arXiv:nucl-ex/0402022v1 26 Feb 2004

π^0 decay branching ratios of^5_ΛHe and^{12}_Λ C hypernuclei

S. Okada^a, S. Ajimura^b, K. Aoki^c, A. Banu^d, H. C. Bhang^e, T. Fukuda^f , O. Hashimoto^g, J. I. Hwang^e, S. Kameoka^g, B. H. Kang^e, E. H. Kim^e, J. H. Kim^e, M. J. Kim^e, T. Maruta^h, Y. Miura^g, Y. Miyake^b, T. Nagae^c, M. Nakamura^h, S. N. Nakamura^g, H. Noumi^c, Y. Okayasu^g, H. Outa^i, H. Park^j , P. K. Saha^f , Y. Sato^c, M. Sekimoto^c, T. Takahashi^g, H. Tamura^g, K. Tanida^i, A. Toyoda^c, K. Tsukada^g, T. Watanabe^g, H. J. Yim^e

aDepartment of Physics, Tokyo Institute of Technology, Tokyo, 152-8551, Japan bDepartment of Physics, Osaka University, Osaka, 560-0043, Japan cHigh Energy Accelerator Research Organization (KEK), Ibaraki, 305-0801, Japan dGesellschaft für Schwerionenforschung mbH (GSI), Darmstadt, 64291, Germany eDepartment of Physics, Seoul National University, Seoul, 151-742, Korea f Osaka Electro-Communication University, Osaka, 572-8530, Japan gDepartment of Physics, Tohoku University, Miyagi, 980-8578, Japan hDepartment of Physics, University of Tokyo, Tokyo, 113-0033, Japan iThe Institute of Physical and Chemical Research (RIKEN), Saitama, 351-0198, Japan jKorea Reserch Institute of Standards and Science (KRISS), Daejeon, 305-600, Korea

We precisely measured π^0 branching ratios of^5_ΛHe and^{12}_Λ C hypernuclei produced via (π^+, K^+) reaction. Using these π^0 branching ratios with the π^− branching ratios and the lifetimes, we obtained the π^0 decay widths and the non-mesonic weak decay widths at high statistics with the accuracy of ∼5%(stat) for both hypernuclei.

1. Introduction

It is well known that a Λ hyperon in free space decays into a nucleon associated with a pion (Γ_π− : Λ → pπ^−, Γ_π0 : Λ → nπ^0). A bound Λ in a nucleus (Λ hypernucleus) also decays via the decay process, called the mesonic weak decay of Λ hypernucleus. The relevant momentum transfer is only ∼100 MeV/c which is not necessarily enough high to exceed the Fermi momentum. The decay rate is therefore suppressed due to the Pauli blocking effect on the outgoing nucleon. Especially in light hypernuclei, it is sensitive to overlap of the Λ wave function with the nucleus. Thus, the mesonic weak decay width of light hypernuclei gives significant information to investigate Λ-nucleus potential shape.

It is believed that the folding potential between Λ and light (s-shell) nuclei has a central repulsive core, which is calculated from the commonly used YNG ΛN interaction. However, it has not been confirmed so far experimentally. For comparison of α-Λ potential, Motoba et al. calculated the mesonic decay widths of^5_ΛHe for two different potentials [ 1]. One is derived from the YNG interaction, and the other is a simply attractive potential derived from one-range-gaussian two-body interaction called “ORG”, which are

Table 1 Previous experimental results and theoretical calculations for the^5_ΛHe and^{12}_Λ C. Refs. Γ_{tot}/ Γ_Λ Γ_π− / Γ_Λ Γ_π0 / Γ_Λ Γ_{nm}/ Γ_Λ 5 ΛHe (exp.) [ 3] 1.03±0.08 0.44±0.11 0.18±0.20 0.41±0.14 5 ΛHe (ORG) [ 1] 0.321 0.177 5 ΛHe (YNG) [ 1] 0.393 0.215 12 Λ C (exp.) [ 4][ 5] 1.14±0.08 0.113±0.015 0.200±0.068 0.828±0.087

determined to reproduce the Λ binding energy of^5_ΛHe. According to their calculation, the difference in the decay widths between them is ∼20% as shown in Table 1. However, existent experimental data cannot distinguish the two due to the large error. In the present experiment, we precisely measured both mesonic decay widths, Γ_π− [ 2] and Γ_π0 .

On the other hand, the bound Λ in a nucleus can interact with a neighboring nucleon (Γ_p: Λp → np, Γ_n: Λn → nn), called the non-mesonic weak decay of Λ hypernucleus. It gives unique opportunity to study baryon-baryon weak interaction which is hidden by strong interaction in normal nuclei. The total non-mesonic weak decay width (Γ_{nm}) is one of the most important observables for the study. It is difficult to measure the Γ_{nm} (= Γ_p+Γ_n) directly due to experimental difficulties such as final state interaction effect. Thus, the Γ_{nm} is usually obtained by subtracting the mesonic weak decay widths from the total decay width Γ_{tot} (inverse of the lifetime), as Γ_{nm}= Γ_{tot}−Γ_π0 −Γ_π− . Table 1 shows the latest experimental data for^5_ΛHe and^{12}_Λ C. The errors of Γ_{nm} for both hypernuclei mainly come from those of Γ_π0 , so that the precise measurement of Γ_π0 is awaited.

In the present paper, we concentrate the measurement of π^0 branching ratios, and Γ_π0 s and Γ_{nm}s for^5_ΛHe and^{12}_Λ C are derived from the π^− branching ratios and the lifetimes.

