arXiv:1807.01555v1 [astro-ph.SR] 4 Jul 2018

MNRAS 000, 1–?? (2018) Preprint 26 February 2019 Compiled using MNRAS L^ATEX style file v3.0

The recurrent nova RS Oph – simultaneous B and V band observations of the flickering variability

R. K. Zamanov,^{1⋆} S. Boeva,^1 G. Y. Latev,^1 J. Martí,^2 D. Boneva,^3 B. Spassov,^1 Y. Nikolov,^1 M. F. Bode^4, S. V. Tsvetkova^1, K. A. Stoyanov^1

1 Institute of Astronomy and National Astronomical Observatory, Bulgarian Academy of Sciences, 72 Tsarigradsko Shose, 1784 Sofia, Bulgaria 2 Departamento de Física (EPSJ), Universidad de Jaén, Campus Las Lagunillas, A3-420, 23071, Jaén, Spain 3 Space Research and Technology Institute, Bulgarian Academy of Sciences, ul. Akad. G. Bonchev blok 1, 1113 Sofia, Bulgaria 4 Office of the Vice Chancellor, Botswana International University of Science and Technology, Private Bag 16, Palapye, Botswana

Accepted 2018 June 30. Received 2018 June 30 ; in original form 2018 March 7

ABSTRACT We performed 48.6 hours (in 28 nights) of simultaneous B and V band observations of the flickering variability of the recurrent nova RS Oph in quiescence. During the time of our observations the brightness of the system varied between 13.2 > B > 11.1 and the colour in the range 0.86 < B − V < 1.33. We find that RS Oph becomes more blue, as it becomes brighter, however the hot component becomes more red as it becomes brighter (assuming that the red giant is non-variable). During all the runs RS Oph exhibits flickering with amplitude 0.16 - 0.59 mag in B band. For the flickering source we find that it has colour −0.14 < B − V < 0.40, temperature in the range 7200 < T_{f l} < 18900, and average radius 1.1 < R_{f l} < 6.7 R_⊙. We do not find a correlation between the temperature of the flickering and the brightness. However, we do find a strong correlation (correlation coefficient 0.81, significance 1.1 × 10^{−7}) between B band magnitude and the average radius of the flickering source – as the brightness of the system increases the size of the flickering source also increases. The estimated temperature is similar to that of the bright spot of cataclysmic variables. The persistent presence of flickering indicates that the white dwarf is actively accreting material for the next outburst.

Key words: accretion, accretion discs – stars: binaries: symbiotic – novae, cataclysmic variables – stars: individual: RS Oph

1 INTRODUCTION

RS Oph (HD 162214) is a symbiotic recurrent nova which exhibits recurrent nova outbursts approximately every 15- 20 years. During the outbursts the brightness rises from an initial value of V ∼ 11 to V ≈ 6 magnitude. Most likely, the recurrent nova outbursts are the result of a thermonuclear runaway on the surface of the white dwarf (Starrfield 2008), however some authors suggest dwarf nova-like accretion disc instability (King & Pringle 2009; Alexander et al. 2011).

RS Oph contains an M giant mass donor (Dobrzycka & Kenyon 1994; Anupama & Mikołajewska 1999) and a massive (1.2-1.4 M⊙) carbon-oxygen white dwarf (Mikołajewska & Shara 2017). The mass transfer mechanism could be via Roche lobe overflow or stellar wind capture, but it is still the

⋆ E-mail: rkz@astro.bas.bg (RKZ), glatev@astro.bas.bg (GYL) subject of debates (Somero, Hakala & Wynn 2017). Booth, Mohamed & Podsiadlowski (2016) find that the quiescent mass transfer produces a dense outflow, concentrated towards the binary orbital plane, and an accretion disc forms around the white dwarf. A photoionization model of the quiescent spectrum indicates the presence of a low-luminosity accretion disc (Mondal et al. 2018).

Brandi et al. (2009) found that the orbital period of the system is 453.6 d and give a mass ratio q = MRG/MW D = 0.59 ± 0.05, which corresponds to mass of the red giant MRG=0.68–0.80 M⊙ and an inclination of the orbit i = 49^0 − 52^0. The orbit of the system is consistent with it being circular with period 455.7 d (Fekel et al., 2000).

The most recent nova outburst of RS Oph occurred in 2006 February 12 (Narumi et al. 2006; Evans et al. 2008) and the multiwavelength observations widen our knowledge on the mechanisms and physics of nova explosions and for-

© 2018 The Authors

2 Zamanov et al.

mation of planetary nebulae. The optical and radio observations after the outburst confirmed an asymmetric doublering structure of the nova remnant (O’Brien et al. 2006; Bode et al. 2007; Rupen, Mioduszewski & Sokoloski 2008). The X-ray observations show that the nova interacts with the dense circumstellar medium leading to deceleration of the material (Sokoloski et al. 2006; Bode et al. 2006). The ejecta have low mass – Mej ∼ 10^{−7} – 10^{−6} M⊙, and high velocity – υej ≳ 4000 km s^{−1} (Bode et al. 2006; Sokoloski et al. 2006; Vaytet et al. 2011).

