arXiv:astro-ph/0312557v1 20 Dec 2003

To Appear in the Astrophysical Journal

A Study of the Reionization History of Intergalactic Helium with FUSE and VLT^1

W. Zheng^2, G. A. Kriss^{2,3}, J.-M. Deharveng^4, W. V. Dixon^2, J. W. Kruk^2, J. M. Shull^{5,6}, M. L. Giroux^7, D. C. Morton^8, G. M. Williger^2, S. D. Friedman^3, and H. W. Moos^2

ABSTRACT

We obtained high-resolution FUSE (R ∼ 20,000) and VLT (R ∼ 45,000) spectra of the quasar HE2347–4342 to study the properties of the intergalactic medium between redshifts z = 2.0 − 2.9. The high-quality optical spectrum allows us to identify approximately 850 H I absorption lines with column densities between N ∼ 5 × 10^{11} and 10^{18} cm^{−2}. The reprocessed FUSE spectrum extends the wavelength coverage of the He II absorption down to an observed wavelength

1Based on observations made for the Guaranteed Time Team by the NASA-CNES-CSA FUSE mission, operated by the Johns Hopkins University under NASA contract NAS5-32985; Ultraviolet-Visual Echelle Spectrograph observations performed at the European Southern Observatory, Paranal, Chile, within the program 68.A-0230; and observations with the NASA/ESA Hubble Space Telescope, obtained at the Space Telescope Science Institute, which is operated by the Association of Universities of Research in Astronomy, Inc., under NASA contract NAS5-26555.

2Center for Astrophysical Sciences, Department of Physics and Astronomy, The Johns Hopkins University, Baltimore, MD 21218 (zheng@pha.jhu.edu; wvd@pha.jhu.edu; kruk@pha.jhu.edu; williger@pha.jhu.edu; hwm@pha.jhu.edu)

3Space Telescope Science Institute, 3700 San Martin Drive, Baltimore, MD 21218 (gak@stsci.edu; friedman@stsci.edu)

4Laboratoire d’Astrophysique de Marseille, BP 8, 13376 Marseille Cedex 12, France (jeanmichel.deharveng@oamp.fr)

5CASA, Department of Astrophysical and Planetary Sciences, University of Colorado, Boulder, CO 80309 (mshull@casa.colorado.edu)

6Also at JILA, University of Colorado and National Institute of Standards and Technology

7Department of Physics and Astronomy, Box 70652, East Tennessee State University, Johnson City, TN 37614 (giroux@polar.etsu.edu)

8Herzberg Institute of Astrophysics, National Research Council, Victoria, BC V9E 2E7, Canada (don.morton@nrc.gc.ca)

– 2 –

of 920 Å. Source flux is detected to restframe wavelengths as short as ∼ 237 Å. Approximately 1400 He II absorption lines are identified, including 917 He II Lyα systems and some of their He II Lyβ, Lyγ, and Lyδ counterparts. The ionization structure of He II is complex, with approximately 90 absorption lines that are not detected in the hydrogen spectrum. These features may represent the effect of soft ionizing sources. The ratio η=N(He II)/N(H I) varies approximately from unity to more than a thousand, with a median value of 62 and a distribution consistent with the intrinsic spectral indices of quasars. This provides evidence that the dominant ionizing field is from the accumulated quasar radiation, with contributions from other soft sources such as star-forming regions and obscured AGN, which do not ionize helium. We find an evolution in η toward smaller values at lower redshift, with the gradual disappearance of soft components. At redshifts z > 2.7, the large but finite increase in the He II opacity, τ = 5 ± 1, suggests that we are viewing the end stages of a reionization process that began at an earlier epoch. Fits of the absorption profiles of unblended lines indicate comparable velocities between hydrogen and He^+ ions. For line widths b_{He}+ = ξb_H , we find ξ = 0.95 ± 0.12, indicating a velocity field in the intergalactic medium dominated by turbulence. At hydrogen column densities N < 3 × 10^{12} cm^{−2} the number of forest lines shows a significant deficit relative to a power law, and becomes negligible below N = 10^{11} cm^{−2}.

Subject headings: dark matter — intergalactic medium — quasars: absorption lines — quasars: individual (HE2347–4342) — ultraviolet: general

1. INTRODUCTION

According to current models of cold-dark-matter structure formation, the first generation of massive baryonic objects, i.e., stars, galaxies and quasars, was formed in the early universe as the result of density fluctuations of the intergalactic medium (IGM; Zhang et al. 1995; Miralda-Escudé et al. 1996; Bi and Davidsen 1997). The radiation from these objects gradually ionized the surrounding IGM, ending the so-called “dark age.” Most models predict that the intergalactic hydrogen was ionized at z ∼ 7 − 10, and helium at z ∼ 3 − 4 (Loeb and Barkana 2001; Wyithe and Loeb 2003, and references therein). The recent WMAP results (Spergel et al. 2003) provide evidence that the IGM reionization may have started at z ∼ 17. Cen (2003) suggests that there may have been a second stage of hydrogen reionization that took place at z ∼ 6, and Venkatesan et al. (2003) suggest that helium may also have been reionized twice, partially by an early generation of Population iii stars, and

– 3 –

subsequently by quasar radiation at z < 5.

Our knowledge of the IGM has been derived largely from the Lyα forest absorption of neutral hydrogen. The expansion of the universe following reionization leads to a rapid drop in the hydrogen Lyα effective optical depth of the IGM, τ ∝ (1 + z)^{3.5} (Press et al. 1993). The number density of forest lines also increases toward lower column density, with dn/dN ∝ N^{−1.5} (Kim et al. 2002). Lines at a column density of N ∼ 10^{13} cm^{−2} represent the mean density the IGM. The underdense regions, represented by hydrogen column densities below N ∼ 10^{12} cm^{−2}, have been largely undetected. Throughout this paper, the column density N refers to hydrogen, unless noted otherwise.

The IGM can also be traced by He II absorption, which is far more sensitive than H I. Under the hard photoionizing conditions at z ∼ 3, He^+ outnumbers H^0 by a factor η of the order of 100 (Davidsen et al. 1996; Kriss et al. 2001). The He II optical depth is therefore η/4 or approximately 25 times greater than that of H I for turbulent line broadening and η/2 for thermal broadening. For a tenuous structure that produces an H I optical depth less than 0.01, even the best optical spectra may not provide a significant detection. But the corresponding He II optical depth, at 0.25, can be detected at a moderate signal-to-noise (S/N) ratio. He II absorption is therefore an effective tracer of the low-density structures that fill ∼ 70% of the volume of the universe at z ∼ 3. Significant He II absorption exists even in the spectral voids where there are no detected Lyα forest lines. As Croft et al. (1997) show, each of several different CDM models can explain the distribution of the H I forest lines, but the various models predict different results for He II absorption.

