arXiv:1804.02703v2 [astro-ph.HE] 3 Jul 2018

MNRAS 000, 1–21 (0000) Preprint 6 May 2019 Compiled using MNRAS L^ATEX style file v3.0

A high-density relativistic reflection origin for the soft and hard X-ray excess emission from Mrk 1044

L. Mallick^1,^⋆ W. N. Alston^2,† M. L. Parker^3,‡ A. C. Fabian^2, C. Pinto^2, G. C. Dewangan^1, A. Markowitz^{4,5}, P. Gandhi^6, A. K. Kembhavi^1, R. Misra^1

1 Inter-University Centre for Astronomy and Astrophysics, Post Bag 4, Ganeshkhind, Pune 411007, India 2 Institute of Astronomy, University of Cambridge, Madingley Road, Cambridge CB3 0HA, UK 3 European Space Astronomy Centre (ESA/ESAC), E-28691 Villanueva de la Cañada, Madrid, Spain 4 Nicholas Copernicus Astronomical Center, ul. Bartycka 18, PL-00-716 Warsaw, Poland 5 Center for Astrophysics and Space Sciences, Univ. of California, San Diego, MC 0424, La Jolla, California, 92093-0424, U.S.A. 6 School of Physics and Astronomy, University of Southampton, Highfield, Southampton SO17 1BJ, UK

6 May 2019

ABSTRACT We present the first results from a detailed spectral-timing analysis of a long (∼130 ks) XMM-Newton observation and quasi-simultaneous NuSTAR and Swift observations of the highly-accreting narrow-line Seyfert 1 galaxy Mrk 1044. The broadband (0.3−50 keV) spectrum reveals the presence of a strong soft X-ray excess emission below ∼1.5 keV, iron K_α emission complex at ∼6−7 keV and a ‘Compton hump’ at ∼15−30 keV. We find that the relativistic reflection from a high-density accretion disc with a broken power-law emissivity profile can simultaneously explain the soft X-ray excess, highly ionized broad iron line and the Compton hump. At low frequencies ([2 − 6] × 10^{−5} Hz), the power-law continuum dominated 1.5−5 keV band lags behind the reflection dominated 0.3−1 keV band, which is explained with a combination of propagation fluctuation and Comptonization processes, while at higher frequencies ([1 − 2] × 10^{−4} Hz), we detect a soft lag which is interpreted as a signature of X-ray reverberation from the accretion disc. The fractional root-mean-squared (rms) variability of the source decreases with energy and is well described by two variable components: a less variable relativistic disc reflection and a more variable direct coronal emission. Our combined spectral-timing analyses suggest that the observed broadband X-ray variability of Mrk 1044 is mainly driven by variations in the location or geometry of the optically thin, hot corona.

Key words: black hole physics—accretion, accretion discs—relativistic processes— galaxies: active—galaxies: Seyfert— galaxies: individual: Mrk 1044

1 INTRODUCTION

The basic mechanism underlying the activity of active galactic nuclei (AGN) is the accretion of matter onto the central supermassive black holes (SMBHs) of mass MBH ∼ 10^5 − 10^{10} M⊙. AGN are the most luminous (10^{41} − 10^{47} erg s^{−1}) persistent sources of electromagnetic radiation in the universe and have been the centre of interest for several reasons. They are considered as the only probes to determine the changing demographics and accretion history of SMBHs with cosmic time. The evolution of galaxies is closely linked with the growth and energy output from SMBHs (e.g.

⋆ Email: labani@iucaa.in (LM) † Email: wna@ast.cam.ac.uk (WNA) ‡ Email: mparker@sciops.esa.int (MLP)

Kormendy & Ho 2013). The feedback from AGN can regulate the star formation in their host galaxies and hence play a key role in galaxy evolution (see e.g. Fabian 2012).

AGN emit over the entire electromagnetic spectrum, from radio to gamma-rays, with each waveband allowing us to probe different aspects of the physics of accretion onto the central SMBH. The broadband X-ray spectrum of a large fraction of AGN generally consists of the following main components: a primary power-law continuum, a soft X-ray excess emission below ∼ 2 keV, iron (Fe) K emission complex at around 6−7 keV, Compton hump above 10 keV and complex absorption. The power-law continuum is thought to be produced by inverse-Compton scattering of lower energy optical/UV seed photons from the accretion disc in a corona consisting of hot electrons (Sunyaev & Titarchuk 1980; Haardt & Maraschi 1991, 1993). The X-ray contin-

© 0000 The Authors

2 L. Mallick et al.

uum emission from the hot corona is bent down onto the accretion disc due to strong gravity and gives rise to Xray reflection features by the processes of Compton scattering, photoelectric absorption, fluorescent line emission and bremsstrahlung (Ross & Fabian 2005). The most notable reflection feature is the Fe K complex in the 6−7 keV energy range. The reflection spectrum is blurred by the combination of Doppler shifts, relativistic beaming and gravitational redshifts in the strong gravitational field very close to the black hole (Fabian et al. 1989; Laor 1991). Moreover, we observe absorption features in the X-ray spectrum which can be caused by the presence of absorbing clouds along the line-of-sight or wind launched from the surface of the accretion disc (e.g. Pounds et al. 2003; Tombesi et al. 2011; Reeves et al. 2014; Parker et al. 2017; Pinto et al. 2018).

The broad Fe Kα emission line and soft X-ray excess emission are considered as direct probes available for the innermost accretion disc and black hole spin. However, the physical origin of the soft excess (SE) emission in many AGN remains highly debated (e.g. Crummy et al. 2006; Done et al. 2012). The SE can be modelled physically by thermal Comptonization of the optical/UV seed photons in an optically thick, warm corona (e.g. Dewangan et al. 2007; Lohfink et al. 2012; Porquet et al. 2018) and/or relativistically broadened lines from the inner ionized accretion disc (e.g. Crummy et al. 2006; Fabian et al. 2009; Nardini et al. 2011; Garćia et al 2014). Recently, Garćia et al (2016) have attempted to solve this issue by providing a new reflection model where the density of the disc atmosphere is a free parameter varying over the range ne = 10^{15} − 10^{19} cm^{−3}. The main effect of high-density on the reflection model occurs below 3 keV and is very important for powerful coronae and low-mass, highly-accreting black holes. The high-density relativistic reflection model has been successfully applied in one black-hole binary Cygnus X-1 (Tomsick et al. 2018) and one AGN IRAS 13224–3809 (Jiang et al. 2018).

AGN are variable in all wavebands over timescales from a few seconds to years depending upon the physical processes they are governed by. The X-ray emission from AGN is ubiquitous and shows strong variability which depends on energy and flux of the source (e.g. Markowitz et al. 2007; Vaughan et al. 2011; Alston, Vaughan & Uttley 2013; Parker et al. 2015; Mallick et al. 2017; Alston et al. 2018). This strong variability implies that the X-ray emission is originated in the inner regions of the central engine. Despite many efforts to understand the variable AGN emission, the exact origin of the energy-dependent variability of AGN is not clearly understood because of the presence of multiple emission components and the interplay between them. There are a few approaches that can probe the nature and origin of energy-dependent variability in AGN. One compelling approach is to measure the time-lag between different energy bands of X-ray emission (e.g. Papadakis et al. 2001; McHardy et al. 2004; Arévalo et al. 2006; Arévalo, McHardy & Summons 2008). The measured time lag could be both frequency and energy dependent (e.g. De Marco et al. 2011; Kara et al. 2014). Depending on the source geometry and emission mechanism, the time lags have positive and/or negative values. The positive or hard lag refers to the delayed hard photon variations relative to the soft photons and is detected at relatively low frequencies. The hard lag was first seen in X-ray binaries (e.g. Miyamoto et al. 1988; Nowak et al. 1999; Kotov, Churazov & Gilfanov 2001). The origin of positive or hard lag is explained in the framework of viscous propagation fluctuation scenario (Kotov, Churazov & Gilfanov 2001; Arévalo & Uttley 2006; Uttley et al. 2011; Hogg & Reynolds 2016). The negative or soft time-lag (soft photon variations are delayed with respect to the hard photons) is usually observed at higher frequencies. The soft lag was first discovered in one lowmass bright AGN 1H 0707–495 (Fabian et al. 2009) and interpreted as a sign of the reverberation close to the black hole (e.g. Zoghbi et al. 2010; Emmanoulopoulos et al. 2011; Zoghbi et al. 2012; Cackett et al. 2013; Kara et al. 2014). The alternative justification for soft lag is the reflection from distant clouds distributed along the line sight or the accretion disc wind (Miller et al. 2010).

Another important perspective to probe the origin of energy-dependent variability is to examine the fractional root-mean-squared (rms) variability amplitude as a function of energy, the so-called fractional rms spectrum (Edelson et al. 2002; Vaughan et al. 2003). The modelling of the fractional rms spectra can shed light on the variable emission mechanisms and has been performed in a handful of AGN (e.g. MCG–6-30-15: Miniutti et al. 2007, 1H 0707– 495: Fabian et al. 2012, RX J1633.3+4719: Mallick et al. 2016, PG 1404+226: Mallick & Dewangan 2017, Ark 120: Mallick et al. 2017). This tool acts as a bridge between the energy spectrum and the observed variability and can effectively identify the constant and variable emission components present in the observed energy spectrum. It provides an orthogonal way to probe the variable components and the causal connection between them. Moreover, the Fourier frequency-resolved fractional rms spectrum allows us to understand both frequency and energy dependence of variability and hence different physical processes occurring on various timescales.

Here we perform the broadband (0.3−50 keV) spectral and timing studies of the highly-accreting AGN Mrk 1044 using data from XMM-Newton, Swift and NuSTAR. We explore the new high-density relativistic reflection model as the origin of both soft and hard X-ray excess emission as well as the underlying variability mechanisms in the source. Mrk 1044 is a radio-quiet narrow-line Seyfert 1 galaxy at redshift z = 0.016. The central SMBH mass of Mrk 1044 obtained from the H_β reverberation mapping is 3 × 10^6M⊙ (Wang & Lu 2001; Du et al. 2015). The dimensionless mass accretion rate as estimated by Du et al. (2015) using the standard thin disc equation is ṁ =^{Ṁc2}_{LE} =

20.1

(_{l44} cosi )_{3/2} (_{MBH} 107 M⊙ )_{−2} = 16.6^{+25.1}_{−10.1} , where LE is the Eddington luminosity, MBH is the SMBH mass, i is the disc inclination angle, l44 = L5100 /10^{44} erg s^{−1} where L5100 represents the AGN continuum luminosity at the rest frame wavelength of 5100Å.

The paper is organized as follows. In Section 2, we describe the observations and data reduction method. In Section 3, we present the broadband (0.3−50 keV) spectral analysis and results. In Section 4, we present the timing analysis and results. In Section 5, we present the energy-dependent variability study of the source in different Fourier frequencies. We summarize and discuss our results in Section 6.

