arXiv:2202.05095v1 [astro-ph.SR] 10 Feb 2022

Long-term optical photometry of the PMS stars V2764 Ori and LkHα 301 in the field of the McNeil’s Nebula

G. Zidarova^1, S. Ibryamov^1, E. Semkov^2, S. Peneva^2

1 Department of Physics and Astronomy, University of Shumen, 115, Universitetska Str., 9700 Shumen, Bulgaria 2 Institute of Astronomy and National Astronomical Observatory, Bulgarian Academy of Sciences, 72, Tsarigradsko Shose Blvd., 1784 Sofia, Bulgaria g.zidarova@shu.bg (Submitted on xxx; Accepted on xxx)

Abstract. In this paper, we present results from long-term V (RI)c photometric observations of the pre-main-sequence stars V2764 Ori and LkHα 301, located in the field of the McNeil’s Nebula within the Orion star-forming complex. Our observations were performed in the period from August 2004 to November 2021 with three telescopes and seven different types of CCD cameras. Photometric observations, especially concerning the long-term behavior of the stars, are missing in the literature. We present the first photometric monitoring for them, which cover 17 years. Our data indicate that the variability of both stars is typical for classical T Tauri stars.

Key words: stars: pre-main sequence, stars: variables: T Tauri, star: individual: (V2764 Ori, LkHα 301)

1. Introduction

The McNeil’s Nebula is a reflection nebula discovered by McNeil (2004). It is located in the LDN 1630 molecular cloud within the Orion star-forming complex and associated with the point-like source IRAS 05436-0007 (V1647 Ori). V1647 Ori is an eruptive young object like FUor or EXor that illuminates the McNeil’s Nebula. The Orion complex is one of the best-known sites of recent star formation containing many molecular clouds, dark and cometary nebulae, Herbig-Haro objects, and pre-main-sequence (PMS) stars.

Photometric variability in PMS stars is one of their main characteristics. Both classes of PMS stars − the low-mass (M≤2M_⊙) T Tauri stars (TTSs) and the more massive (2M_⊙≤M≤8M_⊙) Herbig Ae/Be stars (HAEBESs) show various types of photometric variability (Herbst et al. 1994). The TTSs exhibit rapid irregular light variations and emission spectra (Joy 1945). They are divided into two subgroups: classical T Tauri stars (CTTSs) and weak-line T Tauri stars (WTTSs). Most of the features that characterize each subgroup suggest that accretion disks surround CTTSs, whereas they must have almost disappeared in WTTSs (see Bertout 1989 and Ménard & Bertout 1999). CTTSs are distinguished from WTTSs by their strong Hα emission line and significant infrared and ultraviolet excesses. The presence of hot and cool spots on the stellar surface, variable accretion activity, circumstellar dust or cloud obscuration events are possible reasons for the variability of TTSs (see Grinin et al. 1991, Herbst et al. 1994 and Ismailov 2005).

The stars included in the present study are located in the field of the Mc- Neil’s Nebula. V2764 Ori was found to be variable by Briceño et al. (2004). In their work, the star was labeled as "V". LkHα 301 was registered as Hαemission star by Herbig & Kuhi (1963). Semkov (2004) confirmed that these stars are variables. Both V2764 Ori and LkHα 301 are X-ray sources (Simon

Bulgarian Astronomical Journal xx, 2022

et al. 2004). Flaherty & Muzerolle (2008) classified them as CTTSs and determined their stellar parameters − for V2764 Ori − the spectral class K4, the mass 1.56 M_⊙, the effective temperature 4590 K, the radius 3.04 R_⊙ and the luminosity 3.576 L_⊙; for LkHα 301 − the spectral class K2.5, the mass 1.85 M_⊙, the effective temperature 4815 K, the radius 2.74 R_⊙ and the luminosity 3.525 L_⊙.

V2764 Ori and LkHα 301 were studied spectrally (see Flaherty & Muzerolle 2008, Fang et al. 2009 and Espaillat et al. 2012), but long-term photometry is missing for them. In this paper, we present the long-term optical light variations of the stars.

2. Observations and Data reduction

The V (RI)_c photometric observations of the field of the McNeil’s Nebula were carried out in the period from August 2004 to November 2021 with the 2-m Ritchey-Chrétien-Coudé (RCC) and the 50/70-cm Schmidt telescopes administered by the Rozhen National Astronomical Observatory (Bulgaria) and the 1.3-m Ritchey-Chrétien (RC) telescope administered by the Skinakas Observatory^1 of the University of Crete (Greece). Seven different CCD cameras were operated to obtain the observations as follows: VersArray 1300B and Andor iKon-L BEX2-DD on the 2-m RCC telescope, Photometrics CH360 and Andor DZ436-BV on the 1.3-m RC telescope, and SBIG ST-8, SBIG STL-11000M and FLI PL16803 on the 50/70-cm Schmidt telescope.