The search for the He II Gunn-Peterson effect has yielded significant results in recent years. Jakobsen et al. (1994) reported a sharp flux cutoff at the He II Lyα wavelength 304(1+z) Å in the spectrum of quasar Q0302-003 (z = 3.286), obtained with HST. Followup observations at a higher S/N level and spectral resolution (Hogan et al. 1997; Heap et al. 2000) found an average He II optical depth τ = 4.0 ± 0.5 at z ∼ 3. At far-UV wavelengths below 1200 Å, He II spectra exhibit a significantly lower He II opacity, enabling detailed studies of the ionization structure of the IGM. Hopkins Ultraviolet Telescope (HUT) observations of the luminous quasar HS1700+64 (z = 2.73, Davidsen et al. 1996) revealed an average He II optical depth of 1.00 ± 0.07, which suggests that the dominant ionization source at z ∼ 2.5 is from quasars instead of stars, but the low resolution of HUT does not allow a study of the individual absorption components.

The bright quasar HE2347–4342 (z = 2.885, V = 16.1; Reimers et al. 1997) is an extremely rare object that exhibits a clear line of sight at restframe wavelengths around 300 Å. Its UV flux, at a level of 2 × 10^{−15} ergs s^{−1} cm^{−2} Å^{−1}, is the highest among the five quasars with known He II Lyα features (Jakobsen et al. 1994; Davidsen et al. 1996;

– 4 –

Reimers et al. 1997; Anderson et al. 1999; Zheng et al. 2004), enabling a high-resolution study of He II absorption with FUSE. Below a redshift of 2.7, Kriss et al. (2001) resolved the He II Lyα absorption as a discrete forest of absorption lines. The column-density ratio η=N(He II)/N(H I) ranges from ∼ 1 to > 1000, suggesting a mix of ionizing sources of radiation consisting of quasars and star-forming galaxies. However, approximately 50% of these lines do not have detectable H I counterparts in the Keck spectrum of this quasar. At higher redshifts, the He II absorption has a patchy structure, including regions with low He II opacity (“voids”) and regions with high opacity and no detectable flux (blacked-out “troughs”). Using high S/N HST/STIS observations of this region, Smette et al. (2002) found that the η value is generally high, but shows large variations, from ∼ 30 in the opacity gaps to a lower limit of 2300 at z ∼ 2.86 in a region that shows an extremely low H I opacity over a 6.5 Å spectral range. In order to explain the shape of the opacity gaps (absence of large individual absorption lines) at this and other wavelengths, they suggested that six bright soft ionization sources lie near the line of sight, for which the ratio between the numbers of H I- to He II-ionizing photons reaching the IGM is large.

This change in character of the He II absorption is similar to the large increases in Lyman series H I opacity at z > 6 seen in several quasars discovered by the Sloan Digital Sky Survey (Becker et al. 2000; Fan et al. 2002; White et al. 2003). As these authors have suggested that reionization of the H I in the IGM occurred just prior to this epoch, it is likely that reionization of He^+ occurred slightly above a redshift of 3. Theoretical models (Haardt and Madau 1996; Fardal et al. 1998; Madau at al. 1999; Loeb and Barkana 2001; Wyithe and Loeb 2003) also indicate that the reionization of intergalactic helium took place later than hydrogen as the number of He II-ionizing photons is significantly smaller than that for hydrogen. These initial regions of He II ionization, however, would have recombined, and only reached full ionization at lower redshift during the quasar era. Indirect evidence based on an increase in H I line widths (Ricotti et al. 2000; Theuns et al. 2002) and a decrease in H I opacity (Bernardi et al. 2003) support the assumption that the final stage of He II reionization may have taken place at z ∼ 3.2 − 3.4.

In this paper, we present results based on a reprocessed FUSE spectrum of HE2347–4342 and a new VLT/UVES echelle spectrum. Our previous paper (Kriss et al. 2001) used only the FUSE data from the LiF channels, and a modest S/N Keck echelle spectrum between 3800 and 6000 Å. The improved FUSE pipeline allows us to extract spectra from the SiC channels, which extend the wavelength coverage to the 912–1000 Å region. The expanded wavelength coverage enables us to study the evolution of intergalactic helium with redshift down to z = 2, and also to observe the Lyβ portion of the He II forest. Our new VLT spectrum spans the full redshift range covered by the FUSE data, and its higher S/N makes it possible to identify weak H I lines with He II counterparts that are not detectable in

– 5 –

the Keck spectrum. We follow the traditional approach in this paper of fitting individual spectral features in the FUSE and VLT spectra. In a separate paper, Shull et al. (2003) describe an independent analysis of the FUSE spectrum at redshift 2.3-2.9 and another set of VLT/UVES data using a non-parametric approach to study the opacity variations in the IGM. They also identify fluctuations in the ionizing radiation field on a fine-grained scale, Δz ∼ 0.001.

Our discussion in this paper is organized as follows. In §2 we describe our reprocessing of the FUSE data, and our new VLT/UVES observations. In §3 we explain how we identify and fit individual spectral features in the FUSE and VLT spectra. In §4 we discuss the scientific results of our analysis, concentrating on the column-density distribution of Lyα absorbers (§4.1), the velocity field in the IGM (§4.2), the evolution of the ionization state of the IGM (§4.3), the evolution of the He II opacity (§4.4), and the approach to the He II reionization epoch (§4.5). Section 5 summarizes our results.

2. DATA

2.1. Ultraviolet Data

The Far-Ultraviolet Spectroscopic Explorer (FUSE) is a NASA-CNES-CSA mission dedicated to high-resolution spectroscopy between 905 and 1187 Å. It consists of two UV detectors, four Rowland-circle gratings and four mirrors. The LiF-coated optics yield a wavelength coverage of ∼ 979 − 1187 Å, and the SiC-coated optics cover ∼ 905 − 1104 Å. For a full description of FUSE, its mission, and its in-flight performance, see Moos et al. (2000) and Sahnow et al. (2000).

The FUSE observations of HE2347–4342 were carried out in three periods in 2000: June 27, August 18-25, and October 15-20. A total of 243 raw images were obtained, representing an exposure time of 619 kseconds, of which 431 kseconds were at night. While the FUSE detector background is intrinsically low, the source count level from HE2347–4342 is still weaker than the background because of the high spectral resolution. The key step in our data analysis is the background subtraction. The FUSE background consists of two components: the detector dark count and the scattered light. The dark count is roughly constant across the detector but varies in intensity with time. The scattered light during day time is an order of magnitude stronger than at night, and it produces considerable and different spatial structures across the detectors. The inclusion of the day portion would completely obscure the weak source structure. We therefore use only the night portion of the data.

Based on the data of this quasar from the LiF channels of FUSE and a Keck optical

– 6 –

spectrum, (Kriss et al. 2001) have reported a rich absorption structure that reflects a broad range of ionization level. The average value of η ∼ 80 is consistent with photoionization of the absorbing gas by a hard ionizing spectrum resulting from the integrated light of quasars. The presence of He II absorbers with no H I counterparts indicates that structure is present even in low-density regions.

