arXiv:astro-ph/9607126v1 24 Jul 1996

Limits on Far-UV Emission from Warm Gas in Clusters of Galaxies with the Hopkins Ultraviolet Telescope

W. Van Dyke Dixon and Mark Hurwitz Space Sciences Laboratory, University of California Berkeley, California 94720 vand@ssl.berkeley.edu, markh@ssl.berkeley.edu and Henry C. Ferguson Space Telescope Science Institute, Baltimore, Maryland 21218 ferguson@stsci.edu

To appear in The Astrophysical Journal (Letters)

ABSTRACT

We have searched the far-UV spectra of five clusters of galaxies observed with the Hopkins Ultraviolet Telescope (HUT) for emission in the resonance lines of O VI λλ1032, 1038 and C IV λλ1548, 1551. We do not detect significant emission from either species in any of the spectra. Lieu et al. [ApJ, 458, L5 (1996)] have recently proposed a warm [(5 − 10) × 10^5 K] component to the intracluster medium (ICM) to explain excess 0.065–0.245 keV flux present in EUVE and ROSAT observations of the Virgo cluster. If the surface brightness of this warm component follows that of the hot, x-ray-emitting gas (i.e., is centrally condensed), then our upper limit to the O VI surface brightness in M87 is inconsistent with the presence of substantial 5 × 10^5 K gas in the center of the Virgo cluster. This inconsistency may be alleviated if the central gas temperature is ∼> 7.5 × 10^5 K. HUT limits on the O VI surface brightness of the four other clusters can provide important constraints on models of their ICM.

Subject headings: galaxies: clusters: general — ultraviolet: galaxies

– 2 –

1. Introduction

X-ray observations of clusters of galaxies have long revealed the presence of hot (2 × 10^7 K), low-density gas permeating many clusters (Forman & Jones 1982). Recently, Lieu et al. (1996) have reported the detection of extended, extreme-ultraviolet (EUV) emission in the Virgo cluster. The emission, observed in the 0.065–0.245 keV energy band with the Extreme Ultraviolet Explorer (EUVE), extends to a radius of some 20^′ about M87, the central galaxy of the Virgo cluster. The excess is also present in archival data obtained with the ROSAT PSPC (Böhringer et al. 1995), which overlaps the EUVE wavelength band at low energies. The authors interpret this emission as evidence for a second, warm [(5 − 10) × 10^5 K] component to the intracluster medium (ICM).

The warm gas, with a total mass of approximately 8.9 × 10^{10}M⊙, would cool at a rate of at least 340 M⊙ yr^{−1}, more than 30 times the cooling-flow rate deduced from X-ray observations of the hot ICM (Stewart et al. 1984). This discrepancy has led Fabian (1996) to suggest that the apparent EUV excess is an artifact of the interstellar absorption model used in the data analysis. EUV flux is strongly attenuated by gas in our Galaxy’s interstellar medium (ISM). If the Galactic absorption is slightly less than currently predicted, then an EUV excess is not required to reproduce the observed spectrum.

In a note added in proof, Lieu et al. report that ROSAT data of Coma and the Abell clusters 2199, 1795, and 1367 are better modeled by a two-temperature gas in which the cooler component has T ∼ 10^6 K than by a single-temperature hot gas, indicating that warm gas may not be limited to the Virgo cluster. If a reservoir of warm gas were present in the cores of clusters of galaxies, it would emit strongly in the far-UV (FUV) resonance lines of O VI λλ1032, 1038 and C IV λλ1548, 1551 as it cools through temperatures of a few times 10^5 K (Edgar & Chevalier 1986; Voit, Donahue, & Slavin 1994). Limits on the intensity of FUV lines from clusters of galaxies can thus provide important constraints on the mass of the warm component of the ICM. To this end, we have used the Hopkins Ultraviolet Telescope (HUT) to search for FUV line emission from clusters of galaxies.

2. Observations and Data Reduction

Our observations were carried out with HUT on the Astro-2 mission of the space shuttle Endeavour in 1995 March. HUT consists of a 0.9 m, f/2 mirror that feeds a prime-focus spectrograph with a microchannel-plate intensifier and photodiode array detector. First-order sensitivity extends from 820 to 1840 Å at 0.51 Å pixel^{−1}. The resolution is about 4 Å through the spectrograph’s 10^{′′}×56^{′′} aperture and 7 Å through its

– 3 –

20^{′′} diameter aperture. The effective area is nearly 24 cm^2 at 1032 Å. The spectrograph and telescope are described by Davidsen et al. (1992), while Kruk et al. (1995) discuss modifications, performance, and calibration for the Astro-2 mission.

