have large angles against vertical axis and pass through side of T4 array without losing whole kinetic energy. Our analysis required two(three) segments at the center of T2(T3) counter to be fired so as to avoid such ambiguity and accurately determine pion detection efficiency.

Electrons created by Λ → nπ^0 decay followed by electro-magnetic shower cannot be distinguished from pion. The electron contamination rate was evaluated by Monte Carlo method using GEANT and effectively subtracted.[ 5]

The pion emission rate is stable when the hypernuclear mass gate is narrowed, which confirms that contamination with higher excited states is negligible.

π^− decay branching ratio was determined to be b_π− = 0.359 ± 0.009 (statistical error only).

Lifetime

The hypernuclear decay time was directly measured as Δt = t_{T 2} − l_d/v_d − l_b/v_b − t_{T 1}, where t_{T 2} was the time when the decay particles reached T2 counter, l_d is flight length of the decay particles from target to T2 counter, v_d is velocity of the decay particles,

Figure 1. Charged particle identification emitted from the decay of^5_ΛHe.

Figure 2. the excitation spectra of^6Li(π^+, K^+) reaction for (up) inclusive and (down) pion coincident events.

l_b is flight length of beam pion from T1 counter to target, v_b is velocity of beam pion, and t_{T 1} is beam injection time at T1 counter. The lifetime was derived by fitting the decay time spectrum by exponential function convoluted with time response function of the detector system, which is obtained as Δt spectrum for prompt reaction caused via strong interaction.[ 4] (π, pp) events, which means that a scattered proton was detected by SKS and another proton was detected by the decay counter, were simultaneously collected for this purpose and fluctuation of the time response function was corrected every two hours during data acquisition. Figure 3(right) shows prompt(up) and delayed(down) time spectra. With above procedure, lifetime of^5_ΛHe was determined to be τ = 278^{+11}_{−10} ps.

Lifetime of^{12}_Λ C was also measured as 212 ± 6 ps, whose value is twice more accurate over the previous measurement.[ 4] See Figure 3(left) for the fitting of^{12}_Λ C lifetime.

3. Results and discussion

The total decay width and π^− decay width of^5_ΛHe obtained were Γ_{tot} = 1/τ = 0.947 ± 0.038 Γ_Λ and Γ_π− = b_π− × Γ_{tot} = 0.340 ± 0.016 Γ_Λ, respectively.

Table 3 compares the present experiment with previous one[ 3] and the theoretical calculation based on ORG/YNG α-Λ potential. One can see that data accuracies were drastically improved although further careful check for systematic error is remained to be done. Our measurement shows that π^− decay width is considerably smaller than the theoretical prediction using YNG ΛN interaction. This suggests that new α-Λ potential such as gives larger overlap between Λ and nucleus need to be considered.

Figure 3. Left: Prompt time spectrum of^6Li(π^+, pp) events (up) and decay time spectrum of^5_ΛHe (down). Right: Prompt time spectrum of^{12}C(π^+, pp) events (up) and decay time spectrum of^{12}_Λ C (down).

Experiment Theory[ 1] present previous[ 3] ORG YNG

Γ_{tot}/Γ_Λ 0.947± 0.038 1.03 ± 0.08 — —

Γ_π− /Γ_Λ 0.340 ± 0.016 0.44 ± 0.11 0.321 0.393 Table 1 The experimental results compared with previous experiment and theoretical calculations. The errors of the present data are statistical only.

REFERENCES

1. T. Motoba et al., Nucl. Phys. A534, 597 (1994). 2. I. Kumagai-Fuse et al., Phys. Lett. B345, 386 (1995). 3. J. J. Szymanski et al., Phys. Rev. C43, 849 (1991). 4. H. Park et al., Phys. Rev. C61, 054004 (2000). 5. CERN Program Library, GEANT.