All frames were taken through a standard Johnson-Cousins (V (RI)_c) set of filters. Twilight flat-fields in each filter were obtained each clear evening or morning. The frames acquired with the cameras on the 2-m RCC and the 1.3- m RC telescopes are bias-frame subtracted and flat-field corrected. The frames obtained with the cameras on the 50/70-cm Schmidt telescope are dark-frame subtracted and flat-field corrected.

The photometric data were reduced using subroutine daophot in the idl software package. As a reference sequence we used the V (RI)_c comparisons reported in Semkov (2006). All data were analyzed using the same aperture, which was chosen to have a 5^{′′} radius and background annulus from 10^{′′} to 15^{′′}. The average value of the errors in the reported magnitudes is 0.01-0.02 mag for the I_c and R_c band data and 0.01-0.03 mag for the V band data.

3. Results and Discussion

Figure 1 features an I_c band image of the field of the McNeil’s Nebula in the LDN 1630, where the positions of the stars from our study and V1647 Ori are marked.

Results from our long-term CCD observations of V2764 Ori are summarized in Table 1. The columns in the table contain date (dd.mm.yyyy format) and Julian date (J.D.) of the observations, I_cR_cV magnitudes of the star, and telescope and CCD camera used. The light curves of the star constructed on

1 Skinakas Observatory is a collaborative project of the University of Crete, the Foundation for Research and Technology, Greece, and the Max-Planck-Institut für Extraterrestrische Physik, Germany.

Fig. 1. An I_c band image of the field of the McNeil’s Nebula obtained on 05 February 2013 with the 50/70-cm Schmidt telescope. The positions of the stars from our study and the young object V1647 Ori are marked. North is up, and east is left

the basis of our monitoring are displayed in Fig. 2. The available data suggest that during our observations the brightness of V2764 Ori principally varies around some intermediate level. The star exhibits irregular variability with different amplitudes in different periods. In August 2004 and December 2013, short-term decreases in the star’s light were registered.

Fig. 2. V (RI)_c light curves of V2764 Ori for the period August 2004−November 2021.

4 G. Zidarova et al.

Table 1: Photometric CCD observations of V2764 Ori.

