arXiv:cond-mat/0503619v2 [cond-mat.other] 13 Oct 2005

Bose-Einstein Condensation on a Permanent-Magnet Atom Chip

C. D. J. Sinclair, E. A. Curtis, I. Llorente Garcia, J. A. Retter,^∗ B. V. Hall,^† S. Eriksson, B. E. Sauer, and E. A. Hinds^‡ Centre for Cold Matter, Blackett Laboratory, Imperial College, Prince Consort Road, London SW7 2BW, United Kingdom

We have produced a Bose-Einstein condensate on a permanent-magnet atom chip based on periodically magnetized videotape. We observe the expansion and dynamics of the condensate in one of the microscopic waveguides close to the surface. The lifetime for atoms to remain trapped near this dielectric material is significantly longer than above a metal surface of the same thickness. These results illustrate the suitability of microscopic permanent-magnet structures for quantum-coherent preparation and manipulation of cold atoms.

PACS numbers: 03.75.Kk, 34.50.Dy, 39.25.+K, 03.75.Be

Atom chips are making rapid progress in the quantumcoherent manipulation of microscopic cold atom clouds [1, 2, 3] with a view to fundamental studies of quantum gases [4], interferometry [5], and quantum information processing [6]. Small-scale magnetic field patterns for atom chips can be made using either microfabricated current-carrying wires or microscopic structures of permanent magnetization. This second idea is attractive because there is no power dissipation in a permanent magnet and because very tight atom traps with oscillation frequencies of ∼ 1 MHz (10 nm ground state size) are possible [7]. Previous studies have used audiotape [8], floppy disks [9, 10], videotape [11], magnetic and magneto-optical films [7, 12, 13], and hard disks [14]. Until recently, permanently magnetized films were used only for mm- or cm-scale manipulation of atom clouds by reflection, but now cold atom clouds have been loaded into the microtraps [12, 15]. For many applications of these magnetic microtraps, the next significant step is to prepare a Bose-Einstein condensate (BEC) on the chip as a source of coherent matter waves for interferometry or as a low-entropy reservoir for quantum information processing.

In this paper we describe the production of a BEC on a permanent-magnet atom chip made from videotape, which forms an array of waveguides. We have observed the propagation of the BEC along one of these guides. With the ends of the guide closed, we study center-of-mass and length oscillations of the trapped gas, demonstrating that the videotape chip is a practical way to manipulate cold atoms. We also show that the spin relaxation time of the trapped atoms is significantly longer above the dielectric surface of the videotape than above a metal surface of the same thickness.

The waveguides of our atom chip are due to a sinu-

∗Present address: Laboratoire Charles Fabry de l’Institut d’Optique, UMR8501 du CNRS, 91403 Orsay Cedex, France. †Present address: Centre for Atom Optics and Ultrafast Spectroscopy, Swinburne University of Technology, Melbourne, Australia.

‡Electronic address: ed.hinds@imperial.ac.uk

FIG. 1: Magnetic field lines produced by the magnetized videotape are shown in the foreground. A uniform bias field, B_{bias}, is added to this to make an array of atom guides. Contours of constant magnetic field strength are shown in the background. Circular contours enclose the lines of minimum field strength, where atoms are trapped.

soidal pattern of magnetization written along the length of the videotape (x̂ direction) with the form M_0 cos(kx)x̂, as illustrated in Fig. 1. This produces a field

(B_x, B_y) = B_{sur} e^{−ky}(− cos(kx), sin(kx)), (1)

where B_{sur} is the field strength at the surface (y = 0). The waveguides appear, as shown at the top of Fig. 1, when a bias field B_{bias} is added in the x-y plane. Near the center of each guide, the magnetic field has a quadrupole structure with a gradient of field strength given by B^′ = kB_{bias}. An axial bias B_z prevents the total field from going to zero at the center. For small-amplitude transverse oscillations this makes a harmonic trap with frequency 2πf_r = kB_{bias} √ μ_B g_F m_F mB_z , (2)

where μ_B g_F m_F is the usual factor in the Zeeman energy and m is the mass of the atom.

Our atom chip is made using Ampex 398 Betacam SP videotape, which has a 3.5 μm-thick magnetic layer containing iron-composite needles set in a glue and supported on a polymer ribbon 11 μm thick. The magnetization has a period of 106 ± 2 μm and gives a surface field of B_{sur} = 11 ± 1 mT [15]. With a small bias field of B_{bias} = 0.1 mT and B_z = 0.1 mT, the atom guides

FIG. 2: Videotape atom chip assembly. The gold-coated surface is 2.5 × 2.5 cm. Wires underneath facilitate the loading and manipulation of atoms on the chip.

lie 79 μm from the surface of the chip. For ground state 87Rb atoms in the |F = 2, m_F = 2⟩ sublevel the transverse oscillation frequency is 760 Hz. The bias field does not alter the magnetization of the videotape, which has very low susceptibility and high coercivity. Further details on permanent magnetic patterns may be found in Ref. [3].

