arXiv:cond-mat/0002216v1 [cond-mat.mtrl-sci] 15 Feb 2000

Ferroelectricity and structure of BaTiO_3 grown on YBa_2Cu_3O_{7−δ} thin films

Ch. Schwan, F. Martin, G. Jakob, J.C. Martinez, and H. Adrian Institut für Physik, Johannes Gutenberg-Universität Mainz, D-55099 Mainz, Germany (March 19, 2019)

We have investigated the crystal structure and the ferroelectric properties of BaTiO3 thin films with YBa2Cu3O_{7−δ} as the bottom and Au as the top electrode. Epitaxial heterostructures of YBa2Cu3O_{7−δ} and BaTiO3 were prepared by dc and rf sputtering, respectively. The crystal structure of the films was characterised by x-ray diffraction. The ferroelectric behaviour of the BaTiO3 films was confirmed by hysteresis loop measurements using a Sawyer Tower circuit. We obtain a coercive field of 30 kV/cm and a remanent polarisation of 1.25 μC/cm^2. At sub-switching fields the capacitance of the films obeys a relation analogous to the Rayleigh law. This behaviour indicates an interaction of domain walls with randomly distributed pinning centres. At a field of 5 MV/m we calculate 3% contribution of irreversible domain wall motion to the total dielectric constant.

PACS numbers: 74.76.-w, 77.55.+f, 77.80.-e, 81.15.Cd, 84.32.Tt, 85.50.+k

I. INTRODUCTION

In recent years, there has been much interest in the preparation of superconducting field effect transistors (SuFETs) with a (Ba,Sr)TiO_3 thin film as gate insulator and YBa_2Cu_3O_{7−δ} (YBCO) as source-drain channel [1]. More recently the development of high frequency superconducting devices increased the interest of the community on YBCO/ferroelectric heterostructures [2]. From these studies it became clear that it is possible to grow high quality perovskite ferroelectric thin films on top of YBCO electrodes. This motivated us to investigate the room temperature ferroelectric and structural properties of YBCO/BaTiO_3/Au heterostructures.

The objective of this work is to analyse the domain wall contribution to the dielectric properties of high quality BaTiO_3 (BTO) thin films. So far, similar studies have only been done on Pt/PbZr_xTi_{1−x}O_3 (PZT)/Pt heterostructures [3].

II. EXPERIMENT

The 100 nm thick YBCO layers and the BTO films were sputtered in-situ in pure O_2 atmosphere. The top Au electrodes were thermally evaporated through a shadow mask. Before deposition, the YBCO target was pre-sputtered for 1 hour and the BTO target for 30 minutes. After this time the dc-voltage of the plasma did not decrease anymore showing that the targets reached a stable state. For both processes the substrate target distance was about 20 mm. The heterostructures have been prepared on MgO substrates because of the better High Frequency properties of this material in comparison to SrTiO_3. The YBCO ground electrode was prepared following the method already described in details in Ref. [4]. The difference in the present work is that the post annealing was performed after the deposition of the BTO layer. The stoichiometric BTO targets were prepared at the University of Mainz. The BTO films were deposited by rf-sputtering in on axis geometry without a magnetron in O_2 pressures between 0.5 and 1.5 mbar. This was needed in order to prevent re-sputtering. During deposition, the rf power was regulated at 130 W resulting in a typical bias voltage of 30 V. The best films were deposited at 700^∘C. At the end of the process, the bi-layers were cooled down to room temperature during 1 hour and annealed in 1 bar oxygen pressure. The electrode contact size varied between 0.5 mm^2 and 1 mm^2. X-ray diffraction patterns in Bragg-Brentano and four-circle geometry were obtained using a Philips X’Pert-MPD and a STOE STADI4 diffractometer, respectively. The capacitance and the hysteresis loops were measured with a HP4284A LCR-meter and a self made Sawyer-Tower circuit, respectively.