Of the five clusters of galaxies, Virgo, Coma, and the Abell clusters 2199, 1795, and 1367, for which Lieu et al. find evidence of (5 − 10) × 10^5 K gas, all but Abell 2199 were observed with HUT on Astro-2. The Hercules cluster (Abell 2151) was also observed and is included in our sample. The observations were obtained during orbital night, minimizing the strength of the various airglow features and the scattered light from Lyα, which is quite strong during the day. Two of the targets, Coma and Hercules, were observed twice; their individual spectra were added together for our analysis. For neither Coma nor Hercules was the telescope pointed at a particular galaxy. The two Coma pointings were offset from one another by some 2.^′4, roughly the resolution of the model that Lieu et al. fit to the EUV data. The M87 pointing was centered on the galaxy’s center of light. Table 1 lists the observations in our sample.

In our analysis, models are fit to raw-counts spectra using the non-linear curve-fitting program SPECFIT (Kriss 1994), which runs in the IRAF^1 environment and performs a χ^2 minimization. Error bars are assigned to the data assuming Poisson statistics. Emission line intensities are converted to energy units using the HUT absolute calibration, which is based on white dwarf model atmospheres and is believed accurate to about 5% (Kruk et al. 1995). Throughout this paper, line intensities are expressed in units of ergs cm^{−2} s^{−1} sr^{−1} and refer to the sum of the doublet line intensities.

To set limits on the observed O VI emission, we fit a linear continuum and three emission features, the Lyβ λ1026 airglow line and the redshifted O VI λλ1032, 1038 doublet, to a segment of the raw-counts spectrum. The Lyβ line is fit with a model line profile derived from raytraces of the telescope light path kindly provided by J. Kruk. Because the O VI lines are expected to fill the aperture, the same profile is used for them as for Lyβ. The wavelength of the Lyβ line is free to vary; those of the O VI lines are tied to it assuming that the emitting gas lies at the cluster redshift. The line strengths also vary freely, except that the O VI lines are held to the 2:1 ratio expected from an optically thin plasma. The O VI line is then fixed at zero counts and the spectrum refit. If Δχ^2 > 4 (corresponding to a 2 σ deviation for one interesting parameter, in this case the total counts in the O VI line; Avni 1976), we claim a detection and determine 1 σ error bars by raising the model line

1 The Image Reduction and Analysis Facility (IRAF) is distributed by the National Optical Astronomy Observatories, which is operated by the Association of Universities for Research in Astronomy, Inc. (AURA) under cooperative agreement with the National Science Foundation.

– 4 –

strength above the best-fit level until Δχ^2 = 1. Otherwise, we create a “background-only” data set by subtracting the O VI component of the best-fitting model (which, though not statistically significant, is usually non-zero) from the observed spectrum. We fit a linear continuum to the background spectrum, then raise the model O VI line strength above zero until Δχ^2 = 4 to set a 2 σ limit on the flux of the O VI line. Limits to the C IV flux are set in the same way. Fig. 1 shows the HUT spectrum of the Coma cluster in the region of the redshifted O VI feature; model spectra without O VI and with the line fixed at its 2 σ upper limit are overplotted.

A more complex model is required to reproduce the spectrum of M87, which has a strong stellar component. As shown in Fig. 2, the redshifted O VI line falls within the broad stellar Lyβ absorption feature. In order to estimate the stellar contribution at this wavelength, we flux-calibrate the data and model it with the synthetic spectrum, based on the stellar atmosphere models of Kurucz (1992) and Clegg & Middlemass (1987) and the evolutionary tracks of Dorman, Rood, & O’Connell (1993) and Vassiliadis & Wood (1994), originally fit to these data by Brown, Ferguson, & Davidsen (1995). The model spectrum is sampled at 10 Å resolution; we interpolate it to 0.5 Å using the spline function in the IRAF routine INTERP. Limits on the flux of the O VI doublet are then set as described above.