Date J.D. (24...) Ic Rc V Tel CCD Date J.D. (24...) Ic Rc V Tel CCD

18.08.2004 53235.723 13.67 15.15 16.41 1.3-m Phot 03.09.2012 56173.572 13.03 14.31 15.40 1.3-m AND 21.08.2004 53238.719 13.10 14.41 15.61 1.3-m Phot 13.09.2012 56183.564 13.05 14.33 15.49 1.3-m AND 09.09.2004 53257.704 13.24 14.59 15.81 1.3-m Phot 23.09.2012 56193.576 12.95 14.19 15.34 1.3-m AND 18.09.2004 53266.733 12.96 14.22 15.37 1.3-m Phot 23.09.2012 56193.597 12.93 14.19 - Sch FLI 19.09.2004 53267.734 12.90 14.16 15.30 1.3-m Phot 09.10.2012 56209.563 13.06 14.38 - Sch FLI 20.09.2004 53268.724 13.04 14.33 15.51 1.3-m Phot 18.11.2012 56249.501 13.03 14.34 - Sch FLI 21.09.2004 53269.672 13.12 14.46 15.65 1.3-m Phot 13.12.2012 56275.457 12.88 14.11 15.31 2-m VA 23.09.2004 53271.716 13.44 14.81 16.04 1.3-m Phot 14.12.2012 56276.450 12.98 14.24 15.48 2-m VA 29.09.2004 53277.624 13.14 14.47 15.66 1.3-m Phot 19.01.2013 56312.331 12.93 14.16 15.39 2-m VA 30.09.2004 53278.619 13.09 14.38 15.57 1.3-m Phot 04.02.2013 56328.303 13.09 14.40 - Sch FLI 01.10.2004 53279.627 12.90 14.13 15.28 1.3-m Phot 05.02.2013 56329.311 13.05 14.33 - Sch FLI 02.10.2004 53280.736 12.82 14.02 15.21 1.3-m Phot 05.09.2013 56540.584 12.91 14.18 15.35 Sch FLI 03.10.2004 53281.729 12.88 14.12 15.27 1.3-m Phot 07.09.2013 56542.564 12.91 14.19 - Sch FLI 19.11.2004 53328.498 13.17 14.46 15.69 Sch ST-8 08.09.2013 56543.593 12.93 14.16 15.37 2-m VA 21.11.2004 53330.546 13.13 14.43 15.67 Sch ST-8 18.09.2013 56553.544 12.88 14.13 - 1.3-m AND 08.12.2004 53348.359 12.93 14.14 15.35 Sch ST-8 09.12.2013 56636.381 12.89 14.09 15.33 2-m VA 10.12.2004 53350.390 12.87 14.10 - Sch ST-8 28.12.2013 56655.413 13.48 14.92 - Sch FLI 10.02.2005 53412.366 12.81 14.03 - Sch ST-8 29.12.2013 56656.404 13.10 14.41 - Sch FLI 11.02.2005 53413.350 12.95 14.21 - Sch ST-8 23.01.2014 56681.349 13.23 14.61 - Sch FLI 12.03.2005 53442.273 13.11 14.38 15.63 2-m VA 05.02.2014 56694.316 13.33 14.67 15.96 2-m VA 03.04.2005 53464.242 13.11 14.40 - Sch ST-8 26.02.2014 56715.250 13.10 14.43 - Sch FLI 14.08.2005 53596.730 12.89 14.11 - 1.3-m Phot 22.03.2014 56739.222 13.18 - - Sch FLI 27.08.2005 53609.713 13.02 14.28 15.43 1.3-m Phot 30.03.2014 56747.311 - - 15.34 2-m VA 28.08.2005 53610.711 12.88 14.10 15.23 1.3-m Phot 30.08.2014 56899.567 13.23 14.59 15.79 1.3-m AND 29.08.2005 53611.708 12.88 14.13 15.28 1.3-m Phot 13.12.2014 57005.488 13.02 14.32 - Sch FLI 03.09.2005 53616.724 12.96 14.20 15.32 1.3-m Phot 15.12.2014 57006.601 12.99 14.28 - Sch FLI 10.09.2005 53623.724 12.91 - 15.26 1.3-m Phot 24.12.2014 57016.438 12.95 - 15.33 2-m VA 11.09.2005 53624.724 12.86 14.09 15.23 1.3-m Phot 25.12.2014 57017.371 13.02 - - 2-m VA 15.09.2005 53628.702 13.12 14.45 15.62 1.3-m Phot 20.02.2015 57074.281 13.00 14.32 - Sch FLI 19.09.2005 53632.688 12.94 14.20 - 1.3-m Phot 02.09.2015 57267.570 13.04 14.34 15.57 1.3-m AND 20.09.2005 53633.706 12.97 14.23 15.39 1.3-m Phot 03.09.2015 57268.593 12.92 14.19 15.40 1.3-m AND 25.09.2005 53638.699 12.91 14.13 - 1.3-m Phot 04.09.2015 57269.581 12.87 14.12 - 1.3-m AND 03.10.2005 53646.700 12.94 14.20 15.35 1.3-m Phot 03.11.2015 57330.281 12.91 14.20 - Sch FLI 03.11.2005 53678.396 13.15 14.41 15.60 2-m VA 05.11.2015 57331.511 12.80 14.04 - Sch FLI 26.11.2005 53701.340 12.92 - - Sch ST-8 06.11.2015 57333.444 12.88 - - Sch FLI 10.09.2006 53988.592 13.06 - - 1.3-m Phot 07.11.2015 57333.502 12.88 - - Sch FLI 20.11.2008 54791.385 13.14 14.49 - Sch STL-11 08.11.2015 57334.501 12.87 - - Sch FLI 11.01.2009 54843.261 13.18 14.57 - Sch STL-11 12.12.2015 57369.458 12.94 14.12 15.34 2-m VA 24.03.2009 54915.260 12.99 14.28 - Sch STL-11 13.12.2015 57370.436 13.02 14.32 15.55 2-m VA 16.04.2009 54938.268 12.89 - - Sch STL-11 14.12.2015 57371.436 13.02 14.23 15.52 2-m VA 22.08.2009 55065.559 13.06 - - Sch FLI 15.12.2015 57372.435 12.86 14.11 - Sch FLI 09.10.2009 55114.450 13.03 14.35 - Sch FLI 17.12.2015 57374.398 12.86 14.13 - Sch FLI 