arXiv:gr-qc/0202038v1 12 Feb 2002

Thermal lensing in cryogenic sapphire substrates

Takayuki Tomaru†∗, Toshikazu Suzuki‡, Shinji Miyoki†, Takashi Uchiyama‡, C.T. Taylor†, Akira Yamamoto‡, Takakazu Shintomi‡, Masatake Ohashi†, Kazuaki Kuroda†

† Institute for Cosmic Ray Research (ICRR), The University of Tokyo, 5-1-5 Kashiwanoha, Kashiwa, Chiba, 277-8582, Japan ‡ High Energy Accelerator Research Organization (KEK), 1-1 Oho, Tsukuba, Ibaraki, 305-0801, Japan

Abstract. We report the reduction of the thermal lensing in cryogenic sapphire mirrors, which is planed to be used in the Large scale Cryogenic Gravitational wave Telescope (LCGT) project. We measured three key parameters of sapphire substrate for thermal lensing at cryogenic temperature. They are optical absorption coefficient, thermal conductivity and temperature coefficient of refractive index at cryogenic temperature. On basis of these measurements, we estimated the shot noise sensitivity of the interferometer with thermal lensing by using a wave-front tracing simulation. We found that thermal lensing in cryogenic sapphire mirrors is negligible.

∗ Present address: High Energy Accelerator Research Organization (KEK), 1-1 Oho, Tsukuba, Ibaraki, 305-0801, Japan E-mail: tomaru@post.kek.jp

1. Introduction

Thermal lensing is a serious problem for the next generation interferometric gravitational wave detectors. Thermal lensing is an effect of wave-front distortion of laser beam caused by refractive index distribution in the mirrors with temperature distribution due to optical absorption. It causes mode mismatching between beam wave-front and mirror surface, and it finally increases the photon shot noise[1]. Although monocrystalline sapphire mirror substrate is one of the most effective materials to reduce thermal noise[2, 3, 4], it has large optical absorption at present stage. Large effort to reduce thermal lensing by reducing optical absorption in sapphire are done by some groups[5, 6, 7]. In this paper, we report the reduction of the thermal lensing in the cryogenic sapphire mirrors, which are planed to be used in the Large scale Cryogenic Gravitational wave Telescope (LCGT) project[8] to reduce thermal noise drastically[9, 10]. Firstly, we describe the measurement of key parameters of sapphire substrate at cryogenic temperature, which are needed to estimate wave-front distortion caused by thermal lensing. After then, we discuss the shot noise sensitivity with thermal lensing by using a wave-front tracing simulation (an FFT simulation)[11].

2. Measurement of key parameters of sapphire substrate for the thermal lensing at cryogenic temperature

The sagitta of wave-front distortion of laser beam ds caused by the thermal lensing depends on three parameters of mirror substrate; ds ∝ αβ κ (1) where α is optical absorption coefficient in the mirror, κ is thermal conductivity of the mirror substrate and β is temperature coefficient of refractive index (dn/dT ) of the mirror substrate.

Firstly, we measured optical absorption coefficient in cryogenic sapphire by laser calorimetry method[12]. The sample temperature was 5 K and light wavelength was 1.064 μm (Nd:YAG laser). We measured two sapphire samples, ”CSI white high purity” and ”Hemlite”, both manufactured by Crystal Systems Inc[13]. The size of ”CSI white” is 10 mm in diameter and 150 mm in thickness, and that of ”Hemlite” is 100 mm in diameter and 60 mm in thickness. The results show about 90 ppm/cm optical absorption for both samples[14]. There is also no large difference of optical absorption coefficient at different positions in a sample for both samples. At room temperature, there are several reports for optical absorption in small sapphire samples by photothermal method[5, 6, 7, 15]. Although their values scatter in a range from 3 ppm/cm to 550 ppm/cm, typical values are in between 40 ppm/cm and 100 ppm/cm.

Secondly, we measured thermal conductivity of sapphire in a range from 4 K to 40 K. Thermal conductivity of crystals at cryogenic temperature largely depends on sample quality. The ”CSI white” sample, used in optical absorption measurement, was used.