Our limits on the line fluxes are presented in Table 2. None of the spectra show significant FUV line emission; the relatively high O VI limit derived from the M87 spectrum reflects the greater uncertainty in the spectral continuum. Dereddened intensities are calculated assuming the values of E(B−V ) in Table 1 and the extinction parameterization of Cardelli, Clayton, & Mathis (1989; hereafter CCM). Though the FUV portion of the CCM extinction curve is based on an extrapolation of data obtained at longer wavelengths, it is able to reproduce the general shapes of the extinction curves of early-type stars observed with Copernicus (CCM) and has been used successfully to model the FUV spectra of hot stars and galaxies observed with HUT (e.g., Brown et al. 1995; Dixon, Davidsen, & Ferguson 1995). We follow Brown et al. (1995) in assuming R_V = 3.05 for the diffuse ISM along these lines of sight (cf. Buss et al. 1994); uncertainties in R_V do not greatly affect our result, as the FUV extinction A(λ) varies slowly with R_V when E(B−V ) is small.

3. Discussion

We do not detect significant emission from redshifted O VI λλ1032, 1038 and C IV λλ1548, 1551 in the HUT spectra of five clusters of galaxies. Are our limits consistent with the EUV emission detected in the Virgo Cluster?

– 5 –

Lieu et al. assume a distance to M87 of 20.6 Mpc. Fitting a two-temperature model to the combined EUVE and ROSAT data, they derive the temperature, emission integral (EI ≡ ∫ n_pn_edV ), and abundance of both the warm and hot components of the ICM as a function of radius. For the warm component in the central region (r < 3^′) of the cluster, they find a temperature of 5.0^{+1.9}_− × 10^5 K, an emission integral of 3.71^+_{−2.09} × 10^{64} cm^{−3}, and an abundance of 0.592^{+0.037}_{−0.061} relative to solar. (The lower bound of the temperature and the upper bound of the emission integral are unconstrained in the fit.) Using the best-fit values for each of these parameters and line emissivities estimated with the Raymond-Smith (1977) plasma code by C.-Y. Hwang, we find that the O VI flux expected from the warm gas in the central region of the Virgo cluster is 6.9 × 10^{−12} ergs cm^{−2} s^{−1}. If we assume that the O VI flux is evenly distributed within this region, then its surface brightness is 2.9 × 10^{−6} ergs cm^{−2} s^{−1} sr^{−1}, or 60% of our dereddened upper limit.

The reddening to M87 may be less than we have assumed. The value E(B − V ) = 0.023 presented in Table 1 (Burstein & Heiles 1984) is derived from the H I map of Heiles (1975), which gives N_H = 3.7 × 10^{20} cm^{−2} in the direction of M87. Lieu et al. have re-mapped the Galactic H I column density near M87 and find N_H ∼ (1.8 − 2.1) × 10^{20} cm^{−2}, which corresponds to E(B − V ) = 0.000 ± 0.015 according to the prescription of Burstein & Heiles (1982, 1984). Goudfrooij et al. (1994) combine deep CCD images in B, V , I and narrow-band Hα+[N II] to derive the amount and morphology of ionized gas and dust in 56 elliptical galaxies. They find no evidence for dust in M87, save for that associated with the Hα+[N II] jet near the nucleus (Jarvis 1990), to a detection limit of A_B ∼ 0.02, or E(B − V ) ∼ 0.005. If extinction along the line of sight to M87 is indeed negligible, then we may compare the predicted O VI surface brightness with the observed limit presented in Table 2, rather than the dereddened value.

It is likely that the emission integral of the warm gas—and thus the predicted O VI surface brightness—is not constant across the central 6^′ of the cluster. Schreier, Gorenstein, & Feigelson (1982) find that the surface brightness of the hot component of the ICM, as measured with the Einstein HRI, falls off as r^{−1.1} for 20^{′′} < r < 4^′. The ratio of the EUV excess to the x-ray flux in the Virgo cluster is roughly constant with radius (Lieu, private communication). If we assume that the warm gas has a profile similar to that of the HRI data (and for simplicity that it is flat for r < 20^{′′}), then the fraction of the predicted O VI flux falling in the HUT slit rises by a factor of 5.6, to a mean surface brightness of 1.6 × 10^{−5} ergs cm^{−2} s^{−1} sr^{−1}, more than four times the observed (and three times the dereddened) O VI limit set with HUT.