2. Experimental Method

The present experiments (E462/E508) were performed at the K6 beam line of the KEK 12-GeV proton synchrotron (KEK-PS). Hypernuclei of^5_ΛHe and^{12}_Λ C were produced by the (π^+,K^+) reaction at 1.05 GeV/c on^6Li and^{12}C (active) targets. The hypernuclear mass spectra were calculated by reconstructing momenta of incoming π^+ and outgoing K^+ using the beam line spectrometer (QQDQQ) and the SKS spectrometer, respectively.

The schematic view of the decay counter system is shown in Ref [ 7]. Neutral decay particles were detected by the T4 counter arrays comprising 6 layers of 5cm-thick plastic scintillators. Charged decay particles were vetoed by thin plastic scintillators installed just before T4 counter arrays. π^0 from NMWD was identified by detecting high energy γ ray, because the energy of this γ ray is about 70 MeV, and that from other decay process is about a few MeV. The γ rays were separated from neutrons by means of time-of-flight technique between the start timing counter of incident beam and the T4 counter.

3. Analysis and Results

The formations of each hypernucleus were identified by gating the ground state region in the excitation energy spectra of^6_ΛLi and^{12}_Λ C as shown in Figure 1 (a). Neutral particles from the decay were detected at T4 counter with 2 MeVee (MeV electron equivalent) threshold. The 1/β spectrum for^{12}_Λ C is shown in Figure 2 (a), which shows good γ/n separation. The γ gate corresponds to 0 ≤ 1/β ≤ 2. Using the yields below the γ peak (1/β < 0), the accidental background within the γ gate was estimated as good as ∼ 2 %.

In order to estimate the efficiency of the detector setup, the GEANT-based Monte Carlo simulation was performed. The efficiency depends on the energy of π^0. We assumed mono-energetic (104.9 MeV/c) π^0 for^5_ΛHe (^5_ΛHe → π^0+^5He (g.s.)), and we used the π^0 distribution for^{12}_Λ C given by Motoba et al.[ 6]. Figure 3 shows the γ energy spectra for^5_ΛHe. The points with error bars are the experimental data, and the shaded one is the simulation. To select γ-ray shower clearly, we applied the multiplicity cut for the identification. Upper figure shows the spectrum with applying multiplicity M ≥ 1, and lower figure shows that for M ≥ 2. There is a low energy background in the spectrum for the M ≥ 1 condition, whereas the background disappear in that for M ≥ 2 condition. In order to remove the low energy background completely, we determined the π^0 cut condition as “M ≥ 2” and “ADC sum ≥ 20 MeVee”. The 1/β spectrum applied this π^0 cut condition is shown in Figure 2 (b). In this figure, the γ ray from π^0 decay more clearly separated from neutron. For the efficiency estimation, the same cut condition was applied in the simulation. The detection efficiency (including the detector acceptance) is estimated to be ε ∼ 10.5 %. The good agreement of the energy spectra between data and simulation in Figure 3 (2) shows that we can count for the efficiency estimation.

Figure 1 (b) shows the excitation energy of^6_ΛLi and^{12}_Λ C with the π^0 cut condition. The π^0 branching ratio is represented by b_π0 = N_π0 /N_{inc}/ε, where N_{inc} and N_π0 are the numbers gated for the ground state regions shown in the Figure 1 (a) and (b), respectively. Consequently, the π^0 branching ratios for^5_ΛHe and^{12}_Λ C were determined to be b_π− = 0.212 ± 0.008 and 0.133 ± 0.005, respectively (statistical error only), though preliminary yet.

Γ_π0 s and Γ_{nm}s for^5_ΛHe and^{12}_Λ C were derived from our results of the lifetimes and the π^− branching ratios[ 2] as shown in Table 2. The result of Γ_π0 for^5_ΛHe is located in between those of ORG- and YNG-based calculations, which is consistent with the Γ_π− result [ 2]. It indicates that the α-Λ overlapping is larger than that of the YNG-based calculation.

The statistical errors of obtained Γ_{nm}s for^5_ΛHe and^{12}_Λ C were much improved as 34% → 5% for^5_ΛHe and 11% → 5% for^{12}_Λ C. The theoretical calculations of non-mesonic weak decay are required to meet these Γ_{nm} results and our Γ_n/Γ_p results[ 7] simultaneously.

Table 2 Summary of present preliminary results for the^5_ΛHe and^{12}_Λ C.

Γ_{tot}/ Γ_Λ Γ_π− / Γ_Λ Γ_π0 / Γ_Λ Γ_{nm}/ Γ_Λ 5 ΛHe 0.947±0.038 [ 2] 0.340±0.016 [ 2] 0.201±0.011 0.406±0.020 12 Λ C 1.242±0.042 [ 2] 0.123±0.015 [ 4][ 2] 0.165±0.008 0.953±0.032

REFERENCES

1. T. Motoba et al., Nucl. Phys. A534, 597 (1994). 2. S. Kameoka et al., in this proceedings. 3. J. J. Szymanski et al., Phys. Rev. C43, 849 (1991). 4. Y. Sato et al., to be published in Phys. Rev. C. 5. A. Sakaguchi et al., Phys. Rev. C43, 73 (1991).

6. T. Motoba and K. Itonaga, Prog. Theor. Phys. Suppl. No. 117 447 (1994). 7. H. Outa et al., in this proceedings.

Figure 1. Excitation energy spectra of^6_ΛLi (left figure) and^{12}_Λ C (right figure). (a) for inclusive, (b) with the π^0 cut condition.

Figure 2. 1/β spectrum of neutral particle for^{12}_Λ C. (a) without the π^0cut condition, (b) with the π^0cut condition which is layer multiplicity M ≥ 2 and ADC sum ≥ 20 MeVee.

Figure 3. γ energy (ADC sum) spectra from π^0 decay of^5_ΛHe (point with error bar) are compared with the simulation (shaded one). (1) layer multiplicity M ≥ 1, (2) M ≥ 2.