A piece of recorded videotape is glued to a glass coverslip and is coated with approximately 400 nm of gold to make the surface reflect 780 nm light. This allows the formation of a magneto-optical trap (MOT) by reflection [16] in order to collect and cool the atoms close to the videotape. The coverslip is then glued to a stainless-steel base to form the assembly shown in Fig. 2. Underneath this, three wires run parallel to the z direction. The central one, the “center wire”, is used to transport cold atoms from the MOT into one of the videotape guides, whilst the outer two form an rf antenna for evaporative cooling. The two wires running along x allow the guide to be pinched off to form a trap by making a field whose z component rises to a maximum above each wire. The whole assembly is mounted in a vacuum chamber, where a remarkably low outgassing rate [17] allows the vacuum to reach ∼ 10^{−11} Torr. Further details of the construction are given in Ref. [15].

Cold^{87}Rb atoms from a low-velocity intense source (LVIS)[18] are captured 4 mm from the surface by the reflection MOT. This is loaded for 20 s to collect typically 10^9 atoms before the LVIS is turned off. The MOT is moved to 1.5 mm from the surface by ramping up an external bias field, while increasing the laser detuning from -15 MHz to -45 MHz, cooling the cloud to 50 μK. Next, the MOT light and quadrupole field are switched off, the atoms are optically pumped into the |F = 2, m_F = 2⟩ state, and the cloud is recaptured in a purely magnetic trap, formed by passing 15 A through the center wire with a 1.4 mT bias field along x.

The bias field is ramped up to 4.4 mT over 100 ms, which increases the trap depth, compresses the cloud and moves it to 160 μm from the surface. An initial stage of forced evaporative cooling ensures the cloud is cold enough to load only one of the videotape microtraps.

FIG. 3: Absorption images taken after 8.7 ms of free expansion. (a) Thermal cloud at 500 nK with a final rf frequency of 820 kHz. (b) Condensate with a final rf frequency of 810 kHz. Image area is 0.9 × 0.5 mm.

The rf field is swept over 6 s from 30 MHz to 3.9 MHz, cooling the cloud to ∼ 15μK. We continue to evaporate at 3.9 MHz by reducing the center-wire current and the bias field over 4 s. This gradually merges the wire trap with one of the videotape microtraps as the cloud approaches the surface. The wire current is then ramped to zero leaving the atoms confined entirely by the videotape microtrap at a temperature of order 10 μK.

A final rf sweep lasting two or three seconds, typically down to 800 kHz, cools the cloud below its critical temperature. The transition to a condensate can be seen by releasing the cloud, allowing it to expand, and imaging its density by the absorption of light tuned to the D2(F = 2 → 3) transition. Figure 3(a) shows a 500 nK thermal cloud imaged after 8.7 ms of expansion. The trap was 88 μm from the surface with f_r = 450 Hz and f_z = 15 Hz giving a prolate aspect ratio of 30 : 1. The isotropic thermal velocity distribution gives a nearly spherical image after expansion. By contrast, the condensate imaged in Fig. 3(b) is oblate, as expected for a condensate that is prolate in the microtrap. The cloud is released by switching off B_{bias} in a time of 3 to 4 ms.

An important feature of the atom chip is that it creates waveguides in which the atoms can propagate. We have used this as a better way to see the formation of the condensate. After evaporation, we open the ends of the trap by switching off the end wires. Now the cloud expands freely along the guide and we make absorption images of the atoms in situ. Figure 4(a) shows the Gaussian density profile of a 520 nK thermal cloud after 13.7 ms of expansion in a guide with f_r = 580 Hz. By contrast, Fig. 4(b) shows a similarly expanded BEC. Here the thermal component has a temperature of 330 nK as obtained from a fit to the wings of the profile. Near the center we add a parabola of 180 μm length to this in order to fit the region of the condensate. The expected condensate length can be found by the following rough estimate. Since a quarter of the cloud is condensed at 330 nK, we calculate that the initial trap (f_r = 320 Hz, f_z = 15 Hz) has about 8 × 10^4 atoms in the condensate, with a Thomas- Fermi length of 90 μm. After 13.7 ms of expansion (see Eq. 11 of Ref. [19]) this length is expected to grow to 200 μm. Our measurement therefore indicates that the interaction with the thermal cloud may slightly impede the expansion, although we do not currently have enough

FIG. 4: Atom density profiles measured by absorption imaging after allowing the cloud to expand for 13.7 ms in a videotape waveguide. (a) Thermal cloud at 520 nK. (b) Partially condensed cloud with a thermal component at 330 nK. The parabolic central peak corresponding to the condensed fraction is 180 μm wide.

accuracy in all the relevant parameters to be sure. In any case, the condensate length grows rapidly in the waveguide compared with a 3D expansion because there is no radial expansion to release the mean-field energy.

