arXiv:1805.11819v1 [astro-ph.GA] 30 May 2018

Research in Astron. Astrophys. Vol.0 (20xx) No.0, 000–000 http://www.raa-journal.org http://www.iop.org/journals/raa (L^ATEX: ms72.tex; printed on June 1, 2018; 4:35)

Research in Astronomy and Astrophysics

The search for roAp stars: null results and new candidates from Strömgren-Crawford photometry

E. Paunzen^1, G. Handler^2, K. Hoňková^3, J. Juryšek^3, M. Mašek^4, M. Dróżdż^5, J. Janík^1, W. Ogłoza^5, L. Hermansson^6, M. Johansson^6, M. Jelínek^7, M. Skarka^7 and M. Zejda^1

1 Department of Theoretical Physics and Astrophysics, Masaryk University, Kotlářská 2, CZ-611 37, Czech Republic; epaunzen@physics.muni.cz 2 Nicolaus Copernicus Astronomical Center, Bartycka 18, 00-716 Warsaw, Poland 3 Variable Star and Exoplanet Section of Czech Astronomical Society, Vsetínská 941/78, CZ-757 01, Valašské Meziříčí, Czech Republic 4 Institute of Physics, The Czech Academy of Sciences, Na Slovance 1999/2, CZ-182 21, Praha, Czech Republic 5 Mt. Suhora Observatory, Pedagogical University, Podchora̧żych 2, 30-084 Kraków, Poland 6 Sandvretens Observatory, Linnégatan 5A, 75332, Uppsala, Sweden 7 Astronomical Institute, Czech Academy of Sciences, (ASU CAS), Ondřejov, Czech Republic

Abstract The rapidly oscillating Ap (roAp) stars exhibit pulsational photometric and/or radial velocity variations on time scales of several minutes, which are essential to test current pulsation models as well as our assumptions of atmospheric structure characteristics. In addition, their chemical peculiarity makes them very interesting for probing stellar formation and evolution in the presence of a global magnetic field. To date, a limited number of only 61 roAp stars are known to show photometric variability. On the other hand, a literature survey yields 619 unique stars that have unsuccessfully been searched for variability of this kind. Strömgren- Crawford uvbybeta photometry of stars from both subgroups were used to investigate whether there is a selection bias of the investigated stars. We also present new photometric measurements (202 hours in 59 different nights) of 55 roAp candidates. We did not detect any new roAp star. Although our detection limits are comparable to other surveys, we also did not find pulsations in the known roAp star HD 12098, which may be a consequence of temporal amplitude changes. On the other hand, we do find some evidence for photometric variability of beta CrB at its spectroscopically derived pulsation period. From the uvbybeta photometry we conclude that the blue border of the roAp instability strip appears observationally well defined, whereas the red border is rather poorly known and studied. Within these boundaries, a total of 4646 candidates were identified which appear worthwhile to be investigated for short-term pulsational variability.

Key words: stars: chemically peculiar — stars: early-type — stars: variables: general — techniques: photometric

2 E. Paunzen et al.

1 INTRODUCTION

Up to now, there are 61 rapidly oscillating Ap (roAp) stars known (Joshi et al. 2016). They are located within an area of pulsational instability in the Hertzsprung-Russell diagram, across the main sequence, ranging in effective temperature from about 6 600 K to 8 500 K. The roAp stars share this area with pulsators of the δ Sct and γ Dor types, but their spectral and variability properties are markedly different.

Photometric investigations of roAp stars show a period range of five to twenty five minutes, which is consistent with acoustic (p-mode) pulsations of low degree and high radial overtone (Kurtz et al. 2011).

The driving mechanism of their oscillation modes is still not fully understood. The most probable explanation appears to be the “classical” κ-mechanism operating in the hydrogen ionisation zone (e.g. Balmforth et al. 2001). Many physical processes could play a role in this context: for example the coupling with the magnetic field, the ability of the latter to freeze convection and to facilitate the stratification of chemical elements. Therefore, the roAp stars are very interesting for studying pulsations in the presence of a stable magnetic field and diffusion in the stellar atmosphere. The very small percentage of such variables with respect to the total number of Ap stars already suggests that the conditions needed to excite pulsation with a detectable amplitude have to be very specific.

Even so, there appear to be additional shortcomings in the theoretical prediction of pulsation among roAp stars. For instance, theoretically predicted regions of pulsational instability (Cunha 2002) do not agree with the observed ones, in the sense that both the theoretical blue and red edges are shifted towards higher temperatures compared to observations. Furthermore, some roAp stars pulsate with frequencies higher than the acoustic cutoff frequency, which led to the suggestion that these could be driven by turbulent pressure (Cunha et al. 2013).

Therefore, as important as the knowledge about the roAp stars themselves, is the analysis of objects in the same temperature range which show no sign of roAp variability (noAp stars). A comparison of both groups should provide crucial constraints about the astrophysical conditions that enable pulsations in those stars.

We present in this paper new photoelectric and CCD photometric observations for 55 roAp candidates selected on the basis of their spectral types. In total, we analysed 202 hours of observations in 59 different nights. No new roAp star was detected.

The classification of a star as a noAp object is not straightforward because roAp stars can show, for example, strong amplitude variations from night to night (e.g., White et al. 2011; Medupe et al. 2015). The amplitudes also depend on the wavelength region observed (Medupe & Kurtz 1998), and space photometry shows that some stars pulsate with amplitudes undetectable from the ground (e.g. Holdsworth 2016). Therefore, a noAp star can only be defined by an observational upper limit of variability for a given time base and filter, which needs to be kept in mind when discussing these stars.

In order to select new candidates within the Strömgren-Crawford uvbyβ photometric system, we analysed the location of the roAp and noAp groups in reddening free diagrams. On the basis of newly defined areas in which roAp stars are located, we present a list of 4646 new candidates deemed worthwhile for variability searches. Several regions of Strömgren-Crawford indices (for example, [m_1] > 0.35) appear to be insufficiently investigated for new variables.