The flickering is seemingly irregular with light variations on timescales of a few minutes with amplitude of a few×0.1 magnitudes. The flickering of RS Oph has been observed by Walker (1977), Bruch (1980), Gromadzki et al. (2006) and others. The study of flickering in any interacting binary system is important because it allows us to probe what is going on in the inner accretion disc regions. The release of luminosity here follows variations at larger accretion disc radii on time-scales of the order, or larger than, the local viscous time-scale. The variations are expected to be of flicker-noise type according to α-based accretion disc models pioneered by Lyubarskii (1997). Improving our knowledge of flickering in RS Oph enables us to widen the exploration of the parameter space of accretion discs around mildly compact objects such as its white dwarf companion. In this context, our RS Oph observations contribute to a complementary view of flickering sources beyond previous studies, which have been more focused on black holes in X-ray binary and Active Galactic Nuclei systems. With its unusual flickering properties among symbiotic stars, RS Oph provides an excellent alternative workbench for theorists to put to the test their accretion disc models, and help to understand phenomena such as the widely observed rms-flux relation (see Scaringi et al. 2012).

Here, we report quasi-simultaneous observations of the flickering variability of the recurrent nova RS Oph in two optical bands – B and V and analyze the colour changes, temperature and radius of the flickering source and their response to the brightness variations.

2 OBSERVATIONS

The observations were performed with five telescopes equipped with CCD cameras:

• the 2.0 m telescope of the National Astronomical Observatory (NAO) Rozhen, Bulgaria (Bonev & Dimitrov 2010) • the 50/70 cm Schmidt telescope of NAO Rozhen • the 60 cm telescope of NAO Rozhen • the 60 cm telescope of the Belogradchik Observatory, Bulgaria (Strigachev & Bachev 2011)

• the 41 cm telescope of the University of Jaén, Spain (Martí, Luque-Escamilla, & García-Hernández 2017).

The data reduction was done with IRAF (Tody 1993) following standard recipes for processing of CCD images and aperture photometry. A few comparison stars from the list of Henden & Munari (2006) have been used. On Fig. 1 two examples of our data are given – the observed variability in B and V bands is plotted together with the calculated B-V colour. The typical photometric errors are 0.006 mag in B band and 0.005 mag in V band.

We have 28 nights with simultaneous observations in B and V bands during the period July 2008 - September 2017. The B − V colour is calculated for 2749 points in total. During our observations the brightness of RS Oph was: 11.121 ≤ B ≤ 13.208, 10.093 ≤ V ≤ 11.908, 0.864 ≤ B − V ≤ 1.333, with mean B = 12.204, mean V = 11.106, mean B-V = 1.098. The peak-to-peak amplitude of the flickering in B band is in the range 0.16 - 0.59 mag.

The journal of observations is given in Table 1. In the table are given as follows: the date (in format YYYYMMDD), band, the telescope, number of data points over which B-V colour is calculated, average, minimum and maximum magnitude in the corresponding band, dereddened colour of the flickering source (B − V )01 and (B − V )02, T1 and T2 - temperature of the flickering source, R_{f l} and R2 - radius the flickering source. Details of the calculation are given in Sect. 5 below.

3 INTERSTELLAR EXTINCTION AND RED GIANT CONTRIBUTION

3.1 Interstellar reddening

We have nine high resolution spectra obtained with the FEROS spectrograph attached to the 2.2m telescope ESO La Silla and the echelle spectrograph ESPERO at the 2.0m telescope of NAO Rozhen. We compared these spectra with spectra of a few red giants with similar spectral type and measured the equivalent widths of four interstellar features clearly visible in the high resolution spectra. Using the equivalent width of KIλ7699 and the calibration by Munari & Zwitter (1997), we find 0.60 < E(B − V ) < 0.83. Using the diffuse interstellar bands (DIBs) and results of Puspitarini, Lallement & Chen (2013), we derive for DIB λ6613 0.59 < E(B − V ) < 0.80, for DIB 5780 0.57 < E(B − V ) < 0.69, for DIB 5797 0.65 < E(B − V ) < 0.78. Taking into account the individual errors, we estimate E(B − V ) = 0.69 ± 0.07. This is in agreement with (1) the value E(B − V ) = 0.73 ± 0.10 given in Snijders (1987) on the basis of UV spectra and to (2) the Galactic dust reddening for a line of sight to RS Oph (NASA/IPAC IRSA: Galactic Reddening and Extinction Calculator) 0.59 ≤ E(B − V ) ≤ 0.69, which should be considered as an upper limit for the interstellar reddening. Hereafter we use E(B − V ) = 0.69 ± 0.07.

3.2 Red giant

On basis of the light curves of RS Oph after the 2006 outburst (see Sect. 3 in Zamanov et al. 2015) we estimated that the brightness of the red giant is mV ≈ 12.26. To check this value we assume that the ratio between the variable and non-variable part of the hot component contribution to the brightness is equal in U and V bands. The flickering of RS Oph is clearly visible in all UBVRI bands with amplitude increasing to the blue. Using data from Zamanov et al. (2010, 2015), we estimate the magnitude of the red giant in V band to be mV = 12.19 ± 0.10. This value (although based on an assumption) is in agreement with mV ≈ 12.26 above.

Shenavrin, Taranova & Nadzhip (2011) found M2pe

MNRAS 000, 1–?? (2018)

RS Oph: optical flickering 3

Figure 1. Example of our observations - light curves of RS Oph in B and V bands together with the calculated B-V colour.