III. RESULTS AND DISCUSSION

A. X-ray diffraction

The θ/2θ-scan shown in Fig. 1 reveals only c-axis oriented growth of the BTO films. However as shown by detailed TEM studies there may still exist small amounts of a-axis oriented domains embedded on a c- axis matrix even if by x-ray diffraction no splitting caused by a-and c-axis oriented domains can be found [5]. The c-axis length of the BTO thin films in our work sputtered at 0.7 mbar is determined to be 3% larger in comparison with the bulk material and coincides with the value of the work of Abe et al. [6]. On the other hand, by using a deposition pressure of 1.5 mbar we obtain the same c-axis length like the bulk material. Hence the lattice expansion at a lower pressure may result from atomic defects due to the high kinetic energy of the incident species. This explanation is in accordance with our observation that the lattice expansion occurs only for BTO but not for SrTiO_3 thin films. As barium ions are much heavier than strontium ions they can induce more serious damage upon impact on the previously deposited film. We expect therefore the lattice parameters to be also dependent on the deposition technique, as already reported by Srikant et al. [7].

In order to characterise the in-plane orientation of the YBCO/BTO heterostructures we performed a ϕ-scan of the YBCO (103) reflex (see Fig. 2) and a two-dimensional scan of the plane ℓ = 1 for BTO (see Fig. 3). For both films there are 8 peaks, indicating a fourfold symmetry and an in-plane alignment of YBCO’s and BTO’s crystallographic axes parallel and rotated 45^∘ relative to the MgO lattice. The rotated alignment can be explained by the fact that 2 lattice constants of MgO equals 3 diagonal lattice parameters of YBCO. Since BTO grows on YBCO epitaxial it reproduces this 45^∘ rotation.

A fourfold symmetry was obtained by the use of SrTiO_3 substrates. The orientation matrix gives for our films the in-plane lattice constants a = b = (0.3994 ± 0, 0002) nm for BTO. This value is in excellent agreement with the result on bulk materials. For YBCO we measured a = 0.3847 nm, b = 0.3851 nm. These values coincide well with the average between a and b in bulk materials. This is due to the usual mixing of these two orientations observed in thin films done on standard substrates. The results above show, that the c- axis distortion of BTO cannot be explained by the requirement to conserve the unit cell volume, according to the Poisson ratio. This indicates that the high energy of barium at the sputtering process might be indeed responsible for the observed lattice distortion.

The mosaic spreads of the different layers were determined by measuring the rocking curves of BTO (002) and YBCO (005). For BTO we obtain a FWHM (full width at half maximum) of 0.38^∘ and for YBCO 0.32^∘, indicating a good epitaxial growth of the heterostructures. The small FWHM obtained in our BTO films can be explained by a reduced lattice mismatch between YBCO and BTO. For comparison, Wills et al. got for a-axis oriented BTO on LaAlO_3 substrates a FWHM of 0.6^∘ [8].

B. Ferroelectric hysteresis loops

The non-remanent component of polarisation is caused by non-ferroelectric ionic and electronic polarisability as well as field induced reversible ferroelectric domain wall motion. The remanent component is induced by switching ferroelectric domains. Using a Sawyer-Tower circuit, we obtain a remanent polarisation of P_r = 1.25μC/cm^2 and a coercive field of E_c = 30 kV/cm (Fig. 4). The remanent polarisation is consistent with other results obained by rf-sputtering [9,10]. But Yoneda et al. even observed for 30 monolayers thick BTO films a ferroelectric hysteresis up to 600^∘C [11]. Measuring the dielectric constant of our 300 nm thick BTO films, from room temperature to 200^∘C, did not indicate any sign of a ferroelectric phase transition, as well. This result is rather surprising since bulk BTO is known to have a Curie temperature of about 120^∘C [12]. This increase in the curie temperature could be due to internal stresses induced by the substrate.