2 OBSERVATIONS AND DATA REDUCTION

Well established magnetic chemically peculiar stars (also known as CP2 objects) for which no or only limited time-series photometric observations from the literature (Joshi et al. 2016) are available, were selected from the catalogue of Ap, HgMn and Am stars by Renson & Manfroid (2009). Although most known roAp stars are spectrally classified as SrCrEu, we extended our list of targets also to earlier spectral types, i.e. silicon stars. We have not used any other photometric

Null results and new candidates from Strömgren-Crawford photometry 3

Table 1: Observation log, and the results from the time series analysis. HD 12098 and HD 137909 are known roAp stars.

HD/TYC BD/HIP/TYC HJD(start) Δt N Filter Site Upper Limit [2450000+] [min] [mmag]

8441 6560 6976.50705 113.5 327 B Suhora (gs8in) 0.7 7012.28702 104.1 173 B Uppsala 5.8 10783 10783 6977.18299 261.7 983 B Suhora (gs8in) 0.4 12098 3687–2649–1 6976.53518 85.3 457 v Suhora (Zeiss) 0.3 6977.34519 21.7 99 v Suhora (Zeiss) 0.6 12288 9604 6977.17831 258.7 1289 v Suhora (Zeiss) 0.4 15089 11569 6977.27179 336.5 239 B Suhora (MK) 1.4 6977.27204 337.5 443 B Suhora (MK) 1.8 7012.40129 90.7 161 B Uppsala 1.8 20476 2852–1042–1 7083.32199 74.0 131 g^′ BOOTES-2 3.4 21190 14700 7053.67151 87.3 57 B FRAM-Auger 8.7 25354 18912 7019.33714 162.5 292 B Uppsala 1.3 38823 27423 7045.53101 78.9 65 B FRAM-Auger 5.8 7059.58522 88.8 90 B FRAM-Auger 5.9 47074 146–1489–1 7059.42474 133.7 267 g^′ BOOTES-2 1.4 50403 1343–1516–1 7051.50925 145.7 215 g^′ BOOTES-2 7.0 51684 33375 7045.70282 90.1 54 B FRAM-Auger 5.5 7050.74948 124.3 96 B FRAM-Auger 4.8 52181A 1352–1045–1 7070.47641 147.9 252 g^′ BOOTES-2 3.8 52628 34174 7141.62517 68.6 147 B APT 0.8 54824 34773 7140.62067 83.1 187 B APT 0.7 7145.62726 50.6 127 B APT 0.7 7146.62815 49.6 94 B APT 2.9 55228 1346–208–1 7143.62237 69.7 125 B APT 1.1 61600 37483 6976.65123 77.1 388 v Suhora (Zeiss) 0.5 65339 39261 6976.64251 83.5 334 B Suhora (gs8in) 0.5 7014.99839 88.7 224 v APT 1.6 7015.99486 88.5 224 v APT 1.1 7019.48691 102.4 211 B Uppsala 4.1 7095.32740 86.4 194 B Uppsala 2.9 68542 40311 7096.32184 126.2 172 B Uppsala 2.5 7133.61644 81.5 192 B APT 0.8 7134.61691 68.7 160 B APT 2.5 7149.62957 62.6 151 B APT 1.2 96003 54141 7109.73310 88.5 219 v APT 0.6 7114.71982 62.9 151 v APT 0.6 96097 54182 7143.67192 113.2 204 v APT 1.2 7144.71328 43.9 109 v APT 1.4 7145.66500 112.2 278 v APT 1.3 7150.62999 164.5 416 v APT 2.6 7151.63058 164.6 416 v APT 2.2 97633 54879 7092.77862 126.4 296 v APT 0.6 7107.73745 88.2 219 v APT 0.6 7108.73344 88.1 219 v APT 0.7

criteria, such as, for example, Joshi et al. (2016) used within the Strömgren-Crawford uvbyβ system. In total, we selected 55 objects for observations. Two of these targets (HD 12098 and HD 137909) are already known roAp stars with very small photometric amplitude (HD 12098) and only spectroscopically detected variability (HD 137909). From these 55 objects, 18 have already been observed before in order to detect roAp variability. However, since some roAp stars show strong variabilities in amplitude (e.g. White et al. 2011; Medupe et al. 2015), several observations in different nights are not a disadvantage.

The choice of photometric filter is also important in this respect. Medupe & Kurtz (1998) showed that the amplitude of roAp variability significantly drops redwards of ≈ 4500 Å.

4 E. Paunzen et al.

Table 1: continued.

HD/TYC BD/HIP/TYC HJD(start) Δt N Filter Site Upper Limit [2450000+] [min] [mmag]

