arXiv:hep-ph/0305295v1 27 May 2003

PARAMETER DEGENERACY AND REACTOR EXPERIMENTS^∗

OSAMU YASUDA Department of Physics, Tokyo Metropolitan University, 1-1 Minami-Osawa, Hachioji, Tokyo 192-0397, Japan E-mail: yasuda@phys.metro-u.ac.jp

Degeneracies of the neutrino oscillation parameters are explained using the sin^2 2θ_{13}–s^2_3 plane. Measurements of sin^2 2θ_{13} by reactor experiments are free from the parameter degeneracies which occur in accelerator appearance experiments, and reactor experiments play a role complementary to accelerator experiments. It is shown that the reactor measurement may be able to resolve the degeneracy in θ_{23} if sin^2 2θ_{13} and cos^2 2θ_{23} are relatively large.

1. Introduction

Thanks to the successful experiments on atmospheric and solar neutrinos and KamLAND, we now know approximately the values of the mixing angles and the mass squared differences of the atmospheric and solar neutrino oscillations: (sin^2 2θ_{12}, Δm^2_1) ≃ (0.8, 7 × 10^{−5}eV^2) for the solar neutrino and (sin^2 2θ_{23}, |Δm^2_{31}|) ≃ (1.0, 3 × 10^{−3}eV^2) for the atmospheric neutrino. In the three flavor framework of neutrino oscillations, the quantities which are still unknown to date are the third mixing angle θ_{13}, the sign of the mass squared difference Δm^2_{31} of the atmospheric neutrino oscillation, and the CP phase δ. Among these three quantities, the determination of θ_{13} is the next goal in the near future neutrino experiments.

In this talk I will first explain briefly the ambiguity due to the parameter degeneracies, which occur in the long baseline experiments, using the sin^2 2θ_{13}–s^2_3 plane, and then I will show that reactor experiments will play a role complementary to accelerator experiments, and it may resolve a certain degeneracy when combined with an accelerator experiment. This talk

∗This work is supported in part by the Grant-in-Aid for Scientific Research in Priority Areas No. 12047222 and No. 13640295, Japan Ministry of Education, Culture, Sports, Science, and Technology. 1

2 is based on the work^1, in which references on the subject can be found.

2. Parameter degeneracies

It has been realized that we cannot determine the oscillations parameters θ_{jk} , Δm^2_{jk} , δ uniquely even if we know precisely the appearance probabilities P (ν_μ → ν_e) and P (ν̄_μ → ν̄_e) in a long baseline accelerator experiment with an approximately monoenergetic neutrino beam due to so-called parameter degeneracies. There are three kinds of the parameter degeneracies: the intrinsic (θ_{13}, δ) degeneracy, the degeneracy of Δm^2_{31} ↔ −Δm^2_{31}, and the degeneracy of θ_{23} ↔ π/2 − θ_{23}. Each degeneracy gives a two-fold solution, so in total one has eight-fold solution if the degeneracies are exact. When these degeneracies are lifted, there are eight solutions for the oscillation parameters such as θ_{13} etc., and it will be important in future long baseline experiments to discriminate the real solution from fake ones.

To explain the parameter degeneracies, let me consider the contours which are given by P ≡ P (ν_μ → ν_e) and P̄ ≡ P (ν̄_μ → ν̄_e) at the same time in the sin^2 2θ_{13}–s^2_3 plane. If there were no matter effect A ≡ √ 2G_F N_e = 0, if the mass squared difference Δm^2_1 of the solar neutrino oscillation were exactly zero, and if θ_{23} is exactly π/4, then we would have one solution with 8-fold degeneracy as is shown in Fig.1(a). If we lift the conditions in the order (A = 0, Δm^2_1 = 0, θ_{23} − π/4 = 0) → (A = 0, Δm^2_1 = 0, θ_{23} − π/4 ≠ 0) → (A = 0, Δm^2_1 ≠ 0, θ_{23} − π/4 ≠ 0) → (A ≠ 0, Δm^2_1 ≠ 0, θ_{23} − π/4 ≠ 0), then the exact degeneracies are lifted as is depicted in Figs.1(a) (one solution with 8-fold degeneracy) → (b) (two solutions with 4-fold degeneracy) → (c) (four solutions with 2-fold degeneracy) → (d) (eight solutions without any degeneracy). Furthermore, if we assume the neutrino energy to be approximately monoenergetic and to satisfy the oscillation maximum condition |Δm^2_{31}L/4E| = π/2 as is the case at the JHF experiment, then the contours look like Fig.1(e) and in this case only ambiguity which causes a problem is the θ_{23} degeneracy, since the intrinsic (θ_{13}, δ) degeneracy is exact and there is little ambiguity due to the sgn(Δm^2_{31}) degeneracy because |AL/2| ≪ 1. Here let me explain briefly the behaviors of the contours in Fig.1(e), which is shown in Fig.2 in detail. Using the analytic approximate formulae^3 in the case of the oscillation maximum,