Figure 2. The spectrum of RS Oph is denoted by the black line. The spectrum is corrected for interstellar extinction using E(B- V)=0.69 and the contribution of the hot continuum is subtracted. The green, red and blue lines are template spectra of M1III, M2III and M3III giants, respectively, from Zhong et al. (2015).

for the spectral type of the red giant from IR photometry. Mondal et al. (2018) from the absorption band indices derived the spectral type to be M2-M3. Skopal (2015a) found that the radiation from the giant corresponds to its effective temperature T_{ef f} = 3800 − 4000 K, and the radius Rg = (61 − 55)(d/1.6 kpc) R⊙. Comparing our spectra with spectra of red giants (Houdashelt et al. 2000; Bagnulo et al. 2003; Zhong et al. 2015), we estimate a similar spectral type M2 III. In Fig.2 we plot one of our spectra of RS Oph. The spectrum is corrected for the interstellar extinction using E(B-V)=0.69, the contribution of the hot continuum is subtracted, and the spectrum is normalized at 8350 Å. The emission lines are not removed. We compared the spectrum with templates of M giants by Zhong et al. (2015). The red line is the template spectrum of an M2III giant from Zhong et al. (2015), for which we achieved the best agreement.

An M2III star is expected to have an effective temperature 3695 – 3750 K, and radius 57.8 – 60.5 R⊙ (van Belle et al. 1999). For such a giant and solar metallicity models Houdashelt et al. (2000) give T_{ef f} = 3740 K, log g = 0.81, B − V = 1.629, V − I = 1.927. We adopt for the brightness of the red giant in the optical bands mB = 14.660 and mV = 12.261. The typical 1σ error of these magnitudes is about ±0.05 mag.

4 VARIABILITY IN B AND V BANDS

In Fig.3 we plot B versus V band magnitude. In the left panel (Fig. 3a) are the observed magnitudes of RS Oph. In the right panel (Fig. 3b) are the dereddened magnitudes of the hot component (e.g. the red giant contribution is subtracted using the magnitudes given in Sect. 3.2).

4.1 B-V colour

In Fig.4, we plot colour magnitude diagrams. The colourmagnitude diagram is quite different from that of the cataclysmic variable AE Aqr (Zamanov et al. 2017). In the case of AE Aqr all the data occupy a well defined strip, here such a strip is not visible, although the observations from each night are placed on a strip on the diagram. This indicates that the flickering behaviour in the case RS Oph is more complicated and/or with a different mechanism.

In Fig.5, we plot the calculated mean values for each night (one night – one point). The error bars correspond to the standard deviation of the run. It is seen that the system becomes bluer as it becomes brighter, however the

MNRAS 000, 1–?? (2018)

4 Zamanov et al.

hot component becomes redder as it gets brighter. There is a correlation between the mean colour and magnitude of the hot component. The Pearson correlation coefficient is 0.70, Spearman’s (rho) rank correlation – 0.69, the statistical significance p–value = 5.5 × 10^{−5}. This indicates that the hot component becomes redder as it gets brighter.

5 FLICKERING LIGHT SOURCE

In his remarkable paper, Bruch (1992) proposed that the light curve of a white dwarf with flickering can be separated into two parts – constant light and variable (flickering) source. Following his assumptions, we calculate the flux of the flickering light source as F_{fl1} = Fav − Fmin, where Fav is the average flux during the run and Fmin is the minimum flux during the run (corrected for the typical error of the observations).

An extension of the method is proposed by Nelson et al. (2011), who suggests to use the F_{fl2} = Fmax − Fmin, where Fmax is the maximum flux during the run.

Practically, the method of Bruch (1992) refers to the average luminosity of the flickering source, while that of Nelson et al. (2011) – to its maximal luminosity. F_{fl1} and F_{fl2} have been calculated for each band, using the values given in Table 1 and the calibration for a zero magnitude star F0(B) = 6.293 × 10^{−9} erg cm^{−2} s^{−1} Å^{−1}, λ_{ef f} (B) = 4378.12 Å, F0(V ) = 3.575 × 10^{−9} erg cm^{−2} s^{−1} Å^{−1} and λ_{ef f} (V ) = 5466.11 Å as given in Spanish virtual observatory Filter Profile Service (Rodrigo et al. 2018, see also Bessel 1979).

It is worth noting that while the calculated colours of the hot component depend on the assumed red giant brightness, the parameters of the flickering source are independent on the the red giant parameters.

Using method of Bruch (1992), we find that in B band the flickering light source contributes about 13% of the average flux of the system, with 0.06 ≤ F_{fl1}/Fav ≤ 0.24. In V band its average contribution is 11%, with 0.05 ≤ F_{fl1}/Fav ≤ 0.19.

Using method of Nelson et al (2011), we find that in B band the flickering light source contributes about 25% of the maximal flux of the system, with 0.13 ≤ F_{fl2}/Fmax ≤ 0.42. In V band its is about 21%, with 0.10 ≤ F_{fl2}/Fmax ≤ 0.36.

From the amplitude - flux relation (rms-flux relation), we expect that the luminosity of the flickering source will increase as the brightness increases. However, it is not a priori clear which parameter – temperature or radius (or both) increases.

5.1 B-V colour and temperature of the flickering source

The calculated de-reddened colours of the flickering light source are given in Table 1, where (B − V )01 is calculated using Fav and Fmin, while (B − V )02 is calculated using Fmax and Fmin. Typical error is ±0.05 mag.

In Fig.6 we plot (B − V )02 versus (B − V )01. The solid line represents (B − V )02 = (B − V )01. To check for a systematic shift between the two methods we performed linear least-squares approximation in one-dimension (y = a+bx), when both x and y data have errors. We obtain a = 0.027 ± 0.017 and b = 1.007 ± 0.093. A Kolmogorov- Smirnov test gives Kolmogorov-Smirnov statistic 0.18 and significance level 0.72. It means that both methods give similar results and there is not a systematic shift.

The average difference between them is ≈ 0.08 mag, which is comparable with the accuracy of our estimations. In Fig.7, we plot (B − V )0 versus the average B band magnitude. We do not detect a correlation between the colour of the flickering source and brightness.