MNRAS 000, 1–21 (0000)

High-density disc reflection in Mrk 1044 3

2 OBSERVATIONS AND DATA REDUCTION

2.1 XMM-Newton

XMM-Newton (Jansen et al. 2001) observed Mrk 1044 on 27th January 2013 (Obs. ID 0695290101) with a total duration of ∼ 130 ks. We analyzed the data from the European Photon Imaging Camera (EPIC-pn; Strüder et al. 2001) and Reflection Grating Spectrometer (RGS; den Herder et al. 2001). The EPIC-pn camera was operated in the small window (sw) mode with the thin filter to decrease pile up. The log of XMM-Newton/EPIC-pn observation used in this work is shown in Table 1. The data sets were processed with the Scientific Analysis System (sas v.15.0.0) and the updated (as of 2017 December 31) calibration files. We processed the EPIC-pn data using epproc and produced calibrated photon event files. We filtered the processed pn events with pattern⩽ 4 and flag== 0 by taking both single and double pixel events but removing bad pixel events. To exclude the proton flare intervals, we created a gti (Good Time Interval) file above 10 keV for the full field with the rate< 0.5 cts s^{−1} using the task tabgtigen and acquired the maximum signal-to-noise. We examined for the pile-up with the task epatplot and did not find any pile-up in the EPIC-pn data. We extracted the source spectrum from a circular region of radius 30 arcsec centred on the source and the background spectrum from a nearby source free circular region with a radius of 30 arcsec. We produced the Redistribution Matrix File (rmf) and Ancillary Region File (arf) with the sas tasks rmfgen and arfgen, respectively. We extracted the background-subtracted, deadtime and vignetting corrected source light curves for different energy bands from the cleaned pn event file using the task epiclccorr. Finally, we grouped the EPIC-pn spectral data in order to oversample by at least a factor of 5 and to have a minimum of 20 counts per energy bin with the task specgroup. The net count rate estimated for EPIC-pn is (17.48 ± 0.01) cts s^{−1} resulting in a total of 1.26 × 10^6 pn counts.

We processed the RGS data with the task rgsproc. The response files were produced using the sas task rgsrmfgen. We combined the spectra and response files for RGS 1 and RGS 2 using the task rgscombine. Finally, we grouped the RGS spectral data with a minimum of 25 counts per energy bin using the ftools (Blackburn 1995) task grppha.

2.2 NuSTAR

Mrk 1044 was observed with the NuSTAR telescope (Harrison et al. 2013) on February 8, 2016 (Obs.ID 60160109002) starting at 07:31:08 UT with a total duration of ∼ 40 ks with its two co-aligned focal plane modules FPMA and FPMB. The observation log of NuSTAR is shown in Table 1. We analyzed the data sets with the NuSTAR Data Analysis Software (nustardas) package (v.1.6.0) and the updated (as of 2017 December 31) calibration data base (version 20170222). We produced the calibrated and cleaned photon event files with the task nupipeline. We used the script nuproducts to extract the source spectra and light curves from a circular region of radius 50 arcsec centred on the source while the background spectrum and light curves were extracted from two same-sized circular regions free from source contamination and the edges of the CCD. We generated the background-subtracted FPMA and FPMB light curves with the ftools task lcmath. Finally, we grouped the spectra using the grppha tool with a minimum of 30 counts per bin. The net count rate is ∼ 0.18 cts s^{−1} resulting in a total of ∼ 4000 counts with the net exposure time of about 22 ks for both FPMA and FPMB.

2.3 Swift

Swift (Gehrels et al. 2004) observed Mrk 1044 several times with one observation quasi-simultaneous with NuSTAR on February 8, 2016 (Obs.ID 00080912001) starting at 12:09:57 UT for a total duration of ∼ 6.2 ks. The details of the Swift observations used in this work are listed in Table 1. Here we analyzed the data from the X-Ray Telescope (XRT; Burrows et al. 2005) with the XRT Data Analysis Software (xrtdas) package (v.3.2.0) and the recent (as of 2017 December 31) calibration data base (version 20171113). We generated the cleaned event files with the task xrtpipeline. We have extracted the source spectra from a circular region of radius 40 arcsec centred on the source position and background spectra were produced from a nearby source free circular region of radius 40 arcsec with the script xrtproducts. We combined the spectra and response files for all observations with the tool addascaspec. Finally, we grouped the spectral data with the grppha tool so that we had a minimum of 20 counts per energy bin. The total net XRT count rate is ∼ 0.6 cts s^{−1} resulting in a total of ∼ 16500 counts with the net exposure time of ∼ 29.4 ks.

3 BROADBAND (0.3−50 keV) SPECTRAL ANALYSIS: A FIRST LOOK

We performed the spectral analysis of Mrk 1044 in xspec v.12.9.0n (Arnaud 1996) and spex^1 v.3.04.00 (Kaastra, Mewe & Nieuwenhuijzen 1996). We employed the χ^2 statistics and estimated the errors at the 90 per cent confidence limit corresponding to Δχ^2 = 2.71, unless specified otherwise.

3.1 The 3−10 keV EPIC-pn spectrum

AGN are well known to exhibit a complex soft X-ray excess below ∼ 2 keV and hence we first focused on the hard X-ray emission above 3 keV. We begin the spectral analysis by fitting the 3−10 keV EPIC-pn spectrum of Mrk 1044 with a simple power-law (zpowerlw) corrected by the Galactic absorption model (tbabs) assuming the cross-sections and solar interstellar medium (ISM) abundances of Asplund et al. (2009). The Galactic neutral hydrogen column density was fixed at NH = 3.6 × 10^{20} cm^{−2} (Willingale et al. 2013). The fitting of the 3−10 keV data with the tbabs×zpowerlw model provided an unacceptable fit with χ^2/d.o.f = 220.2/165 and a strong residual in the Fe K region (6−7 keV) as shown in Figure 1 (left). In order to assess the presence of a neutral Fe K emission from the ‘torus’ or other distant material, we model an emission line

1 https://www.sron.nl/spex

MNRAS 000, 1–21 (0000)

4 L. Mallick et al.

Table 1. XMM-Newton/EPIC-pn, NuSTAR and Swift/XRT observations of Mrk 1044. The net exposure time is the live time of the instrument after background filtering.

Satellite Camera Obs. ID Date Net exposure Net count rate (yyyy-mm-dd) (ks) (counts s^{−1})

XMM-Newton EPIC-pn 0695290101 2013-01-27 72.0 17.5

NuSTAR FPMA 60160109002 2016-02-08 21.7 0.18

FPMB 60160109002 2016-02-08 21.6 0.18

Swift XRT 00035760001 2007-07-25 3.0 0.71

00035760002 2007-08-01 7.6 0.32

00035760003 2008-03-02 5.5 0.21

00091316001 2012-06-05 3.0 1.66

00080912001 2016-02-08 6.1 0.59

00093018003 2017-09-08 4.1 0.72

Figure 1. Left: The XMM-Newton/EPIC-pn 3−10 keV spectrum, the zpowerlw model (Γ = 1.96) modified by the Galactic absorption and the residuals. A strong residual in the Fe K region (6−7 keV) is clearly seen. The data are binned up for clarity. Right: The EPIC-pn 3−10 keV spectrum, the best-fitting phenomenological model, tbabs×(zgauss1+zgauss2+zpowerlw) and the residual spectrum. The model consists of an absorbed power-law along with narrow and broad iron emission lines.

that is expected to be unresolved by the EPIC-pn camera. Any additional broad contribution to the line profile would then come from material closer to the black hole, e.g., the inner disc. Therefore, we first added one narrow Gaussian line (zgauss1) to model the neutral Fe K emission by fixing the line width at σN = 10 eV, which improved the fit statistics to χ^2/d.o.f = 186.6/163 (Δχ^2=−33.6 for 2 d.o.f). However, the residual plot shows a broad excess emission centered at ∼ 6.8 keV. Then, we added another Gaussian line (zgauss2) and set the line width to vary freely. The fitting of the 3−10 keV EPIC-pn spectrum with the phenomenological model, tbabs×(zgauss1+zgauss2+zpowerlw) provided a statistically acceptable fit with χ^2/d.o.f = 154.3/160 (Δχ^2=−32.3 for 3 d.o.f) as shown in Fig. 1 (right). The centroid energies of the narrow and broad emission lines are E1 = 6.43^{+0.05}_{−0.04} keV and E2 = 6.84^{+0.14}_{−0.15} keV, which are representatives of the neutral Fe Kα line and highly-ionized Fe line, respectively. The line width of the ionized Fe emission line is σB = 0.31^{+0.23}_{−0.14} keV. The best-fitting values for the equivalent width of the Fe Kα and ionized Fe emission lines are EW1 = 36.9^{+24.8}_{−23.5} eV and EW2 = 131.7^{+57.2}_{−62.8} eV, respectively. Thus, we infer that the 3−10 keV EPIC-pn spectrum of Mrk 1044 is well described by a power-law like primary emission along with neutral, narrow and ionized, broad iron emission lines.

Since modelling of the iron emission features with Gaussian lines is not physically realistic, we explored the physically-motivated reflection models (Garćia et al 2014, 2016) to fit the iron emission lines and hence understand the physical conditions of the accretion disc. First, we modelled the narrow Fe Kα emission feature with the reflection (xillverd) model (Garćia et al 2016) without relativistic blurring, as appropriate for distant reflection and with density fixed at ne = 10^{15} cm^{−3}, the lowest value afforded by the model. We also fixed the ionization parameter of the xillverd model at its minimum value (log ξ = 0) as the Fe Kα line is neutral. The inclination angle of the distant reflector was fixed at a higher value, i = 60^∘ and decoupled

MNRAS 000, 1–21 (0000)

High-density disc reflection in Mrk 1044 5

Figure 2. Left: The EPIC-pn 3−10 keV spectral data, the fitted distant reflection model [tbabs×(xillverd+zpowerlw)] and the residuals which show a broad excess emission in the 6.5 − 6.9 keV energy range. The data are binned up for clarity. Right: The EPIC-pn 3−10 keV spectrum, the best-fitting reflection model, tbabs×(relxilld+xillverd+zpowerlw) along with the model components and the residuals. The best-fitting model consists of three main components: a primary power-law emission (in dash-dotted), an ionized, relativistic disc reflection with a single power-law emissivity profile (in dashed line) and a neutral, distant reflection (in dotted line).