A new version of the FUSE calibration software (CalFUSE v2.2) enables us to reprocess the data and improve its quality. We first process each of the 243 raw exposures, rejecting undesirable events such as detector count bursts. The processed spectra are then merged to form a final image with the highest S/N possible. From this image, we are able to model and subtract the background more accurately than before.

We perform the background subtraction using two parallel approaches, including the standard pipeline procedure and manual extraction. To extract the spectrum manually, we define respective background windows on both sides of the source extraction windows on the detector. The background variations are assumed to be linear across the spatial dimension (Y), and its slope is estimated from the two background windows. The background level at the extraction window is then interpolated at every wavelength unit along the dispersion direction (X). This method cannot be fully implemented for extraction windows near the detector edge. In such cases, we define two background windows on one side of the extraction window, calculate the slope of variations and extrapolate the background level at the source position. A pair of background windows is necessary because the background varis across the detector, even at a low level.

The manual extraction yields better results, as judged by the level of residual flux in the opaque portions of the He II absorption spectrum. The standard pipeline extraction, on the other hand, produces a better photometric agreement at long wavelengths in the region of overlap with the HST/STIS data. The final data we present here are based on the manual extraction using photometric corrections as described below.

For a given window position, we extract the data using different sets of detector pulseheight parameters (FUSE Observer’s Guide 2003): 4-16, 5-16, 7-15, and 8-12. In principle, dark current and photon events exhibit different pulse characteristics. By choosing a narrow band of the pulse height, one would be able to reduce the contribution of dark-current events. However, a fraction of the source counts would also be lost, leading to photometric inaccuracy. The standard parameters for the pulse height, between 4 and 16 counts, yield a flux level that is close to photometric. A pulse height range of 5–16, however, maximizes the S/N, so we choose this range and normalize the extracted spectrum to the same flux level as obtained using the photometric pulse height range of 4–16.

– 7 –

The full set of FUSE data consists of eight segments labeled LiF 1A, 1B, 2A, 2B and SiC 1A, 1B, 2A, 2B. Sky emission lines are removed from the spectra (Feldman et al. 2000). Significant airglow lines include He I λ584 (second order at 1168 Å), N I λ1134, O I λ989 and the Lyman-series lines. The spectra are then binned to 0.025 Å, and combined with their S/N as the weighting factor at every pixel. This level of binning gives critical sampling of two bins per R = 20, 000 resolution element provided by FUSE, and corresponds identically in velocity (∼ 7.5 km s^{−1}) to the 0.1 Å bins we use in sampling the H I spectrum described later in §2.2. A typical S/N level per resolution element is 10 at the long wavelength part (λ > 1050 Å), and 3 at the short wavelengths.

The spectral normalization involves two steps: First, we correct the zero level. While the spectra extracted with CalFUSE v2.2 improve upon earlier pipeline results, and our manual extraction technique is even better, there are still regions where the zero level is not perfect. This is particularly obvious in the SiC spectra from detector 1, where the SiC 1A and 1B extraction windows lie near the edge of the detector. We correct the zero level using the H I Lyα forest spectrum where there are many features with fully saturated absorption at the line center. It is reasonable to assume that their He II counterparts will also be completely absorbed at the line center, as the He II optical depth is considerably higher than that of the H I feature. We assume that these data points should have zero flux, and fit a smoothly varying polynomial to these low points to determine the zero-level correction. This correction is up to 10% of the maximum flux in the LiF data segments, and up to 40% in the SiC channels.

Secondly, we normalize the FUSE spectrum, assuming the intrinsic, unabsorbed spectrum is a reddened power law. Since more than a thousand He II absorption lines nearly blanket the entire FUSE spectrum, it is difficult to determine the continuum level from the FUSE spectrum itself. As described by Kriss et al. (2001), a pair of HST/STIS spectra are used to derive the intrinsic continuum. These data were obtained contemporaneously with the respective FUSE data and serve as a photometric standard for our extracted FUSE spectrum. A comparison between the STIS and FUSE spectra indicates that the photometric quality of the FUSE data is reasonably good, agreeing with the STIS data to within about 5% between 1150 and 1187 Å. The best-fit power law is f_λ = 3.3 × 10^{−15}(λ/1000Å)^{−2.4} ergs s^{−1} cm^{−2} Å^{−1}, with E(B-V)=0.014. An extrapolation of this continuum model serves as the baseline for the renormalization of our FUSE spectrum.

– 8 –

2.2. Optical Data

Optical echelle spectra of HE2347–4342 were obtained at the ESO VLT/UVES on 2001 November 23-24. The exposure time for each readout was 30 minutes, and the total exposure time was 8 hours. The sky was photometric. With a slit opening of 1 arcsecond, the spectral resolution is approximately 45,000. We used the blue instrument arm, consisting of a 2048 × 4096 CCD detector, an echelle grating of 41.59 line mm^{−1}, and a cross disperser of 600 line mm^{−1} and blaze wavelength of 4600 Å. With a central wavelength 4200 Å for the cross disperser, the spectrum covers the wavelength range between 3600 and 4800 Å in 31 orders, which corresponds to the entire He II Lyα wavelength range studied with FUSE from z = 2.0 to 2.9. There are significant overlaps in wavelength coverage between adjacent orders. The wavelength calibration spectra were taken with the ThAr lamp.

Using IRAF tasks designed for echelle data, we processed the spectra. For each extraction segment, we used 10-15 pixels on both sides of the trace to derive the background. The final wavelength calibration is accurate to ∼ 0.007 Å, and it has been corrected to vacuum wavelengths in a heliocentric reference frame. We normalized each individual echelle order with a polynomial, then rebinned them to 0.1 Å. We then merged all 31 segments of normalized spectra, weighted by the individual S/N ratios. The S/N ratio in the merged spectrum is about 110 per 0.1 Å bin at 4700 Å, and about 46 at 3850 Å. This is approximately 2.5 and 10 times that of the Keck data, respectively. Only the VLT data cover the wavelength range between 3600 and 3800 Å. To improve the continuum fitting, this count spectrum is further normalized with a high-order polynomial across the entire wavelength range. Figure 1 displays the normalized FUSE and VLT spectra of HE2347–4342 across the full wavelength range covered by our new data.

3. LINE FITTING

We analyze the spectral features in the FUSE and VLT spectra using the IRAF task Specfit (Kriss 1994). Absorption features are fit with Gaussian profiles rather than Voigt profiles. This is a good approximation for line components with column densities below 10^{15} cm^{−2}. Saturated lines may be better represented by Voigt profiles, but it is not important for our purpose since our main goal is to study the weak absorption lines. Because of the large number of components and variables, we carry out the fitting procedure in 48 wavelength segments of approximately 25 Å each.

Below 3984 Å in the optical spectrum, Lyβ absorption starts to appear. Line fitting in this region is carried out using both Lyα and Lyβ for each identified feature. Paired

– 9 –

absorption lines are fit using the same velocity width and column density, and their central wavelengths are tied to the ratio of their intrinsic wavelengths.