C. Contribution of the domain walls to the permittivity

The major research in ferroelectric thin films emphasises the nucleation, growth and switching of domains because these features are very important for nonvolatile memory applications. In contrast, contributions to the dielectric or the piezoelectric constant at sub-switching fields due to domain wall displacements and vibrations were investigated mainly for single crystals or ceramics. We follow here the procedure of Taylor et al. by extending the models for the interaction and pinning of domain walls with randomly distributed pinning centres in magnetic materials to the dielectric displacement in ferroelectric thin films [3]. Below we will address the dielectric response of a BTO thin film both in terms of the weak-field (Rayleigh law) and the logarithmic frequency dependence. The Rayleigh law is valid for low-field conditions, where no nucleation of domains occur and the average structure of the domain walls drifts within the sample as the field is cycled [14]. In order to achieve the linear Rayleigh behaviour for the dielectric constant we cycled the sample about 10^7 times prior to the measurement with an amplitude below the coercive voltage. Figure 5 shows the linear dependence of the capacitance versus ac voltage amplitude V_0. From the capacitance at 100 Hz, and from the geometry of our electrodes we deduce a dielectric constant ϵ = 300. In accordance to the Rayleigh law the weak-field dependence can be described by the formula C = C_{init} + aV_0. C_{init} represents the intrinsic lattice and reversible domain wall movement. The second term aV_0 with the Rayleigh coefficient a is responsible for the weakfield hysteresis due to the pinning and depinning of domain walls. According to Néel it is caused by the irreversible displacement of the walls between two meta-stable states when the applied field is large enough to overcome the barrier. In Fig. 6 we show the logarithmic dependence of the capacitance on frequency. As for magnetic systems this logarithmic behaviour is generally attributed to domain wall motion across randomly distributed pinning centres [3,?]. In order to determine whether the reversible C_{init} or the irreversible Rayleigh coefficient a is responsible for this behaviour, we extracted them for all frequencies from the ac field dependence of the capacitance. The result indicating the logarithmic frequency dependence of both parameters is presented in Fig 7. Using a Sawyer-Tower circuit we finally measured the non-saturating hysteresis loop (Rayleigh loop) of our samples at sub-switching fields (see Fig. 8). The full line representing the calculated hysteresis curve is based on the LCR-meter measurement by using the formula P = (ϵ_{init} + αE_0)E ± α/2(E^2_0 − E^2), where + stands for the decreasing and − for the increasing field. ϵ_{init} and α are derived from C_{init} and a respectively. E_0 designates the maximum field reached during the cycle. While the slopes of the loops coincide, the area of the calculated hysteresis curve is underestimated in comparison to the measured one. This fact suggests that the observed hysteresis is not only due to the Rayleigh-type irreversible contribution of the dielectric constant, but by the losses having their origin in the series resistance and parallel conductivity of the capacitor. This explanation is confirmed by the fact that the calculated curve is only based on the imaginary and not on the real part of the impedance.

So far there is no universal behaviour for the frequency response of capacitors based on insulating perovskites. While Taylor et al. observed, for Pt/PZT/Pt capacitors, in the range from 10^{−1} Hz to 10^4 Hz an exponential law between capacitance and frequency [3], Zafar et al. used for Pt/(Ba,Sr)TiO_3/Pt between 10^2 Hz and 10^6 Hz a power law to describe their data [16].

