arXiv:astro-ph/0510340v1 12 Oct 2005

Astronomy & Astrophysics manuscript no. 3189 December 4, 2020 (DOI: will be inserted by hand later)

The broad-band spectrum of Cyg X-2 with INTEGRAL

G. Lavagetto^{1,⋆}, T. Di Salvo^1, M. Falanga^2,R. Iaria^1, N.R. Robba^1, L. Burderi^3, W.H.G. Lewin^4, M. Méndez^5, L. Stella^6, and M. van der Klis^7

1 Dipartimento di Scienze Fisiche ed Astronomiche, Università di Palermo, via Archirafi 36, 90123 Palermo (PA) Italy 2 CEA Saclay, DSM/DAPNIA/Service d’Astrophysique (CNRS FRE 2591), F-91191, Gif sur Yvette, France 3 Università degli Studi di Cagliari, Dipartimento di Fisica, SP Monserrato-Sestu, KM 0.7, 09042 Monserrato, Italy 4 Center for Space Research, Massachusetts Institute of Technology, 77 Massachusetts Avenue, Cambridge, MA 02139 5 SRON, National Institute for Space Research, 3584 CA, Utrecht, the Netherlands 6 Osservatorio Astronomico di Roma, Via Frascati 33, 00040 Monteporzio Catone (Roma), Italy 7 Astronomical Institute ’Anton Pannekoek’, University of Amsterdam, and Center for High Energy Astrophysics, Kruislaan 403, 1098 SJ, Amsterdam, the Netherlands

the date of receipt and acceptance should be inserted later

Abstract. We study the broad band (3-100 keV) spectrum of Cygnus X–2 with INTEGRAL. We find that the spectrum is well fitted by a Comptonized component with a seed-photons temperature of ∼ 1 keV, an electron temperature of ∼ 3 keV and an optical depth τ ∼ 8. Assuming spherical geometry, the radius of the seed-photons emitting region is ∼ 17 km. The source shows no hard X-ray emission; it was detected only at a 3σ level above 40 keV. We also analyzed public ISGRI data of Cyg X–2 to investigate the presence of a hard X–ray component. We report the possible presence of hard X-ray emission in one data set.

Key words. accretion, accretion disks – binaries: close – stars: individual: Cygnus X–2 – stars: neutron

1. Introduction

Cyg X–2 is one of the six Galactic Low Mass X-ray Binaries (hereafter LMXBs) that are classified as Zsources. This classification relies upon a combination of the track (that resembles a Z) traced on an X-ray colorcolor diagram (CCD) and of the correlated timing properties of these sources (Hasinger & van der Klis 1989).

Several studies have been carried out on Cyg X-2: type- I X-ray bursts have been observed in its X-ray lightcurve (Smale 1998), confirming that the primary in the system is a neutron star (NS); its distance has been estimated to be 7.2 ± 1.1 kpc from optical observations (Orosz & Kuulkers 1999), consistent with previous determinations from radio observations (Hjellming et al. 1990) but not with measurements obtained from X-ray bursts (11.6 kpc, Smale 1998). The binary system has an orbital period of 9.8444 d, as can be deduced from the optical behavior of the companion, V1341 Cyg (Casares et al. 1998). The masses of the two stars are 1.78 ± 0.23M_⊙ and 0.60 ±

Send offprint requests to: G. Lavagetto ⋆ e-mail: lavaget@fisica.unipa.it

0.13M_⊙ for the primary and the companion, respectively (Orosz & Kuulkers 1999).

The X-ray spectrum of the source has been studied several times over the years. It has been fitted both with the so-called Western model – a blackbody plus a Comptonized component (Hasinger et al. 1990; Smale et al. 1993), and with the so-called Eastern model – a multitemperature blackbody together with a Comptonized blackbody (Hasinger et al. 1990; Hoshi & Mitsuda 1991; Hirano et al. 1995). More recently, the broad band spectrum of Cyg X–2 has been studied with BeppoSAX (Frontera et al. 1999; Di Salvo et al. 2002; Piraino et al. 2002).