Free parameters in the fit are line width, column density, and the centroid wavelength. The weakest features that we are able to identify in the VLT spectrum have a column density N = 5 × 10^{11} cm^{−2}, mostly at wavelengths longward of 4400 Å. At the short-wavelength end, the minimum detectable column density is ∼ 1.5 × 10^{12} cm^{−2}. The number of these weak lines and their fitted parameters are affected by the continuum level. The errors in their column densities may be as large as a factor of two. We identify metal lines as those with b values less than 10 km s^{−1}. A total of 852 Lyα absorption lines are present in the VLT spectrum over the full 3600-4750 Å wavelength range.

The initial line fits to the FUSE spectrum are based on our results from fitting the H I Lyα forest. For every H I absorption line, we define a He II counterpart with the same velocity width (see §4.2) and redshift, with only the column density allowed to vary. As described in Kriss et al. (2001), additional He II absorption lines are added in regions where the He II optical depth is so high high that no known H I component can provide with reasonable η values. Such added absorption lines are given a fixed Doppler parameter b = 27 km s^{−1}. For the VLT spectrum, multiple Gaussian profiles are often introduced to fit a single absorption feature. Fitting to the corresponding FUSE data sometimes to converge to one of these profiles, but fails to identify the others. In such a case, we fix this set of profiles to the same η value, as these absorbers are ionized by the same radiation field. Approximately ten H I absorption lines have no apparent He II counterparts, and they are not apparently blended. We assign He II column densities to these lines as 1-σ lower limits that are on the order of 10^{13} cm^{−2}, and mark them in Table 1 with null errors in the He II column density. Most of these absorption lines are only marginally detected in the VLT data; therefore their reality may be questionable. It is worth noting that uncertainties in the FUSE data reduction and fitting, particularly the imperfect background subtraction may contribute significant errors in these peculiar absorption lines.

At wavelengths shortward of 996 Å, the presence of He II Lyβ poses additional difficulty in line identification. We fit the FUSE data in this region in two ways. For lines that are not badly blended, we fit He II Lyα and Lyβ simultaneously, using the same approach we applied to the VLT H I spectrum. The Lyα and Lyβ lines are forced to have the same column density, redshift, and Doppler parameter, For those lines that are blended, the noisy Lyβ region can adversely affect the fitting process. In such cases, we determine the He II column densities of the Lyβ lines from the longer-wavelength Lyα lines alone and fix this parameter for the corresponding Lyβ line. We then fit the He II Lyα lines in the blended region using the corresponding H I lines from the VLT spectrum to fix the redshifts and line widths. As

– 10 –

above, if additional He II opacity is needed at specific wavelengths, we add additional He II Lyα components with a fixed Doppler parameter. We do not fit the spectrum below 920 Å, as blended Lyman-series airglow contamination becomes too strong to correct.

At wavelengths longward of 1000 Å, our fits agree well with those in Kriss et al. (2001), but require fewer added He II components. The higher quality of our VLT spectrum allows us to identify more weak hydrogen absorbers. Between 1000 and 1130 Å, we identify 362 absorption lines with both H I and He II Lyα absorption and only require 43 additional He II Lyα lines with no H I counterpart. The number of identified H I Lyα forest lines is nearly twice that in the Keck spectrum of this object (Songaila 1998; Kriss et al. 2001) over this spectral range, and they include most of the added He II Lyα components in the work of Kriss et al. (2001). The properties of sample components are listed in Table 1: their absorption redshifts, He II column densities, Doppler parameters, H I column densities, and η values. Null errors in the Doppler parameter represent an added component that is not detected in the VLT data (the corresponding H I column density is the upper limit.) In such a case, the η value is an upper limit.

4. DISCUSSION

4.1. Distribution of Absorption Features

The H I Lyα forest lines in quasar spectra follow a well-defined power-law distribution, dn/dN ∝ N^{−β}, where β = 1.5 at 3 × 10^{12} < N < 10^{15} cm^{−2} (Tytler 1987; Rauch 1998; Kim et al. 2002). At higher column density there are more damped systems than this power law predicts. Below N < 3 × 10^{12} cm^{−2}, line identification becomes difficult, and the results are not certain. Hu et al. (1995) suggest that this power law may be extended to lower column density, assuming a large correction factor.

As the FUSE data reveal a large number of absorption lines with low H I column density, useful information about their distribution with column density may be obtained. We first examine the column-density distribution of the Lyα lines that are observed in both H I and He II. In Figure 2, the distribution of the H I forest lines in HE2347–4342 is plotted. The results are consistent with a power law of β = 1.5 between 3 × 10^{12} < N < 10^{16} cm^{−2}. Another histogram displays the distribution of values derived from the He II column density. Each data point is divided by 62, the median η. The distribution of these calculated hydrogen absorption lines follows a pattern similar to the real ones, demonstrating the possibility of using He II parameters to describe the H I counterparts. The histograms do not match well at higher column density, as a result of this simplified approach which assumes a fixed value

– 11 –

for η.

We extend the database for Figure 2 with additional absorption lines which are detected only in He II. If the average value of η = 300, approximately 100 data points are added to the He II database in Figure 2, to produce the results displayed in Figure 3. If we choose a value lower than 300, many absorption-lines should have been detected in the optical spectrum, and values higher than 300 will leave a gap in the distribution shown in Figure 3. The added points represent our estimate of the low-column-density end of the H I absorption line distribution. There is a significant downturn around N = 3 × 10^{12} cm^{−2}, from β ∼ 1.5 to 0.3. On the basis of this pattern, we infer that the number of absorption lines with N < 10^{11} cm^{−2} is negligible.

A part of the observed trend in Figures 2 and 3 at the low-column-density end may be attributable to the confusion limit of the FUSE data: Weak absorption features fall into other troughs and become undetected. We have carried out simulations by introducing additional absorption lines into the FUSE spectrum, and performing the same line-fitting procedure described in §3. At a He II column density of ∼ 10^{15} cm^{−2}, more than 90% of the absorption lines are identified. At ∼ 10^{14} cm^{−2}, approximately two thirds of the lines are identified. The others are heavily blended, and the fitting task only yields a single fitted component for them. This may explain why many fitted lines have Doppler parameters greater than 40 km s^{−1}. At the limiting column density of 10^{13} cm^{−2}, only one out of five may be detected. Assuming an average η = 300, these components have their H I column density on the order of 10^{10} cm^{−2}. A correction factor of 5 may therefore increase the number of weak absorbers at N < 10^{11} cm^{−2}. The downturn of the distribution shown in Figure 3 takes place at a He II column density of N ∼ 10^{15} cm^{−2}, where the correction factor is insignificant. We therefore suggest that this change in the distribution is real, not just the result of confusion.

