arXiv:astro-ph/9809308v1 24 Sep 1998

Mon. Not. R. Astron. Soc. 000, 000–000 (0000) Printed 23 February 2021 (MN L^ATEX style file v1.4)

Constraints on a soft X-ray excess in the quasar 3C 279

A. J. Lawson and I. M. M^cHardy

Department of Physics & Astronomy, University of Southampton, University Road, Southampton SO17 1BJ

Accepted for publication by MNRAS, 1998 July 3.

ABSTRACT We present the results of a three-week daily monitoring campaign on the quasar 3C 279 by the X-ray satellites RXTE and ROSAT. A cross correlation provides no evidence for any time lag between the very similar soft and hard X-ray light curves, and the source shows no significant spectral variability over the observing period. There is no evidence to support the presence of a soft excess, with a 99 per cent upper limit on any such component of 25 per cent of the total observed luminosity in the 0.1–2 keV band (< 3 × 10^{38} W). This fraction (but not the luminosity) is significantly less than that of the soft excess observed in 3C 273.

Key words: quasars: individual: 3C 279 - galaxies: active - X-rays: galaxies

1 INTRODUCTION

Soft excesses are the steep upturn in the X-ray spectra of active galactic nuclei (AGN) below ∼2 keV (e.g. Mushotzky, Done & Pounds 1993). They were first detected in Seyfert galaxies (Arnaud et al. 1985), where they are quite common (Turner & Pounds 1989; Mushotzky et al. 1993). They can be modelled by a steep power law (α >2), or by a cool thermal component (T< 150 eV), and are thought to be the high energy tail of the accretion disc radiation (e.g. Mushotzky et al. 1993).

Soft excesses are reasonably common in quasars (Urry et al. 1989; Masnou et al. 1992; Saxton et al. 1993), and there appears to be a trend for the more distant objects to have flatter spectra (Schartel et al. 1992), as expected if a soft component were being redshifted below the soft X-ray energy range. Initial detections were in radio-quiet objects (Comastri et al. 1992), but more recent work (Bühler et al. 1995; Prieto 1996; Schartel et al. 1996) suggests that a soft excess may also be a common feature in radio-loud objects. One of these with a consistently detected soft excess is 3C 273 (Turner et al. 1990; Staubert 1992; Leach, M^cHardy & Papadakis 1995). It is also one object for which the spectral parameters of the soft excess itself are reasonably well known (Leach et al. 1995).

2 THE RXTE AND ROSAT OBSERVATIONS

The main instrument on RXTE (Bradt, Rothschild & Swank 1993) is the proportional counter array (PCA). With five xenon filled counters (PCU’s), it has an energy range of 2- 60 keV, an energy resolution of 18 per cent at 6 keV, a large (∼0.7m^2) effective area, and a circular field of view (FWHM: 1^o). Each PCU has three separate layers. Only data from layer 1 has been used, as for observations of faint sources most of the counts in layers 2 and 3 are caused by the background. Problems with two of the PCUs meant they were switched off for some of the observations (noted in Table 1).

The RXTE observations (see Table 1) were made on a roughly daily basis between 1996 June 27 to July 14 and have an average exposure of about 650 seconds. Data reduction was done using RXTE specific ftool programs. The Standard2 data were filtered using internally applied good times (e.g. times of SAA passage), as well as the criteria that elevation above the horizon of greater than 10^o and offsource angle of less than 0.1^o , and then reduced to light curves and spectra using saextrct.

The PCA cannot measure the background during an observation and so it must be estimated. The accuracy of this estimation is very important for faint sources such as 3C 279. pcabackest (v1.4g with the q6 model) was used to produce models of the background due to particles and cosmic X-rays, and spectra and light curves were then extracted from these models in the same way as for the source observations. In order to check the accuracy of the PCA background model, and to provide a systematic error for the PCA datapoints, we have analysed 11 slew observations with individual exposures of greater than 400 seconds (average exposure is 671 seconds). The mean residual count rate after subtraction of the background in the ∼2–15 keV band is -0.25 cts/sec (i.e. the model is an over estimate of the data on average), with an intrinsic scatter of 0.44 cts/sec.

ROSAT observed 3C 279 17 times between 1996 June 28 and July 14 (see Table 1) using the HRI, an imager with an energy range of 0.1–2 keV, but no energy resolution. The data were analysed using xselect, part of the ftool software system. Counts were taken from a circular region 160 arcsec in radius centred on the source, while the background was derived from an annulus 160–320 arcsec from the source.