Figure 3. Left: The full band (0.3−10 keV) EPIC-pn spectrum, the hard band (3−10 keV) best-fitting spectral model, tbabs×(relxilld+xillverd+zpowerlw) extrapolated down to 0.3 keV and the ratio of data to the model. Right: The full band (0.3−10 keV) EPIC-pn spectrum, the best-fitting model, tbabs×gabs×(relxilld+xillverd+zpowerlw) and the residuals. The model components are: a primary power-law emission (in dash-dotted), an ionized, high-density relativistic disc reflection with a broken powerlaw emissivity profile (in dashed), a neutral distant reflection (in dotted), and a broad Gaussian absorption line at around 0.7 keV.

from the relativistically blurred reflection component modelling the disc reflection. Since the incident continuum as assumed by the high-density reflection model is a powerlaw without a variable high-energy cut-off parameter, we have used a simple power-law (zpowerlw) model as the illuminating continuum. The fitting of the 3−10 keV spectrum with the model, tbabs×(xillverd+zpowerlw) provided a χ^2/d.o.f = 184.1/163 with a broad excess emission at ∼ 6.5 − 6.9 keV energy range (see Figure 2, left). The origin of the broad Fe line could be the relativistic reflection from the inner regions of an ionized accretion disc. Therefore, we have added the high-density relativistic reflection model (relxilld; Garćia et al 2016) with a single power-law emissivity profile. The relevant parameters of the relxilld model are: emissivity index (q, where emissivity of the relativistic reflection is defined by ϵ ∝ r^{−q} ), inner disc radius (rin), outer disc radius (rout), black hole spin (a), disc inclination angle (θ^∘), ionization parameter, electron density, iron abundance, reflection fraction (R) and photon index. We fixed the SMBH spin and outer disc radius at a = 0.998 and rout = 1000rg , respectively, where rg = GMBH/c^2. The reflection fraction of the relxilld model was fixed at R = −1 to obtain only the reflected emission. The photon index and iron abundance for the relativistic reflection (relxilld) component were tied with the distant reflection (xillverd) component. In xspec, the 3−10 keV model reads as tbabs×(relxilld+xillverd+zpowerlw) which provided a reasonably good fit with χ^2/d.o.f = 157.2/157. The best-fitting values for the photon index, emissivity index, disc inclination angle, ionization parameter and electron density are Γ = 2.25^{+0.07}_{−0.09} , q = 10^{+0p}_{−5.7} , θ^∘ = 44.5^{+5.2}_{−2.3} , ξ = 492^{+223}_{−382} erg cm s^{−1} and log(ne/cm^{−3}) = 16.4^{+2.6p}_{−1.4p} , respectively. Therefore, we infer that the hard X-ray (3−10 keV) spectrum of Mrk 1044 is well explained by a neutral distant reflection as well as an ionized, relativistic disc reflection where the emission is centrally concentrated in the inner

MNRAS 000, 1–21 (0000)

6 L. Mallick et al.

regions of the accretion disc. The 3−10 keV EPIC-pn spectral data, the best-fitting physical model along with all the model components and the deviations of the observed data from the model are shown in Fig. 2 (right).

3.2 The 0.3−10 keV EPIC-pn spectrum

To examine the presence of any excess emission in the soft X-ray band, we extrapolated the hard band (3−10 keV) best-fitting spectral model, tbabs×(relxilld+xillverd+zpowerlw) down to 0.3 keV. Figure 3 (left) shows the full band (0.3−10 keV) EPIC-pn spectral data, the extrapolated spectral model and the data-to-model ratio, which unveils an excess emission along with a broad absorption dip at ∼ 0.7 keV in the observed frame. For spectral analysis, we ignored the 1.8−2.5 keV band due to instrumental features present around the Si and Au detector edges at ∼ 1.8 keV and ∼ 2.2 keV, respectively (see e.g. Marinucci et al. 2014; Matt et al. 2014). Then we fitted the full band (0.3−10 keV) EPIC-pn spectrum with the hard band (3−10 keV) best-fitting model where the emissivity profile had a single power-law shape without any break. This resulted in a poor fit with χ^2/d.o.f = 551.6/230. To fit the soft X-ray excess emission, we consider that the emissivity profile of the relativistic disc reflection follows a broken power-law shape: ϵ ∝ r^{−qin} for r < r_{br} and ϵ ∝ r^{−qout} for r > r_{br} where r_{br}, qin and qout are the break radius, inner and outer emissivity indices, respectively. The fitting of the 0.3−10 keV EPIC-pn spectrum with the model, tbabs×(relxilld+xillverd+zpowerlw), where emissivity has a broken power-law shape, improved the fit statistics to χ^2/d.o.f = 431/228 (Δχ^2=−120.6 for 2 d.o.f). To model the absorption dip at ∼ 0.7 keV, we multiplied a Gaussian absorption line (gabs). The fitting of the 0.3−10 keV EPIC-pn spectral data with the high-density relativistic reflection plus constant density distant reflection as well as an intrinsic absorption [tbabs×gabs×(relxilld+xillverd+zpowerlw)] provided a statistically acceptable fit with χ^2/d.o.f = 239.5/225. We also checked for the possible presence of warm absorbers and created an xstar table model (Kallman & Bautista 2001) with the default turbulent velocity of 300 km s^{−1}, where we varied log ξwa and log N^{wa}_H from −5 to +5 and 20 to 25, respectively. However, the modelling of the ∼ 0.7 keV absorption dip with the low-velocity warm absorber model(s) does not improve the fit statistics. An absorber with log ξwa ∼ 0 − 1 and N^{wa}_H ∼ 5 × 10^{20} cm^{−2} yields minimal continuum curvature below ∼ 0.6 keV and an Fe M UTA (unresolved transition array) feature close to ∼ 0.8 keV, which is too high for what is observed here. The lower ionization values, e.g., closer to log ξwa ∼ −1 moves the Fe M UTA close to ∼ 0.7 keV but adds moderate continuum curvature below ∼ 0.5 − 0.6 keV even for low column densities such as N^{wa}_H ∼ 5 × 10^{20} cm^{−2}. However, we did not see any extra continuum curvature below ∼ 0.6 keV even by fixing the Galactic neutral hydrogen column density at NH = 3.6 × 10^{20} cm^{−2} (Willingale et al. 2013). The centroid energies of the absorption line in the observed and rest frames are ∼ 705.5 eV and ∼ 717.1 eV, respectively. The 717.1 eV absorption feature in the rest frame of the source can be due to either O VII or O VIII with corresponding outflow velocities of ∼ 0.25c or ∼ 0.1c, where c is the light velocity in vacuum. The interstellar hydrogen column density obtained from the 0.3−10 keV EPIC-pn spectral fitting is NH = 4.6^{+0.2}_{−0.3} × 10^{20} cm^{−2} where we considered the cross-sections and solar ISM abundances of Asplund et al. (2009). The full band (0.3−10 keV) EPIC-pn spectrum, the best-fitting model, tbabs×gabs×(relxilld+xillverd+zpowerlw) and the deviations of the observed data from the best-fitting spectral model are shown in Fig. 3 (right). In order to assure that the fitted parameter values are not stuck at any local minima, we performed a Markov Chain Monte Carlo (MCMC) analysis in xspec. We used the Goodman-Weare algorithm with 200 walkers and a total length of 10^6. Figure A1 shows the probability distributions of various parameters. To verify that the spectral parameters are not degenerate, we have shown the variation of different spectral parameters with the disc density and ionization parameter. Figure A2 represents the contour plots between the disc density (log ne) and other spectral parameters (Γ, AFe, log ξ_{blur}, qin, qout, r_{br}, θ^∘) and between disc ionization parameter (log ξ_{blur}) and two other spectral parameters (rin and qin), which indicate that there is no degeneracy in the parameter space and the fitted parameters are independently constrained. The best-fitting spectral model parameters and their corresponding 90 per cent confidence levels are summarized in Table 2. Thus, the XMM-Newton/EPIC-pn spectral analysis indicates that the SE emission in Mrk 1044 results from the relativistic reflection off an ionized, high-density accretion disc with the ionization parameter of ξ = 909^{+90}_{−201} erg cm s^{−1} and electron density of log(ne/cm^{−3}) = 16.2^{+0.3}_{−0.1} , respectively. We do not require any extra low-temperature Comptonization component to model the SE emission from the source.

3.3 The 0.38−1.8 keV RGS spectrum

To confirm the presence of the ∼ 0.7 keV absorption line in the observed frame and also to detect any emission or absorption features, we have modelled the high-resolution RGS spectrum in spex v.3.04. Since RGS data alone cannot constrain the continuum, we applied the full band (0.3−10 keV) EPIC-pn continuum model without any absorption component and redshift correction to the RGS data and multiplied a constant component to account for the cross-calibration uncertainties. We fixed all the continuum model parameters to the best-fitting EPIC-pn value. The EPIC-pn continuum model is then corrected for redshift and the Galactic ISM absorption with the models reds and hot in spex, respectively. The temperature of the hot model was fixed at T = 0.5 eV (Pinto et al. 2013), while the column density was set to vary freely. The fitting of the 0.38−1.8 keV RGS spectrum with the model, hot×reds×(relxilld+xillverd+powerlaw), provided a χ^2/d.o.f = 2411.5/2250 with a significant residual at ∼ 0.7 keV in the observed frame (Figure 4, left). To model the absorption feature, we have used the photoionized absorption model (xabs) in spex v.3.04. The xabs model calculates the absorption by a slab of material in photoionization equilibrium. The relevant parameters of the model are: column density (N^{abs}_H ), line width (σv), line-of-sight velocity (vout) and ionization parameter (log ξ_{abs}), where

MNRAS 000, 1–21 (0000)

High-density disc reflection in Mrk 1044 7

Table 2. The best-fitting model parameters for the EPIC-pn (0.3−10 keV) spectrum. Parameters with notations ‘(f)’ and ‘∗’ indicate fixed and tied values, respectively. Errors are quoted at a 90 per cent confidence level and estimated from the MCMC output. Component Parameter EPIC-pn Description (0.3−10 keV)