5.2 Temperature of the flickering source

We calculate the temperature of the flickering source using its dereddened colours and the colours of the black body (Straižys, Sudžius & Kuriliene 1976). T1 is calculated using (B − V )01, and T2 is calculated using (B − V )02. The values are given in Table 1. The two methods give similar results for the temperature of the flickering source as well as for (B − V )0. The average values are T1 = 9835 ± 2400 and T2 = 10306 ± 2693. The slightly larger scatter of the values calculated following Nelson et al. (2011) is due to the fact that Fav is calculated more precisely than Fmax.

5.3 Radius of the flickering source

The radius of the flickering source R_{f l} is calculated using the derived temperature (Sect.5.2), B band magnitude and assuming that it is spherically symmetric. We obtain 0.92 < R_{f l} < 5.6 R⊙. In Fig.8 we plot R_{f l} versus the average B band magnitude. It is seen that R_{f l} increases when the brightness of the system increases. When we use all 28 points we find moderate to strong correlation with Pearson correlation coefficient 0.70, Spearman’s (rho) rank correlation 0.73, and statistical significance p–value ≈ 9 × 10^{−6}.

The most deviant point is the run 2012 August 15, the same run that also deviates from the rms-flux relation (see Sect. 6.1 in Zamanov et al. 2015). When we remove this deviating point (due to the low brightness and high amplitude variability, i.e. Npts = 27), we obtained strong and highly significant correlation between the radius of the flickering source and average B band magnitude of the hot component with Pearson correlation coefficient 0.81, Spearman’s (rho) rank correlation 0.83, statistical significance of the correlation p–value ≈ 1.1 × 10^{−7} .

We do not detect significant correlation between the brightness and the radius of the flickering source calculated with Fmax. 5.4 Luminosity of the flickering source

The luminosity of the flickering source L_{f l} is calculated using the derived temperature and radius given in Table 1 and assuming that it is spherically symmetric: L_{f l} = 4πR^2_{f l}σT^4_1 , where σ is the Stefan-Boltzmann constant. We obtain 27 L⊙ < L_{f l} < 173 L⊙.

6 DISCUSSION

The flickering variability is typical for the accreting white dwarfs in cataclysmic variables and is considered an obser-

MNRAS 000, 1–?? (2018)

RS Oph: optical flickering 5

Figure 3. B versus V band magnitude: a) observed, b) calculated for the hot component.

Figure 4. Colour magnitude diagram: a) observed, b) calculated for the hot component.

Figure 5. Mean colour magnitude diagram, each point represent one run: a) observed, b) calculated for the hot component.

MNRAS 000, 1–?? (2018)

6 Zamanov et al.

Figure 6. (B − V )_{02} versus (B − V )_{01} – there is no systematic shift between the two methods. See text for details.

Figure 7. (B − V )_0 colour of the flickering source versus the average B magnitude. The squares represent (B − V )_{01} calculated by method of Bruch (1992), the plus signs – (B −V )_{02} derived following Nelson et al. (2011). There is no tendency for the flickering source to become redder or bluer when the brightness changes.

vational proof of accretion onto a white dwarf (Sokoloski & Bildsten 2010). It is a relatively rare phenomenon for symbiotic stars. Among more than 200 symbiotic stars known in our Galaxy, flickering is observed only in 11 objects. The last two detected in recent years V648 Car (Angeloni et al. 2013) and EF Aql (Zamanov et al. 2017). The flickering of RS Oph disappeared after the 2006 outburst (Zamanov et al. 2006), reappeared by day 241 of the outburst (Worters et al. 2007), and is visible in all our observations obtained since then to now. This indicates that the white dwarf is accumulating material for the next outburst.

Outbursts of RS Oph have been recorded in 1898, 1933, 1958, 1967, 1985 and most recently in 2006 (Evans et al., 2008; Narumi et al. 2006). According to Schaefer (2010), two outbursts in 1907 and 1945 were missed when RS Oph was aligned with the Sun. The time interval between two consecutive outbursts is between 8.6 and 26.6 years (Schaefer 2010; Adamakis et al. 2011). The last one took place in 2006,

Figure 8. Luminosity and radius of the flickering source versus the average B band magnitude. There is a well defined tendency for the flickering source to become brighter and bigger when the brightness of the system increases.

which means that the next one can be expected between the time of writing and 2032. We are now well into the observed historic inter-outburst period and we should be alert for the next eruption.

Changes in the emission from Hα line are detected on time-scales as short as 2 min (Worters & Rushton 2014). This time scale is similar to that of the flickering variability and indicates that the flickering is partly re-processed in the nebula. The variability observed in Hα could be due to changes in the photoionization of the nebula linked to the flickering activity. Given the discussion in Sect. 6.2 of Sokoloski, Bildsten & Ho (2001) about the difficulty of producing rapid variability from the nebular emission, we expect the rapidly variable component of RS Oph to reflect the physical origin of the variations, for example in the accretion disc (or boundary layer, or hot spot), and not be dominated by nebular features.

In the following paragraphs we discuss the implication of our results for three possible sites of origin of the flickering - the hot spot (e.g. Smak 1971), structures in the accretion disc (e.g. Baptista, Borges & Oliveira 2016) and the boundary layer (e.g. Bruch & Duschl 1993).