© 0000 RAS

2 A.J. Lawson and I.M. M^cHardy

Table 1. Observational parameters

RXTE ROSAT Obs^a Day and time^b Date^c Exp^d Det^e Count rate^f Obs^a Day and Time^b Date^c Exp^d Count rate

1 27/6 07:01:21 179.293 1152 5 6.25±0.17 1 28/6 08:59:35 180.375 1975 0.253±0.015 2 28/6 16:02:41 180.669 640 5 5.94±0.21 2 29/6 11:57:16 181.498 2387 0.264±0.014 3 29/6 11:16:09 181.470 704 3 5.94±0.25 3 30/6 07:09:45 182.298 2177 0.269±0.014 4 30/6 05:23:29 182.225 544 3 5.83±0.30 4 01/7 07:02:43 183.294 2070 0.307±0.015 5 01/7 06:29:13 183.270 720 3 5.82±0.25 5 02/7 06:55:30 184.289 2057 0.265±0.015 6 02/7 08:06:09 184.338 704 5 6.31±0.20 6 03/7 06:46:37 185.282 2113 0.267±0.014 7 03/7 12:55:21 185.538 688 5 5.13±0.20 7 04/7 06:38:45 186.277 2093 0.267±0.014 8 04/7 11:20:09 186.472 720 5 5.02±0.20 8 05/7 06:29:45 187.271 1977 0.253±0.014 9 05/7 06:33:37 187.273 544 3 5.48±0.29 9 06/7 07:54:21 188.329 2311 0.243±0.014 10 07/7 13:20:25 189.556 560 3 4.55±0.29 10 07/7 07:46:29 189.324 2231 0.220±0.014 11 09/7 16:45:53 191.699 736 3 4.36±0.27 11 08/7 04:28:53 190.187 2033 0.209±0.014 12 10/7 18:28:25 192.770 688 3 4.70±0.29 12 09/7 01:06:24 191.046 1768 0.238±0.015 13 11/7 19:25:21 193.810 544 5 5.21±0.24 13 10/7 00:57:44 192.040 1834 0.217±0.015 14 12/7 15:06:01 194.629 608 5 3.93±0.23 14 11/7 07:16:13 193.303 2238 0.215±0.013 15 13/7 09:57:13 195.415 576 3 3.93±0.29 15 12/7 00:42:46 194.030 1915 0.221±0.014 16 14/7 16:48:41 196.701 512 3 5.25±0.34 16 13/7 03:51:19 195.161 1963 0.178±0.013 17 14/7 03:42:38 196.155 1901 0.231±0.014

Notes:^aObservation No.,^bMiddle of the observation (UT),^cWhere Jan 1^{st} 1996 at 00:00:00 is day 1.0 (UT),^dExposure (seconds) after data selection,^eNo. of PCUs on during the observation ,^f 2.19–15.5 keV band (spectral channels 2-36, systematic effects of the background modeling not included), when only three detectors were on the count rate has been corrected using PCU area ratios

3 LIGHT CURVES

Visual examination shows similar behaviour in both the RXTE and HRI light curves (Fig. 1). Both light curves display a slow, quasi-linear, decrease in intensity of approximately 30 per cent. A discrete cross-correlation does not provide any strong constraints, owing to the largely featureless nature of the light curves, and the two light curves are perfectly consistent with zero lag.

4 SPECTRAL ANALYSIS

4.1 Broad-band comparisons

Before performing detailed spectral analysis, we have looked for any correlations between the soft (ROSAT) and hard (RXTE) X-ray count rates. The ROSAT and RXTE observations were not simultaneous, so to compare the two light curves we have linearly interpolated the ROSAT data to the time of the RXTE observations. The error for the shifted HRI points is the mean of the errors listed in Table 1. Fig. 2 shows the shifted ROSAT and unshifted RXTE count rates plotted against one another. A simple straight line model is not a good fit (reduced χ^2 ∼ 2). This may be a result of changes in the relative amounts of hard and soft components or spectral changes to a single component. Investigation shows that changes of ±7 per cent in the hardness ratio cannot be ruled out. We have also, as a check, interpolated the RXTE data to the time of the ROSAT observations. The results are consistent with those (above and below) for the opposite case.

Of interest with respect to the soft excess is the intercept on the y-axis. If a single component spanned both the soft and hard X-ray bands, then the intercept would be expected to be at zero. However, if a soft excess were present then some residual soft count rate should remain, as the

Figure 1. RXTE (top) and ROSAT light curves of 3C 279. The RXTE points include the effects of the background modelling discussed in Section 2

Constraints on a soft excess in 3C 279 3

Figure 2. Shifted HRI vs unshifted RXTE count rate. The dashed line shows the best-fitting straight line model to the data. The dotted lines on the plots show the 68 per cent upper and lower bounds for this model.

hard band counts reduce to zero. The best-fitting models intersect the y-axis near zero, suggestive of no soft excess. However, the poorly sampled counts–counts plane and the large error bars give a mean 99 per cent upper limit on the residual HRI count rate of 0.15 counts s^{−1}. This is a sizable fraction of the observed HRI count rate, and only places a weak constraint on any soft excess of ≤60 per cent of the soft X-ray count rate.