Galactic absorption (tbabs) N_H(10^{20} cm^{−2}) 4.6^{+0.2}_{−0.3} Galactic neutral hydrogen column density Intrinsic absorption (gabs) E_{abs}(eV) 705.5^{+8.3}_{−12.6} Absorption line energy in the observed (z = 0.016) frame σ_{abs}(eV) 77.5^{+15.8}_{−8.0} Absorption line width τ_{abs}(10^{−2}) 1.8^{+0.6}_{−0.2} Absorption line depth Relativistic reflection (relxilld) q_{in} 9.73^{+0.24}_{−1.13} Inner emissivity index q_{out} 2.4^{+0.5}_{−0.2} Outer emissivity index r_{br}(r_g) 3.2^{+0.3}_{−0.3} Break disc radius a 0.992^{+0.005}_{−0.016} SMBH spin θ^∘ 46.4^{+1.9}_{−5.0} Disc inclination angle r_{in}(r_g ) 1.29^{+0.12}_{−0.05} Inner disc radius r_{out}(r_g ) 1000(f) Outer disc radius Γ 2.29^∗ Blurred reflection photon index A_{Fe} 2.2^{+0.5}_{−0.6} Iron abundance (solar) log(n_e/cm^{−3}) 16.2^{+0.3}_{−0.1} Electron density of the disc ξ_{blur}(erg cm s^{−1}) 909^{+90}_{−201} Ionization parameter for the disc N_{blur}(10^{−4} ) 2.4^{+0.1}_{−1.1} Normalization of the relativistic reflection component Distant reflection (xillverd) Γ 2.29^∗ Distant reflection photon index A_{Fe} 2.2^∗ Iron abundance (solar) log(n_e/cm^{−3}) 15(f) Density of the distant reflector ξ_{distant}(erg cm s^{−1}) 1(f) Ionization parameter of the distant reflector i^∘ 60(f) Inclination angle of the distant reflector N_{distant}(10^{−6}) 4.6^{+2.4}_{−2.3} Normalization of the distant reflection component Incident continuum (zpowerlw) Γ 2.29^{+0.01}_{−0.03} Photon index of the incident continuum N_{PL}(10^{−3} ) 2.1^{+0.9}_{−0.5} Normalization of the incident continuum flux F_{0.3−2}(10^{−11} ) 2.26 Observed 0.3−2 keV flux in units of erg cm^{−2} s^{−1} F_{2−10}(10^{−11} ) 1.07 Observed 2−10 keV flux in units of erg cm^{−2} s^{−1} χ^2/ν 239.5/225 Fit statistic

Table 3. The best-fitting physical model parameters for the Galactic and intrinsic absorptions, which are obtained from the fitting of the RGS (0.38−1.8 keV) spectrum.

Component Parameter RGS (0.38−1.8 keV) Description Galactic absorption (hot) N_H(10^{20} cm^{−2}) 3.8^{+0.1}_{−0.1} Galactic neutral hydrogen column density Intrinsic absorption (xabs) v_{out}(c) 0.1^{+0.01}_{−0.01} Outflow velocity of the wind N^{abs}_H (10^{20} cm^{−2}) 4.7^{+0.9}_{−1.2} Column density log(ξ_{abs}/erg cm s^{−1}) 1.8^{+0.6}_{−0.2} Ionization state σ_v (km s^{−1}) 14147^{+3648}_{−2344} Velocity broadening χ^2/ν 2353/2346 Fit statistic

MNRAS 000, 1–21 (0000)

8 L. Mallick et al.

Figure 4. Left: The 0.38−1.8 keV RGS spectrum, the spectral model, hot×reds×(relxilld+xillverd+powerlaw) and the residuals, showing a broad absorption feature at ∼ 0.7 keV in the observer’s frame. Right: The 0.38−1.8 keV RGS spectrum, the best-fitting spectral model, hot×reds×xabs×(relxilld+xillverd+powerlaw) and the residual plot. The data are binned up by a factor of 4 for plotting purposes only.

Figure 5. Left-hand panel: The Swift/XRT (0.3−6 keV: in green crosses), NuSTAR/FPMA (3−50 keV: in black circles) and FPMB (3−50 keV: in red triangles) spectral data, the primary power-law (zpowerlw: Γ ∼ 2.13) continuum model modified by the Galactic absorption (tbabs) fitted in the 0.3−50 keV band and the residuals as a function of energy. The residual plot shows a soft X-ray excess emission below ∼ 1 keV, a narrow emission line at ∼ 6.4 keV and a hard X-ray excess emission at around 15−30 keV energy range. The spectra are binned for clarity. Right-hand panel: The combined Swift/XRT (green crosses), XMM-Newton/EPIC-pn (blue plus), NuS- TAR/FPMA (black circles) and FPMB (red triangles) spectra, the best-fitting model, tbabs×gabs×(relxilld+xillverd+zpowerlw) and the residuals. The best-fitting model (in grey solid) consists of the following components: a primary power-law emission (in dashdotted), a distant reflection (in dotted) for the 6.4 keV narrow Fe K_α emission, and an ionized, high-density relativistic disc reflection (in dashed) responsible for the soft X-ray excess emission, broad Fe line and Compton hump.

ξ_{abs} =^L_{nr2} , L is the source luminosity, n is the hydrogen density and r is the distance of the slab from the ionizing source. The modelling of the broad absorption dip with the xabs model improved the fit statistics to χ^2/d.o.f = 2353/2346 (Δχ^2 = −58.5 for 4 d.o.f). The best-fitting parameters of the absorbers are summarized in Table 3. The fitting of the rest-frame ∼ 0.72 keV absorption feature with a single absorber provides an outflow velocity of v = (0.1 ± 0.01)c. If we fix the outflow velocity to v = 0.25c corresponding to the O VII wind, then the fit statistics get worse by Δχ^2=8.1 for 1 d.o.f. Thus our analysis prefers the slower (0.1c) O VIII outflow over the faster (0.25c) O VII outflow. The 0.38−1.8 keV

RGS spectrum, the best-fitting spectral model, hot×reds×xabs×(relxilld+xillverd+powerlaw) and the residuals are shown in Fig. 4 (right).

3.4 Joint fitting of Swift, XMM-Newton and NuSTAR spectra

We jointly fitted the Swift/XRT, XMM-Newton/EPIC-pn and NuSTAR/FPMA, FPMB spectra to obtain tighter constraints on the reflection continuum including the SE emission and investigate the presence of any hard X-ray excess emission above 10 keV. We tied all the parameters together between four data sets and multiplied a constant compo-

MNRAS 000, 1–21 (0000)

High-density disc reflection in Mrk 1044 9

Table 4. The best-fitting model parameters for the joint fitting of Swift/XRT (0.3−6 keV), XMM-Newton/EPIC-pn (0.3−10 keV) and NuSTAR (3−50 keV) spectra of Mrk 1044. Parameters with notations ‘(f)’ and ‘∗’ indicate fixed and tied values, respectively.

Component Parameter XMM-Newton/EPIC-pn Swift/XRT NuSTAR (0.3−10 keV) (0.3−6 keV) (3−50 keV)

Galactic absorption (tbabs) N_H(10^{20} cm^{−2}) 4.6^{+0.2}_{−0.2} 4.6^∗ 4.6^∗

Intrinsic absorption (gabs) E_{abs}(eV) 707.2^{+7.1}_{−7.0} 707.2^∗ 707.2^∗

σ_{abs}(eV) 77.9^{+9.4}_{−8.3} 77.9^∗ 77.9^∗

τ_{abs}(10^{−2}) 1.9^{+0.2}_{−0.2} 1.9^∗ 1.9^∗

Relativistic reflection (relxilld) q_{in} 9.4^{+0.5}_{−0.7} 9.4^∗ 9.4^∗

q_{out} 2.4^{+0.3}_{−0.2} 2.4^∗ 2.4^∗

r_{br}(r_g) 3.2^{+0.1}_{−0.1} 3.2^∗ 3.2^∗

a 0.997^{+0.001}_{−0.016} 0.997^∗ 0.997^∗

θ^∘ 47.2^{+1.0}_{−2.5} 47.2^∗ 47.2^∗

r_{in}(r_g ) 1.31^{+0.08}_{−0.05} 1.31^∗ 1.31^∗

r_{out}(r_g ) 1000(f) 1000(f) 1000(f)

Γ 2.28^∗ 2.31^∗ 1.89^∗

A_{Fe} 2.3^{+0.1}_{−0.2} 2.3^∗ 2.3^∗

log(n_e/cm^{−3}) 16.7^{+0.3}_{−0.7} 16.7^∗ 16.7^∗

ξ_{blur}(erg cm s^{−1}) 812^{+131}_{−64} 81^{+108}_{−29} 1980^{+235}_{−908}

N_{blur}(10^{−4} ) 1.2^{+0.1}_{−0.4} 1.2^∗ 1.2^∗

Distant reflection (xillverd) Γ 2.28^∗ 2.31^∗ 1.89^∗

A_{Fe} 2.3^∗ 2.3^∗ 2.3^∗

log(n_e/cm^{−3}) 15(f) 15^∗ 15^∗

ξ_{distant}(erg cm s^{−1}) 1(f) 1(f) 1(f)

i^∘ 60(f) 60^∗ 60^∗

N_{distant}(10^{−6}) 2.3^{+0.7}_{−0.7} 2.3^∗ 2.3^∗

Incident continuum (zpowerlw) Γ 2.28^{+0.01}_{−0.01} 2.31^{+0.07}_{−0.06} 1.89^{+0.14}_{−0.06}

N_{PL}(10^{−4} ) 9.3^{+2.6}_{−1.2} 11.0^{+1.9}_{−2.2} 4.5^{+4.1}_{−4.4}

χ^2/ν 735/694 — —

nent to take care of the cross-normalization factors. This factor is kept fixed at 1 for the FPMA and varied for the FPMB, XRT and EPIC-pn spectral data. Initially, we fitted the quasi-simultaneous Swift/XRT and NuSTAR/FPMA, FPMB spectral data with a simple power-law (zpowerlw) model modified by the Galactic absorption (tbabs), which provided a poor fit with χ^2/d.o.f = 601/329. The deviations of the observed data from the absorbed power-law model are shown in Figure 5 (left). The residuals show the presence of a soft X-ray excess emission below ∼ 1 keV, a narrow emission feature ∼ 6.4 keV and a hard X-ray excess emission in the energy range 15−30 keV, which most likely represents the Compton reflection hump as observed in many AGN (e.g. NGC 1365: Risaliti et al. 2013, MCG–6- 30-15: Marinucci et al. 2014, 1H 070–495: Kara et al. 2015, Ark 120: Porquet et al. 2018).