Our upper limit to the O VI flux corresponds to a cooling rate within the HUT aperture of Ṁ ∼< 2.4M⊙ yr^{−1}, based on the models of Edgar & Chevalier (1986) rescaled

– 6 –

by the abundance (Z = 0.592 Z⊙) of the warm gas. This value is consistent with the rate Ṁ ∼ 2M⊙ yr−1 derived by Stewart et al. (1984) for the hot component of the ICM within ∼ 1^′ of the galactic center.

A substantial reservoir of warm gas may reside within a cluster of galaxies if its temperature is greater than we have assumed. The O VI line emissivity depends critically on the gas temperature, falling by a factor of 10 as the temperature rises from 5 to 10 ×10^5 K. From the observed limit to the O VI flux of M87, we derive an upper limit to the emission integral as a function of temperature. In Fig. 3, we compare this limit with the best-fit value of the emission integral derived from the EUVE data by Lieu et al., scaled to the area of the HUT slit assuming that the EUV surface brightness (a) is constant across the inner region of the cluster, and (b) scales as the x-ray surface brightness. The value of the emission integral corresponding to case (b), EI = 1.1 × 10^{63} cm^{−3}, is higher than the upper limit derived from the HUT data unless T ∼> 7.5 × 10^5 K.

Lieu et al. report that the ROSAT data for Coma and the Abell clusters are best modeled by a two-temperature gas in which the cooler component has T ∼ 10^6 K. The lower O VI emissivity expected of a 10^6 K gas may reconcile the presence of substantial warm gas with the limits set by the HUT data. As more EUV and X-ray observations of these clusters become available, the O VI limits presented in Table 2 will provide important constraints on models of their intracluster media.

4. Conclusions

We have searched the spectra of five clusters of galaxies observed with the Hopkins Ultraviolet Telescope for redshifted O VI λλ1032, 1038 and C IV λλ1548, 1551 emission. We do not detect significant emission in either feature in any of the spectra. If the surface brightness of the EUV emission in the central region (r < 3^′) of the Virgo cluster is centrally condensed, then our upper limit to the O VI surface brightness is inconsistent with that predicted for the 5 × 10^5 K gas proposed by Lieu et al. This inconsistency may be alleviated if the gas temperature is ∼> 7.5 × 10^5 K. HUT limits on the O VI surface brightness of the four other clusters can provide important constraints on models of their intracluster media.

We would like to thank J. Kruk for providing raytrace results and C.-Y. Hwang for calculating line emissivities. This research has made use of the NASA/IPAC Extragalactic Database (NED), which is operated by the Jet Propulsion Laboratory, Caltech, under contract with the National Aeronautics and Space Administration, the NASA ADS Abstract Service, and the Catalogue Service of the CDS, Strasbourg, France. We wish to acknowledge

– 7 –

the efforts of our colleagues on the HUT team as well as the many NASA personnel who helped make the Astro-2 mission successful. The Hopkins Ultraviolet Telescope Project is supported by NASA contract NAS 5-27000 to the Johns Hopkins University. W.V.D. and M.H. acknowledge support from NASA grant NAG5-696.

– 8 –

Table 1. Target Summary

Name l b z E(B−V )^a AMET^b Time (s) Slit^c

Hercules 31.6 44.5 0.0369 0.015 205.8 1592 6 277.4 1592 6 A1795 33.8 77.2 0.0616 0.000 278.8 2292 6 Coma^d 58.1 88.0 0.0232 0.013 253.0 1748 7 254.5 2004 7 A1367 234.8 73.0 0.0216 0.000 179.8 1928 7 M87 283.8 74.5 0.00428 0.023 286.8 954 6

aFrom Burstein & Heiles 1984.

bStart time of observation in hours from launch (1995:061:06:38:13 UT).

cSlit 6 measures 10^{′′}×56^{′′}; slit 7 is 20^{′′} in diameter.

dThe two Coma pointings were offset by approximately 2.^′4.

– 9 –

Table 2. 2 σ Upper Limits to Far-UV Emission Lines

O VI λλ1032, 1038 C IV λλ1548, 1551 Name Observed Dereddened Observed Dereddened

Hercules 0.577 0.700 0.565 0.631 A1795 1.12 1.12 1.19 1.19 Coma 1.21 1.43 1.65 1.81 A1367 2.24 2.24 1.20 1.20 M87 3.52 4.84 3.07 3.64

Note. — Units are 10^{−6} erg cm^{−2} s^{−1} sr^{−1}. Dereddened intensities assume a CCM extinction curve, the E(B−V ) value from Table 1, and R_V = 3.05.