MNRAS 000, 1–?? (2018)

RS Oph: optical flickering 7

6.1 Typical time of the flickering

The wavelet analysis of the flickering of RS Oph performed by Kundra, Hric & Gális (2010) and Kundra & Hric (2014) found two different sources of flickering, the first one with amplitude of 0.1 magnitude and frequency 60-100 cycles per day and the second one with amplitude of 0.6 magnitude and frequency less than 60 cycles per day (with both parameters varying from night to night). Similar frequencies (17 - 144 cycles/day) are also visible in our data (Georgiev et al. 2018). Simon, Hudec & Hroch (2004) using observations with the Optical Monitoring Camera onboard of INTEGRAL satellite, found that the typical frequency was 30-50 cycles/day (i.e. period of 48-29 min) during the observations in 2003. Semiregular oscillations with period 82 ± 2 min on one night (about 17 cycles per day) have been also detected by Dobrzycka, Kenyon & Milone (1996).

Let us suppose that these quasi-periods correspond to the Keplerian period in the accretion disc around the WD: R_{Kepl} = ( GMW D 4π^2ν^2 )_{1/3} , (1)

where G is the gravitational constant, R_{Kepl} is the distance from the WD, and ν is the frequency of the variability. For a 1.4 M⊙ WD the frequencies correspond to R_{Kepl} ≈ 0.2 − 0.5 R⊙. These values are 5-10 times smaller than the calculated (in Sect. 5.3) average radius of the flickering source. However they are similar to the radii estimated in Sect. 6.3.

6.2 Bright spot

The temperature and the size of the bright spot are derived for a few cataclysmic variables. For OY Car, Wood et al (1989) calculated temperature in the range 8600 – 15000 K; Zhang & Robinson (1987) for U Gem - T = 11600 ± 500 K; Robinson, Nather & Patterson (1978) give T = 16000 K for the bright spot in WZ Sge. For IP Peg three estimates exist: Marsh (1988) – T = 12000 ± 1000 K, Ribeiro et al. (2007) – 6000-10000 K, Copperwheat et al. (2010) – 7000 - 13000 K. The temperature of the optical flickering source of RS Oph is in the range 7000 < T_{f l} < 18000 K (see Sect.4.1), which is similar to the temperature of the bright spot for the CVs.

The bright spot is produced by the impact of the stream on the outer parts of the accretion disc. In case of Roche-lobe overflow this stream is coming from the inner Lagrangian point L1. If the red giant in RS Oph does not fill its Roche lobe, the white dwarf accretes material from its wind. In this case accretion cone and accretion wake will be formed [see Fig. 1 of Jackson (1975) or Fig. 4 of Ahmad, Chapman & Kondo (1983)]. The stream formed in the accretion wake should be similar to that formed from Roche-lobe overflow.

The luminosity of the bright spot is approximately (Shu 1976; Elsworth & James 1982): L_{bs} ≈ 1 2 v^2_⊥Ṁacc, (2) where Ṁacc is the mass accretion rate and v_⊥ is the inward component of the stream’s velocity at the impact with outer disc edge. Eq. 2 indicates that when the mass accretion rate increases, the luminosity of the hot spot also must increase. In addition, our results (Sect.5.3) indicate that when the mass accretion rate increases the radius of the bright spot (if it is the source of flickering) also increases, while its temperature remains almost constant. In this case the quasi-periods (Sect. 6.1) are not connected with the Keplerian rotation but most likely with fragmentation and/or variability in the stream.

6.3 Temperature in the accretion disc

The timescales of changes of the overall structure of the accretion disc (e.g. the mass transfer rate, angular momentum transport, global spiral structure formation) are longer compared to the local fluctuating processes in the flow that are responsible for the flickering activity. In this way the dynamical time scale variability of the flickering light source do not change the overall structure of the accretion disc. Considering the entire disc structure, the temperature in the disc can be approximated with the radial temperature profile of a steady-state accretion disc (e.g. Frank, King & Raine 2002):

T^4_{ef f} = 3GṀaccM_{wd} 8πσR^3 [ 1 − ( R_{wd} R )_{1/2}] , (3)

R is the radial distance from the WD. We assume M_{wd} = 1.35 M⊙. In the standard model an white dwarf with mass 1.2-1.4 M⊙ is expected to have radius 0.006 - 0.002 R⊙ (e.g. Magano et al. 2017). The average mass accretion rate in quiescence is of about 2.3 × 10^{−7} M⊙ yr^{−1} (Skopal 2015b). Bearing in mind the variability of the hot component in B band (see Fig. 5b) it implies that the mass accretion rate in quiescence varies approximately from 1 × 10^{−7} to 5.5 × 10^{−7} M⊙ yr^{−1}.

Using the parameters for RS Oph, a temperature 7500 ≤ T_{f l} ≤ 14500 K (the temperature of the flickering light source as derived in Sect. 5.2) should be achieved at a distance R ≈ 0.5 − 2.0 R⊙ from the WD. If the vortexes are 1000 K hotter than their surroundings than this distance is R ≈ 0.6 − 2.6 R⊙ from the WD. These values are similar to the Keplerian radii corresponding to the quasi-periods in the flickering light curves (see Sect. 6.1). If the accretion disc itself (vortexes, blobs or other structures in the disc, e.g. Bisikalo et al. 2001) is the place for the origin of the flickering of RS Oph, then it comes from R ∼ 1 R⊙ from the WD.

6.4 X-ray emission from the boundary layer

RS Oph is an X-ray faint recurrent nova. Practically X-ray observations point to a ”missing boundary layer” (Mukai 2008). However the flickering source of RS Oph is considerably brighter in the visible and near infrared (V, R and I bands) than the flickering source of T CrB, which is a X-ray bright source (Mukai et al. 2013). For example in R and I bands RS Oph has flickering with an amplitude larger than 0.20 mag, while in T CrB the flickering in R and I bands is with amplitude less than 0.03 mag. In V band RS Oph has flickering with an amplitude larger than 0.30 mag, while T CrB it is ≤ 0.05 mag (e.g. Zamanov et al. 2010, 2016).