100809 56597 7457.77923 154.0 379 B APT 0.4 7459.77421 154.0 381 B APT 1.0 105999 59487 6735.76575 171.7 110 B FRAM-Auger 1.0 6736.53343 190.9 93 B FRAM-Auger 1.3 6736.53359 192.4 231 B FRAM-Auger 0.8 107000 59998 7131.67513 126.5 311 B APT 0.6 7133.67420 75.4 185 B APT 1.0 107612 60313 7018.98447 114.1 280 v APT 0.7 7020.98280 112.4 261 v APT 1.0 7021.97194 125.1 246 v APT 0.6 7095.43070 91.3 121 B Uppsala 3.6 108283 60697 7109.79554 88.1 214 v APT 0.9 7118.71067 124.0 274 v APT 0.8 108945 61071 7019.98178 102.7 18 v APT 1.4 7022.97093 115.4 20 v APT 1.6 112528 63247 6739.81531 144.5 189 B FRAM-Auger 1.3 6746.49682 67.2 32 B FRAM-Auger 9.8 115708 64936 6709.59688 94.1 221 v MUO 0.6 117361 65754 7092.86750 116.4 226 v APT 0.8 7107.79969 88.4 217 v APT 0.7 7108.79571 88.5 212 v APT 0.7 118022 66200 7028.95317 123.0 276 v APT 0.8 119213 66700 7025.96276 139.6 352 v APT 0.6 124883 69661 7113.79238 88.7 224 v APT 1.1 7118.81935 111.5 243 v APT 0.5 7139.78190 75.8 192 v APT 1.3 7148.79921 120.9 251 v APT 0.7 125709 2011–105–1 7148.79789 133.9 30 v APT 2.9 126515 70553 7113.72906 89.7 220 B APT 0.7 7131.76541 140.0 285 v APT 2.9 134305 74109 7140.68059 102.4 248 B APT 1.8 7141.67654 102.9 253 B APT 1.0 134793 74334 7140.75278 117.5 281 B APT 0.6 7141.74905 115.3 288 B APT 0.5 137909 75695 7092.95079 113.6 271 v APT 0.8 7107.86215 88.1 221 v APT 0.9 7108.85822 88.0 220 v APT 0.6 7109.85830 88.0 219 v APT 0.9 7135.95188 67.9 144 v APT 1.2 7150.74538 215.7 544 v APT 1.3 7151.74604 215.7 535 v APT 0.6 242006 699–1159–1 7047.30371 96.8 260 g^′ BOOTES-2 1.8

Therefore, using a filter passband somewhere between the near-ultraviolet and the blue will be most suitable to detect roAp pulsations.

Our observations of roAp candidates were performed with several different telescopes, instruments and filters. We used the Johnson B (λ_c = 4400 Å, FWHM = 950 Å), SDSS g^′ (4750, 1400) and Strömgren v (4100, 160) filters. Here is an overview of the basics characteristics of the telescopes and instruments.

1. Automatic Photoelectric Telescope (APT) T6 (0.75m) at Fairborn Observatory (Arizona, USA) 2. BOOTES-2, 0.6m RC telescope, EMCCD Andor iXon-889+ in Andalucía, Spain

Null results and new candidates from Strömgren-Crawford photometry 5

Table 1: continued.

HD/TYC BD/HIP/TYC HJD(start) Δt N Filter Site Upper Limit [2450000+] [min] [mmag] 242442 2390–208–1 7047.42182 98.6 190 g^′ BOOTES-2 1.4 245222 1869–1770–1 7063.43180 135.9 245 g^′ BOOTES-2 2.8 245416 2404–775–1 7045.53083 138.3 195 g^′ BOOTES-2 2.1 7048.49546 126.9 244 g^′ BOOTES-2 5.6 246587 1861–299–1 7046.44334 132.7 185 g^′ BOOTES-2 2.1 246726 2405–1110–1 7102.37786 122.9 711 B Suhora (gs8in) 1.5 247628 2409–1922–1 7100.36153 159.6 740 B Suhora (gs8in) 1.5 259380 2426–652–1 7072.48449 147.2 258 g^′ BOOTES-2 2.2 264291 1343–2532–1 7063.52746 88.3 160 g^′ BOOTES-2 2.2 266311 157–22–1 7059.51917 145.2 226 g^′ BOOTES-2 2.3 268471 1895–873–1 7047.49150 99.0 191 g^′ BOOTES-2 2.1 276625 2884–484–1 7050.30892 92.9 210 g^′ BOOTES-2 2.4 2320–605–1 +36 363 7036.19795 126.7 312 B Suhora (gs8in) 0.4 3009–62–1 +41 2144 7047.56523 86.6 224 g^′ BOOTES-2 2.5 3021–603–1 +38 2360 7052.53427 95.5 228 g^′ BOOTES-2 2.7 4520–578–1 13172 7036.33613 97.5 262 B Suhora (gs8in) 4.0 7045.43571 131.4 196 g^′ BOOTES-2 2.4 7048.28533 126.9 126 g^′ BOOTES-2 3.5

3. F(/Ph)otometric Robotic Atmospheric Monitor (FRAM-Auger) 0.3m FRAM-Auger Schmidt-Cassegrain, G4-16000 CCD telescope of the Pierre Auger Observatory (Malargüe, Argentina) 4. Masaryk University Observatory (MUO, Brno, Czech Republic), 0.6m, G2-4000 CCD 5. Sandvreten Observatory (Uppsala, Sweden), 0.406m, f/9 RC telescope, SBIG STL-6303 CCD 6. Mt. Suhora observatory (Poland)

– 0.034m refractor (MK), G2-402 CCD – 0.2m RC telescope (gs8in), SBIG ST-10 CCD – 0.6m Zeiss telescope, Apogee AltaU-47 CCD

The integration times varied between 10 and 30 s depending on the instrument and target brightness.

The photoelectric data of the APT were reduced by compensating for coincidence losses and subtracting sky background. Extinction corrections were determined with the standard Bouguer method from the target star data themselves.

The reductions of the time series CCD observations were performed using a standard technique. First, bias-subtraction, dark-correction and flat-fielding was applied. Then, differential aperture photometry was performed using two different program packages:

– Image Reduction and Analysis Facility (IRAF, Stetson 1987), – C-Munipack under Windows1.

To account for different seeing conditions, several apertures were used and tested. For each data set, we have chosen the aperture which yielded the smallest scatter in the differential target star light curves. If several comparison stars were available, these were checked individually to exclude variable objects.

The total reduced data set comprised 202 hours of observations in 59 different nights (Table 1). The time series analysis of the differential light curves was conducted applying a standard

1 http://c-munipack.sourceforge.net/

6 E. Paunzen et al.

Fourier technique and the Phase-Dispersion-Method. All computations were done within the programme package Peranso (Paunzen & Vanmunster 2016).

Defining the upper limit of variability is not straightforward and has often been discussed in the literature (Reegen et al. 2008). In general, the statistical significance of the noise in the Fourier spectrum is underestimated. We here employ a conservative approach and define the upper limit of variability as the upper envelope of the peaks in an amplitude spectrum (Fig. 1).