28.10.2009 55133.417 13.02 14.34 - Sch FLI 06.02.2016 57425.312 12.95 14.23 - Sch FLI 19.11.2009 55155.408 12.99 14.28 - Sch FLI 07.02.2016 57426.302 13.20 14.54 - Sch FLI 20.11.2009 55156.470 12.99 14.27 - Sch FLI 05.04.2016 57484.260 12.91 - 15.34 2-m VA 21.11.2009 55157.471 13.01 14.31 - Sch FLI 22.11.2016 57714.500 12.92 14.10 15.35 2-m VA 25.11.2009 55161.496 13.03 14.34 15.57 2-m VA 22.11.2016 57715.490 13.00 14.31 15.44 2-m VA 11.03.2010 55267.275 13.01 14.26 15.52 2-m VA 23.11.2016 57716.479 12.87 14.15 15.35 2-m VA 12.03.2010 55268.321 12.96 14.22 - 2-m VA 02.01.2017 57756.370 13.00 14.29 - Sch FLI 12.08.2010 55420.614 13.07 - - 1.3-m AND 27.01.2017 57781.304 12.81 14.08 - Sch FLI 20.08.2010 55428.606 12.94 14.18 - 1.3-m AND 28.01.2017 57782.376 - - 15.28 2-m VA 24.08.2010 55432.586 13.09 14.38 - 1.3-m AND 01.02.2017 57786.333 - - 15.24 2-m VA 25.08.2010 55433.594 13.09 14.37 - 1.3-m AND 15.02.2017 57800.275 12.81 14.04 - Sch FLI 20.09.2010 55459.636 13.05 14.35 15.50 1.3-m AND 16.02.2017 57801.305 12.83 14.07 - Sch FLI 30.10.2010 55499.524 13.07 14.36 15.61 2-m VA 28.02.2017 57813.257 12.88 14.15 - Sch FLI 31.10.2010 55500.503 13.10 14.41 15.68 2-m VA 04.03.2017 57817.268 12.85 14.11 - Sch FLI 01.11.2010 55501.501 13.15 14.42 15.66 2-m VA 01.04.2017 57845.249 12.83 14.09 - Sch FLI 01.11.2010 55501.546 13.10 14.40 - Sch FLI 02.04.2017 57846.255 12.95 14.25 - Sch FLI 02.11.2010 55502.569 13.04 14.32 15.54 2-m VA 17.09.2017 58013.548 12.88 14.14 - Sch FLI 04.11.2010 55505.472 13.00 14.28 - Sch FLI 17.10.2017 58043.523 12.79 14.03 - Sch FLI 06.11.2010 55506.501 13.11 14.42 - Sch FLI 18.10.2017 58044.595 12.77 14.00 - Sch FLI 07.11.2010 55507.511 13.17 14.51 - Sch FLI 22.11.2017 58080.483 12.90 14.17 - Sch FLI 01.01.2011 55563.420 13.06 14.36 - Sch FLI 23.11.2017 58081.486 12.98 14.25 - Sch FLI 06.01.2011 55568.388 13.10 14.39 15.66 2-m VA 25.12.2017 58113.402 12.76 13.96 - Sch FLI 08.01.2011 55570.273 13.08 14.34 15.60 2-m VA 26.12.2017 58114.397 12.85 14.10 - Sch FLI 09.01.2011 55571.378 13.09 14.37 15.63 2-m VA 03.09.2018 58364.578 12.95 14.26 - Sch FLI 06.02.2011 55599.321 13.05 14.33 - Sch FLI 05.11.2018 58428.435 12.90 14.16 - Sch FLI 07.02.2011 55600.299 12.99 14.25 - Sch FLI 12.01.2019 58496.316 12.90 - - Sch FLI 04.04.2011 55656.253 12.96 14.24 - Sch FLI 28.02.2019 58543.232 12.95 - - Sch FLI 09.04.2011 55661.260 13.04 14.28 15.51 2-m VA 01.03.2019 58544.250 13.03 14.29 - 2-m AND 11.09.2011 55815.564 13.01 14.27 15.46 1.3-m AND 12.08.2019 58707.587 12.89 - - Sch FLI 12.09.2011 55816.591 13.07 14.34 15.52 1.3-m AND 01.09.2019 58727.587 12.99 - - 2-m AND 20.09.2011 55824.537 13.13 14.43 15.64 1.3-m AND 03.09.2019 58729.589 13.12 - - 2-m AND 08.10.2011 55842.510 12.99 14.26 15.41 1.3-m AND 02.10.2019 58758.539 12.86 - - Sch FLI 14.10.2011 55848.501 13.02 14.28 15.42 1.3-m AND 15.01.2020 58864.358 12.78 - - Sch FLI 30.10.2011 55865.483 - 14.37 - 2-m VA 16.01.2020 58865.361 12.77 - - Sch FLI 01.11.2011 55866.521 - 14.26 15.50 2-m VA 18.01.2020 58867.372 12.91 14.15 15.33 2-m AND 26.11.2011 55892.474 13.09 14.33 15.53 2-m VA 20.01.2020 58869.361 12.89 14.07 - 2-m AND 27.11.2011 55893.417 13.14 14.43 - Sch FLI 21.01.2020 58870.366 12.75 14.07 - Sch FLI 29.11.2011 55895.486 13.08 14.35 - Sch FLI 29.02.2020 58909.278 12.85 - - Sch FLI 30.11.2011 55896.443 12.96 14.24 - Sch FLI 21.03.2020 58930.318 12.87 - - Sch FLI 29.12.2011 55925.450 12.94 14.20 - Sch FLI 13.09.2020 59105.602 12.86 - - Sch FLI 01.01.2012 55928.381 12.99 14.26 - Sch FLI 22.11.2020 59176.451 12.88 14.24 - Sch FLI 16.03.2012 56003.258 12.96 14.24 - Sch FLI 05.01.2021 59220.339 13.12 14.39 15.71 2-m AND 26.03.2012 56013.259 13.33 14.61 15.88 2-m VA 04.02.2021 59250.350 13.24 14.51 15.85 2-m AND 28.03.2012 56015.310 13.03 14.29 - 2-m VA 11.09.2021 59468.598 12.88 14.23 15.46 Sch FLI 21.08.2012 56160.582 13.07 14.36 - 1.3-m AND 30.11.2021 59549.451 12.85 - - Sch FLI