Di Salvo et al. (2002) fitted the broad band spectrum of Cyg X-2 obtained with BeppoSAX using a two component continuum model, consisting of a disk blackbody and a Comptonized component. A broad emission line at ∼ 1 keV and an emission line at ∼ 6.7 keV (most probably coming from highly ionized iron) proved necessary for a good fit. In two of the intervals selected on the CCD, the continuum spectrum of Cyg X–2 could not be fit by the usual two-component model, and a third component was needed to fit the high energy part of the spectra. This

2 G. Lavagetto et al.: Spectral Analysis of Cyg X-2 with INTEGRAL

hard X-ray emission fits a power-law with photon index ∼ 2.

A similar “hard X-ray tail” has been found in other observations, but with an index Γ ∼ 3 (Piraino et al. 2002).

A hard X-ray emission has been detected in other Zsources : GX 5–1 (Asai et al. 1994), GX 17+2 (Di Salvo et al. 2000), GX 349+2 (Di Salvo et al. 2001), Sco X–1 (D’Amico et al. 2001a), and in the non-flaring state of the anomalous Z-source Cir X–1 (Iaria et al. 2001). The physical mechanism producing this high-energy emission is yet to be understood.Some evidence of the correlation of the hard tail with the position of the source in the Xray CCD has been found for GX 5–1, GX 17+2 and Cyg X–2. Such a correlation may not be present in observations of Sco X–1 (D’Amico et al. 2001a) and of GX 349+2 (see Iaria et al. 2004). D’Amico (2001b) proposed that the presence of a high-energy non-thermal emission could be linked to the 20–50 keV luminosity of the Comptonized component of the spectrum: they made the hypothesis that there is a threshold luminosity (∼ 4×10^{36} ergs s^{−1}) of the Comptonized component above which the non-thermal hard X-ray emission is produced.

In analyzing the first INTEGRAL pointings to Cyg X– 2, Natalucci et al. (2003) found the source in the ISGRI images in the 20-40 keV energy band, while it was not detected above 40 keV. We report here on the broad band (3– 100 keV) spectral analysis of an INTEGRAL AO1 observation of Cyg X–2 and of all the publicly available ISGRI observations of the source.

2. Observations

The AO1 observation was performed between May 2 and May 3, 2003 (52761.32-52762.43 MJD), during satellite revolution 67. The high-energy coded mask imager IBIS/ISGRI (Ubertini et al. 2003; Lebrun et al. 2003) was used to observe Cyg X-2 for a total exposure time of 66.8 ks. Cyg X-2 was in the JEM-X (Lund et al. 2003) field of view during four science windows, for a total exposure of 7.2 ks. Data were extracted for all pointings with a source position offset ≤ 12^∘ in ISGRI and ≤ 3.5^∘ in JEM-X.

Publicly available data from the satellite pointings towards the Cygnus region during the Performance Verification Phase (PVP) have been previously analyzed (Natalucci et al. 2003). Along with these data, 10 more observations have been carried out with the high-energy coded mask imager and have become publicly available. The publicly available observations used in this paper are listed in Table 1.

Data reduction for both instruments was performed using the standard Offline Science Analysis (OSA) version 4.2 distributed by the INTEGRAL Science Data Center (Courvoisier et al. 2003). The algorithms used in the analysis are described in Goldwurm et al. (2003). For the spectral analysis we used data corresponding to the 3–20 keV energy range for JEM-X and to the 20–100 keV energy range for ISGRI.

Obs. Start End Exposure (s) Rev P.L. ASM norm. rate 1 1085.63 1087.82 20737 023 < 9.1 29 ± 1.5 2 1092.68 1093.51 9169.59 025 < 9.0 54.9 ± 0.2 3 1109.35 1109.39 2209 031 16.8 ± 8.4 34.4 ± 0.5 4 1178.89 1178.92 3308.26 054 < 12.7 31.0 ± 0.6 5 1202.11 1202.17 4992.27 062 < 9.2 32.4 ± 0.6 6 1226.06 1226.12 4917.2 070 < 9.1 40.5 ± 0.3 7 1238.05 1238.1 4889.13 074 < 9.2 39.4 ± 0.4 8 1257.39 1258.34 17113.3 080 < 9.2 41.4 ± 0.6 9 1261.95 1262 4913.84 082 < 9.2 38.9 ± 0.9 10 1291.96 1292.96 5021.14 092 < 7.8 41.0 ± 1.2 11 1441.42 1441.45 3308.99 142 < 7.1 35.2 ± 0.4 12 1450.43 1450.48 4923.44 145 < 4.0 31.8 ± 0.6 AO1 1217.37 1218.42 66795.96 067 < 4.0 45 ± 3 Table 1. Summary of all ISGRI observations of Cyg X–2 used in this paper. Start and stop times are in IJD (IJD= MJD - 51544). The criterion used to detect the hard Xray emission is discussed in section 3.2.Here we report the power–law flux in the energy range 30–100 keV in units of 10^{−11} erg cm^{−2} s^{−1}. Errors and upper limits are at 90% confidence.