3 ANALYSIS AND RESULTS

The time series analysis of the targets revealed only upper limits for variability in the frequency range of the known roAp stars. The upper limits range from 0.3 to 9.8 mmag with a mean of 1.9 mmag and a median of 1.3 mmag. This is well in the range of other ground based surveys (Handler & Paunzen 1999; Joshi et al. 2016) with similar or larger telescopes. Although we have not detected any new roAp star, establishing the upper limits across the observed instability strip is also important for testing and improving models taking into account the excitation and visibility of pulsations under the influence of a magnetic field (Saio 2008). In this respect, it would be also interesting to examine, for example, the high precision Kepler Space Telescope (Murphy 2014) or K2 data for the absence of short-term variability among stars in this region of the Hertzsprung-Russell-diagram.

In the following, we want to discuss our results for the two already known roAp stars in more detail.

HD 12098: This star was reported as a roAp pulsator with a period of about 7.7 min by Girish et al. (2001). They presented photometric data in Johnson B for 16 individual nights with durations of one to nine hours. The reported amplitudes range from 0.38 to 1.47 mmag with a mean of 0.94 mmag. Such a strong amplitude variation was also found, for example, for the roAp star HD 217522 (Medupe et al. 2015) for which the amplitudes ranges from 2.0 mmag to be hidden in the noise (< 0.3 mmag). Another prominent case, among others, is HD 24355 (Holdsworth et al. 2016). This behaviour can be explained by the Oblique Pulsator Model (Kurtz 1982, Bigot & Kurtz 2011, Saio et al. 2012). Within this model, the amplitude can even approach a zero value depending on the inclination of the rotation axis to the line-of-sight as well as the magnetic to the rotation axis for a given rotation period. We observed HD 12098 in two consecutive nights and could not detect its variability in Strömgren v (Table 1), although our detection level should have permitted this. This case shows how important it is not only to have high quality observations during several nights but also to use a filter in the blue wavelength region (Medupe & Kurtz 1998).

HD 137909 (β CrB): Hatzes et al. (2004) detected pulsational variability in their radial velocity measurements with a period of 16.2 min (1.029 mHz) and an amplitude of about 140 m s^{−1}. Later, Kurtz et al. (2007) confirmed this period on the basis of individual lines of the first ionization stage of rare earth elements and in Hα. However, the amplitude was only 30 m s^{−1}. Since no recent photometric time series were found in the literature, we observed HD 137909 in seven nights with the APT (Table 1). Although we cannot claim a statistically significant detection, we found in two nights a peak above the noise level very close (1.042(17) and 1.046(16) mHz, respectively) to to the spectroscopic period. Within the errors, the photometric frequencies are in excellent agreement with the spectroscopic one. However, in the other five nights, no similar peaks are detected. In Fig. 1, the Fourier spectra of all nights are shown. Further photometric observations are needed to unambiguously confirm the spectroscopically found pulsational frequency. Again, the characteristics of the variability for HD 137909 show the desire for precise photometric as well as spectroscopic observations over more than one night.

In general, it seems that the capabilities of ground-based photometric observations to detect new roAp stars have reached their limits. Suitable telescopes and instrumentations need to achieve a time resolution of less than one minute in the blue wavelength region (i.e. Johnson B and Strömgren v filter) with a photometric accuracy in the sub-mmag region. At first sight,

Null results and new candidates from Strömgren-Crawford photometry 7

Fig. 1: The Fourier spectra of the observations for all nights (Table 1) of HD 137909 (β CrB). The spectroscopically detected frequency of 1.03 mHz is indicated by a vertical line.

current on-going ground-based photometric surveys such as ASAS (Pojmański 2009 and references therein) and SuperWASP (Pollacco et al. 2006), just to mention two, seem to neither have the time resolution nor the accuracy for this purpose (Bernhard et al. 2015; Hümmerich et al. 2016).

In this context, it is interesting to discuss the paper by Holdsworth et al. (2014a). These authors presented 350 stars which are variable on periods less than 30 min on the basis of SuperWASP data and concluded this variability is due to pulsation. The observations, using a broadband filter with a passband from 4000 to 7000 Å, are such that two consecutive 30 s integrations at a given pointing are typically repeated every 10 min. Such a time sampling is a-priori unfavourable for detecting variability in a period range up to 30 min. This situation can however be mitigated by a significant number of observations over a long time base which then cover the whole pulsational phase. Among the 15 known roAp stars in their sample, Holdsworth et al. (2014a) were able to detect one (HD 12932 with a published amplitude of 4 mmag in Johnson B). Other roAp stars of even higher amplitude, such as HD 99563 and HD 101065, were not detected. In addition to the cadence of the data, saturation of objects brighter than V < 8 mag may also play a significant role here. Most of the known roAp stars are brighter than that limit and therefore their pulsations are very difficult to detect in SuperWASP data. This might explain the non-detection of many known roAp stars.

8 E. Paunzen et al.

Holdsworth et al. (2014a) also selected 543 Ap stars from Renson & Manfroid (2009) on spectroscopic grounds and found no new roAp stars. This has to be taken into account when interpreting the results on the variability of the newly detected variables (as the authors themselves pointed out). In total, Holdsworth et al. (2014a) presented 10 out of the 350 variable objects as new roAp stars. Their reasoning that these are true roAp variables is based on classification resolution spectra and an enhancement of Sr, Cr and Eu, typical for CP2 stars (Ryabchikova & Romanovskaya 2017). However, another observable that distinguishes roAp variables from other pulsators is the typical Pr-Nd anomaly (Ryabchikova et al. 2004) that should be searched for by high resolution spectroscopy. Apart from that, independent confirmation of variability of these and the remaining > 300 stars and determination of its origin is desirable. Nevertheless, the capability of the SuperWASP data to detect new roAp stars on such a large scale is promising.