4.2. Velocity Field in the IGM

An important but as yet unknown parameter in the IGM is the velocity ratio ξ = b_{He}/b_H between the He^+ ions and hydrogen atoms in an individual spectral feature. This is a vital clue to the actual physical processes that dominate the evolution of structure in the IGM. Previous models and observations often assumed a value, either 1.0 for purely turbulent motions, or 0.5 for purely thermal broadening, in order to constrain other parameters. Even with the high spectral resolution of FUSE, an attempt to derive the He II Doppler line widths is difficult because of line blending and the low S/N. In spectral voids, however, where absorption lines are sparse, we have identified a sample of individual He II and H I absorption lines that are not blended in either Lyα or Lyβ. We fit the profiles of these

– 12 –

individual absorption features (Figures 4 and 5) and let the velocity widths vary as free parameters. The optical depths of the Lyα and Lyβ lines are also linked by simple atomic physics, providing an important additional constraint on the allowed range of the fitted line widths. Table 2 summarizes the results of our fits. A linear fit to the line widths yields a ratio of the He II to H I line widths of ξ = 0.95 ± 0.12. As shown Figure 6, this velocity ratio is consistent with turbulence being dominant, with one or two cases of possible thermal line broadening. We therefore have assumed identical He II and H I line widths for all absorption lines in our analysis.

4.3. Evolution of Ionization Level

The derived η ratios are plotted in Figure 7, along with the lower limits from those He II Lyα lines which do not have H I counterparts (now a minor fraction of the data set, < 10%) and the upper limits from the H I lines without significant He II counterparts. Our analysis reveals a significant population of IGM structures with hydrogen column densities between 5 × 10^{11} and 2 × 10^{12} cm^{−2}. They account for approximately 40% of all the identified He II absorption lines. We calculate the average value of η in logarithmic units, including only lines that are detected in both the FUSE and VLT spectra. For n data points, we calculate the logarithmic average as log(η̄) = ( ∑ log(η_i))/n, and its corresponding uncertainty as log(Δη) = ( ∑ (log(Δη_i))^2)^{1/2}/n. The average value of η ∼ 48 ± 10 strongly suggests that the main ionization source is the accumulated emission from quasars. Zheng et al. (1997) and Telfer et al. (2002) derive a mean spectral index below 1000 Å for quasars of α ∼ −1.7, which is consistent with the ionization level measured here. The median value of η is 62, which is reasonably close to the average value. However, there is significant variation of the ionization parameter η, from less than unity to over a thousand. Some lines with low η values in our list are associated with heavily saturated Lyman-limit systems, in which the measurement errors are large.

Cases with η > 500 may represent the regions in the IGM that are ionized by local soft radiation sources, but not yet by the metagalactic UV background radiation field. Approximately 90 such lines are added in fitting the FUSE spectrum, particularly at z > 2.7. They are needed to explain the complete absorption troughs, and they confirm the suggestion of Zheng et al. (1998) that a significant part of the He II absorption may be produced by absorption lines without detected H I counterparts. These lines represent the tenuous regions of the IGM that have not been detected in hydrogen. The lack of such high η values at lower redshifts suggests that the ionization of intergalactic helium is fairly complete at z ∼ 2.

Figures 7 and 8 show that the column-density ratio η decreases gradually toward lower

– 13 –

redshift. The main reason appears to be the decline in the number of absorption lines with η > 1000 with decreasing redshift (only one is seen below z = 2.25), as the He II reionization by a metagalactic UV background field becomes complete. Haardt and Madau (1996) and Madau at al. (1999) model the evolution of the ionizing continuum under the assumption that quasar emission is the dominant source of ionizing photons and suggest that the He II/H I ratio in the IGM and the Lyα clouds increases from ∼ 25 at z = 0 to ∼ 45 at z = 2.5, and then decreases again below 30 for z > 4.5. Telfer et al. (2002) study the EUV continuum shape of quasars and find that it remains fairly constant between redshifts of 0.3 and 2. Such a trend is also noted in the model results of Fardal et al. (1998) for a fixed continuum-power-law index. Our results strongly suggest that the main ionizing source at redshift z ∼ 2.8 is the accumulated radiation from quasars.

As suggested by Kriss et al. (2001) and Shull et al. (2003), the large variations in η may be due to local sources of ionizing radiation. For each observed value of η, we infer the incident spectral index α_{EUV} (defined by f_ν ∝ f^{−αEUV} ) using models of power-law radiation propagated through the IGM (Fardal et al. 1998, model A2 in their Figure 10). In Figure 9 we compare this distribution of inferred spectral indices to those measured by Telfer et al. (2002). At low values of α_{EUV} the two distributions are similar, suggesting that the observed variations in η are consistent with the natural variation of intrinsic quasar spectral indices. At high values of α_{EUV} , however, the excess of features with high η indicates a contribution from an additional population of soft ionizing sources such as star-forming galaxies or obscured AGN. One problem with this simple interpretation is that the observed space density of quasars at z = 2.5 is too sparse to produce fluctuations on the observed scale of Δz = 0.001, and the expected high space density of star-forming galaxies should produce a more uniform radiation field. As discussed by Shull et al. (2003), the combination of the natural variation in quasar spectral indices, the resulting difference in the proximity spheres for H I and He II, and radiative transfer through a non-uniform IGM may all conspire to produce the observed variations in η.

4.4. Evolution of He II Opacity

Studies of He II absorption along several lines of sight (Davidsen et al. 1996; Heap et al. 2000; Kriss et al. 2001, and references therein) have shown that from z = 2.3 to z = 3.3 the average opacity increases toward higher redshift. In our reprocessed FUSE spectrum of HE2347–4342, for a given section of the spectrum, we calculate the average transmission and its associated uncertainty by summing over the n data points T = ( ∑ t_i)/n and ΔT = ( ∑ (Δt_i)^2)^{1/2}/n, where the transmission at each point i in the normalized binned

– 14 –

spectrum is given by t_i. The He II Lyα optical depth is then calculated as τ_α = −ln T. At wavelengths shorter than 995.5 Å, however, we must modify this procedure as He II Lyβ and other higher-order Lyman series lines begin to blend in with the He II Lyα forest. The high resolution of the VLT and FUSE spectra enable us to separate the Lyα absorption lines at z < 2.27 from high-order Lyman lines at higher redshift. To isolate the contribution from the Lyα absorption lines alone, we construct a model for the short-wavelength section of the spectrum based on the H I line list from the fitted VLT spectrum (for the He II Lyα lines) and the fitted parameters of the longer-wavelength He II Lyα lines (for the higher-order Lyman lines). At wavelengths shortward of 995.5 Å (z < 2.28), we then calculate the He II Lyα opacity from this modeled spectrum. Figure 10 shows the average He II Lyα optical depth as a function of redshift. For comparison, we show the empirical trend with redshift for He II of τ ∝ (1 + z)^{3.5} (Fardal et al. 1998). At redshifts below 2.7, the agreement is quite reasonable; however, at higher redshift, the opacity grows much more rapidly. We discuss this in the next section.