Fig. 1. The 20–40 keV IBIS/ISGRI mosaicked and deconvolved sky image of the AO1 66.8 ks observation. The image is centered at Cyg X-2 position. The pixel size is 5^′.

3. Results

3.1. The AO1 observation

Fig. 1 shows the ISGRI map of the Cyg X-2 region in the 20–40 keV energy range during the AO1 observation. Single pointings were deconvolved and analyzed separately, and then combined in mosaic images. The source is clearly detected at a significance level of 36σ. In the energy range 40–80 keV, the source can be detected only with a significance of 3σ. At higher energies Cyg X-2 was not detected at a statistically significant level neither in single exposures nor in the total exposure time. Cyg X- 2 was observed in ISGRI images at α_{J2000} = 21^h44^m40^s and δ_{J2000} = 38^∘19^′00^{′′}. The source position is consistent, within the source location error at 90% confidence of 0.8^′

G. Lavagetto et al.: Spectral Analysis of Cyg X-2 with INTEGRAL 3

(see Gros et al. 2003), with the catalog position (Liu et al. 2001).

We base our spectral investigations mainly on preceding BeppoSAX spectral results (Di Salvo et al. 2002). We find that the broad-band (3–100 keV) spectrum of the AO1 observation is well fitted by an absorbed Comptonization spectrum. Due to the lack of low-energy data we fixed the value of the photoelectric absorption to the value reported by Di Salvo et al. (2002). We will adopt their spectral model in fitting the data. Using the compTT (Titarchuk 1994) model in xspec 11.3.1 we were able to fit the data with a reduced chi squared of 1.09 for 144 degrees of freedom (d.o.f.). The non-detection of a low energy thermal component in the continuum spectrum is not surprising, since it was used to model mainly the low energy (0.1–3 keV) BeppoSAX spectra. The addition of a power-law component at high energies, or of a Gaussian emission line at ∼ 6.7 keV that were found in BeppoSAX observations are not statistically required. Fixing the energy and the width of the emission line to the best values obtained by Di Salvo et al. (2002), we find an upper limit on the intensity of 13×10^{−3} photons cm^{−2} s^{−1} (at 90 % confidence), well compatible with the intensity found in the BeppoSAX observations, which varied between 3 and 7 × 10^{−3} photons cm^{−2} s^{−1}. We were able to determine an upper limit on the flux of a power-law component (using the pegpwrl model inside xspec) by fixing the photon index to the value reported by Di Salvo et al. (2002), 2.09. We find an upper limit (at 90 % confidence) on power law flux between 30 and 100 keV of 4.0 × 10^{−11} erg cm^{−2} s^{−1}. During the BeppoSAX observation analyzed by Di Salvo et al. (2002) in which the hard X-ray emission was detected, the flux in the same energy band was 5.2^{+7.9}_{−1.1} × 10^{−11} erg cm^{−2} s^{−11}. Since the flux in the 3–30 keV energy band in the present observation, (1.1 ± 0.3) × 10^{−8} erg cm^{−2} s^{−1}, is comparable with the flux in the BeppoSAX data in the same band, (1.0 ± 0.3) × 10^{−8} erg cm^{−2} s^{−1}, we conclude that the spectrum of the INTEGRAL data is softer than during the BeppoSAX observations and that no significant hard X-ray emission is present. We added a normalization factor between Jem-X and ISGRI spectra; keeping the ISGRI normalization fixed to 1 we found a Jem-X normalization of 0.986. Detailed results for the best-fit model are reported in table 2. The reduced χ^2 (d.o.f.) of the best fit model is 1.03(142). The folded and unfolded spectra together with the best-fit model and the respective residuals are shown in figure 2.