One way to provide a homogeneous study of the occurrence of the roAp phenomenon is the use of space-based data. Several roAp stars were found and analysed within the Kepler and K2 fields (Smalley et al. 2015) and references therein). Other roAp stars were investigated with BRITE-Constellation (Weiss et al. 2016), MOST (Gruberbauer et al. 2011) and WIRE (Bruntt et al. 2009) satellite missions. The next milestone is expected to be the upcoming TESS mission (Ricker et al. 2015). With a cadence of 2 min, a time-basis of up to one year and the predicted accuracy, it should be quite suitable to detect roAp stars in both hemispheres on a large scale. However, as TESS will observe in a very wide near infrared passband, it remains to be seen by how much the roAp pulsation amplitudes will be diminished in comparison to blue-filter data. Nevertheless, the TESS data set will provide a homogeneous view on both, noAp and roAp stars.

Another approach is the search for radial velocity shifts due to the pulsations (Ryabchikova et al. 2007; Kochukhov et al. 2013). The amplitudes can reach up to 5 km s^{−1} with typical values between 100 and 500 m s^{−1} (Elkin et al. 2005). Such accuracies are nowadays even achievable with a 60 cm telescope (Pribulla et al. 2015). However, the spectral and time resolution have to be appropriate for the expected pulsational period and line blending. But also here, the candidates have to be selected with care. Freyhammer et al. (2008), for example, observed nine luminous CP stars and found only upper limits for radial velocity amplitudes of 20 to 65 m s^{−1}. The 350 photometric variable candidates reported by Holdsworth et al. (2014a) are excellent targets for such observations. Last, but not least, one can also search for the typical Pr-Nd anomaly (Ryabchikova et al. 2004) in known CP stars using high resolution spectroscopy, as a spectroscopic signature of the roAp phenomenon that appears to be an abundance differences of second and first ions of Pr and Nd of at least 1.5 dex and up to 2.5 dex. Stars with this spectral feature then need to be tested for rapid photometric variations.

3.1 New Strömgren-Crawford photometric criteria to search for roAp stars

Although a significant number of stars were searched for roAp variability in the past, we want to estimate the amount of potential candidates not checked for pulsations to date. To this end, criteria to find such candidates have to be established. A basic selection can be done either by spectroscopic or photometric means (or by a combination of both). In the past, both approaches have been successfully applied (e.g. Handler & Paunzen 1999; Martinez et al. 2001; Paunzen et al. 2012).

For a spectroscopic-based selection, the catalogue by Renson & Manfroid (2009) and its previous versions have been used. Since the roAp stars are normally characterized as cool CP SrCrEu stars, they can be traced in this catalogue or at least the CP1 (Am/Fm) stars can be excluded as candidates. However, this catalogue is an inhomogeneous compilation which is outdated. A new version is very much needed to perform an assessment of possible roAp candidates, not yet photometrically investigated.

Null results and new candidates from Strömgren-Crawford photometry 9

For an efficient and viable selection based on photometry, systems are needed that provide parameters that are reddening free and are metallicity and luminosity sensitive. For such a purpose, only intermediate to narrow band photometric systems are suitable. This excludes the usage of the 2MASS (Skrutskie et al. 2006) measurements, for example. The same is true for the SDSS photometric system used for APASS (Henden et al. 2015). We mention just these two all-sky surveys because they (will) provide deep homogeneous photometric data from the UV to the NIR region. In principle, three well-known photometric systems are able to provide the required information: Geneva 7-colour (Golay 1972; Nicolet 1986), Strömgren-Crawford uvbyβ (Strömgren 1966), and Vilnius (Straižys & Sviderskiene 1972; Smriglio et al. 1986). Unfortunately, from these, only the Strömgren-Crawford system is nowadays still relatively widely used. In addition, it was also used for the roAp candidate selection in the past (Joshi et al. 2009).

In the literature, several definitions of the different photometric parameters within the Strömgren-Crawford system are available. Because sometimes different definitions are given, we list the ones used for our study, these are:

– [c_1] = c_1 – 0.19(b − y) – [m_1] = m_1 + 0.33(b − y) – [u − b] = (u − b) – 1.53(b − y) – a0 = 1.54[m_1] + 0.74r – 0.27 – r = 0.35[c_1] – β + 2.565

It is important to use the whole variety of these indices because they are sensitive to different parameters as briefly discussed in the following. All known roAp stars, besides one (KIC 7582608 with T_{eff} = 8700 K; Holdsworth et al. 2014b), fall in the “cool region” of T_{eff} ≤ 8500 K as defined by Napiwotzki et al. (1993). There, β and [m_1] are measures for T_{eff} and [c_1] an indicator for the Balmer discontinuity, thus the luminosity; [m_1] is also sensitive to metallicity. For the intermediate region (11000 K ≤ T_{eff} ≤ 8500 K), these indices are replaced by a0 and r. The [u− b] colour index is sensitive to T_{eff} throughout the whole range and was also used to calibrate CP stars (Mégessier 1988). Although there are three different indices which are sensitive to T_{eff}, this is vital for the study of CP stars because they exhibit significant flux depressions at 4100, 5200, and 6300 Å (Adelman 1980). Measuring T_{eff} using different spectral regions avoids the introduction of systematics in the analysis.

Often, the δc_1 and δm_1 indices were applied to select targets (Joshi et al. 2006). Both indices are defined as the deviation from a standard line of unreddened, solar abundant, mainsequence stars such that they are negative for stars with overbundances of elements. One has to keep in mind that δc_1 is also sensitive to luminosity. The standard line can be defined either by observational data or by stellar atmosphere models and synthetic photometry. Thus, the calculation of δc_1 and δm_1 is not straightforward and the interpretation of these indices can be ambiguous.