The brightness variation of V2764 Ori during the whole period of our monitoring is in the range 12.75-13.67 mag for the I_c band, 13.96-15.15 mag for the R_c band and 15.21-16.41 mag for the V band. The registered amplitudes of the light variations of the star during the same period are 0.92 mag for the I_c band, 1.19 mag for the R_c band and 1.20 mag for the V band. Variability with such amplitudes is observed in CTTSs and it can be explained by variations in the mass accretion rate and rotational modulation of a spot or group of spots on the stellar surface.

The measured color indices (V − I_c and V − R_c) versus the V magnitude of V2764 Ori are depicted in Fig. 3. As can be seen, the star becomes redder as it fades. Such color variation is typical for T Tauri variables, whose variability is produced by the presence of a spot or group of spots on the star’s surface, as well as by the small irregular obscuration by the circumstellar material.

Fig. 3. Color indices V − I_c and V − R_c versus the V magnitude of V2764 Ori.

LkHα 301 is located at 20^{′′} from V2764 Ori. Results from our long-term photometric monitoring of the star are summarized in Table 2. The columns have the same content as in Table 1. Figure 4 shows V (RI)_c light curves of LkHα 301 from our observations. As can be seen, like the star V2764 Ori, LkHα 301 exhibits irregular light variations and its brightness varies around some intermediate level. In September 2004 and September 2019, two shortterm decreases in the star’s brightness were registered. During our monitoring the light variation of LkHα 301 is in the range 12.31-13.01 mag for the I_c band, 13.38-14.27 mag for the R_c band and 14.46-15.43 mag for the V band. The observed amplitudes are ΔI_c=0.70 mag, ΔR_c=0.89 mag and ΔV =0.97 mag, which are typical for CTTSs.

6 G. Zidarova et al.

Table 2: Photometric CCD observations of LkHα 301.