While the logarithmic frequency dependence is in accordance to the contribution of domain walls, the power law dependence is known as the Curie-von Schweidler law. Obviously further studies are necessary to determine the correct relationship between the dielectric constant and the frequency. Maybe our data and the results of Taylor et al, fit better to the logarithmic frequency dependence because the films exhibit a remanent polarisation and thus a higher domain wall contribution in comparison to non-ferroelectric (Ba,Sr)TiO_3 films. The relative irreversible domain wall contribution to the total capacitance can be obtained by the ratio aV/C. If we apply an sinusoidal electrical field with a frequency of 100 Hz and an amplitude of E_0 = 5 MV/cm we obtain a ratio of 3%. This value is much smaller than the 21% calculated by Taylor et al. for 1.3 μm thick PZT thin films. Since the irreversible part of the dielectric constant determines the remanent polarisation it is reasonable for BTO to obtain a lower contribution of irreversible domain wall movement than for PZT because the remanent polarisation of PZT thin films is typically in the range of 40 μC/cm^2. This is more than one magnitude larger in comparison with our BTO thin films, revealing a remanent polarisation of 1.25 μC/cm^2. Damjanovic et al. determined the Rayleigh parameters describing the piezoelectric response of PZT and BTO ceramics by applying an external ac pressure to the samples [13,14,17]. The Rayleigh law for the piezoelectric behaviour can be described by the formula d = d_{init} + βX_0 with the piezoelectric constant d, the amplitude X_0 of the applied pressure and the Rayleigh coefficient β. In contrast to our results for thin films they observed, for the coarse grain (average grain size 27 μm) BTO ceramic, a higher relative irreversible contribution βX/d than for soft PZT. Thus the potential barrier for a domain wall displacement is not dominated by the material, but by the grain size and the type of domain walls because 180^∘ domain walls influence the dielectric constant but not the piezoelectric coefficient [18]. Demartin concluded for fine grain samples (0.7 μm grain size) of BTO that domain walls are clamped to a considerable degree by the high internal pressure [19] and hence they contribute less to the piezoelectric coefficient. In contrast to coarse grain ceramics (26 μm grain size), the domain walls created in fine grain ceramics are not sufficient to relieve the stress produced by the phase transition, resulting in a high internal stress and a weak activity of the domain walls. The decrease in dielectric constant with decreasing grain size (from 50 nm to 12 nm) arises also from the absence of 180^∘ domain boundaries in smaller grains [20,21]. On the other hand, it is well known that polycrystalline BTO with a grain size of approximately 1 μm possesses a much higher permittivity at room temperature than a single crystal BTO due to the higher contribution of domain walls [22]. The much larger film thickness of 1.3 μm chosen by Taylor and Damjanovic [3] yields an enhanced activity of the domain walls and a higher Rayleigh coefficient in comparison to our 300 nm thick BTO films.

The grain size and the stresses due to the phase transition determine the dielectric constant in ceramics. But ferroelectric thin films are additionally influenced by the existence of interfaces and additional stresses, caused by the lattice mismatch between film and substrate.

IV. CONCLUSION

The small lattice mismatch and chemical compatibility between YBCO and BTO allow a good crystal structure for heterostructures of both materials. X-ray diffraction patterns display a high crystalline order of both YBCO and BTO whereas their in-plane orientation is influenced by the choice of MgO as substrate material. The sub-switching ac electric field dependence of the permittivity may be described in terms of the Rayleigh law. At a field of 5 MV/m the total dielectric constant contains 3% contribution of irreversible domain wall movement. In addition to C_{init} the irreversible Rayleigh parameter representing irreversible domain wall movement shows also a linear logarithmic frequency dependence of permittivity. This behaviour can be explained by pinning of domain walls. In comparison to conventional Pt as base electrode for ferroelectric memories, YBCO offers the advantages of better fatigue behaviour.

The authors gratefully acknowledge support by the Materialwissenschaftlichen Forschungszentrum (MWFZ), Mainz, the Training and Mobility of young researchers (TMR) program of the European Union under grant number ERBFM- BICT972217 and the German Bundesministerium für Bildung, Wissenschaft, Forschung und Technologie (BMBF) under project number 13N6916.