We now evaluate how the regions of known noAp and roAp stars overlap in the different photometric Strömgren-Crawford diagrams. For this, lists for both groups are needed.

We have searched the literature for stars which were investigated for roAp variability. Of course, these investigations were performed with different instruments and filters. Also the overall quality of the observing nights, the time base, and cadence play a role. It is therefore not really possible to compare directly all these different sources when it comes to define to which limit a star does not show any roAp variability (see also the discussion above about amplitude variations over time). We used the following 21 references to generate a list of noAp objects

– Kurtz (1984) – Matthews & Wehlau (1985) – Heller & Kramer (1988)

10 E. Paunzen et al.

Fig. 2: The location of 416 noAp (open circles) and 42 roAp (filled circles) within three reddening free Strömgren-Crawford uvbyβ diagrams. The red lines denote the boxes defined from the known roAp stars in which we searched for new candidates.

– Matthews et al. (1988) – Belmonte (1989) – Kurtz (1989) – Martinez (1989) – Weiss & Schneider (1989) – Kreidl (1991) – Nelson & Kreidl (1993) – Schutt (1993) – Martinez & Kurtz ( 1994) – Dorokhova & Dorokhov (1998) – Handler & Paunzen (1999) – Martinez et al.( 2001) – Joshi et al. (2006) – Joshi et al. (2009) – Paunzen et al. (2012) – Paunzen et al. (2013) – Paunzen et al. (2015) – Joshi et al. (2016)

Null results and new candidates from Strömgren-Crawford photometry 11

Table 2: The list of 4646 new roAp candidates selected on the basis of Strömgren-Crawford uvbyβ diagrams. The errors are taken from Paunzen (2015).

TYC V σV N (b − y) σ(b − y) N [m_1] σ[m_1] N [c_1] σ[c_1] N β σβ N 5-334-1 9.000 1 0.208 1 0.169 1 0.740 1 2.732 1 5-958-1 8.430 1 0.173 1 0.242 1 0.742 1 2.779 1 11-1234-1 8.014 0.013 4 0.229 0.003 4 0.164 0.006 4 0.698 0.013 4 2.719 0.003 2 13-974-1 7.663 0.024 2 0.104 0.001 2 0.211 0.001 2 0.914 0.008 2 2.847 1 19-1437-1 6.098 0.016 3 0.154 0.005 3 0.194 0.007 3 0.805 0.021 3 2.796 0.007 3 20-386-1 8.122 0.004 2 0.179 0.001 2 0.196 0.004 2 0.799 0.015 2 2.774 1 23-173-1 7.590 1 0.183 1 0.176 1 0.798 1 2.750 1 23-524-1 9.650 1 0.187 1 0.199 1 0.732 1 2.762 1 25-677-1 8.550 1 0.170 1 0.192 1 0.777 1 2.762 1 27-637-1 8.370 1 0.181 1 0.194 1 0.708 1 2.739 1 31-919-1 8.666 1 0.172 1 0.235 1 0.804 1 2.806 1 32-127-1 8.390 1 0.199 1 0.183 1 0.720 1 2.754 1 32-385-1 8.860 1 0.202 1 0.178 1 0.687 1 2.721 1 35-339-1 9.360 1 0.188 1 0.171 1 0.725 1 2.750 1 41-782-1 8.257 0.011 2 0.194 0.001 2 0.171 0.007 2 0.674 0.008 2 2.745 1 41-820-1 8.300 1 0.168 1 0.182 1 0.771 1 2.759 1 Only a portion of this table is shown here to demonstrate its form and content. A machine-readable version of the full table is available.

In total, the final list (available in electronic form) includes 620 stars from which 109 objects have been found in more than one reference. For the next step, the 61 roAp stars listed in Joshi et al. (2016) were taken and all objects searched for uvbyβ colors in the catalogue by Paunzen (2015). This catalogue includes only stars with Tycho identifiers and is therefore limited to objects brighter than 15th magnitude (98% of the stars in that catalogue are between 4th and 12th magnitude). In the following, only stars with complete uvbyβ measurements can and will be considered. Those are 416 (67% of all noAp) and 42 (69% of all roAp) objects, i.e. a representative number for both subgroups.

In Fig. 2 we present three diagrams of unreddened indices: β versus [m_1], [c_1] versus [m_1] and r versus a0. It is obvious that the blue boundary of the roAp phenomenon is well defined and a significant number of objects hotter than the known roAp stars have already been observed. However, the red border appears more fuzzy. The reddest star in these diagrams is HD 101065 (Przybylski’s Star), but also HD 69013 and HD 143487 are located in the region with a0 > 0.3. These stars also have the largest [m_1] and [u − b] values. For HD 101065, several detailed investigations are available in the literature. Shulyak et al. (2010) concluded that there is nothing special in HD 101065 compared to other known cool CP and roAp stars except its relatively low T_{eff} (6 400 K) and a high abundance of rare earth elements. Erroneous measurements of uvbyβ can also be excluded as a cause for the outstanding location in the diagrams because there are four consistent different references over almost two decades available. Therefore, the range for the search of roAp candidates on the basis of Strömgren-Crawford uvbyβ colours should be significantly extended to cooler CP stars. In this respect, it is especially interesting to study the possible overlap with solar-type oscillations which are in the same frequency region, but according to theory should be suppressed by the effects of the magnetic field that are required to excite roAp pulsations (Balmforth et al. 2001). Helioseismology found that the mode amplitudes of solar acoustic oscillations are anti-correlated with solar magnetic activity.

Using the diagrams shown in Fig. 2, we define new and extended boundaries for the location of known roAp stars for a further search of other variable stars of this type:

12 E. Paunzen et al.

0.58 > [m_1] > 0.22 1.40 > [u − b] > 1.00 0.54 > a0 > 0.10 [3.2 − (0.95 ∗ [m_1])] > β > [2.94 − (0.95 ∗ [m_1])] [1.75 − (3.1 ∗ [m_1])] > [c_1] > [1.25 − (3.1 ∗ [m_1])] [0.16 − (0.5 ∗ a0)] > r > 0.5 ∗ a0

Applying these relations to the catalogue by Paunzen (2015), we find a list (available in electronic form) of 4646 new candidates (Table 2). This sample is intentionally a-priori unbiased by any additional spectral type information, and can be used as a starting point for searches for roAp variables.