Then we applied the best-fitting EPIC-pn (0.3−10 keV) spectral model to the combined XRT, EPIC-pn, FPMA and FPMB spectral data sets. The joint fitting of the all four spectral data (0.3−50 keV) with the EPIC-pn spectral model, tbabs×gabs×(relxilld+xillverd+zpowerlw) provided a poor fit with χ^2/d.o.f = 960/700. Since we are using multi-epoch observations, the spectral parameters might undergo significant variability. First, we set the photon index to vary between the Swift/XRT, XMM-Newton/EPICpn and NuSTAR data sets. This improved the fit statistics to χ^2/d.o.f = 776/698 (Δχ^2=−184 for 2 d.o.f). Then we set the normalization of the incident continuum to vary between the observations, which improved the fit statistics to χ^2/d.o.f = 765/696 (Δχ^2=−11 for 2 d.o.f). Another spectral parameter that might encounter significant variability is the ionization parameter for the relativistic disc reflection component, which is directly proportional to the incident continuum flux. Therefore, we allow log ξ_{blur} to vary, which provided an improvement in the fit statistics with χ^2/d.o.f = 735/694 (Δχ^2=−30 for 2 d.o.f) without any significant residuals. The cross-normalization factors obtained from the best-fitting model are ∼ 1.02 for FPMB, ∼ 2.56

MNRAS 000, 1–21 (0000)

10 L. Mallick et al.

for XRT and ∼ 2.43 for EPIC-pn, which is expected given the non-simultaneous observations over a long ∼ 10 year period. The best-fitting values for the electron density, inner radius, break radius and inclination angle of the disc are log(ne/cm^{−3}) = 16.7^{+0.3}_{−0.7} , rin = 1.31^{+0.08}_{−0.05} rg, r_{br} = 3.2^{+0.1}_{−0.1} rg and θ^∘ = 47.2^{+1.0}_{−2.5} , respectively. The inclusion of the data above 10 keV prefers moderately higher value for the disc density parameter. If we fix log(ne/cm^{−3}) to 15, then the broadband fit statistics get worse by Δχ^2=12.25 for 1 d.o.f. An F-test indicates that the high-density disc model is preferred at the ∼ 3.4σ confidence level compared to a lowdensity disc. Thus, the broadband (0.3−50 keV) spectral analysis suggests that the soft X-ray excess, highly ionized broad Fe line and Compton hump in Mrk 1044 is well explained by the relativistic disc reflection with a broken power-law emissivity profile of an ionized, high-density accretion disc. The Swift/XRT, XMM-Newton/EPIC-pn, NuS- TAR/FPMA and FPMB spectral data sets, the best-fitting model, tbabs×gabs×(relxilld+xillverd+zpowerlw) along with the components and the deviations of the broadband (0.3−50 keV) data from the best-fitting model are shown in Fig. 5 (right). The best-fitting broadband spectral model parameters are summarized in Table 4. If we replace the simple power-law (zpowerlw) model by a power-law with high-energy exponential cut-off (cutoffpl), then the estimated lower limit to the high-energy cut-off is ∼ 128 keV.

4 TIMING ANALYSIS

To understand the time and energy dependence of the variability and the causal connection between the variable emission components, we explored the timing properties of Mrk 1044 using various model-independent approaches.

4.1 Time series and hardness ratio

Initially, we derived the background-subtracted, deadtime and vignetting corrected, full band (0.3−10 keV) EPIC-pn time series of Mrk 1044 with the time bin size of 400 s, as shown in the top, left panel of Figure 6. The source noticeably exhibits strong short-term variability. By applying the Scargle’s Bayesian Blocks segmentation algorithm (Scargle et al. 2013) to the time series, we found that the X-ray emission from Mrk 1044 varied by ∼ 50 per cent in about 800 s. The max-to-min amplitude variation of the source count rate is ∼ 3.1 on a timescale of ∼ 22.8 hr. To characterise the flux variations of the source, we computed the fractional rms variability, Fvar and its 1σ error using the formula given in Vaughan et al. (2003). The estimated fractional rms amplitude in the full band (0.3−10 keV) is Fvar,0.3−10 = (19.7 ± 0.1) per cent. We also investigated the energy dependence of variability by generating light curves in two different energy bands: soft (S=0.3−2 keV) and hard (H=2−10 keV), which are mostly dominated by the SE and primary emission, respectively. We have shown the soft and hard X-ray light curves of Mrk 1044 in Fig. 6 (left). The variability trend in these two bands is found to be similar. However, the soft band is more variable than the hard band with the fractional rms variability of Fvar,0.3−2 = (20.3 ± 0.1) per cent and Fvar,2−10 = (15.5 ± 0.5) per cent, respectively which is indicative of the presence of multicomponent variability. The max-to-min amplitude variations of the count rate in the 0.3−2 keV and 2−10 keV bands are ∼ 3.2 and ∼ 2.9 on timescales of ∼ 22.4 hr and ∼ 22.7 hr, respectively. In the lower, left panel of Fig. 6, we have shown the temporal variations of the hardness ratio (HR), defined by H/S. The χ^2 test revealed the presence of a significant variability in the source hardness with χ^2/d.o.f=1028/318. The max-to-min amplitude variation of the hardness ratio is ∼ 2.2 on ∼ 1.2 hr timescales. Thus, we infer that Mrk 1044 showed a significant variability in flux as well as in spectral shape during the 2013 XMM-Newton observation.

We also study the timing behaviour of the source in the 3−50 keV energy range during the NuSTAR observation in 2016. The full (3−50 keV), soft (3−10 keV) and hard (10−50 keV) X-ray, background-subtracted, combined FPMA and FPMB light curves of Mrk 1044 are shown in Fig. 6 (right). The max-to-min amplitude variations in the 3−50 keV, 3−10 keV and 10−50 keV bands are ∼ 2.2, ∼ 2.4 and ∼ 2.6 on timescales of ∼ 6.1 hr, ∼ 6.1 hr and ∼ 4.6 hr, respectively. According to the χ^2 test, the variability in the full (3−50 keV), soft (3−10 keV) and hard (10−50 keV) bands is statistically significant with χ^2/d.o.f=200/58, 180/58 and 67/58, respectively. The fractional variability analysis confirms these results, indicating the presence of moderate variability with the amplitude of Fvar,3−50 = (14.4 ± 1.3) per cent, Fvar,3−10 = (15.1 ± 1.5) per cent and Fvar,10−50 = (7.8 ± 4.8) per cent in the full (3−50 keV), soft (3−10 keV) and hard (10−50 keV) bands, respectively. In the bottom, right panel of Fig. 6, we show the time series of the hardness ratio (HR=10−50 keV/3−10 keV). Although the source was variable in flux, the χ^2 test revealed no significant variability in the hardness (χ^2/d.o.f=42/58) during the 2016 NuSTAR observation.

4.2 Hardness−flux and flux−flux analyses

During the 2013 XMM-Newton observation, the source was variable both in flux and spectral shape as shown in Fig. 6 (left). To understand the interrelationship between the spectral shape and flux variations, we study the variation of the hardness ratio (HR=H/S: H=2−10 keV and S=0.3−2 keV) as a function of the total X-ray (0.3−10 keV) count rate. Figure 7 shows the hardness−intensity diagram of Mrk 1044, derived with the time bin size of 400 s. We found a decrease in source spectral hardness with the flux or ‘softer-when-brighter’ behaviour of Mrk 1044, which is usually observed in radio-quiet Seyfert 1 galaxies (e.g. Markowitz, Edelson & Vaughan 2003, 1H 0707– 495: Wilkins et al. 2014, Ark 120: Mallick et al. 2017; Lobban et al. 2018). To quantify the statistical significance of the observed ‘softer-when-brighter’ trend of Mrk 1044, we estimated the Spearman rank correlation coefficient between the hardness ratio and X-ray count rate, which is ∼ −0.5 with the null hypothesis probability of p ∼ 1.2 × 10^{−21} . Although there is a lot of scatter in the diagram, a moderate anti-correlation between the hardness ratio and the total Xray count rate is statistically significant.

We also studied the connection between the 0.3−2 keV and 2−10 keV band count rates using the flux−flux analysis which is a model-independent approach to study the spectral variability and was pio-

MNRAS 000, 1–21 (0000)

High-density disc reflection in Mrk 1044 11

Figure 6. Left: The background-subtracted, deadtime corrected XMM-Newton/EPIC-pn light curves in the full (0.3−10 keV), soft (S=0.3−2 keV) and hard (H=2−10 keV) X-ray bands and the hardness ratio (H/S). Right: The background-subtracted NuS- TAR/FPMA+FPMB light curves in three different energy bands: full (3−50 keV), soft (S=3−10 keV), hard (H=10−50 keV) and the corresponding hardness ratio (H/S) of Mrk 1044. The bin size used in all the panels is 400 s.

Figure 7. The variation of the X-ray hardness ratio, H/S (S=0.3−2 keV, H=2−10 keV) as a function of the total (0.3−10 keV) X-ray count rate, representing a ‘softer-when-brighter’ behaviour of Mrk 1044 as commonly observed in radioquiet Seyfert 1 galaxies.

neered by Churazov, Gilfanov & Revnivtsev (2001) and Taylor, Uttley & McHardy (2003). We derived the flux−flux plot for Mrk 1044 with the time bins of 400 s (Figure 8, left). We fitted the flux−flux plot with a linear model of the form H = m × S + c, which provided a poor fit with χ^2/d.o.f = 866/318, slope m ∼ 0.07 and a hard offset c ∼ 0.44 cts s^{−1}. In order to investigate whether spectral pivoting of the primary power-law emission is a plausible cause for the observed variability, we fitted the data with a simple power-law model of the form H = α × S^β , which resulted in a statistically unacceptable fit with χ^2/d.o.f = 862/318, α ∼ 0.7 and β ∼ 0.22. The poor quality of the fitting could be caused by the presence of lots of scatter in the data. For greater clarity, we binned up the flux−flux plot in the flux domain. The binned flux−flux plot is shown in the right panel of Fig 8. However, the fitting of the binned flux−flux plot with the linear and power-law models provided unacceptable fits with χ^2/d.o.f = 37.4/16 and χ^2/d.o.f = 28.9/16, respectively. To effectively distinguish between a linear versus a power-law fit, a wide range of flux is required. However, the EPIC-pn count rate spans only a factor of ∼ 2 − 3 for Mrk 1044. The error bars on the binned flux-flux points are too small to yield a good fit without adding some systematics. Another possible reason for the bad fit could be due to the presence of a degree of independent variability between the soft and hard bands.

4.3 Frequency-dependent lag and coherence

To probe the physical processes dominating on various timescales, we evaluate the time lag as a function of temporal frequency using the Fourier method described in Vaughan & Nowak (1997); Nowak et al. (1999). The time lag between two different energy bands is given by the formula τ (ν) = ϕ(ν)/2πν, where ϕ(ν) = arg(< C(ν) >), is the phase of the average cross power spectrum, C(ν). The expression for the cross power spectrum is C(ν) = S^∗(ν)H(ν), where S(ν) and H(ν) are the discrete Fourier transforms of two different time series s(t) and h(t), respectively. First, we composed light curves in three different energy bands: E1 = 0.3 − 0.8 keV (super-soft band dominated by the free-

MNRAS 000, 1–21 (0000)

12 L. Mallick et al.

Figure 8. The 0.3−2 keV vs. 2−10 keV flux−flux plot for Mrk 1044 (left). The time bin size used is 400 s. The binned flux−flux plot for Mrk 1044 (right). The dashed and dotted lines represent the linear (H = m × S + c) and power-law (H = α × S^β ) fits to the data.

Figure 9. Frequency-dependent time lags between the E_1 (0.3−0.8 keV) and E_3 (1.5−5 keV) light curves (left) and between the E_2 (0.8−1 keV) and E_3 (1.5−5 keV) light curves (right). Lags were calculated relative to the soft band (E_1 = 0.3 − 0.8 keV: left and E_2 = 0.8 − 1 keV: right), and positive lag implies that the hard band variations are delayed relative to the soft band variations.