3.2. Looking for hard X-ray emission in other INTEGRAL observations of Cyg X-2

Since no JEM-X data are available during other public ISGRI observations, it is not possible to determine the parameters of the compTT component at these times. To test the presence of a hard tail, we fitted the ISGRI data

1 All errors on the fluxes are at 90% confidence.

Fig. 2. Folded (top panel) and unfolded (middle panel) spectra of the AO1 Observation of Cyg X–2 (top panel) together with residuals with respect to the best fit model (bottom panel).

with the model we fitted to the AO1 observation, keeping the seed photons temperature T_w and the optical depth of the Comptonizing cloud τ frozen to their best-fit values; the only free parameters in the fit are therefore the normalizations of the two components and the electron temperature of the compTT component. In observations 3, 4 and 11 (see table 1) we had to fix the electron temperature as well.

We consider that a hard tail is present in the spectrum when the power-law flux in the 30-100 keV energy range is different from 0 at 90% confidence. Using this criterion, we find one data set in which the hard tail is detected (see table 1). In the other 11 data sets, no hard tail is detectable, although in most cases the upper limits are consistent with the flux found by BeppoSAX . The detection (or the lack of it) is reported in table 1. Our results partially confirm that a hard tail appears from time to time in Cyg X–2 spectra, as reported by other authors (Di Salvo et al. 2002, Piraino et al. 2002). It was proposed that the presence of the hard power-law emission is strongest in the horizontal branch of the X-ray CCD (Di Salvo et al. 2002). Unfortunately we have no possibility to obtain information about the position of the source along its Z track, neither in the public data nor during the AO1 observation (JEM-X data covered only a small fraction of the ISGRI observation). In the analysis of the first INTEGRAL observations of Cyg X–2, Natalucci et al. (2003) suggested that there could be a correlation between the variability of the high-energy spectrum and the long term variability in the soft X-ray lightcurve of Cyg X–2. We analyzed the Cyg X–2 lightcurves obtained with the RXTE All Sky Monitor (ASM) simultaneously with the INTEGRAL observations, seeking for some sort of correlation between the long term soft X–ray variability and the detection of a hard tail. We do not find evidence of a

4 G. Lavagetto et al.: Spectral Analysis of Cyg X-2 with INTEGRAL

CompTT CompTT + power-law NH (×10^{22} cm^{−2}) 0.2 (frozen) 0.2 (frozen) kTW (keV) 0.99 ± 0.03 0.95 ± 0.04 kTe (keV) 3.44^{+0.43}_{−0.34} 3.03^{+0.41}_{−0.31} τ 6.8^{0.87}_{−0.82} 8.0^{+1.2}_{−1.1} RW 17.1 ± 1.6 18.3 ± 2.2 Pho. Index - 2.09 (frozen) Npo - < 4.0 EF e(keV) - 6.65 (frozen) σF e(keV) - 0.2 (frozen) IF e - < 13 × 10^{−3} Flux 1.05 1.13 χ^2(d.o.f.) 1.09(144) 1.03(142) Table 2. Results of the fit of the INTEGRAL Cyg X- 2 spectrum in the 3–100 keV energy band for the AO1 observation, with a Comptonized spectrum modeled by CompTT and with a model consisting of compTT and a power law with the photon index frozen to 2.09. Uncertainties are at 90% confidence level for a single parameter. Upper limits (also at 90% confidence) for the normalization of a Gaussian emission line from highly ionized iron and of a hard power-law are reported here to make a comparison with results by Di Salvo et al. (2002). kT_W is the temperature of the soft seed photons for the Comptonization, kT_e is the temperature of the scattering electron cloud, while τ is its optical depth in spherical geometry. R_W is the radius of the seed photons emitting region, assuming a source distance of 7.2 kpc. The powerlaw flux is in units of 10^{−11} erg cm^{−2} s^{−1} in the 30–100 keV energy range. The emission line intensity I is in units of photons cm^{−2} s^{−1}. The total unabsorbed flux, in units of 10^{−8} ergs cm^{−2} s^{−1}, refers to the 3–100 keV energy range.

correlation between the presence of the hard tail and the count rate in the ASM (see table 1).

We tried to obtain a crude estimate of the 20-50 keV luminosity of the Comptonized component from our fitting model in order to verify the hypothesis by D’Amico et al (2001b). In most observations, the error on the inferred luminosity is of one order of magnitude. In the AO1 observation however the power-law was not detected and the 20-50 keV luminosity of the Comptonized component is (1.0 ± 0.2)10^{36} erg s^{−1}, but in observation 3, where we detect the hard tail, the luminosity of the Comptonized component is (0.6 ± 0.5) × 10^{36} erg s^{−1}. This does not agree with the hypothesis of D’Amico et al. (2001b).