The measurement method is the longitudinal heat flow method[16]. The result shows that the maximum thermal conductivity of the sample was 4.3 × 10^3 W/m/K at 20 K. This value is about four times smaller than the value in the data book[16]. However, this value is two orders of magnitude larger than the value at room temperature.

Lastly, we measured temperature coefficient of refractive index β of cryogenic sapphire by measuring the change of refractive angle of light due to the change of sample temperature. The displacement of transmitted beam δx caused by change of refractive index is described as

δx = sin( π 2 − θ) d cos ϕ 1 cos ϕ tan ϕ δn n , (2)

where d is the sample length, ϕ is the refractive angle, n is the refractive index of the sample at temperature T and δn is the change of the refractive index. Injection beam angle θ of 60 degrees was used, which gave maximum displacement of transmitted beam for sapphire. The ”Hemlite” sample, 100 mm in diameter and 60 mm in thickness, was used. To investigate thermal deformation of the sample, the displacement of reflected beam from the sample was also monitored. Although the measured result was limited by thermal deformation of the sample, the upper limit of |β| ≤ 9 × 10^{−8} K^{−1} was obtained at 1.064 μm in an average between 5 K and 40 K. This value was two orders of magnitude smaller than that at room temperature[17].

3. Thermal lensing in interferometer

Table 1. Comparison of thermal lensing parameters for fused silica and sapphire.

Fused silica (300 K) Sapphire (300 K) Sapphire (20 K) α [ppm/cm] 2 - 20 40 - 100 90 κ [W/m/K] 1.4 46 4.3 × 10^3 β [K^{−1}] 1.4 × 10^{−5} 1.3 × 10^{−5} ≤ |9 × 10^{−8}| αβ/κ [W^{−1}] × 10^{−9} 2 - 20 1 - 3 ≤ |2 × 10^{−4}|

Table 1 lists the thermal lensing parameters for fused silica and sapphire. This table shows that thermal lensing in cryogenic sapphire mirrors is at least four order of magnitude smaller than that both in fused silica and in sapphire at room temperature. We can regard the thermal lensing in fused silica at room temperature as almost same as that in sapphire at room temperature.

To estimate the shot noise sensitivity of interferometers affected by thermal lensing, an FFT simulator is useful. The FFT simulator was developed by LIGO[11]. We assumed optical absorption in sapphire substrate of 90 ppm/cm and that in coating of 1 ppm. The LCGT design, the configuration is a power recycled Fabry-Perot Michelson interferometer (Figure 1), the finesse is 100, the recycling gain is 50 and the injection laser power is 100 W, was used in this calculation. The phase maps of wave-front

Figure 1. A model of GW interferometer (power recycled Fabry-Perot Michelson interferometer). The phase maps of wave-front distortion caused by thermal lensing were inputted into the both near mirrors. The LCGT design was used in this calculation.

distortion caused by thermal lensing was calculated by Hello’s method[18] (Figure 2 (a)). In the case of cryogenic mirrors, since thermal radiation from the mirrors is very small and the mirrors are cooled only by thermal conduction of suspension fibers, we calculated the phase maps by changing from the boundary condition of Hello’s calculation, which is the thermal radiation, to that of thermal conduction of a fiber (Figure 2 (b)). Where we assumed an axi-symmetric model of thermal conduction as the first approximation. Since the calculation of thermal lensing in the beam splitter has difficulty of axi-asymmetric temperature distribution, we took this effect into the simulation by assuming different thermal lensing between both arms. No compensative technique for wave-front distortion[19, 20, 21] was considered in this calculation.

Figure 3 shows the results of the shot noise sensitivity calculated by using the FFT simulation. This result shows that the shot noise sensitivity in the case that sapphire mirrors are used at room temperature is two times worse than that in the ideal case due to thermal lensing. This sensitivity decline is resulted from the reduction of recycling gain, from 50 to 16. In the case that there are different optical absorption between the both arms, decline of contrast also reduces the sensitivity. On the other hand, the thermal lensing in cryogenic sapphire mirrors is negligible, even if the case of ±50 % asymmetric optical absorption between the both near mirrors. Cryogenic sapphire mirror effectively prevents thermal lensing.