4.5. He II Opacity at z > 2.7

At redshifts above z = 2.7, the spectrum of HE2347–4342 is largely opaque in He II Lyα. The high S/N HST/STIS spectrum (Smette et al. 2002) shows several deep absorption troughs at z > 2.77. Following the nomenclature and wavelength intervals defined in their Table 3, Troughs A, C, D, and I have average He II Lyα optical depths of ∼ 4 or more. Our new short-wavelength FUSE data allow us to derive more accurate optical depths in these deepest troughs since we can now measure the opacity not only in Lyα, but also in the corresponding higher-order Lyman lines. For example, trough A is seen in Lyα (1175.6-1178Å), Lyβ (991.8-993.8Å), and Lyγ (940.5-942.4Å). Because of these low S/N and uncertain continuum, the Lyγ troughs (visible in Figure 1) are not quantitatively useful in improving the limits on the Lyα opacity. To measure the average optical depth due to Lyβ alone in a given wavelength interval, we first calculate the optical depth directly from the FUSE spectrum. There are overlying He II Lyα lines throughout this region of the spectrum, however, and we correct for these by using the predicted He II Lyα opacity based on the H I Lyα line list in each of these intervals obtained from the VLT spectrum. For each H I Lyα line, we assume the median value of the He II-H I column-density ratio η = 62, compute the corresponding He II Lyα column density, and assume that it has the same redshift and velocity width as the H I feature. We then integrate this synthetic He II Lyα spectrum to obtain the contaminating contribution of He II Lyα to the opacity in each of the regions that we measure for the Lyβ transmission. Table 3 summarizes our opacity measurements for each of the wavelength regions identified by Smette et al. (2002). For each He II Lyα

– 15 –

wavelength region in column 2, we give the redshift at the center of the region in column 3, the He II Lyα opacity measured from the FUSE spectrum in column 4, the He II Lyα opacity from the STIS spectrum in column 5, the raw He II Lyβ opacity from the corresponding interval in the short-wavelength portion of the FUSE spectrum in column 6, the corrected opacity of the Lyβ region for overlying He II Lyα lines in column 7, and the inferred He II Lyα opacity based on the corrected Lyβ opacity in column 8. We derive the inferred Lyα opacity based on the higher-order Lyman lines using the standard relationship between the optical depth and the oscillator strengths for lines in the Lyman series: τ(Lyα) τ(Lyβ) = f(Lyα) λ(Lyα) , f(Lyβ) λ(Lyβ)

where f(Lyα) = 0.4162 and f(Lyβ) = 0.0791 are the oscillator strengths.

For the deepest troughs where only lower limits on the opacity could be set using the STIS spectrum, we conclude that the average optical depth of Lyα is high, but finite, with a typical value of τ_{Lyα} ∼ 5. As shown in Figure 10, the distribution of the He II Lyα optical depth follows a slowly rising empirical curve similar to that observed for the overall H I opacity, and suddenly increases at z ∼ 2.85. Such a sudden change in the He II opacity may signal the late stages of the reionization of intergalactic He^+ at z ∼ 3. An analogous phenomenon is also observed for intergalactic hydrogen at z ≤ 6 (Becker et al. 2000; Fan et al. 2002; White et al. 2003), where the H I opacity abruptly rises from ∼ 3 to > 10. The predicted increase at this epoch is more rapid than τ ∝ (1 + z)^{3.5} (Fardal et al. 1998), and the merging of ionized bubbles should produce a huge discontinuity at some slightly higher redshift. Numerical simulations of H I reionization (Razoumov et al. 2002) illustrate this same effect. A slow rise in opacity with redshift that roughly follows a power law in (1 + z) shows first a marked departure from the power law followed by a discontinuity of several orders of magnitude that corresponds to the epoch when all the Strömgren spheres began to merge. Our inferences from the HE2347–4342 spectrum are consistent with indirect evidence from H I line widths (Ricotti et al. 2000; Theuns et al. 2002) and H I Lyα forest opacity (Bernardi et al. 2003) suggesting that the He II reionization discontinuity occurred at z = 3.2 − 3.4, and that we are seeing only the final stages in the process of He II reionization.

5. Summary

We have studied absorption by He II and H I in the IGM over a redshift range 2.0 < z < 2.9 using deep, new VLT/UVES spectra and reprocessed FUSE data for the quasar HE2347– 4342. The VLT data reach a limiting H I column density of 5×10^{11} cm^{−2}. More than 90% of the He II absorption lines identified in the FUSE spectrum have H I counterparts, suggesting

– 16 –

that we have traced most of the IGM mass, and that only a small fraction of it exists in regions with H I column density smaller than 5 × 10^{11} cm^{−2}. The reprocessed FUSE data extend our view of He II absorption to wavelengths shortward of 1000 Å, allowing us to study its properties down to redshifts as low as z ∼ 2, and giving us access to the Lyβ portion of the forest. Using these data, we reach the following conclusions:

1. The distribution function of the absorption features is a power law with respect to hydrogen column density. The identified and added He II absorption lines in the FUSE spectrum suggest a low-column-density cutoff around an H I column density of 3 × 10^{12} cm^{−2}, with a gradually diminishing contribution from lower column density features down to ∼ 10^{11} cm^{−2}.

2. By analyzing a sample of isolated He II features with both Lyα and Lyβ components, we are able to compare the He II line widths to the widths of their H I counterparts. We find that the ratio of He II to H I Doppler parameters ξ = b_{He}/b_H = 0.95 ± 0.12, indicating that the IGM may be dominated by turbulent gas motions.

3. We find that the ratio of He II to H I column densities η shows a gradual evolution with redshift, decreasing from a median value of ∼70 at z = 2.85 to ∼40 at z = 2.05. The number of He II absorption features with no H I counterparts, indicative of IGM regions photoionized by very soft spectra, also decreases with decreasing redshift (Figure 7 and 8). This trend suggests that by a redshift of 2, the ionization of intergalactic He^+ is mainly due to AGN.

4. From z = 2.0 to 2.7, we see a slow increase in He II Lyα optical depth. At z ∼ 2, the average He II optical depth is about 0.5, increasing to τ ∼ 1 at z ∼ 2.6. A sudden increase in optical depth to τ ∼ 5 is observed at z ∼ 2.87. This trend in optical depth with redshift is analogous to that observed in H I at higher redshift.

5. We limit the He II Lyα optical depths in the opaque regions of the UV spectrum at z > 2.7 to values of τ_{Lyα} ∼ 5 by using the corresponding troughs in the Lyβ portions of the spectrum to extend our dynamic range. This sudden, but finite, increase in optical depth suggests that we are seeing the end of the He II reionization process that began at an earlier epoch as indicated indirectly by the increase in H I line widths and H I opacity observed at z = 3.2 − 3.4.

The successful execution of the FUSE observations of this quasar is the result of many years of collaborative work of the FUSE science team. W.Z. would like to thank the staff at ESO Paranal observatory, especially Andreas Kaufer, for their professional help.