Figure 10. Poisson noise subtracted coherence between 0.3−0.8 keV and 1.5−5 keV (left) and between 0.8−1 keV and 1.5−5 keV (right).

MNRAS 000, 1–21 (0000)

High-density disc reflection in Mrk 1044 13

Figure 11. Left: The lag-energy spectrum of Mrk 1044 in the lowest frequency range ν ∼ [2 − 6] × 10^{−5} Hz, where a hard lag is observed. The profile has a power-law like shape of the form τ (E) = 1036.9 × E^{0.75} − 912.2 s and is shown as the solid, green line. Right: The lag-energy spectrum of Mrk 1044 in the high-frequency range ν ∼ [1 − 2] × 10^{−4} Hz, where a soft lag is detected. The high-frequency lag peaks at 0.8−1 keV and is very similar to the ratio of 0.3−10 keV data to the 3−10 keV best-fitting reflection model extrapolated down to 0.3 keV, as shown in the left, bottom panel of Fig. 3.

Figure 12. Energy-dependent, noise corrected coherence in the lowest frequency range ν ∼ [2 − 6] × 10^{−5} Hz (left) and high-frequency range ν ∼ [1 − 2] × 10^{−4} Hz (right).

free emission within the high-density disc), E2 = 0.8−1 keV (soft band corresponding to the Fe-L line and dominated by the disc reflection) and E3 = 1.5−5 keV (primary power-law continuum dominated). In order to obtain evenly-sampled light curves, we used the time bin size of 400 s. We computed time lag by averaging the cross power spectra over five unfolded segments of time series and then averaging in logarithmically spaced frequency bins (each bin spans ν → 1.5ν). The resulting lags between E1 and E2 and between E1 and E3 as a function of temporal frequency are shown in the left and right panels of Figure 9, respectively. The lags were estimated relative to the E1 and E2 bands and the positive lag implies that the E1 and E2 bands are leading the E3 variations. In the lowest frequency range ν ∼ [2 − 6] × 10^{−5} Hz, we detected a hard lag of 1173 ± 327 s and 815 ± 267 s between the 0.3−0.8 keV and 1.5−5 keV bands, and between the 0.8−1 keV and 1.5−5 keV bands, respectively. Therefore, at the lowest frequencies (⩽ 6 × 10^{−5} Hz) or longer timescales (⩾ 16.7 ks), the primary emission dominated hard band, lags behind the reflection dominated super-soft band (0.3−0.8 keV) by 1173±327 s and soft band (0.8−1 keV) by 815 ± 267 s. However, as the frequency increases, the time lag between 0.3−0.8 keV and 1.5−5 keV becomes zero. At frequencies ν ∼ [1 − 2] × 10^{−4} Hz, the soft band (0.8−1 keV) dominated by the relativistic disc reflection, lags behind the primary power-law dominated hard band (1.5−5 keV), by −183 ± 145 s.

We examined the significance of the lags by calculating the Poisson noise subtracted coherence as a function of frequency, following the prescription of Vaughan & Nowak (1997). The resulting coherence is high (> 0.5) over the entire frequency range as shown in Figure 10. The high coherence implies that time series in all three energy bands are well correlated linearly and the physical processes re-

MNRAS 000, 1–21 (0000)

14 L. Mallick et al.

Figure 13. Left: The 0.3−10 keV EPIC-pn mean (in circle) and frequency-averaged absolute rms (in square) spectra. Right: The 0.3−10 keV frequency-averaged fractional rms spectrum.

Figure 14. The 0.3−10 keV absolute rms spectrum of Mrk 1044 in the low-frequency range, ν_{low} ∼ [1.7 − 10] × 10^{−5} Hz (left) and high-frequency range, ν_{high} ∼ [1 − 10] × 10^{−4} Hz (right). A hint of enhanced variability is found at ∼ 0.85 keV in both frequency bands.

Figure 15. The 0.3−10 keV fractional rms spectrum of Mrk 1044 in the low-frequency range, ν_{low} ∼ [1.7 − 10] × 10^{−5} Hz (left) and high-frequency range, ν_{high} ∼ [1 − 10] × 10^{−4} Hz (right).

MNRAS 000, 1–21 (0000)

High-density disc reflection in Mrk 1044 15

Figure 16. The 0.3−10 keV frequency-averaged F_{var} spectrum, the best-fitting variability spectral model (in solid blue) and the data-to-model ratio. The best-fitting model has one constant distant reflection component and two either uncorrelated or moderately anti-correlated variable spectral components: an ionized high-density relativistic reflection continuum with variable normalization (ΔN_{blur}) and a direct power-law continuum with variable normalization (ΔN_{PL}) and spectral index (ΔΓ), where ΔN_{PL} and ΔΓ are positively correlated. The dotted line represents the data-to-model ratio of 1. Error-bars are 1σ.

sponsible for the soft X-ray excess, Fe emission complex and primary power-law emission are linked with each other.

5 ENERGY-DEPENDENT VARIABILITY

In order to study the energy dependence of variable spectral components, we determined the combined spectral and timing characteristics of Mrk 1044 with the use of different techniques: lag-energy spectrum, coherence spectrum and rms variability spectra on various timescales.

5.1 Lag-energy and coherence spectra

The variation of the time lag as a function of energy can compare the energy spectral components and their relative lag and hence provides important insights into the origin of different spectral components. First, we extracted light curves in ten different energy bands: 0.3−0.4 keV, 0.4−0.5 keV, 0.5−0.6 keV, 0.6−0.8 keV, 0.8−1 keV, 1−1.5 keV, 1.5−2 keV, 2−3 keV, 3−5 keV and 5−10 keV. Then, we estimated the lag between the time series in each energy band and a reference band. The reference band is defined as the full (0.3−10 keV) band minus the energy band of interest. This allows us to obtain high signal-to-noise ratio in the reference band and also to overcome correlated Poisson noise. Here, the positive lag means that the variation in the chosen energy band is delayed relative to the defined reference band. In the left panel of Figure 11, we have shown the lag-energy spectrum of Mrk 1044 at the lowest frequency range ν ∼ [2 − 6] × 10^{−5} Hz, where the hard lag was observed. The low-frequency lag is increasing with energy and the lag-energy profile can be well described by a power-law of the form, τ (E) = 1036.9 × E^{0.75} − 912.2 s and is shown as the solid, green line in Fig. 11 (left). The low-frequency lag-energy spectrum of Mrk 1044 is similar to that observed in other AGN (e.g. Mrk 335 and Ark 564: Kara et al. 2013, MS 2254.9−3712: Alston et al. 2015).

The lag-energy spectrum of Mrk 1044 in the highfrequency range ν ∼ [1−2]×10^{−4} Hz, where we found a hint of the soft lag, is shown in the right panel of Fig. 11. The lag-energy profile has a peak at 0.8−1 keV, which could indicate a larger contribution of the reprocessed soft X-ray excess emission from the ionized accretion disc that results in a delayed emission with respect to the direct nuclear emission. This is consistent with our energy spectral fitting. However, we do not see any Fe-K lag because of poor signal-to-noise in the hard band.

The noise-corrected coherence as a function of energy for these two frequency ranges, ν ∼ [2 − 6] × 10^{−5} Hz and ν ∼ [1 − 2] × 10^{−4} Hz, are shown in the left and right panels of Figure 12, respectively. The coherence is nearly consistent with unity over the entire energy range, indicating that the physical processes dominating different energy bands are well connected with each other.

5.2 The absolute and fractional rms variability spectra

The variation of the rms variability amplitude as a function of energy will allow us to distinguish between the constant and variable spectral components and is worthwhile to understand the origin of energy-dependent variability in accreting systems (Gierliński & Zdziarski 2005; Miniutti et al. 2007; Fabian et al. 2012; Mallick et al. 2016; Mallick & Dewangan 2017; Mallick et al. 2017). Moreover, the modelling of the fractional rms spectrum can quantify the percentage of variability of variable spectral components and probe the causal connection between them.

5.2.1 Deriving the absolute and fractional rms spectra

We derived the XMM-Newton/EPIC-pn (0.3−10 keV) frequency-averaged (∼ 7.8×10^{−6} −1.25×10^{−3} Hz) absolute and fractional rms variability spectra of Mrk 1044 following the prescription of Vaughan et al. (2003). The absolute rms (σrms) is the square root of the excess variance (σ^2_{XS}) and fractional rms (Fvar) is defined as the square root of the normalized excess variance σ^2_{NXS} which is the ratio of the excess variance (σ^2_{XS}) and the square of the mean (x) of the time series:

σrms = √ σ^2_{XS} = √ S^2 − σ^2_{err} (1)

Fvar = √ σ^2_{NXS} = √ σ^2_{XS} x^2 = √ S^2 − σ^2_{err} x^2

, (2)

where σ^2_{XS} is defined by the sample variance S^2 minus the mean squared error σ^2_{err}. The sample variance, S^2 is defined by S^2 = 1 N − 1 N∑ i=1 (xi − x)^2, (3)

MNRAS 000, 1–21 (0000)

16 L. Mallick et al.

and mean squared error, σ^2_{err} is:

σ^2_{err} = 1 N N∑ i=1 σ^2_{err,i}. (4)

The uncertainty on Fvar was estimated using the equation (B2) of Vaughan et al. (2003) and is given by:

err(Fvar) = 1 2Fvar ( √ 2 N . σ^2_{err} x^2

)_2 + ( √ σ^2_{err} N . 2Fvar x )_2 (5) We derived the deadtime corrected, background subtracted EPIC-pn light curves in 19 different energy bands with the time bins of 400 s. Then we computed the frequency-averaged (∼ 7.8 × 10^{−6} − 1.25 × 10^{−3} Hz) absolute rms (σrms) in units of counts s^{−1} keV^{−1} and fractional rms (Fvar) in each time series. We also derived the EPIC-pn mean spectrum by rebinning the response matrix with same energy binning as the rms spectra. We have shown the EPICpn mean and absolute rms spectra in the left panel and fractional rms spectrum in the right panel of Figure 13. The fractional rms amplitude of the source decreases with energy convexly with a hint of drops at ∼ 0.7 keV and ∼ 0.9 keV.

Then we explored the frequency-resolved variability spectra of Mrk 1044 by calculating the absolute and fractional rms variability amplitudes in two broad frequency bands: ν_{low} ∼ [1.7 − 10] × 10^{−5} Hz and ν_{high} ∼ [1 − 10] × 10^{−4} Hz. The corresponding timescales are ∼ 5 − 60 ks and ∼ 0.5 − 10 ks, respectively. To obtain the low-frequency variability spectra, we extracted the corrected light curves with the time bin size of Δt = 5 ks and segment length of t = 60 ks. For the high-frequency variability spectra, the chosen time bin size and segment length of the time series were Δt = 500 s and t = 10 ks, respectively. The derived low and high-frequency absolute and fractional rms spectra of Mrk 1044 are shown in the left and right panels of Figure 14 and Figure 15, respectively.