– 10 –

REFERENCES Avni, Y. 1976, ApJ, 210, 642 Böhringer, H., Nulsen, P. E. J., Braun, R., & Fabian, A. C. 1995, MNRAS, 274, L67 Brown, T. M., Ferguson, H. C., & Davidsen, A. F. 1995, ApJ, 454, L15 Burstein, D., & Heiles, C. 1982, AJ, 87, 1165 Burstein, D., & Heiles, C. 1984, ApJS, 54, 33 Buss, R. H., Jr., Allen, M., McCandlis, S., Kruk, J., Liu, J.-C., & Brown, T. 1994, ApJ, 430, 630 Cardelli, J. A., Clayton, G. C., & Mathis, J. S. 1989, ApJ, 345, 245 (CCM) Clegg, R. E. S., & Middlemass, D. 1987, MNRAS, 228, 759 Davidsen, A. F., et al. 1992, ApJ, 392, 264 Dixon, W. V., Davidsen, A. F., & Ferguson, H. C. 1995, ApJ, 454, L47 Dorman, B., Rood, R. T., & O’Connell, R. W. 1993, ApJ, 419, 596 Edgar, R. J., & Chevalier, R. A. 1986, ApJ, 310, L27 Fabian, A. C. 1996, Science, 271, 1244 Forman, W., & Jones, C. 1982, ARA&A, 20, 547 Goudfrooij, P., Hansen, L., Jørgensen, H. E., & Nørgaard-Nielsen, H. U. 1994, A&AS, 105, 341 Heiles, C. 1975, A&AS, 20, 37 Jarvis, B. J. 1990, A&A, 240, L8 Kriss, G. A. 1994, in ASP Conf. Ser. 61, Astronomical Data Analysis Software and Systems III, ed. D. R. Crabtree, R. J. Hanisch, & J. Barnes (San Francisco: ASP), 437 Kruk, J. W., Durrance, S. T., Kriss, G. A., Davidsen, A. F., Blair, W. P., Espey, B. R., & Finley, D. 1995, ApJ, 454, L1 Kurucz, R. L. 1992, in IAU Symposium No. 149, The Stellar Populations of Galaxies, ed.

B. Barbuy & A. Renzini (Dordrecht: Kluwer), 225

– 11 –

Lieu, R., Mittaz, J. P. D., Bowyer, S., Lockman, F. J., Hwang, C.-Y., & Schmitt, J. H.

M. M. 1996, ApJ, 458, L5 Raymond, J. C., & Smith, B. W. 1977, ApJS, 35, 419 Schreier, E. J., Gorenstein, P., & Feigelson, E. D. 1982, ApJ, 261, 42 Stewart, G. C., Canizares, C. R., Fabian, A. C., & Nulsen, P. E. J. 1984, ApJ, 278, 536 Vassiliadis, E., & Wood, P. R. 1994, ApJS, 92, 125 Voit, G. M., Donahue, M., & Slavin, J. D. 1994, ApJS, 95, 87

This preprint was prepared with the AAS L^ATEX macros v4.0.

– 12 –

Fig. 1.— HUT spectrum of the Coma cluster, showing the region about redshifted O VI λλ1032, 1038. The data are shown as a histogram and are overplotted by models including no O VI emission (dotted line) and O VI at our 2 σ upper limit (solid line).

– 13 –

Fig. 2.— HUT spectrum of M87 in the Virgo cluster, which does not show significant O VI λλ1032, 1038 emission. The data are shown as a histogram; overplotted are models including no O VI emission (dotted line) and O VI at our 2 σ upper limit (solid line). The fit to the stellar component is from Brown et al. (1995).

– 14 –

Fig. 3.— Upper limit to the emission integral (EI ≡ ∫ n_pn_edV ) as a function of gas temperature (solid line). This curve is derived from the observed (i.e., not dereddened) upper limit to the O VI flux in the HUT spectrum of M87. The horizontal lines indicate the best-fit value of the emission integral derived from the EUVE data for the central region (r < 3^′) of M87 scaled to the area of the HUT slit assuming that the EUV surface brightness (a) is constant across the inner region of the cluster (long dashed line), and (b) scales as the x-ray surface brightness (short dashed line). For case (b), the HUT data impose a lower limit to the gas temperature of 7.5 × 10^5 K.