– 17 –

This work is based on data obtained for the Guaranteed Time Team by the NASA- CNES-CSA FUSE mission operated by the Johns Hopkins University. Financial support to U. S. participants has been provided by NASA contract NAS5-32985. A portion of this work is based on observations with the NASA/ESA Hubble Space Telescope, obtained at the Space Telescope Science Institute, which is operated by the Association of Universities for Research in Astronomy, Inc., under NASA contract NAS5-26555.

– 18 –

REFERENCES Anderson, S. F., Hogan, C. J., and Williams, B. F. 1999, AJ, 117, 56 Becker, R. H., et al., 2001, AJ, 122, 2850 Bernardi, M., et al. 2003, AJ, 125, 32 Bi, H., and Davidsen, A. F. 1997, ApJ, 479, 523 Cen, R. 2003, ApJ, 591, 12 Croft, R. A. C., Weinberg, D. H., Katz, N., and Hernquist, L. 1997 ApJ, 488, 532 Davidsen, A. F., Kriss, G. A., and Zheng, W. 1996, Nature 380, 47 Fan, X., et al. 2002, AJ, 12, 1247 Fardal, M. A., Giroux, M. L., and Shull, J. M. 1998, AJ, 115, 2206 Feldman, P. D., Sahnow, D. J., Kruk, J. W., Murphy, E. M., and Moos, H. W. 2000, J.

Geophys. Research, 106, 8119 FUSE Observer’s Guide 2003, http://fuse.pha.jhu.edu/support/guide/guide.html#INBKG Haardt, F., and Madau, P. 1996, ApJ, 461, 20 Heap, S. R., et al. 2000, ApJ, 534, 69 Hogan, C. J., Anderson, S. F., and Rugers, M. H. 1997, AJ, 113, 1495 Hu, E. M., Kim, T.-S., Cowie, L. L., Songaila, A., and Rauch, M. 1995, 110, 1526 Jakobsen, P., et al. 1994, Nature, 370, 35 Kim, T.-S., Carswell, R. F., Cristiani, S., D’Odorico, S., and Giallongo, E. 2002, MNRAS, 335, 555 Kriss, G. A. 1994, in ASP Conf. Series 61: Astronomical Data Analysis Software and Systems III, eds. D. R. Crabtree, R. J. Hanisch, and J. Barnes, (San Francisco: ASP), 437 Kriss, G. A., et al. 2001, Science, 293, 1112 Loeb, A., and Barkana, R. 2001, ARAA, 39, 19 Madau, P., Haardt, F., and Rees, M. J. 1999, ApJ, 514, 648

– 19 –

Miralda-Escudé, J., Cen, R., Ostriker, J. P., and Rauch, M. 1996 ApJ, 471, 582 Moos, H. W., et al. 2000 ApJ, 538, L1 Press, W., Rybicki, G., and Schneider, D. P. 1993, ApJ, 414, 64 Rauch, M. 1998, ARAA, 36, 267 Razoumov, A. O., Norman, M. L., Abel, T., and Scott, D. 2002, ApJ, 572, 695 Reimers, D., Köhler, S., Wisotzki, L., Groote, D., Rodriguez-Pascual, P., and Wamsteker, W. 1997, A&A, 327, 890 Ricotti, M., Gnedin, N. Y., and Shull, J. M. 2000, ApJ, 534, 41 Sahnow, D., et al. 2000 ApJ, 538, L7 Shull, J. M., Tumlinson, J., Giroux, M. L., Kriss, G. A., and Reimers, D. 2003, ApJ, in press Smette, A., Heap, S. R., Williger, G. M., Tripp, T. M., Jenkins, E. B., and Songaila, A.

2002, ApJ, 564, 542 Songaila, A., 1998, AJ, 115, 2184 Spergel, D. N., et al. 2003, ApJS, 148, 175 Telfer, R. C., Zheng, W., Kriss, G. A., and Davidsen, A. F. 2002, ApJ, 565, 773 Theuns, T., Bernardi, M., Prieman, J., Hewett, P., Schaye, J., Sheth, R. K., and Subbarao, M. 2002, ApJ, 574, L111 Tytler, D. 1987, ApJ, 321, 49 Venkatesan, A., Tumlinson, J., and Shull, J. M. 2003, ApJ, 584, 621 White, R. L., Becker, R. H., Fan, X., and Strauss, M. A. 2003, AJ, 126, 1 Wyithe, J. S. B., and Loeb, A. 2003, ApJ, 586, 693 Zhang, Y., Anninos, P., and Norman, M. L. 1995, ApJ, 453, L57 Zheng, W., Davidsen, A. F., and Kriss, G. A. 1998, ApJ, 115, 391 Zheng, W., Kriss, G. A., Telfer, R. C., Grimes, J. P. and Davidsen, A. F. 1997, ApJ, 475, 469

– 20 –

Zheng, W., et al. 2004, AJ, in press (astro-ph/0311307)

This preprint was prepared with the AAS L^ATEX macros v5.0.

– 21 –

Figure Captions

Fig. 1.— Normalized spectra of quasar HE2347–4342. The upper panel shows the FUSE data, and lower panel the VLT/UVES data. Both the FUSE and VLT data are binned to 0.1 Å. The propagated errors are plotted as dashed curves. For the FUSE data, the errors are scaled down by a factor of 5 for clearer presentation, and are plotted only for positive data points. Strong airglow lines are removed and marked with an Earth symbol. Three spectral regions, where the He II opacity is significantly lower than average, are marked as B, F, G (after Smette et al.) and K, respectively. Seven regions of high He II opacity, defined by Smette et al., are also marked. The positions of Lyα, Lyβ and Lyγ are indicated at the quasar redshift, and the wavelengths of the interstellar Lyman-series lines below 950 Å are labeled.

Fig. 2.— Column-density distribution of Lyα forest lines. The dashed line represents the expected values for a power law dn/dN ∝ N^{−1.5}. The area marked with “He” represents the values that are derived from their He II column density, divided by the median η value of 62. Fig. 3.— Column-density distribution of absorption systems, with added components that are detected via only He II absorption in the FUSE spectrum. To convert from He II column density to H I for these added components in the FUSE spectrum, we assume η = 300 (marked by the scale at the top). Correcting for the confusion limit may increase the actual number of systems with column density N^<∼ 10^{11} cm^{−2}.

Fig. 4.— Spectral features in void regions F and G. The FUSE data are binned to 0.05 Å. The arrows represent the identified absorption components. The Lyβ regions are blended with a number of prominent Lyα absorption features at z ∼ 2.22, some of which coincide with the expected Lyβ features.

Fig. 5.— Spectral features in void region K. The FUSE data are binned to 0.05 Å. Some unmarked absorption features in the Lyβ regions are Lyα features at z ∼ 2.14.

Fig. 6.— Doppler parameters for hydrogen and helium absorbers. The solid line is for expected values with turbulence line-broadening, and the dashed line for thermal broadening.