5.2.2 Modelling the fractional rms spectrum

To identify the variable spectral components responsible for the observed energy-dependent variability of Mrk 1044, we modelled the 0.3−10 keV Fvar spectrum following the approach of Mallick et al. (2017). The Fvar spectrum can be considered as a representative of the fractional rms variations of the average energy spectrum. The best-fitting average energy spectral model of Mrk 1044 consists of a direct power-law continuum (fDPC), an ionized high-density relativistic reflection continuum (fRRC) and a neutral distant reflection (f_{dist}), modified by the Galactic (fGA) and intrinsic (f_{abs}) absorption components and can be expressed as

f(E) = fGAf_{abs}[fDPC(E) + fRRC(E) + f_{dist}(E)] (6)

If we consider that the observed energy-dependent variability of Mrk 1044 is caused by variations in the normalization (NPL) and photon index (Γ) of the hot Comptonization component as well as in the normalization (N_{blur}) of the relativistic reflection component, then the variations in the average energy spectrum can be written as

Δf(E) = Δf_{DPC}(E, N_{PL}, Γ) + Δf_{RRC}(E, N_{blur}) (7) where

Δf_{DPC}(E, N_{PL}, Γ) = f_{DPC}(N_{PL}+ΔN_{PL}, Γ+ΔΓ)−f_{DPC}(N_{PL}, Γ) (8) and Δf_{RRC}(E, N_{blur}) = f_{RRC}(N_{blur} + ΔN_{blur}) − f_{RRC}(N_{blur}) (9)

Therefore, we can write the expression for the fractional rms spectrum Fvar(E) using the equation (3) of Mallick et al. (2017):

F_{var}(E) = √ < (Δf_{DPC}(E, N_{PL}, Γ) + Δf_{RRC}(E, N_{blur}))^2 > f_{DPC}(E) + f_{RRC}(E) + f_{dist}(E) . (10) We simplified the expression for the fractional rms spectrum by expanding the first term on the right-hand side of equation (8) and (9) in a Taylor series around the variable parameters (NPL, Γ), N_{blur}, respectively and neglecting the higher order (second-order derivatives onward) terms. We can also obtain the correlation coefficients, α between ΔNPL and ΔΓ and β between ΔNPL and ΔN_{blur} from the numerator of equation (10). We then fitted the observed fractional rms spectrum of Mrk 1044 by implementing the equation (10) in ISIS v.1.6.2-40 (Houck & DeNicola 2000) as a local model.

Initially, we fitted the 0.3−10 keV Fvar spectrum of Mrk 1044 with a model consisting of variable hot Comptonization component (ΔfDPC) with free parameters ΔNPL, ΔΓ. We also consider that ΔNPL and ΔΓ are correlated by the correlation coefficient α. This provided a statistically unacceptable fit with χ^2/d.o.f = 80.1/16. Then we included variability in the normalization (ΔN_{blur}) of the ionized disc reflected emission and also consider that variations in the normalization of the direct power-law continuum, ΔNPL and inner disc reflection, ΔN_{blur} are connected to each other by the correlation coefficient, β. This model describes the observed fractional rms spectrum of Mrk 1044 well with χ^2/d.o.f = 12.8/14 (Δχ^2=−67.3 for 2 d.o.f). The best-fitting values for the fractional rms spectral model parameters are:

ΔNPL

NPL = 62.8^{+12.6}_{−11.6} per cent,^{ΔΓ}_Γ = 8.6^{+5.4}_{−2.5} per cent, α = 1.0^{+0p}_{−0.21} ,^{ΔNblur}_{Nblur} = 25.0^{+2.5}_{−3.0} per cent and β = −0.34^{+0.34}_{−0.33} . The 0.3−10 keV frequency-averaged fractional rms variability spectrum, the best-fitting variability spectral model and the data-to-model ratio are shown in Figure 16. Thus we infer the presence of a less variable inner disc reflection with variable flux and a more variable direct coronal emission where the flux variations of the coronal emission and relativistic disc reflection are either uncorrelated or moderately anti-correlated with each other.

6 SUMMARY AND DISCUSSION

We present the first results from the broadband (0.3−50 keV) spectral and timing studies of the highly accreting, narrow-line Seyfert 1 galaxy Mrk 1044 using XMM- Newton (∼ 130 ks), NuSTAR (∼ 22 ks) and Swift (∼ 29 ks) observations. Here we perform time-averaged spectral modelling, frequency and energy-dependent time-lag, coherence, absolute and fractional rms variability spectral analyses. We investigate the underlying physical processes (Comptonization, reverberation and propagation fluctuation) surrounding the SMBH and disentangle various emission components

MNRAS 000, 1–21 (0000)

High-density disc reflection in Mrk 1044 17

responsible for the observed energy-dependent variability on various timescales. The main results of our work are summarized below:

(i) The time-averaged XMM-Newton (0.3−10 keV) spectrum of Mrk 1044 shows strong soft X-ray excess emission below ∼ 2 keV, a narrow Fe Kα emission line at ∼ 6.4 keV, a broad Fe emission line at ∼ 6.84 keV and a possible O VIII wind with an outflowing velocity of (0.1 ± 0.01)c.

(ii) The broadband (0.3−50 keV) quasi-simultaneous Swift and NuSTAR spectra confirm the presence of a soft X-ray excess below ∼ 1 keV, a narrow Fe Kα emission line at ∼ 6.4 keV and reveal a Compton hump at ∼ 15 − 30 keV.

(iii) The fitting of the average energy spectrum requires an ionized high-density relativistic reflection model with a broken power-law emissivity profile of the accretion disc, to describe the soft X-ray excess, broad Fe line and Compton hump. The best-fitting values for the electron density, inner radius and break radius of the disc are ne = 5.2^{+5.2}_{−4.2} × 10^{16} cm^{−3}, rin = 1.31^{+0.08}_{−0.05} rg and r_{br} = 3.2^{+0.1}_{−0.1} rg, respectively.

(iv) During the 2013 XMM-Newton observation, Mrk 1044 shows a significant variability with changes in the total X-ray (0.3−10 keV) count rate by ∼ 50 per cent on a timescale of ∼ 800 s. The hardness−flux analysis shows that source hardness decreases with the total X-ray (0.3−10 keV) count rate, suggesting a softer-when-brighter trend as usually observed in radio-quiet narrow-line Seyfert 1 AGN (Fig. 7).

(v) At low frequencies (∼ [2 − 6] × 10^{−5} Hz), the hard band (1.5−5 keV) which is dominated by the illuminating continuum lags behind the relativistic reflection dominated super-soft (0.3−0.8 keV) and soft (0.8−1 keV) bands by (1173 ± 327) s and (815 ± 267) s, respectively. As the frequency increases, the time-lag between the super-soft and hard bands disappears. However, we do see a negative lag between the soft (0.8−1 keV) and hard (1.5−5 keV) bands where the soft band lags behind the hard band by (183 ± 145) s at higher frequencies (∼ [1 − 2] × 10^{−4} Hz) (Fig. 9).

(vi) The low-frequency lag-energy spectrum is featureless and has a power-law like shape, while the high-frequency lag spectrum has a maximum value at 0.8−1 keV where the Fe- L emission line peaks and can be attributed to the delayed emission from the inner accretion disc (Fig. 11). However, we do not see any Fe-K lag. The non-detection of the Fe-K lag has previously been reported in another Seyfert 1 galaxy MCG–6-30-15 (Kara et al. 2014).

(vii) The source variability decreases with energy during both 2013 and 2016 observations. The fractional rms amplitudes in the 0.3−2 keV, 2−10 keV, 3−10 keV and 10−50 keV bands are Fvar,0.3−2 = (20.3 ± 0.1) per cent, Fvar,2−10 = (15.5 ± 0.5) per cent, Fvar,3−10 = (15.1 ± 1.5) per cent, Fvar,10−50 = (7.8 ± 4.8) per cent, respectively. The modelling of the XMM-Newton/EPIC-pn frequency-averaged (∼ 7.8 × 10^{−6} − 1.25 × 10^{−3} Hz) fractional rms spectrum reveals that the observed energy-dependent variability of Mrk 1044 is mainly driven by two components: more variable illuminating continuum and less variable relativistic reflection from an ionized high-density accretion disc.

Figure 17. The variation of the disc electron density as a function of the dimensionless mass accretion rate derived from the radiation pressure solution of Svensson & Zdziarski (1994), and considering α = 0.1, M_{BH} = 3 × 10^6M_⊙, f = 0.9 and r = 10. The dotted and dashed lines represent the observed value of the electron density and its 90 per cent confidence limits, respectively.

6.1 Origin of the soft and hard X-ray excess emission: high-density disc reflection

We investigate the origin of the soft and hard X-ray excess emission including the Fe K emission complex and Compton hump in this low-mass, highly accreting AGN. The modelling of the hard band (3−10 keV) EPIC-pn spectrum of the source requires a hot Comptonization component with a photon index of Γ = 2.25^{+0.07}_{−0.09} along with an ionized, relativistic reflection with a single power-law emissivity profile for the accretion disc to fit the broad Fe emission line and a neutral, non-relativistic reflection from the distant medium to fit the narrow Fe Kα emission line. The extrapolation of the 3−10 keV best-fitting model down to 0.3 keV reveals strong residuals below ∼ 2 keV due to the soft X-ray excess emission. The modelling of the full band (0.3−10 keV) EPIC-pn spectrum including the soft X-ray excess requires a broken power-law emissivity profile and high electron density (ne ∼ 5 × 10^{16} cm^{−3}) for the accretion disc. Moreover, the photon index (Γ ∼ 2.25), disc inclination angle (θ ∼ 45^∘), inner emissivity index (qin ∼ 8 − 10) obtained from considering only the 3−10 keV spectrum explaining the Fe emission complex, are consistent with that inferred from fitting the full band (0.3−10 keV) spectrum including soft X-ray excess. We find that the shape of the inner emissivity profile (ϵin ∝ r^{−9} for r < r_{br}) describing the broad Fe emission line remains unaffected even after the inclusion of the soft band data and we only require another flat power-law emissivity profile (ϵout ∝ r^{−2} for r > r_{br}) of the disc to explain the soft X-ray excess. The physical implication of the broken power-law emissivity profile is that the disc emitting regions responsible for the broad Fe emission line and soft X-ray excess are different and separated by the break radius. The best-fit value of the break radius obtained from the full band (0.3−10 keV) EPIC-pn spectrum is r_{br} ∼ 3rg which implies that soft X-ray excess originates from the high-density accretion disc above ∼ 3rg and the

MNRAS 000, 1–21 (0000)

18 L. Mallick et al.

broad Fe emission line arises in the innermost regions of the accretion disc below the break radius of around 3rg.