Criteria for selecting roAp candidates from Strömgren-Crawford photometry can be manifold. For instance, comparing with the boundaries of the roAp phenomenon as defined by Joshi et al. (2016), who use different parameters (and exclude HD 101065), more stars satisfy our criteria. The main reasons are that we do allow for measurement errors, and for a possible extension of the borders of the roAp domain compared to current knowledge. Ideally, one would desire an inspection of all stars from our sample to define (non)variability. Such a large sample can only be comprehensively investigated with data already collected by automatic surveys or by forthcoming space photometry missions.

4 CONCLUSIONS

We investigated some characteristics of noAp and roAp stars using the available data from the literature and new photometric observations. These stars are interesting because the driving mechanism of their oscillation modes is most probably due to the “classical” κ-mechanism operating in the hydrogen ionisation zone, with some possible contributions by turbulent pressure (Cunha et al. 2013). The roAp stars possess a structured and stable magnetic field which triggers diffusion and stratification of chemical elements. The latter leads to strong chemical peculiarities on the stellar surface (spots) which give the possibility to directly measure the rotational period due to light variations. Such a combination is unique among the stars of the upper main sequence where convection does not dominate the outer stellar atmosphere.

An enormous effort was spent in the last three decades to search for roAp stars. The detection of these variables is made difficult by the low pulsation amplitudes (typically only a few mmag) that are largest in the blue optical spectral region and the excited period range (five to twenty five minutes). Other complicating facts are that the amplitudes can vary strongly even between consecutive nights, and that the amplitudes can be so low (or even zero according to the Oblique Pulsator Model) that they are undetectable from the ground. This also makes the definition of a noAp star, i.e. an object that does not pulsate, difficult; one always has to include the upper limit for a given time basis and filter.

The results of our new observations of 55 stars (202 hours in 59 different nights) were combined with already published ones for apparent noAp and roAp stars. For the objects with available Strömgren-Crawford uvbyβ photometry, reddening-free diagrams were generated and analysed. From these diagrams we concluded that the blue border of the observed roAp instability strip is well determined and investigated. The opposite is true for the red border where still only a small number of possible candidates have been observed. On the basis of these diagrams, we defined limits for [m_1], [c_1], [u − b], a0, r and β in which we searched for new roAp candidates. In total, we found 4646 stars brighter than 15th magnitude. We suggest to use surveys like SuperWASP or the forthcoming TESS mission to search for pulsation in these stars.

Null results and new candidates from Strömgren-Crawford photometry 13

On the basis of the published and newly observed data for HD 12098 and HD 137909, we discussed the necessity of high quality photometric observations in several nights to establish variability for this star group. This difficulty may be overcome by searching for radial velocity variability or the unique Pr-Nd anomaly present in roAp stars, followed by a photometric search.

Further ground and space based efforts are very much needed to shed more light on the roAp phenomenon. In particular, an analysis of the possible connection with solar-type oscillations is necessary to understand the changes from radiative to convective dominated stellar atmospheres and their different/common pulsational behaviour in the presence of a magnetic field.

Acknowledgements This project was supported by the grant 7AMB14AT030 (MŠMT). We would like to thank the Pierre Auger Collaboration for the use of its facilities. The operation of the robotic telescope FRAM was supported by the EU grant GLORIA (No. 283783 in FP7- Capacities program) and by the grant of the Ministry of Education of the Czech Republic (MŠMT-ČR LM2016038). The data calibration and analysis related to the FRAM telescope is supported by the Ministry of Education of the Czech Republic MŠMT-ČR LG15014 and EU-MŠMT CZ.02.1.01/0.0/0.0/16 013/0001402. The operation of the Fairborn APT is secured by the Polish NCN grant 2015/18/A/ST9/00578.

References

Adelman, S. J. 1980, A&A, 86, 149 Balmforth, N. J., Cunha, M. S., Dolez, N., et al. 2001, MNRAS, 323, 362 Belmonte, J. A. 1989, PhD Thesis, Universidad de La Laguna, Tenerife, España Bernhard, K., Hümmerich, S., & Paunzen E. 2015, Astron. Nachr., 336, 981 Bigot, L., & Kurtz, D. W. 2011, A&A, 536, A73 Bruntt, H., Kurtz, D. W., Cunha, M. S., et al. 2009, MNRAS, 396, 1189 Cunha, M. 2002, MNRAS 333, 47 Cunha, M., Alentiev, D., Brandão, I. M., & Perraut, K. 2013, MNRAS, 333, 47 Dorokhova ,T. N., & Dorokhov, N. I. 1998, Contrib. Astron. Obser. Skalnate Pleso, 27, 338 Elkin, V. G., Kurtz, D. W., & Mathys, G. 2005, MNRAS, 364, 864 Freyhammer, L. M., Kurtz, D. W., Cunha, M. S., et al. 2008, MNRAS, 385, 1402 Girish, V., Seetha, S., Martinez, P., et al. 2001, A&A, 380, 142 Golay, M. 1972, Vistas in Astronomy, 14, 13 Gruberbauer, M., Huber, D., Kuschnig, R., et al. 2011, A&A, 530, A135 Handler, G., & Paunzen, E. 1999, A&AS, 135, 57 Hatzes, A. P., & Mkrtichian, D. E. 2004, MNRAS, 351, 663 Heller, C. H., Kramer, K. S. 1988, PASP, 100, 583 Henden, A. A., Levine, S., Terrell D., Welch D. L. 2015, in American Astronomical Society Meeting Abstracts, Vol. 225, American Astronomical Society Meeting Abstracts, #336.16 Holdsworth, D. L. 2016, IBVS, No. 6185 Holdsworth, D. L., Smalley, B., Gillon, M., et al. 2014, MNRAS, 439, 2078 Holdsworth, D. L., Smalley, B., Kurtz, D. W., et al. 2014, MNRAS, 443, 2049 Holdsworth, D. L., Kurtz, D. W., Smalley, B., et al. 2016, MNRAS, 462, 876 Hümmerich, S., Paunzen, E., & Bernhard, K. 2016, AJ, 152, 104 Joshi, S., Mary, D. L., Martinez, P., et al. 2006, A&A, 455, 303 Joshi, S., Mary, D. L., Chakradhari, N. K., et al. 2009, A&A, 507, 1763 Joshi, S., Martinez, P., Chowdhury, S., et al. 2016, A&A, 590, A116 Kochukhov, O., Alentiev, D., Ryabchikova, T., et al. 2013, MNRAS, 431, 2808