The permanent-magnet waveguides also offer a suitable setting in which to study more complex dynamics of the cloud. In order to demonstrate this possibility we jump the axial frequency to a lower value but do not remove the axial trapping entirely. This excites a length oscillation of the trapped cloud [20, 21]. We also see an oscillation of its center-of-mass, due to a gravitational shift of the equilibrium position because the atom chip is not perfectly horizontal. Open circles in Fig. 5 show the center-of-mass motion, which is well described by a damped cosine of frequency f_z = 7.6 ± 0.4 Hz and ∼ 180 ms decay time. The damping is probably due to a slight roughness in the magnetic potential, which results from defects in the videotape material [15]. When the initial cloud is thermal, we measure a frequency for length oscillations of 2f_z, as expected. By contrast, if we prepare a partly condensed cloud before relaxing the trap we measure a slower breathing frequency. After a few tens of milliseconds, the atom density profiles no longer show a clear two-component distribution, indicating coupling between the condensed and thermal components. The

FIG. 5: Oscillations following a jump of the axial frequency. Open circles: center-of-mass oscillation. Filled circles: length oscillation. Solid curves are damped cosines. Each point represents a single destructive measurement.

filled circles in Fig. 5 show how the length of the cloud evolves over 300 ms. The main features of the motion are once again described by a damped cosine with 180 ms decay time, but now the frequency is 11.2 ± 0.4 Hz. Within the accuracy of our measurements this frequency is consistent with √ 12/5f_z = 11.8 ± 0.6 Hz as expected for a Bose gas in the hydrodynamic limit [22, 23]. We anticipate that the damping time of the length oscillation would be longer in a smoother guide and with a pure condensate. We are now studying the effects of roughness on the dynamics of cold clouds in these waveguides and we are pressing towards guides of higher radial frequency where aspects of 1D many-body physics may be explored.

In contrast to other atom chips, the material of the videotape is an insulator, not a conductor. This is significant because the trapped atom loss due to spin flips is expected to be much less severe near an insulating surface [24] than it is near a metal [25, 26]. Under conditions that apply to our experiment, we expect a lifetime ∝ ρd^2/h, where ρ is the resistivity of the film, h is its thickness, and d is the atom-surface distance [1]. At the MHz frequencies of relevance here, the resistivity of the videotape film is at least a million times larger than that of gold, so it is predicted that the spin flip rate above our chip should be due entirely to the 400 nm gold film on the surface. Scheel et al. have recently derived a rigorous formula for this rate [27, 28]. Figure 6 shows the lifetime calculated according to Ref. [28] due only to the 400 nm gold layer at the 350(±50) K temperature of the chip. Far from the chip the lifetime is 35 s due to collisions with the background gas. The data points show the longest thermal cloud lifetimes we have measured at various heights above the chip. They agree, confirming that the videotape itself makes no appreciable contribution to the loss rate. For comparison, the dashed line shows the calculated lifetime near a 4 μm-thick gold layer, which is the total thickness of our magnetic layer plus the gold

FIG. 6: Data: lifetimes for loss of atoms trapped above videotape atom chip with a 400 nm gold layer. Solid lines: theory of Scheel et. al. at temperature 350 ± 50K. Dashed line: expected lifetime near a 4 μm-thick gold layer.

coating, and is also typical of the gold thickness used to make atom chips with current-carrying wires. This result shows that permanent magnets may be preferable to metal atom chips in applications where the atoms’ quantum states decohere as a result of magnetic field fluctuations.

In this paper we have shown that a long thin BEC can be prepared in a microtrap formed by a videotape atom chip and can be manipulated in the waveguides of the chip. We have demonstrated a long spin-relaxation lifetime for atoms trapped in this way. These experiments show that permanent-magnet micro-structures offer a powerful new method for making atom microtraps with long lifetimes and tight confinement, which are relevant for applications involving low-dimensional quantum gases. To build more complicated quantum circuits, such as those required for quantum information processing, it will be necessary (and straightforward [7]) to write more elaborate magnetic patterns on the surface.

Acknowledgments

We acknowledge the technical assistance of Jon Dyne. This work is supported by the UK EPSRC Physics Program, the RCUK Basic Technology Program, the Royal Society and the QGates, AtomChips, and FASTnet networks of the European Commission.

[1] R. Folman, P. Krüger, J. Schmiedmayer, J. Denschlag, and C. Henkel, Adv. At. Mol. Opt. Phys. 48, 263 (2002).