Date J.D. (24...) Ic Rc V Tel CCD Date J.D. (24...) Ic Rc V Tel CCD

18.08.2004 53235.723 12.61 13.78 14.89 1.3-m Phot 03.09.2012 56173.572 12.41 13.48 14.46 1.3-m AND 21.08.2004 53238.719 12.67 13.86 15.00 1.3-m Phot 13.09.2012 56183.564 12.41 13.45 14.49 1.3-m AND 09.09.2004 53257.704 13.01 14.27 15.43 1.3-m Phot 23.09.2012 56193.576 12.45 13.50 14.54 1.3-m AND 18.09.2004 53266.733 12.59 13.72 14.81 1.3-m Phot 23.09.2012 56193.597 12.44 13.51 - Sch FLI 19.09.2004 53267.734 12.95 14.19 15.34 1.3-m Phot 09.10.2012 56209.563 12.34 13.44 - Sch FLI 20.09.2004 53268.724 12.62 13.78 14.87 1.3-m Phot 18.11.2012 56249.501 12.38 13.48 - Sch FLI 21.09.2004 53269.672 12.55 13.69 14.76 1.3-m Phot 13.12.2012 56275.457 12.46 13.58 14.68 2-m VA 23.09.2004 53271.716 12.57 13.71 14.79 1.3-m Phot 14.12.2012 56276.450 12.46 - 14.72 2-m VA 29.09.2004 53277.624 12.47 13.61 14.73 1.3-m Phot 19.01.2013 56312.331 12.45 13.55 - 2-m VA 30.09.2004 53278.619 12.45 13.55 14.64 1.3-m Phot 04.02.2013 56328.303 12.56 13.71 - Sch FLI 01.10.2004 53279.627 12.50 13.61 14.69 1.3-m Phot 05.02.2013 56329.311 12.40 13.49 - Sch FLI 02.10.2004 53280.736 12.48 13.58 14.69 1.3-m Phot 05.09.2013 56540.584 12.43 13.53 14.61 Sch FLI 03.10.2004 53281.729 12.49 13.62 14.69 1.3-m Phot 07.09.2013 56542.564 12.42 13.54 - Sch FLI 19.11.2004 53328.498 12.56 13.69 14.86 Sch ST-8 08.09.2013 56543.593 12.45 13.55 14.63 2-m VA 21.11.2004 53330.546 12.54 13.64 14.79 Sch ST-8 18.09.2013 56553.544 12.57 13.73 - 1.3-m AND 08.12.2004 53348.359 12.45 13.57 14.73 Sch ST-8 09.12.2013 56636.381 12.53 13.63 14.75 2-m VA 10.12.2004 53350.390 12.54 13.66 - Sch ST-8 28.12.2013 56655.413 12.42 13.52 - Sch FLI 10.02.2005 53412.366 12.41 13.51 - Sch ST-8 29.12.2013 56656.404 12.43 13.51 - Sch FLI 11.02.2005 53413.350 12.43 13.55 - Sch ST-8 23.01.2014 56681.349 12.46 13.58 - Sch FLI 12.03.2005 53442.273 12.47 13.60 14.72 2-m VA 26.02.2014 56715.250 12.45 13.57 - Sch FLI 03.04.2005 53464.242 12.49 13.62 - Sch ST-8 22.03.2014 56739.222 12.40 - - Sch FLI 14.08.2005 53596.730 12.45 13.61 - 1.3-m Phot 30.03.2014 56747.311 - - 14.69 2-m VA 27.08.2005 53609.713 12.45 13.59 14.67 1.3-m Phot 30.08.2014 56899.567 12.45 13.57 14.61 1.3-m AND 28.08.2005 53610.711 12.44 13.59 14.67 1.3-m Phot 13.12.2014 57005.488 12.43 13.53 - Sch FLI 29.08.2005 53611.708 12.37 13.51 14.58 1.3-m Phot 15.12.2014 57006.601 12.42 13.49 - Sch FLI 03.09.2005 53616.724 - 13.56 14.62 1.3-m Phot 24.12.2014 57016.438 12.50 13.57 14.69 2-m VA 10.09.2005 53623.724 12.46 - 14.67 1.3-m Phot 25.12.2014 57017.371 12.43 - - 2-m VA 11.09.2005 53624.724 - 13.63 14.71 1.3-m Phot 20.02.2015 57074.281 12.40 13.49 - Sch FLI 15.09.2005 53628.702 12.41 13.53 14.57 1.3-m Phot 02.09.2015 57267.570 12.46 13.53 14.63 1.3-m AND 19.09.2005 53632.688 12.38 13.51 - 1.3-m Phot 03.09.2015 57268.593 12.47 13.57 14.66 1.3-m AND 20.09.2005 53633.706 12.41 13.52 14.57 1.3-m Phot 04.09.2015 57269.581 12.46 13.56 - 1.3-m AND 25.09.2005 53638.699 12.46 13.59 - 1.3-m Phot 03.11.2015 57330.281 12.43 13.54 - Sch FLI 03.10.2005 53646.700 12.45 13.61 14.68 1.3-m Phot 05.11.2015 57331.511 12.40 13.50 - Sch FLI 03.11.2005 53678.396 12.50 13.67 14.76 2-m VA 06.11.2015 57333.444 12.39 - - Sch FLI 26.11.2005 53701.340 12.41 - - Sch ST-8 07.11.2015 57333.502 12.40 - - Sch FLI 10.09.2006 53988.592 12.44 - - 1.3-m Phot 08.11.2015 57334.501 12.49 - - Sch FLI 20.11.2008 54791.385 12.45 13.62 - Sch STL-11 12.12.2015 57369.458 12.38 13.44 14.53 2-m VA 11.01.2009 54843.261 12.41 13.57 - Sch STL-11 13.12.2015 57370.436 - - 14.63 2-m VA 24.03.2009 54915.260 12.42 13.59 - Sch STL-11 14.12.2015 57371.436 12.41 13.48 14.61 2-m VA 16.04.2009 54938.268 12.57 - - Sch STL-11 15.12.2015 57372.435 12.43 13.55 - Sch FLI 22.08.2009 55065.559 12.33 - - Sch STL-11 17.12.2015 57374.398 12.39 13.49 - Sch FLI 09.10.2009 55114.450 