If the boundary layer is completely optically thick, this can explain why RS Oph is X-ray faint. In this case the radius of the flickering source measured in the optical bands

MNRAS 000, 1–?? (2018)

8 Zamanov et al.

(Fig. 8) could represent the radius up to which the hard X-rays generated from the boundary layer are effectively processed by the inner parts of the accretion disc and the accretion disc corona.

7 CONCLUSIONS

We report our observations of the flickering variability of the recurrent nova RS Oph, simultaneously in B and V bands. We estimate interstellar reddening towards RS Oph E(B−V ) = 0.69±0.07 and spectral type of the giant M2 III. Subtracting the red giant contribution, we find that dereddened colour (B − V )0 of the hot component changes from -0.4 to 0.3 and it becomes redder when it gets brighter.

For the flickering light source in RS Oph, we estimate average (B − V )0 = 0.18 ± 0.12, T_{f l} = 9800 ± 2400 K, which is similar to the temperature of the bright spot in CVs. Its average radius is R_{f l} = 3.6 ± 1.4 R⊙, and average luminosity L_{f l} = 89 ± 35 L⊙. When the brightness of the hot component increases the temperature of flickering source remains approximately constant and the radius of flickering source increases.

If the flickering of RS Oph is coming from a bright spot our results indicate that when the brightness increases the size of the spot also increases. If the flickering comes from the accretion disc, it is probably generated at distance ∼ 1 R⊙ from the white dwarf.

In any case, the richness of the photometric behaviour reported in this manuscript represents a challenging dataset for further theoretical studies.

ACKNOWLEDGEMENTS

This work was partly supported by the Program for career development of young scientists, Bulgarian Academy of Sciences (DFNP 15-5/24.07.2017), by grants DN 08/1 13.12.2016, DN 12/13 12.12.2017 (Bulgarian National Science Fund), and AYA2016-76012-C3-3-P from the Spanish Ministerio de Economía y Competitividad (MINECO). We are grateful to an anonymous referee whose comments and suggestions helped to improve the original manuscript.

REFERENCES

Adamakis, S., Eyres, S. P. S., Sarkar, A., & Walsh, R. W. 2011, MNRAS, 414, 2195 Ahmad, I. A., Chapman, R. D., & Kondo, Y. 1983, A&A, 126, L5 Alexander, R. D., Wynn, G. A., King, A. R., & Pringle, J. E.

2011, MNRAS, 418, 2576 Anupama, G. C., & Mikołajewska, J. 1999, A&A, 344, 177 Bagnulo, S., Jehin, E., Ledoux, C., et al. 2003, The Messenger, 114, 10 Baptista, R., Borges, B. W., & Oliveira, A. S. 2016, MNRAS, 463, 3799 Bessell, M. S. 1979, PASP, 91, 589 Bisikalo, D. V., Boyarchuk, A. A., Kilpio, A. A., & Kuznetsov, O. A. 2001, Astronomy Reports, 45, 676 Bode, M. F., O’Brien, T. J., Osborne, J. P., et al. 2006, ApJ, 652, 629

Bode, M. F., Harman, D. J., O’Brien, T. J., et al. 2007, ApJ, 665, L63 Bonev, T., & Dimitrov, D. 2010, Bulgarian Astronomical Journal, 13, 153 Booth, R. A., Mohamed, S., & Podsiadlowski, P. 2016, MNRAS, 457, 822 Brandi, E., Quiroga, C., Mikołajewska, J., Ferrer, O. E., & García, L. G. 2009, A&A, 497, 815 Bruch, A. 1980, Information Bulletin on Variable Stars, 1805, 1 Bruch, A. 1992, A&A, 266, 237 Bruch, A., & Duschl, W. J. 1993, A&A, 275, 219 Copperwheat, C. M., Marsh, T. R., Dhillon, V. S., et al. 2010, MNRAS, 402, 1824 Dobrzycka, D., Kenyon, S. J., & Milone, A. A. E. 1996, AJ, 111, 414 Dobrzycka, D., & Kenyon, S. J. 1994, AJ, 108, 2259 Elsworth, Y. P., & James, J. F. 1982, MNRAS, 198, 889 Evans, A., Bode, M. F., O’Brien, T. J., & Darnley, M. J. 2008, RS Ophiuchi (2006) and the Recurrent Nova Phenomenon, 401, Fekel, F. C., Joyce, R. R., Hinkle, K. H., & Skrutskie, M. F. 2000, AJ, 119, 1375 Frank, J., King, A., & Raine, D. J. 2002, Accretion Power in Astrophysics, Cambridge University Press Georgiev, T., et al. 2012, Bulgarian Astronomical Journal, in preparation Gromadzki, M., Mikolajewski, M., Tomov, T., et al. 2006, Acta Astron., 56, 97 Henden, A., & Munari, U. 2006, A&A, 458, 339 Houdashelt, M. L., Bell, R. A., Sweigart, A. V., & Wing, R. F.

2000, AJ, 119, 1424 Jackson, J. C. 1975, MNRAS, 172, 483 King, A. R., & Pringle, J. E. 2009, MNRAS, 397, L51 Kundra, E., Hric, L., & Gális, R. 2010, ASP Conf. 435, 341 Kundra, E., & Hric, L. 2014, Contributions of the Astronomical Observatory Skalnate Pleso, 43, 459 Lyubarskii, Y. E. 1997, MNRAS, 292, 679 Magano, D. M. N., Vilas Boas, J. M. A., & Martins, C. J. A. P.