4. Summary

We estimated the thermal lensing in cryogenic sapphire mirrors on the basis of measurements. We conclude that cryogenic sapphire mirror is effective for not only reducing thermal noise but also suppressing thermal lensing. As a remaining problem of cryogenic interferometers, there is a cooling problem due to large optical absorption in sapphire substrate, which will be solved in near future.

Thermal lensing in cryogenic sapphire substrates 5

Figure 2. A calculation model of wave-front distortion caused by thermal lensing. (a) Room temperature case (Hello’s model). Thermal equilibrium in the mirror is achieved by optical absorption and thermal radiation[18]. (b) Cryogenic temperature case. 20 K was assumed in the LCGT design. Thermal equilibrium in the mirror is achieved by optical absorption and thermal conduction of a fiber. As the first approximation, axi-symmetric heat flow was assumed.

Figure 3. Calculation results of the shot noise sensitivity with and without thermal lensing in sapphire mirrors both at room temperature and at cryogenic temperature. ”Ideal” means the shot noise for the ideal interferometer. The values of ”±0%”, ”±30 %” and ”±50 %” mean asymmetric optical absorption between the both near mirrors.

Thermal lensing in cryogenic sapphire substrates 6

Acknowledgments

This study was carried out under the MOU between LIGO[22] and TAMA[23]. We express our appreciation to Dr. B. Bochner, Dr. P. Saha and Dr. Y. Hefetz, the developers of the LIGO’s FFT simulator. We wish to express appreciation to Dr. H. Yamamoto for preparation of the FFT simulator. We also express particular thanks to Dr. P. Hello and Dr. J. Y. Vinet, all the developers of the early FFT simulation code.

Reference

[1] P. Hello and J. Y. Vinet, Phys. Lett. A 178, (1993) 351. [2] P. R. Saulson, Phys. Rev. D 42, (1990) 2437. [3] Y. Levin, Phys. Rev. D 57, (1998) 659.

[4] V. B. Braginsky et al., Systems with Small Dissipation, Univ. Chicago Press, Chicago (1985) [5] M. M. Fejer, Presentation in LSC meeting, (2001), http://www.ligo.caltech.edu/docs/G/G010152- 00/ [6] D. G. Blair et al., Optical Materials 8 (1997) 233.

[7] F. Benabid, The University of Western Australia, Ph.D. thesis, (2000) [8] K. Kuroda et al., Int. J. Mod. Phys. D 8 (1999) 557. [9] T. Uchiyama et al., Phys. Lett. A 261 (1999) 5. [10] T. Uchiyama et al., Phys. Lett. A 273 (2000) 310.

[11] B. Bochner, Massachusetts Institute of Technology, Ph.D. thesis, (1998) [12] M. Hass et al., Appl. Opt. 14 (1975) 1128.

[13] F. Schmid et al., Am. Ceramic Soc. Bull., 73(2) (1994) 39. [14] T. Tomaru et al., Phys. Lett. A 283 (2001) 80. [15] C. Braxmaier et al., Phys. Rev. D 64 (2001) 042001.

[16] Thermophysical Properties of Matter Vol. 2 Thermal Conductivity-Nonmetallic Solids, The TPRC Data Series, IFI/PLENUM New York-Washington (1970).

[17] I. H. Malitson, J. Opt. Soc. Am. 52, (1962) 1377. [18] P. Hello and J. Y. Vinet, J. Phys. France 51 (1990) 1267.

[19] LIGO II Reference Design, http://www.ligo.caltech.edu/∼ligo2/scripts/refdes.html [20] N. Kugler et al., Appl. Opt. 36 (1997) 9359. [21] U. J. Greiner et al., Opt. Lett. 19, (1994) 1207. [22] A. Abramovici et al., Science 256, (1992) 325.

[23] K. Tsubono, Proceedings of the first Edoardo Amaldi Conference on Gravitational Wave Experiments, Singapore, (1995) 112. : K. Kuroda et al., Proceedings of the international conference on gravitational waves: source and detectors, Singapore, (1997) 100.