14 E. Paunzen et al.

Kreidl, T. J. 1991, MNRAS, 248, 701 Kurtz, D. W. 1982, MNRAS, 200, 807 Kurtz, D. W. 1984, MNRAS, 206, 247 Kurtz, D. W. 1989, MNRAS, 238, 261 Kurtz, D. W., Elkin, V. G., & Mathys, G. 2007, MNRAS, 380, 741 Kurtz, D. W., Cunha, M. S., Saio, H., et al. 2011, MNRAS, 414, 2550 Martinez, P. 1989, MNRAS, 238, 439 Martinez, P., & Kurtz, D. W. 1994, MNRAS, 271, 129 Martinez, P., Kurtz, D. W., Ashoka, B. N., et al. 2001, A&A, 694, 165 Matthews, J. M., & Wehlau, W. H. 1985, PASP, 97, 841 Matthews, J. M., Kreidl, T. J., & Wehlau, W. H. 1988, PASP, 100, 255 Medupe, R., & Kurtz, D. W. 1998, MNRAS, 299, 371 Medupe, R., Kurtz, D. W., Elkin, V. G., et al. 2015, MNRAS, 446, 1347 Mégessier, C. 1988, A&AS, 72, 551 Murphy, S. J. 2014, PhD thesis, Jeremiah Horrocks Institute, University of Central Lancashire, Preston, UK Napiwotzki, R., Schoenberner, D., & Wenske, V. 1993, A&A, 268, 653 Nelson, M. J., & Kreidl, T. J. 1993, AJ, 105, 1903 Nicolet, B. 1986, Baltic Astronomy, 5, 417 Paunzen, E. 2015, A&A, 580, A23 Paunzen, E., & Vanmunster, T. 2016, Astron. Nachr., 337, 239 Paunzen, E., Netopil, M., Rode-Paunzen, M., et al. 2012, A&A, 542, A89 Paunzen, E., Handler, G., Netopil, M., et al. 2013, IBVS, No. 6058 Paunzen, E., Netopil, M., Rode-Paunzen, M., et al. 2015, A&A, 575, A24 in ASP Conf. Ser. Vol. 43, Sky Surveys., ed., T. B. Soifer (San Francisco: ASP), 267 Pojmański, G. 2009, in ASP Conf. Ser. Vol. 403, The Variable Universe: A Celebration of Bohdan Paczyński, ed., K. Z. Stanek (San Francisco: ASP), 52 Pollacco, D. L., Skillen, I., Collier Cameron, A., et al. 2006, PASP, 118, 1407 Pribulla, T., Garai, Z., Hambálek, L., et al. 2015, Astron. Nachrichten, 336, 682 Reegen, P., Gruberbauer, M., Schneider, L., et al. 2008, A&A, 484, 601 Renson, P., & Manfroid, J. 2009, A&A, 498, 961 Ricker, G. R., Winn, J. N., Vanderspek, R., et al. 2015, Journal of Astronomical Telescopes, Instruments, and Systems 1(1), 014003 Ryabchikova, T. A., & Romanovskaya, A. M. 2017, Astronomy Letters, 43, 252 Ryabchikova, T., Nesvacil, N., Weiss, W. W., et al. 2004, A&A, 423, 705 Ryabchikova, T., Sachkov, M., Weiss, W. W., et al. 2007, A&A, 462, 1103 Sachkov, M., Hareter, M., Ryabchikova, T., et al. 2011, MNRAS, 416, 2669 Saio, H. 2008, Journal of Physics: Conference Series, Volume 118, id. 012018 Saio, H., Gruberbauer, M., Weiss, W. W., et al. 2012, MNRAS, 420, 283 Schutt, R. L. 1993, PASP, 105, 22 Shulyak, D., Ryabchikova, T., Kildiyarova, R., et al. 2010, A&A, 520, A88 Skrutskie, M. F., Cutri, R. M., Stiening, R., et al. 2006, AJ, 131, 1163 Smalley, B., Niemczura, E., Murphy, S. J., et al. 2015, MNRAS, 452, 3334 Smriglio, F., Boyle, R. P., Straizys, V., et al. 1986, A&AS, 66, 181 Stello, D., Cantiello, M., Fuller, J., et al. 2016, Nature, 529, 364

Null results and new candidates from Strömgren-Crawford photometry 15

Stetson, P. B. 1987, PASP, 99, 191 Straižys, V., & Sviderskiene, Z. 1972, A&A, 17, 312 Strömgren, B. 1966, ARA&A, 4, 433 Weiss, W. W., & Schneider, H. 1989, A&A, 224, 101 Weiss, W. W., Fröhlich, H.-E., Pigulski, A., et al. 2016, A&A, 588, A54 White, T. R., Bedding, T. R., Stello, D., et al. 2011, MNRAS, 415, 1638

This paper was prepared with the RAA L^ATEX macro v1.2.