2017, Phys. Rev. D, 96, 083012 Marsh, T. R. 1988, MNRAS, 231, 1117 Martí, J., Luque-Escamilla, P. L., & García-Hernández, M. T.

2017, Bulgarian Astronomical Journal, 26, 91 Mondal, A., Anupama, G. C., Kamath, U. S., et al. 2018, MN- RAS, 474, 4211 Mikołajewska, J., & Shara, M. M. 2017, ApJ, 847, 99 Mukai, K. 2008, RS Ophiuchi (2006) and the Recurrent Nova Phenomenon, ASP Conf. 401, 84 Mukai, K., Sokoloski, J. L., Nelson, T., & Luna, G. J. M. 2013, Binary Paths to Type Ia Supernovae Explosions, IAU Symp 281, 186 Munari, U., & Zwitter, T. 1997, A&A, 318, 269 Narumi, H., Hirosawa, K., Kanai, K., et al. 2006, IAU Circ., 8671, 2 Nelson, T., Mukai, K., Orio, M., Luna, G. J. M., & Sokoloski, J. L. 2011, ApJ, 737, 7 O’Brien, T. J., Bode, M. F., Porcas, R. W., et al. 2006, Nature, 442, 279 Popov, V., & Dimitrov, D. 2011, Bulgarian Astronomical Journal, 15, 113 Puspitarini, L., Lallement, R., & Chen, H.-C. 2013, A&A, 555, A25 Ribeiro, T., Baptista, R., Harlaftis, E. T., Dhillon, V. S., & Rutten, R. G. M. 2007, A&A, 474, 213 Robinson, E. L., Nather, R. E., & Patterson, J. 1978, ApJ, 219, 168 Rodrigo, C., Solano, E., Bayo, A.

http://ivoa.net/documents/Notes/SVOFPS/index.html Rupen, M. P., Mioduszewski, A. J., & Sokoloski, J. L. 2008, ApJ, 688, 559-567

MNRAS 000, 1–?? (2018)

RS Oph: optical flickering 9

Scaringi, S., Körding, E., Uttley, P., et al. 2012, MNRAS, 421, 2854 Schaefer, B. E. 2010, ApJS, 187, 275 Shenavrin, V. I., Taranova, O. G., & Nadzhip, A. E. 2011, Astronomy Reports, 55, 31 Shu, F. H. 1976, IAU Symp. 73, 253 Simon, V., Hudec, R., & Hroch, F. 2004, Information Bulletin on Variable Stars, 5562, 1 Skopal, A. 2015a, New Astron., 36, 128 Skopal, A. 2015b, New Astron., 36, 139 Smak, J. 1971, Acta Astron., 21, 15 Sokoloski, J. L., Bildsten, L., & Ho, W. C. G. 2001, MNRAS, 326, 553 Sokoloski, J. L., Luna, G. J. M., Mukai, K., & Kenyon, S. J. 2006, Nature, 442, 276 Sokoloski, J. L., & Bildsten, L. 2010, ApJ, 723, 1188 Somero, A., Hakala, P., & Wynn, G. A. 2017, MNRAS, 464, 2784 Starrfield, S. 2008, RS Ophiuchi (2006) and the Recurrent Nova Phenomenon, 401, 4 Straizys, V., Sudzius, J., & Kuriliene, G. 1976, A&A, 50, 413 Strigachev, A., & Bachev, R. 2011, Bulgarian Astronomical Journal, 16, 144 Snijders, M. A. J. 1987, Ap&SS, 130, 243 Tody, D. 1993, ASP Conf., 52, 173.

van Belle, G. T., Lane, B. F., Thompson, R. R., et al. 1999, AJ, 117, 521 Vaytet, N. M. H., O’Brien, T. J., Page, K. L., et al. 2011, ApJ, 740, 5 Walker, A. R. 1977, MNRAS, 179, 587 Wood, J. H., Horne, K., Berriman, G., & Wade, R. A. 1989, ApJ, 341, 974 Worters, H. L., Eyres, S. P. S., Bromage, G. E., & Osborne, J. P.

2007, MNRAS, 379, 1557 Worters, H. L., & Rushton, M. T. 2014, MNRAS, 442, 2637 Zamanov, R., Boer, M., Le Coroller, H., & Panov, K. 2006, Information Bulletin on Variable Stars, 5733, 1 Zamanov, R. K., Boeva, S., Bachev, R., et al. 2010, MNRAS, 404, 381 Zamanov, R., Latev, G., Boeva, S., et al. 2015, MNRAS, 450, 3958 Zamanov, R. K., Latev, G. Y., Boeva, S., et al. 2017, Astronomische Nachrichten, 338, 598 Zamanov, R., Semkov, E., Stoyanov, K., & Tomov, T. 2016, The Astronomer’s Telegram, 8675, Zhang, E.-H., & Robinson, E. L. 1987, ApJ, 321, 813 Zhong, J., Lépine, S., Li, J., et al. 2015, Research in Astronomy and Astrophysics, 15, 1154

MNRAS 000, 1–?? (2018)

10 Zamanov et al.

Table 1. Simultaneous CCD observations of RS Oph in B and V bands and the calculated parameters of the flickering source. (B − V )_{01} , T_1, and R_{f l} - are dereddened colour, temperature and radius of the flickering source calculated following Bruch (1992), (B − V )_{02}, T_2, and R_2 - following Nelson et al. (2011) – see Sect. 5.