[2] J. Reichel, Appl. Phys. B 74, 469 (2002).

[3] E. A. Hinds and I. G. Hughes, J. Phys. D 32, R119 (1999).

[4] L. Pricoupenko, H. Perrin, and M. Olshanii, eds., Quantum Gases in Low Dimensions, vol. 116 of J. Phys. IV France (2004).

[5] Y.-J. Wang, D. Z. Anderson, V. M. Bright, E. A. Cornell, Q. Diot, T. Kishimoto, M. Prentiss, R. A. Saravanan, S. R. Segal, and S. Wu, Phys. Rev. Lett. 94, 090405 (2005).

[6] T. Calarco, E. A. Hinds, D. Jaksch, J. Schmiedmayer, J. I. Cirac, and P. Zoller, Phys. Rev. A 61, 022304 (2000).

[7] S. Eriksson, F. Ramirez-Martinez, E. A. Curtis, B. E.

Sauer, P. W. Nutter, E. W. Hill, and E. A. Hinds, Appl. Phys. B 79, 811 (2004).

[8] T. M. Roach, H. Abele, M. G. Boshier, H. L. Grossman, K. P. Zetie, and E. A. Hinds, Phys. Rev. Lett. 75, 629 (1995).

[9] I. G. Hughes, P. A. Barton, T. M. Roach, M. G. Boshier, and E. A. Hinds, J. Phys. B: At. Mol. Opt. Phys. 30, 647 (1997).

[10] C. V. Saba, P. A. Barton, M. G. Boshier, I. G. Hughes, P. Rosenbusch, B. E. Sauer, and E. A. Hinds, Phys. Rev. Lett. 82, 468 (1999).

[11] P. Rosenbusch, B. V. Hall, I. G. Hughes, C. V. Saba, and E. A. Hinds, Phys. Rev. A 61, 031404(R) (2000).

[12] I. Barb, R. Gerritsma, Y. T. Xing, J. B. Goedkoop, and R. J. C. Spreeuw, Eur. Phys. J. D 35, 75 (2005).

[13] D. C. Lau, R. J. McLean, A. I. Sidorov, D. S. Gough, J. Koperski, W. J. Rowlands, B. A. Sexton, G. I. Opat, and P. Hannaford, J. Opt. B: Quantum Semiclassical Opt. 1, 371 (1999).

[14] B. Lev, Y. Lassailly, C. Lee, A. Scherer, and H. Mabuchi, Appl. Phys. Lett. 83, 395 (2003).

[15] C. D. J. Sinclair, J. A. Retter, E. A. Curtis, B. V. Hall, I. Llorente Garcia, S. Eriksson, B. E. Sauer, and E. A. Hinds, Eur. Phys. J. D 35, 105 (2005).

[16] J. Reichel, W. Hänsel, and T. W. Hänsch, Phys. Rev.

Lett. 83, 3398 (1999).

[17] S. A. Hopkins, E. A. Hinds, and M. G. Boshier, Appl.

Phys. B 73, 51 (2001).

[18] Z. T. Lu, K. L. Corwin, M. J. Renn, M. H. Anderson, E. A. Cornell, and C. E. Wieman, Phys. Rev. Lett. 77, 3331 (1996).

[19] Y. Castin and R. Dum, Phys. Rev. Lett. 77, 5315 (1996). [20] D. S. Jin, J. R. Ensher, M. R. Matthews, C. E. Wieman, and E. A. Cornell, Phys. Rev. Lett. 77, 420 (1996).

[21] H. Ott, J. Fortágh, S. Kraft, A. Günther, D. Komma, and C. Zimmermann, Phys. Rev. Lett. 91, 040402 (2003).

[22] A. Griffin, W.-C. Wu, and S. Stringari, Phys. Rev. Lett.

78, 1838 (1997).

[23] D. M. Stamper-Kurn, H.-J. Miesner, S. Inouye, M. R.

Andrews, and W. Ketterle, Phys. Rev. Lett. 81, 500 (1998).

[24] D. M. Harber, J. M. McGuirk, J. M. Obrecht, and E. A.

Cornell, J. Low. Temp. Phys. 133, 229 (2003). [25] M. P. A. Jones, C. J. Vale, D. Sahagun, B. V. Hall, and E. A. Hinds, Phys. Rev. Lett. 91, 080401 (2003).

[26] Y. J. Lin, I. Teper, C. Chin, and V. Vuletić, Phys. Rev.

Lett. 92, 050404 (2004).

[27] P. K. Rekdal, S. Scheel, P. L. Knight, and E. A. Hinds, Phys. Rev. A 70, 013811 (2004).

[28] S. Scheel, P. K. Rekdal, P. L. Knight, and E. A. Hinds, Phys. Rev. A 72, 042901 (2005).