P = x^2f^2 − 2xyfg sin δ + y^2g^2 , P̄ = x^2f̄^2 + 2xyf̄g sin δ + y^2g^2, (1)

May 6, 2019 11:15 WSPC/Trim Size: 9in x 6in for Proceedings ws-procs9x6

3

Figure 1. Contours which are given when both P and P̄ are known. The eight-fold parameter degeneracy is lifted as the small parameters are switched on: (cos^2 2θ_{23}, |Δm^2_1/Δm^2_{31}|, AL) (a)(= 0, = 0, = 0), (b)(≠ 0, = 0, = 0), (c)(≠ 0, ≠ 0, = 0), (d)(≠ 0, ≠ 0, ≠ 0), (e)(≠ 0, ≠ 0, ≠ 0, at the first oscillation maximum). The solid (dashed) line stands for the case for Δm^2_{31} > 0 (Δm^2_{31} < 0), respectively, (a),(b),(c). P̄ = P (P̄ > P ) is assumed in (a), (b) and (c) ((d) and (e)), respectively.

4

Figure 2. The contours which are given by both P and P̄ for Δm^2_{31} > 0 (the solid thick line) and for Δm^2_{31} < 0 (the dashed thick line) at the oscillation maximum |Δm^2_{31}L/4E| = π/2. These lie in the overlap of the region which is given by P only (the area which is bound by the thin black solid (dashed) line for Δm^2_{31} > 0 (Δm^2_{31} < 0)) and the region which is given by P̄ only (the area which is bound by the thin gray solid (dashed) line for Δm^2_{31} > 0 (Δm^2_{31} < 0)).

where x ≡ s_{23} sin 2θ_{13}, (f, f̄) ≡ cos(AL/2)/(1 ∓ AL/π), g ≡ sin(AL/2)/(AL/π), x ≡ s_{23} sin 2θ_{13}, y ≡ ϵ c_{23} sin 2θ_{12} and ϵ ≡ |Δm^2_1/Δm^2_{31}|, one can show for any given value of s^2_3

sin^2 2θ_{13} | |_{Δm231>0} − sin^2 2θ_{13} | |_{Δm231<0} = 1 s^2_3 1 ff̄ f − f̄ f + f̄ (P − P̄ ) ≃ AL πs^2_3

(P − P̄ ), (2)

if |AL/2| ≪ 1. Therefore the thick solid and thick dashed lines are close to each other in Fig.2 because the matter effect and ϵ are both small. Notice that |P − P̄ | could be large if ϵ were large even if |AL/2| ≪ 1. One can also show

max s^2_3 | |_{Δm231<0} − max s^2_3 | |_{Δm231>0} = 1 ϵ^2 1 sin^2 2θ_{12} 1 g^2 f − f̄ f + f̄ (P − P̄ ) ≃ 1 ϵ^2

(2/π)^2 sin^2 2θ_{12} AL π (P − P̄ ) (3)

if |AL/2| ≪ 1. (3) indicates that max s^2_3|_{Δm}2_{31<0} − max s^2_3|_{Δm}2_{31>0} is

5 large in Fig.2 because a small quantity AL(P − P̄ ) is enhanced by a large factor 1/ϵ^2. In the case of the JHF experiment, which has L=295km, A ≃1/(1900km), ϵ ≃ 1/35, if P =0.025 and P̄ =0.035, then the right hand side of (2) ≃ 5 × 10^{−4}, and the right hand side of (3) ≃ 0.3.

3. Reactor measurements of θ_{13}

In the three flavor framework the disappearance probability of the reactor neutrinos with a baseline less than 10km is given by

P (ν̄_e → ν̄_e) = 1 − sin^2 2θ_{13} sin^2 ( Δm^2_{31}L 4E ) , (4)

to a good approximation. Hence reactor measurements are free from the ambiguity due to the matter effect, the CP phase δ and θ_{23}. It has been shown^{1,2} that a reactor measurement at the Kashiwazaki-Kariwa nuclear power plant potentially has sensitivity down to sin^2 2θ_{13} ≃ 0.02.

Figure 3. Situations of the long baseline accelerator experiment at the oscillation maximum (|Δm^2_{31}L/4E| = π/2): (a) the case with θ_{23} ≃ π/4, (b) the case with θ_{23} ≠ π/4.

4. Resolution of the θ_{23} ambiguity by the LBL and reactor experiments

Once we have the results from, say, the phase 2 of the JHF experiment on P (ν_μ → ν_e) and P (ν̄_μ → ν̄_e) and the reactor measurement of P (ν̄_e → ν̄_e), there are two possibilities. One is the case where sin^2 2θ_{23} is close to 1, as is shown in Fig.3(a). In this case one could not resolve the ambiguity within

6

Figure 4. Resolution of the θ_{23} degeneracy by combining the results of the reactor and the long baseline accelerator experiments at the oscillation maximum: (a) the case with θ_{23} < π/4, (b) the case with θ_{23} > π/4. The shaded region stands for the error in sin^2 2θ_{13} of the reactor experiment.