DATE band telescope N_{B−V} average min max (B − V )_{01} T_1 R_{f l} (B − V )_{02} T_2 R_2 [mag] [mag] [mag] [K] [R_⊙] [K] [R_⊙]

20080706 B 70cm Sch 49 12.4711 12.380 12.615 0.1117 10515 2.322 0.1189 10384 3.096 V 2.0m Roz 11.2308 11.168 11.325 20090615 B 60cm Roz 76 11.7666 11.597 11.951 0.1442 9948 3.954 0.2118 9102 6.686 V 60cm Bel 10.7420 10.581 10.895 20090721 B 60cm Roz 57 12.0280 11.876 12.277 0.2302 8872 4.937 0.1083 10576 4.773 V 60cm Bel 10.9963 10.891 11.219 20090723 B 70cm Sch 38 11.9789 11.857 12.099 0.2025 9219 3.360 0.1927 9341 4.793 V 2.0m Roz 10.9740 10.865 11.082 20100430 B 60cm Roz 62 11.7409 11.603 11.848 0.3043 7964 4.732 0.1754 9558 5.199 V 60cm Roz 10.6227 10.521 10.718 20100501 B 60cm Roz 66 11.4349 11.121 11.612 0.2539 8576 5.936 0.2554 8558 10.7083 V 60cm Roz 10.3817 10.093 10.541 20120427 B 60cm Roz 58 12.1117 11.934 12.271 0.3551 7541 5.408 0.1868 9415 5.271 V 60cm Bel 10.9899 10.863 11.138 20120613 B 60cm Roz 33 12.5301 12.380 12.671 0.2671 8411 3.349 0.1345 10100 3.564 V 60cm Roz 11.3755 11.274 11.492 20120718 B 70cm Sch 200 12.7207 12.617 12.850 -0.0493 14379 1.254 0.0573 11504 2.351 V 2.0m Roz 11.5400 11.462 11.617 20120721 B 60cm Bel 199 12.4126 12.201 12.552 -0.1415 18972 1.086 -0.1561 19783 1.736 V 60cm Bel 11.4321 11.288 11.524 20120815 B 60cm Roz 63 12.9043 12.618 13.208 0.2897 8129 4.277 0.2549 8564 5.761 V 70cm Sch 11.6736 11.452 11.908 20120816 B 2.0m Roz 185 12.7805 12.666 12.897 0.0039 12783 1.358 0.1430 9962 2.887 V 70cm Sch 11.5624 11.472 11.633 20130702 B 60cm Roz 46 12.1955 11.982 12.368 0.0455 11718 2.422 -0.1098 17211 2.321 V 60cm Roz 11.1140 10.988 11.237 20130710 B 70cm Sch 127 12.0329 11.887 12.207 0.1903 9371 3.784 0.2375 8781 5.997 V 70cm Sch 11.0399 10.896 11.196 20130812 B 70cm Sch 335 12.1202 11.916 12.270 0.3177 7852 4.796 0.1906 9368 5.476 V 2.0m Roz 11.0603 10.897 11.203 20130813 B 70Sch+60Roz 91 12.5788 12.476 12.659 0.1228 10313 1.728 -0.0084 13152 1.855 V 2.0 m Roz 11.4438 11.381 11.503 20130906 B 60cm Bel 39 12.0118 11.848 12.152 0.2258 8928 3.779 0.2608 8490 6.376 V 60cm Bel 10.8648 10.723 10.977 20140621 B 60cm Bel 65 12.5414 12.459 12.614 0.2318 8852 2.199 0.1190 10382 2.469 V 60cm Bel 11.4264 11.369 11.487 20140622 B 60cm Bel 104 12.6152 12.347 12.864 0.1780 9525 3.305 0.2928 8090 6.958 V 60cm Bel 11.5765 11.303 11.786 20140729 B 70cm Sch 32 12.3089 12.228 12.430 0.2826 8218 3.619 0.3866 7278 6.191 V 70cm Sch 11.2557 11.163 11.368 20140831 B 70cm Sch 54 12.0877 11.950 12.303 0.1218 10331 3.434 0.1073 10595 4.361 V 70cm Sch 10.9762 10.873 11.136 20160726 B 70cm Sch 63 12.3041 12.151 12.471 0.2016 9230 3.367 0.2142 9072 4.993 V 2.0m Roz 11.0561 10.941 11.174 20160728 B 70cm Sch 92 12.2771 12.084 12.455 0.1039 10656 2.742 0.1855 9431 5.107 V 70cm Sch 11.0810 10.926 11.201 20170329 B 70cm Sch 116 12.0432 11.925 12.219 0.2167 9041 4.041 0.2650 8438 6.140 V 70cm Sch 10.7978 10.701 10.924 20170528 B 60cm Bel 88 12.1335 11.960 12.252 0.0558 11531 2.142 0.0264 12108 3.259 V 60cm Bel 11.1661 11.028 11.262 20170626 B 60cm Bel 144 11.6834 11.557 11.814 0.3965 7196 6.672 0.3649 7459 8.890 V 60cm Bel 10.5115 10.400 10.632 20170719 B 41cm Jaén 133 11.7123 11.551 11.895 0.1709 9614 4.284 0.0747 11187 4.755 V 41cm Jaén 10.7409 10.617 10.905 20170904 B 41cm Jaén 65 11.6785 11.557 11.805 0.3347 7711 5.645 0.1013 10704 4.409 V 41cm Jaén 10.6443 10.567 10.770

MNRAS 000, 1–?? (2018)