12.34 13.45 - Sch FLI 06.02.2016 57425.312 12.48 13.60 - Sch FLI 28.10.2009 55133.417 12.42 13.53 - Sch FLI 07.02.2016 57426.302 12.44 13.53 - Sch FLI 19.11.2009 55155.408 12.36 13.45 - Sch FLI 05.04.2016 57484.260 12.48 - 14.65 2-m VA 20.11.2009 55156.470 12.40 13.52 - Sch FLI 22.11.2016 57714.500 - - 14.61 2-m VA 21.11.2009 55157.471 12.31 13.38 - Sch FLI 22.11.2016 57715.490 12.44 - 14.61 2-m VA 25.11.2009 55161.496 12.42 13.58 14.68 2-m VA 23.11.2016 57716.479 12.42 13.59 14.69 2-m VA 11.03.2010 55267.275 12.43 13.54 14.65 2-m VA 02.01.2017 57756.370 12.44 13.54 - Sch FLI 12.03.2010 55268.321 12.40 13.54 - 2-m VA 27.01.2017 57781.304 12.40 13.51 - Sch FLI 12.08.2010 55420.614 12.44 - - 1.3-m AND 01.02.2017 57786.333 - - 14.62 2-m VA 20.08.2010 55428.606 12.37 13.43 - 1.3-m AND 15.02.2017 57800.275 12.48 13.58 - Sch FLI 24.08.2010 55432.586 12.43 13.52 - 1.3-m AND 16.02.2017 57801.305 12.47 13.58 - Sch FLI 25.08.2010 55433.594 12.40 13.49 - 1.3-m AND 28.02.2017 57813.257 12.44 13.54 - Sch FLI 20.09.2010 55459.636 12.36 13.45 14.47 1.3-m AND 04.03.2017 57817.268 12.44 13.53 - Sch FLI 30.10.2010 55499.524 12.32 13.44 14.51 2-m VA 01.04.2017 57845.249 12.45 13.57 - Sch FLI 31.10.2010 55500.503 12.36 13.51 14.61 2-m VA 02.04.2017 57846.255 12.45 13.58 - Sch FLI 01.11.2010 55501.501 12.40 13.53 14.62 2-m VA 17.09.2017 58013.548 12.47 13.59 - Sch FLI 01.11.2010 55501.546 12.36 13.46 - Sch FLI 17.10.2017 58043.523 12.49 13.57 - Sch FLI 02.11.2010 55502.569 12.40 13.52 14.61 2-m VA 18.10.2017 58044.595 12.43 13.51 - Sch FLI 04.11.2010 55505.472 12.32 13.41 - Sch FLI 22.11.2017 58080.483 12.47 13.55 - Sch FLI 06.11.2010 55506.501 12.35 13.43 - Sch FLI 23.11.2017 58081.486 12.48 13.58 - Sch FLI 07.11.2010 55507.511 12.32 13.41 - Sch FLI 25.12.2017 58113.402 12.48 13.56 - Sch FLI 01.01.2011 55563.420 12.55 13.74 - Sch FLI 26.12.2017 58114.397 12.46 13.54 - Sch FLI 06.01.2011 55568.388 12.44 13.57 14.68 2-m VA 03.09.2018 58364.578 12.50 13.62 - Sch FLI 08.01.2011 55570.273 12.42 13.52 14.63 2-m VA 05.11.2018 58428.435 12.50 13.61 - Sch FLI 09.01.2011 55571.378 - 13.53 14.65 2-m VA 12.01.2019 58496.316 12.49 - - Sch FLI 06.02.2011 55599.321 12.37 13.46 - Sch FLI 28.02.2019 58543.232 12.56 - - Sch FLI 07.02.2011 55600.299 12.34 13.40 - Sch FLI 01.03.2019 58544.250 12.72 13.94 - 2-m AND 04.04.2011 55656.253 12.36 13.46 - Sch FLI 12.08.2019 58707.587 12.58 - - Sch FLI 09.04.2011 55661.260 12.39 13.50 14.61 2-m VA 01.09.2019 58727.587 12.77 - - 2-m AND 11.09.2011 55815.564 12.44 13.53 14.59 1.3-m AND 03.09.2019 58729.589 12.89 - - 2-m AND 12.09.2011 55816.591 12.43 - 14.57 1.3-m AND 02.10.2019 58758.539 12.53 - - Sch FLI 20.09.2011 55824.537 12.40 13.50 14.60 1.3-m AND 15.01.2020 58864.358 12.49 - - Sch FLI 08.10.2011 55842.510 12.40 13.49 14.54 1.3-m AND 16.01.2020 58865.361 12.49 - - Sch FLI 14.10.2011 55848.501 12.42 13.51 14.53 1.3-m AND 18.01.2020 58867.372 12.60 13.80 - 2-m AND 01.11.2011 55866.521 - - 14.64 2-m VA 20.01.2020 58869.361 12.61 - - 2-m AND 26.11.2011 55892.474 12.47 13.56 14.63 2-m VA 21.01.2020 58870.366 12.42 13.61 - Sch FLI 27.11.2011 55893.417 12.40 13.49 - Sch FLI 29.02.2020 58909.278 12.45 - - Sch FLI 29.11.2011 55895.486 12.35 13.43 - Sch FLI 21.03.2020 58930.318 12.47 - - Sch FLI 30.11.2011 55896.443 12.38 13.50 - Sch FLI 13.09.2020 59105.602 12.44 - - Sch FLI 29.12.2011 55925.450 12.35 13.43 - Sch FLI 22.11.2020 59176.451 12.40 13.62 - Sch FLI 01.01.2012 55928.381 12.39 13.48 - Sch FLI 05.01.2021 59220.339 12.58 13.71 14.78 2-m AND 16.03.2012 56003.258 12.34 13.42 - Sch FLI 04.02.2021 59250.350 12.54 13.70 14.76 2-m AND 26.03.2012 56013.259 12.41 13.52 14.58 2-m VA 11.09.2021 59468.598 12.41 13.61 14.71 Sch FLI 28.03.2012 56015.310 12.47 13.60 - 2-m VA 30.11.2021 59549.451 12.41 - - Sch FLI 21.08.2012 56160.582 12.43 13.49 - 1.3-m AND