Fig. 7.— Column-density ratio η=N(He II)/N(H I) vs. redshift. The circles and upward arrows (colored red in the electronic edition) represent He II Lyα features that have no H^0 counterparts in the VLT spectrum and thus yield only lower limits to the indicated η ratios. The cross and downward arrows (colored blue in the electronic edition) represent H I

– 22 –

Lyα features that have no He II counterparts in the FUSE spectrum and thus yield only upper limits to the indicated η ratios. These η values are likely underestimated because of the limited FUSE data quality. At z < 2.28, above which higher-order He II Lyman lines become visible, η values from only the Lyα components are shown. The dashed curve represents the anticipated values if the ionizing sources are quasars with an EUV power law of f_ν ∝ ν^{−1.76}, which are interpolated from the model results of Fardal et al. (1998).

Fig. 8.— Column-density ratio η vs. redshift. The average η value is calculated from the components that are detected in both the FUSE and VLT spectra. The dashed curve represents the anticipated values if the ionizing sources are quasars with an EUV power law of f_ν ∝ ν^{−1.7}, which are interpolated from results of Fardal et al. (1998).

Fig. 9.— Distribution of power-law indices of the ionizing sources. The dashed line represents a scaled distribution of the α_{EUV} of 39 radio quiet quasars (Telfer et al. 2002). The conversion from η to an inferred value for α_{EUV} uses the quasar models of Fardal et al. (1998). The number excess at higher values indicates a contribution from soft ionizing sources such as star-forming galaxies or obscured AGN.

Fig. 10.— Redshift dependence of the He II Lyα opacity. Values below z = 2.3 are derived from a line spectrum reconstructed from the fitted parameters that omit Lyβ and higherorder Lyman lines. Between z = 2.3 and 2.7 the values are direct measurements from the FUSE data, and at z > 2.7 they are derived from the observed He II Lyβ absorption region. The curve representing τ ∝ (1 + z)^{3.5} is plotted for comparison.

– 23 –

Fig. 1.— a

– 24 –

Fig. 1.— b

– 25 –

Fig. 1.— c

– 26 –

Fig. 1.— d

– 27 –

Fig. 1.— e

– 28 –

Fig. 1.— f

– 29 –

– 30 –

– 31 –

– 32 –

– 33 –

– 34 –

– 35 –

– 36 –

– 37 –

– 38 –

Table 1. Properties of Fitted Absorption Components^a

Redshift N(He II) b^b N(H I) η 10^{12} cm^{−2} km s^{−1} 10^{12} cm^{−2}

2.8881 ± 0.0002 1173 ± 228 27.0 ± 0.0 0.496 ± 0.000 2367 2.8872 ± 0.0009 616 ± 242 26.2 ± 67.4 2.05 ± 3.73 300 2.8861 ± 0.0001 914 ± 1040 22.1 ± 3.20 3.27 ± 1.96 280 2.8858 ± 0.0001 1019 ± 1706 30.3 ± 13.6 3.92 ± 2.15 260 2.8848 ± 0.0001 477 ± 958 30.4 ± 18.6 2.61 ± 1.40 182 2.8839 ± 0.0003 442 ± 3595 24.7 ± 46.1 0.849 ± 1.31 520 2.8831 ± 0.0002 1592 ± 17923 27.0 ± 0.0 0.502 ± 0.000 3172 2.8805 ± 0.0000 1175 ± 1456 19.8 ± 3.40 2.80 ± 0.653 420 2.8788 ± 0.0001 259 ± 5190 17.7 ± 6.30 1.12 ± 0.131 231 2.8781 ± 0.0000 2918 ± 7125 32.3 ± 0.500 66.3 ± 0.784 44.0

aThe complete version of this table is in the electronic edition of the Journal. The printed edition contains only a sample.

bZero error designates an added component with fixed value

– 39 –

Table 2. Absorption Lines in Spectral Voids

Redshift N(He II) N(H I) b(He II) b(H I) η (10^{12} cm^{−2}) (km s^{−1})

2.8230 374 ± 100 3.9 ± 0.4 22 ± 5 16 ± 1 95 ± 26 2.8214 220 ± 22 1.5 ± 0.3 19 ± 7 14 ± 3 146 ± 55 2.8180 112 ± 42 2.0 ± 0.3 24 ± 12 32 ± 5 57 ± 24 2.8161 117± 61 2.5 ± 0.3 23 ± 9 31 ± 3 47 ± 25 2.7276 777 ± 616 4.8 ± 1.1 88 ± 66 50 ± 9 160 ± 132 2.7262 617 ± 219 3.0 ± 0.7 56 ± 17 50 ± 7 206 ± 87 2.7220 235 ± 258 2.6 ± 0.2 50 ± 30 40 ± 19 90 ± 98 2.7203 812 ± 468 4.3 ± 0.6 56 ± 22 79 ± 12 189 ± 112 2.7183 2948 ± 1007 21 ± 0.2 43 ± 10 50 ± 4 137 ± 47

– 40 –

Table 3. He II Lyα Optical Depths at z > 2.77

Interval He II Lyα range z τ(Lyα) τ(Lyα) τ_{raw}(Lyβ) τ_{cor}(Lyβ) τ(Lyα) (Å) FUSE STIS FUSE Calculated (1) (2) (3) (4) (5) (6) (7) (8)

A 1175.60–1178.00 2.8738 2.21 ± 0.20 4.00^{+0.67}_{−0.40} 1.10 ± 0.18 0.75 ± 0.18 4.7 ± 1.1 B 1174.00–1174.90 2.8661 0.07 ± 0.05 0.07 ± 0.04 . . . . . . . . . C 1170.00–1173.50 2.8572 2.09 ± 0.15 4.80^{+∞}_{−0.80} 1.54 ± 0.24 0.89 ± 0.28 5.5 ± 1.7 D 1165.00–1169.90 2.8431 2.18 ± 0.14 > 4.54 1.04 ± 0.11 0.70 ± 0.13 4.3 ± 0.8 E 1162.00–1165.00 2.8300 2.33 ± 0.18 2.86^{+0.39}_{−0.28} 0.72 ± 0.11 0.37 ± 0.14 2.3 ± 0.9 F 1159.00–1161.00 2.8185 0.33 ± 0.03 0.44 ± 0.06 . . . . . . . . . G 1157.75–1158.25 2.8119 0.13 ± 0.06 0.24^{+0.12}_{−0.11} . . . . . . . . . H 1155.00–1157.75 2.8066 1.97 ± 0.12 2.34^{+0.40}_{−0.28} 0.91 ± 0.10 0.56 ± 0.13 3.5 ± 0.8 I 1150.00–1154.95 2.7938 1.79 ± 0.07 3.72^{+∞}_{−0.81} 1.03 ± 0.10 0.68 ± 0.13 4.3 ± 0.8 J 1145.00–1149.95 2.7774 2.32 ± 0.12 2.57^{+0.72}_{−0.41} 0.94 ± 0.07 0.60 ± 0.10 3.8 ± 0.6