4.2 Spectral fitting

Spectral analysis was performed using the xspec fitting package, with the results shown in Table 2. A power-law model with Galactic absorption (see Elvis, Lockman & Wilkes 1989) gives an acceptable fit to each RXTE observation. All the best-fitting indices are consistent with a single power law slope of α = 0.78 ± 0.03. This lies in the range measured by ASCA and Ginga (Tashiro et al. 1994; Lawson & Turner 1997).

The same model was applied to the combined RXTE and ROSAT data. We have treated the observations from each satellite as simultaneous if they were made within six hours of each other. If this was not the case, then the RXTE observation has been fitted separately with the two ROSAT observations (pre- and post-RXTE) closest to it, with the results being averaged (with errors added in quadrature). As with the RXTE data alone, a single power law is an acceptable fit in all cases. The errors on the derived spectral indices are much reduced due to the extended energy range, but again all the data are consistent with a single power law of α = 0.74 ± 0.01. This is consistent with that derived from the RXTE data alone, and means that the soft X-ray data are consistent with an extension of the hard X-ray power law into the HRI energy band.

However, as the HRI has no spectral capability a soft excess could still be hidden. To investigate this we produced a number of fake source spectra with two power law components: a hard component that is the average of the fits to the

Figure 3. Plot of spectral index vs soft excess percentage derived from modelling. The data points represent the mean of the bestfitting indices for a particular strength of soft excess, the error bars are the standard deviation of these best fits (there are 20 model spectra per data point). Line (a) shows the upper limit for 3C 279 derived from the spectral fitting, while line (b) shows the expected spectral index if the soft excess were as prominent as that in 3C 273

RXTE data alone (α = 0.78 with a flux at 1 keV of 3 × 10^{−3} photons cm^{−2} s^{−1} keV^{−1}), and a soft component (α = 1.68, the average value for the soft excess of 3C 273, Leach et al. 1995) with a varying normalisation. A single power law has then been fitted to these spectra (acceptably in each case) and the best-fitting spectral index measured. The results of the fitting are shown in Fig. 3. As expected, a larger fraction of soft excess results in a steeper single power law index.

The best-fitting spectral index to the combined ROSAT and RXTE data is α = 0.74 ± 0.04 (where the error is the standard deviation of the best fit values), and the 99 per cent, or 2.6 σ upper limit is 0.84. This gives an upper limit to the luminosity of a soft excess of ∼ 25 per cent of the total luminosity in the 0.1–2.0 keV band, or less than 3 × 10^{38} W (q0 = 0.5, H0 = 50 km s^{−1} Mpc^{−1}).

For comparison we have calculated (from Leach et al. 1995) that on average 73 per cent of the 0.1–2.0 keV luminosity of 3C 273 is from the soft excess. This is much larger than that seen in 3C 279. Red-shifting the spectrum of 3C 273 to the distance of 3C 279 only reduces the soft excess percentage to 65 per cent. If this percentage were actually present in 3C 279, we would expect an average spectral index of near α = 1.1, a value some 8σ away from the observed value. This clearly shows that any soft excess in 3C 279 is intrinsically weaker relative to the hard X-ray power law than is seen in 3C 273.

5 CONCLUSIONS

We have presented contemporary RXTE (2–15 keV) and ROSAT (0.1–2 keV) observations of the quasar 3C 279 at daily intervals over a three week period. During this time the source exhibited only low amplitude variability, decreas-