7

Figure 5. (a) Errors in the reactor experiment. (b) Ambiguities due to the θ_{23} degeneracy in the long baseline accelerator experiment at the oscillation maximum, where the horizontal axis is defined in such a way that it is near in sin^2 2θ_{23} . ϵ ≡ |Δm^2_1/Δm^2_{31}|=0.028 is the best fit case for the solar and atmospheric neutrino data where δ_{de}(sin^2 2θ_{13})/ sin^2 2θ_{13} is approximated by |1 − tan^2 θ_{23}| for almost all the values of sin^2 2θ_{13} , while ϵ = 0.12 is the most pessimistic case within the 90%CL allowed region for the solar and atmospheric neutrino data, for which approximation by |1 − tan^2 θ_{23}| is not good.

the experimental error nor would one have to worry about the ambiguity, as the difference is small. On the other hand, if sin^2 2θ_{23} turns out to be away from 1 as is depicted in Fig.3(b), then the reactor result may enable us to resolve the θ_{23} ambiguity.

As is shown in Fig.4(a) and (b), if the ambiguity δ_{de}(sin^2 2θ_{13}) ≡ | sin^2 2θ^′_{13} − sin^2 2θ_{13}| due to the degeneracy, where θ_{13} and θ^′_{13} stand for the values of θ_{13} for the real and fake solutions, is larger than the error δ_{re}(sin^2 2θ_{13}) of the reactor measurement, then we can resolve the θ_{23} ambiguity. δ_{de}(sin^2 2θ_{13}) can be computed from the equation (26) in Ref.^4, and we obtain

δ_{de}(sin^2 2θ_{13})

sin^2 2θ_{13} = | |1 − tan^2 θ_{23} | | [ 1 + ϵ^2 sin^2 2θ_{13} tan^2 (aL/2) (aL/π)^2 [1 − ( aL π )^2] sin^2 2θ_{12} ] . (5)

Hence δ_{de}(sin^2 2θ_{13})/ sin^2 2θ_{13} can be approximated by |1 − tan^2 θ_{23}| un-

8 less ϵ is large such as 0.1. As for the error of the reactor measurements, we have δ_{re}(sin^2 2θ_{13}) ≃ 0.018 for any value of sin^2 2θ_{13} in the case with the systematic error 0.8% and 40t·yr. δ_{re}(sin^2 2θ_{13})/ sin^2 2θ_{13} and δ_{de}(sin^2 2θ_{13})/ sin^2 2θ_{13} are shown in Fig.5(a) and (b), and from these figures one can read off the region where the θ_{23} ambiguity is resolved. In general the θ_{23} ambiguity is resolved if sin^2 2θ_{13} and 1 − sin^2 2θ_{23} are both large.

5. Summary

In this talk I have shown that the 8-fold parameter degeneracy in long baseline experiments can be visualized in the sin^2 2θ_{13}–s^2_3 plane. I have demonstrated that one may be able to resolve the θ_{23} ambiguity by combining the results of the JHF experiment at the oscillation maximum and a reactor experiment whose sensitivity for sin^2 2θ_{13} is 0.02, if sin^2 2θ_{13} and cos^2 2θ_{23} are both relatively large. This scenario offers one of the strategies which are expected to resolve the ambiguities due to the parameter degeneracies.^a

References 1. H. Minakata, H. Sugiyama, O. Yasuda, K. Inoue and F. Suekane, arXiv:hepph/0211111.

2. F. Suekane, talk at The 4th Workshop on ”Neutrino Oscillations and Their Origin”, February 10-14, 2003, Kanazawa, Japan (http://www-sk.icrr.u-tokyo.ac.jp/noon2003/transparencies/11/Suekane.pdf).

3. A. Cervera, A. Donini, M. B. Gavela, J. J. Gomez Cadenas, P. Hernandez, O. Mena and S. Rigolin, Nucl. Phys. B 579, 17 (2000) [Erratum-ibid. B 593, 731 (2001)] [arXiv:hep-ph/0002108].

4. V. Barger, D. Marfatia and K. Whisnant, Phys. Rev. D 65, 073023 (2002) [arXiv:hep-ph/0112119];

5. S. Parke, talk at The 4th Workshop on ”Neutrino Oscillations and Their Origin”, February 10-14, 2003, Kanazawa, Japan (http://www-sk.icrr.u-tokyo.ac.jp/noon2003/transparencies/11/Parke.pdf).

6. A. Donini, talk at The 4th Workshop on ”Neutrino Oscillations and Their Origin”, February 10-14, 2003, Kanazawa, Japan (http://www-sk.icrr.u-tokyo.ac.jp/noon2003/transparencies/11/Donini.pdf).

aAs other alternatives to resolve the ambiguities, Parke^5 proposed to measure both P (ν_μ → ν_e) and P (ν̄_μ → ν̄_e) at JHF off the oscillation maximum and at NuMI at the oscillation maximum, whereas Donini^6 discussed the measurements of the golden channel P (ν_e → ν_μ) and the silver channel P (ν_e → ν_τ ) at a neutrino factory.