Fig. 4. V (RI)_c light curves of LkHα 301 for the period August 2004−November 2021.

The measured color indices V − I_c and V − R_c versus the V magnitude of LkHα 301 are plotted in Fig. 5. A clear dependence can be seen from the figure: the star becomes redder as it fades. This is an expected color variation in the TTSs.

Fig. 5. Color indices V − I_c and V − R_c versus the V magnitude of LkHα 301.

We utilized the software package period04 (Lenz & Breger 2005) to search for periodicity in the light variations of V2764 Ori and LkHα 301. We did not identify any periodicity in their photometric behavior. The reason for this negative result is probably the short life of the hot spots on the stellar surface. Another reason may be the insufficient number of photometric points we have for the stars. Due to negative declination, the field of the McNeil’s Nebula can be observed from southern Europe only in the period August-April. In some months and years, we have only a few observations of this field.

4. Concluding remarks

We presented and discussed the optical CCD light curves and color−magnitude diagrams of V2764 Ori and LkHα 301. Our observations cover 17 years and represent the first long-term V (RI)_c monitoring of the stars. The shape of the light curves, the brightness variations, and the observed amplitudes of both stars are typical for CTTSs. Our study adds two CTTSs with long-term photometry to the family of known PMS stars. We plan to continue our monitoring of the field of the McNeil’s Nebula during the next years.

Acknowledgements

This research has made use of NASA’s Astrophysics Data System Abstract Service. The authors thank the Director of Skinakas Observatory Prof. I. Papamastorakis and Prof. I. Papadakis for the award of telescope time. This work was partly supported by the National Science Fund of the Ministry of Education and Science of Bulgaria under grand DN 18-13/2017 and by the research fund of the University of Shumen.

References

Bertout, C., 1989, ARA&A, 27, 3515 Briceño, C., Vivas, A. K., Hernández, J. et al., 2004, ApJ, 606, 123 Espaillat, C., Ingleby, L., Hernández, J. et al., 2012, ApJ, 747, 103 Fang, M., van Boekel, R., Wang, W. et al., 2009, A&A, 504, 461 Flaherty, K. M. & Muzerolle, J., 2008, AJ, 135, 966 Grinin, V. P., Kiselev, N. N., Minikulov, N. Kh., Chernova, G. P., Voshchinnikov, N. V., 1991, Ap&SS, 186, 283 Herbig, G. H. & Kuhi, L. V., 1963, ApJ, 137, 398 Herbst, W., Herbst, D. K., Grossman, E. J. & Weinstein, D., 1994, AJ, 108, 1906 Ismailov, N. Z., 2005, Astronomy Reports, 49, 309 Joy, A. H., 1945, ApJ, 102, 168 Lenz, P. & Breger, M., 2005, CoAst, 146, 53 McNeil, J. W., 2004, IAU Circ, 8284 Ménard, F. & Bertout, C., 1999, In: Origin of Stars and Planetary Systems, eds. C. J. Lada & N. D. Kylafis, 341 Semkov, E. H., 2004 IBVS, 5578, 1 Semkov, E. H., 2006, IBVS, 5683, 1 Simon, T., Andrews, S. M., Rayner, J. T. & Drake S. A., 2004, ApJ, 611, 940