[1] J. Mannhart, Supercond. Sci. Technol. 9, 49 (1996) [2] F. Jin, G.W. Auner, R. Naik, N.W. Schubring, J.V. Mantese, A.B. Catalan, A.L. Micheli, Appl. Phys. Lett. 73, 2838 (1998) [3] D. V. Taylor and D. Damjanovic, J. Appl. Phys. 82, 1973 (1997) [4] M. Schmitt, S. Freisem, T. Becherer, A. Hadish, H. Adrian, J. Appl. Phys. 76, 3220 (1994) [5] S. Kim, S. Hishita, Y. M. Kang, and S. Baik, J. Appl. Phys. 78, 5604 (1995) [6] K. Abe and S. Komatsu, J. Appl. Phys. 77, 6461 (1995) [7] V. Srikant, E. J. Tarsa, D. R. Clarke, and J. S. Speck, J. Appl. Phys. 77 , 1517 (1995) [8] L. A. Wills and B. W. Wessels, Appl. Phys. Lett. 60, 41 (1992) [9] M. H. Song, Y. H. Lee, T. S. Hahn, M. H. Oh, and K. H. Yoon, J. Appl. Phys. 79, 3744 (1996) [10] H.-F. Cheng, J. Appl. Phys. 79, 7965 (1996) [11] Y. Yoneda, T. Okabe, K. Sakaue, and H. Terauchi, J. Appl. Phys. 83, 2458 (1998) [12] F. Jona, G. Shirane, Ferroelectric Crystals, Pergamon, New York, 389 (1962) [13] D. Damjanovic and M. Demartin, J. Phys. D: Appl. Phys. 29, 2057 (1996) [14] D. Damjanovic, J. Appl. Phys. 82, 1788 (1997) [15] T. Natterman, Y. Sapir, I. Vilfan, Phys. Rev. B 42, 8577 (1990) [16] S. Zafar, R. E. Jones, P. Chu, B. White, B. Jiang, D. Taylor, P. Zurcher, and S. Gillespie, Appl. Phys. Lett. 72, 2820 (1998) [17] D. Damjanovic, Phys. Rev. B. 55, 649 (1997) [18] Q. M. Zhang, H. Wang, N. Kim, and L. E. Cross, J. Appl. Phys. 75, 454 (1994) [19] M. Demartin and D. Damjanovic, Appl. Phys. Lett 68, 3046 (1996) [20] J. W. Jang, S. J. Chung, W. J. Cho, T. S. Han, and S. S. Choi, J. Appl. Phys. 81, 6322 (1997) [21] I.-T. Kim, J. W. Jang, H.-J. Youn, C. H. Kim, and K. S. Hong, Appl. Phys. Lett. 72, 308 (1998) [22] G. Arlt, D. Hennings, and G. de With, J. Appl. Phys. 58, 1619 (1985)

FIG. 1. θ/2θ scan of YBCO/BTO. Both YBCO and BTO show c-axis oriented growth. The YBCO peaks are labelled with a Y and the BTO peaks with a B.

FIG. 2. ϕ scan of the YBCO (103) reflection. There are 8 peaks indicating the alignment of YBCO parallel and 45^∘ rotated to the MgO substrate. Both orientations exhibit a fourfold symmetry.

FIG. 3. Two-dimensional scan of the plane ℓ = 1 for BTO. The 8 reflexes are caused by the epitaxial growth of BTO on top of YBCO.

FIG. 4. Polarisation vs field hysteresis loop. Using a Sawyer-Tower circuit, we obtain a remanent polarisation of Pr = 1.25μC/cm^2 and a coercive field of Ec = 30 kV/cm.

FIG. 5. Field dependence of the capacitance at different frequencies. The full lines represent the fits according to the Rayleigh law.

FIG. 6. Frequency dependence of the capacitance. The full lines represent logarithmic fits.

FIG. 7. Frequency dependence of the reversible and irreversible parameters Cinit and a of the capacitance.

FIG. 8. P (E) hysteresis loop for E0 = 2 MV/cm at 100 Hz. Circles correspond to experimental data and the full lines are calculated with Cinit and a extracted from Fig. 5.