4. Conclusions

We analyzed the INTEGRAL AO1 observation of Cyg X- 2. The source was clearly detected in the 20-40 keV (see Figure 1), but only at a 3 σ level in the 40-80 keV energy band. The broad band spectrum is well fitted by a Comptonization model alone. No hard tail was significantly detected in the data We also analyzed 12 publicly available observations carried out with ISGRI, and confirmed the detection of a hard tail at 90% confidence in one case. This is the first direct detection of a hard tail in high-energy imaging data of a Z-source. A longer, continuous observation of Cyg X–2 with both JEM-X and ISGRI would allow to investigate further the nature of the hard X-ray emission and its relationship with other spectral features of the source.

Acknowledgements. We acknowledge financial contribution from contract ASI-INTEGRAL I/R/046/04

References

Asai K., Dotani T., Mitsuda K., Nagase F., Kamado Y., Kuulkers E. & Breedon L. M., 1994, PASJ, 46, 479 Casares, J., Charles, P. A. & Kuulkers, E., 1998, ApJ, 493, L39 Courvoisier, T. J.-L., Walter, R., Beckmann, V., et al. 2003, A&A, 411, L57 D’Amico, F., Heindl, W. A., Rothschild, R. E., Gruber, D. E., 2001a, ApJ, 547, L147 D’Amico F., 2001b, AIP Conf. Proc. 587, Gamma 2001, ed. S. Ritz, N. Gehrels, & C. R. Shrader (Melville, NY: AIP), 44 Di Salvo, T., Stella, L., Robba, N. R., et al. 2000, ApJ, 544, L119 di Salvo, T., Robba, N.R., Iaria, R., Stella, L., Burderi, L., & Israel, G.L., 2001, ApJ, 554, 49 Di Salvo, T., Farinelli, R., Burderi, L., Frontera, F., Kuulkers, E., Masetti, N., Robba, N. R., Stella, L. & van der Klis, M., 2002, A&A, 386, 535 Frontera, F., dal Fiume, D., Malaguti, G., Nicastro, L., Orlandini, M., Palazzi, E., Pian, E., Favata, F., Santangelo, A., 1999, Nucl. Phys. B Proc. Suppl., 69, 286 Goldwurm, A., David, P., Foschini, L., et al. 2003, A&A, 411, L223 Gros, A., Goldwurm, A., Cadolle-Bel M., et al. 2003, A&A, 411, L179 Hasinger G., & van der Klis M., 1989, A&A, 225, 79 Hasinger G., van der Klis M., Ebisawa K., Dotani T., Mitsuda K., 1990, A&A, 235, 131 Hirano, A., Kitamoto, S., Yamada, T.T., Mineshige, S.,& Fukue, J., 1995, ApJ, 446, 350 Hjellming R. M., Han X. H., Cordova F.A.,& Hasinger G., 1990, A&A, 235, 147 Hoshi R., & Mitsuda K., 1991, PASJ, 43,485 Iaria, R., Di Salvo, T., Burderi, L., Robba, N. R., 2001, ApJ, 561,321 Iaria, R., Di Salvo, T., Robba, N. R., Burderi, L., Stella, L., Frontera, F., van der Klis, M., 2004, ApJ, 600, 358 Lebrun F., Leray J.-P., Lavocate, Ph., et al. 2003, A&A, 411, L141 Liu Q.Z., van Paradijs J., & van den Heuvel E.P.J., 2001, A&A, 368, 1021 Lund, N., Budtz-Joergensen, C., Westgaard, N. J., et al. 2003, A&A, 411, L231 Natalucci, L., Del Santo, M., Ubertini, P., Capitanio, F., Cocchi, M., Piraino, S., and Santangelo, A., 2003, A&A, 411, L395 Orosz, J.A., & Kuulkers, E., 1999, MNRAS, 305, 132 Piraino, S., Santangelo, A. & Kaaret, P., 2002, ApJ, 567, 1011 Smale, A. P., Done, C., et al., 1993, ApJ, 410, 796

G. Lavagetto et al.: Spectral Analysis of Cyg X-2 with INTEGRAL 5

Smale, A. P., 1998, ApJ, 498, L141 Titarchuk, L., 1994, ApJ, 434, 570 Ubertini, P., Lebrun, F., Di Cocco, G., et al. 2003, A&A, 411, L131