4 A.J. Lawson and I.M. M^cHardy

Table 2. Spectral fitting results

N^a_X α^b χ^{2c}_ν N^d_R α^e χ^{2f}_ν S^g S^h

1 0.82±0.08 0.5 1 0.69±0.03 0.6 12.8 8.3 2 0.68±0.11 1.1 1,2 0.70±0.05 1.0 12.3 8.1 3 0.58±0.13 0.6 2 0.72±0.04 0.6 12.1 8.2 4 0.80^{+0.17}_{−0.16} 0.8 3 0.75±0.04 0.8 11.8 8.5 5 0.68^{+0.13}_{−0.12} 0.9 4 0.80±0.04 0.9 12.1 9.5 6 0.83±0.10 0.8 5 0.70±0.03 0.8 13.0 8.6 7 0.99^{+0.13}_{−0.12} 0.5 6,7 0.80±0.05 0.6 10.8 8.5 8 1.02±0.12 0.6 7 0.81±0.04 0.7 10.7 8.6 9 0.66^{+0.15}_{−0.14} 0.7 8 0.72±0.04 0.7 11.5 7.9 10 0.45±0.18 0.2 10 0.75±0.05 0.3 9.5 6.8 11 0.68^{+0.20}_{−0.19} 0.9 12,13 0.80±0.07 0.9 9.0 7.1 12 0.65^{+0.19}_{−0.18} 0.4 13,14 0.73±0.07 0.4 9.8 6.8 13 0.96±0.14 0.7 15 0.70±0.04 0.8 10.9 7.2 14 0.73±0.19 0.7 15,16 0.77±0.07 0.6 8.3 6.2 15 0.82^{+0.22}_{−0.21} 0.6 16,17 0.77±0.08 0.6 8.5 6.4 16 0.76^{+0.20}_{−0.19} 0.5 17 0.71±0.05 0.5 10.8 7.3

Notes:^aRXTE observation number,^bbest-fitting power law slope to RXTE data only with 68 per cent error,^cvalue for RXTE fitting only,^dROSAT observation numbers used in combined fits with the RXTE data,^ebest-fitting power law slope to the combined RXTE and ROSAT data (see Section 4.2),^f value for combined ROSAT and RXTE fits,^g 2–10 keV model flux, ×10^{−15} W m^{−2},^h0.1–2 keV model flux, ×10^{−15} W m^{−2}

ing in flux by ∼30 per cent. The largely featureless nature of the light curves prevents us from determining any lag between the RXTE and ROSAT light curves which are quite consistent with zero time delay. We find no evidence for any spectral variability either within the RXTE observations or in the combined RXTE and ROSAT observations.

There is also no significant evidence that a soft excess is present, although modelling cannot rule out a soft excess which emits 25 per cent of the 0.1–2.0 keV X-ray luminosity. Comparison with 3C 273 shows that any soft excess is relatively weaker in 3C 279 than in 3C 273 (although the upper limit to the soft excess in 3C 279 in terms of absolute luminosity is some three times larger than that of 3C 273). This relative weakness could be caused by a number of phenomena, such as a more luminous source having a more massive black hole and cooler disc, but it is more likely that 3C 279 is more jet dominated than 3C 273, perhaps due to a higher beaming factor or more acute viewing angle.

REFERENCES

Arnaud K. A. et al., 1985, MNRAS, 217, 105 Bradt H. V. D., Rothschild R. E., Swank J. H., 1993, A&AS, 97, 355 Bühler P., Courvoisier T. J. L., Staubert R., Brunner H., Lamer G., 1995, A&A, 295, 309 Comastri A., Setti G., Zamorani G., Elvis M., Giommi P., Wilkes B. J., McDowell J. C., 1992, ApJ, 384, 62 Elvis M., Lockman F. J., Wilkes B. J., 1989, AJ, 97, 777 Lawson A. J., Turner M. J. L., 1997, MNRAS, 288, 920 Leach C. M., M^cHardy I. M., Papadakis I. E., 1995, MN- RAS, 272, 221

Masnou J., Wilkes B. J., Elvis M., McDowell J. M., Arnaud K. A., 1992, A&A, 235, 5 Mushotzky R. F., Done C., Pounds K. A., 1993, ARA&A, 31, 717 Prieto M. A., 1996, MNRAS, 282, 421 Saxton R. D., Turner M. J. L., Williams O. R., Stewart G. C., Ohashi T., Kii T., 1993, MNRAS, 262, 63 Schartel N., Fink H., Brinkman W., Trümper J., 1992, in Brinkman W., Trümper J., eds, X-ray and UV emission from Active Galactic Nuclei. MPE, Munich, p. 195 Schartel N., Walter R., Fink H. H., Trümper J., 1996, A&A, 307, 33 Staubert R., 1992, in Brinkman W., Trümper J., eds, X-ray and UV emission from Active Galactic Nuclei. MPE, Munich, p. 42 Tashiro M., Ueda Y., Kii T., Makino F., Fujimoto R., Mushotzky R., Makishima K., Yamashita A., 1994, in Makino F., Ohashi T., eds, New Horizon of X-ray astronomy - First results from ASCA. UAP, Tokyo, p. 343 Turner T. J., Pounds K. A., 1989, MNRAS, 240, 833 Turner M. J. L. et al., 1990, MNRAS, 244, 310 Urry C. M., Arnaud K., Edelson R. A., Kruper J. S., Mushotzky R. F., 1989, in Hunt J., Battrick B., eds, Proc. 23rd ESLAB symposium on Two Topics in Xray Astronomy. ESA SP-296, Noordwijk, Netherlands, p. 789