We also detect a Compton hump at around 15−30 keV during the 2016 NuSTAR observation. The inclusion of the 10−50 keV spectral data does not affect the spectral model parameters (disc inclination angle, spin, emissivity indices, break radius) obtained from fitting of the 0.3−10 keV spectrum only. The best-fit value of the disc electron density as derived from the modelling of the broadband (0.3−50 keV) spectral data is ne = 5.2^{+5.2}_{−4.2} × 10^{16} cm^{−3}. Mrk 1044 is known to be a highly accreting AGN with the dimensionless mass accretion rate of ṁ =^{Ṁc2}_{LE} = 16.6^{+25.1}_{−10.1} (Du et al. 2015). At high accretion rate, the inner region of a standard α-disc (Shakura & Sunyaev 1973) is radiation pressuredominated and the electron density of the disc can be written as (Svensson & Zdziarski 1994)

ne = 1 σTRS 256 √ 2 27 α^{−1}r^{3/2}ṁ^{−2}[1 − (3/r)]^{−1}(1 − f)^{−3}. (11)

where σT = 6.64 × 10^{−25} cm^2 is the Thomson scattering cross section, RS = 2GMBH/c^2 is the Schwarzschild radius, MBH is the black hole mass, α = 0.1 is the disc viscosity parameter, r = R/RS, R is the characteristic disc radius, ṁ =^{Ṁc2}_{LE} is the dimensionless mass accretion rate, f is the fraction of the total power released by the disc into the corona. The variation of the disc electron density (ne) with the dimensionless mass accretion rate (ṁ) for α = 0.1, MBH = 3 × 10^6 M⊙, f = 0.9 and r = 10 is shown as the solid curve in Figure 17. As evident from Fig. 17, the assumption of constant disc density (ne = 10^{15} cm^{−3}) is not physically realistic for low-mass AGN even when the mass accretion rate is very high. The observed best-fit value for the disc electron density of the source and its 90 per cent confidence limits are shown as the dotted and dashed lines in Fig. 17, respectively. The corresponding dimensionless mass accretion rate of Mrk 1044 estimated using equation (11) is ṁ ≈ 10 − 32, which is in agreement with that found by Du et al. (2015). We further verified the SMBH mass with the use of X-ray variability techniques as pioneered by Ponti et al. (2012). The relation between the SMBH mass (MBH,7) in units of 10^7 M⊙ and normalized excess variance (σ^2_{NXS}) in the 2−10 keV light curves of 10 ks segments and the bin size of 250 s, can be written as

log(σ^2_{NXS}) = (−1.83 ± 0.1) + (−1.04 ± 0.09) log(MBH,7). (12)

The SMBH mass of Mrk 1044 measured using equation (12) is MBH = (4 − 5) × 10^6 M⊙ which is close to that measured by Du et al. (2015).

We detected a broad absorption line with the rest frame energy of around 0.72 keV as a single feature and one of the strongest lines present both in the EPIC-pn and RGS spectra. The modelling of the RGS spectrum with the photoionized absorption model infers the presence of an O VIII wind moving with the outflow velocity of (0.1 ± 0.01)c. The existence of a persistent (flux independent) O VIII outflow has previously been reported in another highly-accreting NLS1 AGN IRAS 13224–3809 (Pinto et al. 2018).

Our broadband spectral analysis also reveals that the central SMBH of Mrk 1044 is spinning very fast with the spin parameter a = 0.997^{+0.001}_{−0.016} . The high spin (a ≈ 1) is a natural consequence of high radiative efficiency of prograde accretion (see Fig.5 of King, Pringle & Hofmann 2008), which is further supported by the very high accretion rate of Mrk 1044. So the high spin is not the result of the shortcoming of the relativistic reflection model. Hence we conclude that the origin of the soft X-ray excess, broad Fe emission line and Compton hump is the relativistic reflection from an ionized, high-density accretion disc around the rapidly rotating SMBH.

6.2 Probing Comptonization, propagation fluctuation and reverberation scenarios

We detected hard lags where the 1.5 − 5 keV band emission lags behind the emission from the 0.3−0.8 keV and 0.8−1 keV bands by 1173 ± 327 s and 815 ± 267 s, respectively in the lowest frequency range (2 − 6) × 10^{−5} Hz. Here we explore both the Compton scattering and propagation fluctuation scenarios for the origin of the hard lag. In the framework of Compton up-scattering, a soft X-ray photon with energy ES after N scatterings produces a hard X-ray photon of energy EH (Zdziarski 1985)

EH = A^N ES, (13)

where A = 1 + 4θ + 16θ^2, θ =^{kB Te}_{mec2} and Te and me are the electron temperature and rest mass, respectively. If tc is the time delay between successive scatterings and the hard X-ray photons are produced within the optically thin, hot corona after N scatterings, then the Comptonization timescale is tcomp = Ntc. (14) For an optically thin, hot (Te ∼ 100 keV) corona of size r ∼ 10rg , the Comptonization timescales of ∼ 0.3 keV and ∼ 0.8 keV photons which eventually produce ∼ 5 keV photons within the corona, are ∼ 470 s and ∼ 300 s, respectively. The estimated Comptonization timescales are much smaller than the observed hard lags. Therefore, the origin of the hard lag is not entirely due to the Compton upscattering of the soft X-ray photons from the disc. Then we investigated the viscous propagation fluctuation scenario as proposed by Kotov, Churazov & Gilfanov (2001). In this scenario, the fluctuations produced at different radii in the disc propagates inwards and then hits the edge of the X-ray emitting corona on timescales corresponding to the viscous timescale. The viscous timescale at the disc emission radius r is defined by

tvis = 1 α ( r h )_2 t_{dyn}, (15)

where α ∼ 0.1 is the viscosity parameter, h is the disc height which is much smaller than the disc radius r for a standard thin disc. However, in the inner regions of the disc, r is only a few rg and one can consider h ≈ r. Therefore the expression for the viscous timescale becomes tvis ≈^1_α t_{dyn}. For a SMBH of mass MBH, the dynamical timescale is

t_{dyn} = √_{r3} GMBH ≈ 500

(_{MBH} 108 M⊙ ) (_r rg )_{3/2} s. From the modelling of the full band XMM-Newton/EPIC-pn spectrum with the relativistic reflection model, we found that the soft X-ray photons are produced in the disc above the break radius of r_{br} = r ∼ 3rg. Therefore, the minimum viscous timescale required for a soft X-ray photon to hit the edge

MNRAS 000, 1–21 (0000)

High-density disc reflection in Mrk 1044 19

of the corona is estimated to be tvis ∼ 780 s. Thus the observed hard lags of 1173 ± 327 s and 815 ± 267 s between the super-soft (0.3 − 0.8 keV) and hard (1.5 − 5 keV) bands and between the soft (0.8 − 1 keV) and hard (1.5 − 5 keV) bands can indeed correspond to the sum of the fluctuation propagation timescale (∼ 780 s) between the inner disc and edge of the corona and the Comptonization timescales (∼ 470 s and ∼ 300 s) of the ∼ 0.3 keV and ∼ 0.8 keV seed photons within the corona, respectively. In the propagation fluctuation scenario, we expect to see log-linear behaviour of the lag-energy spectrum. However, the shape of the lowfrequency lag-energy spectrum is not entirely consistent with the log-linear lags. The possible reason for the dilution of the log-linear behaviour could be the Compton up-scattering of the soft X-ray photons in the corona (Uttley et al. 2011). Thus we conclude that both propagation fluctuation and Comptonization are responsible for the observed time-lags on longer timescales.

We also detected a soft lag where the 0.8−1 keV band emission lags behind the harder 1.5−5 keV band emission by 38−328 s in the higher frequency range ∼ (1−2)×10^{−4} Hz. We estimated the soft lag for Mrk 1044 using the scaling relation between the soft lag amplitude (|τ |) and SMBH mass (MBH) from De Marco et al. (2013): log |τ | = 1.98[±0.08] + 0.59[±0.11] log(MBH), where MBH is the SMBH mass in units of 10^7M⊙. For Mrk 1044, the scaling relation suggests the amplitude of the soft lag to lie in the range |τ | = 44−49 s, which is consistent with our measured time-lag. The origin of the soft lag can be explained in the context of the reverberation scenario where the soft X-ray excess emission is produced due to relativistic reflection from an ionized accretion disc and lag amplitude corresponds to the light-crossing time between the direct power-law emitting hot corona and soft X-ray emitting inner disc. For Mrk 1044, the measured soft lag of (38 − 328) s implies that the physical separation between the corona and soft X-ray emitting inner disc is in the range r = (2.5 − 22)rg . This radius is consistent with our average energy spectral fitting with the high-density relativistic reflection model, which revealed that the soft Xray excess emission was originated above a certain radius (r_{br} ∼ 3rg), known as the break radius of the accretion disc. However, we do not find the Fe-K lag in Mrk 1044 which could be caused by several reasons. Since Mrk 1044 is a low-mass AGN and Fe-K emission originates from the innermost region (r ∼ 1.3rg ) of the disc, the predicted Fe-K lag amplitude is only ∼ 20 s which is difficult to detect given the signal-to-noise in the hard band. Another reason for the non-detection of the Fe-K lag could be due to the absence of correlated variability between the direct continuum and disc reflection or changes in the height or radius of the corona, which we discuss in the next section.

6.3 Origin of the broadband X-ray variability and disc/corona connection

The X-ray emission from the source is variable and the variability amplitude is both energy and frequency-dependent. The source showed a decrease in fractional rms amplitude with energy and the shape of the variability spectrum is very similar in both low (ν_{low} ∼ [1.7 − 10] × 10^{−5} Hz) and high (ν_{high} ∼ [1 − 10] × 10^{−4} Hz) frequency bands, although the amplitude is different on different timescales

(see Fig. 15). The fractional variability amplitudes of the source in the 0.3 − 10 keV, 0.3 − 2 keV and 2 − 10 keV bands are (15.9 ± 0.1) per cent, (16.5 ± 0.1) per cent and (11.1±0.4) per cent, respectively on timescales of ∼ 5−60 ks and (17.1 ± 0.1) per cent, (17.6 ± 0.2) per cent and (13.4 ± 0.5) per cent, respectively on timescales of ∼ 0.5 − 10 ks. Thus, it is apparent that the X-ray emission from Mrk 1044 is more variable on short timescales (< 10 ks) in all three energy bands, implying that the shorter timescale variability has been originated in a more compact emitting region which radiates at the smaller radii of the disc and hence close to the SMBH. The modelling of the frequency-averaged fractional rms spectrum reveals the presence of two-component variability: direct coronal and reflected inner disc emission, both of which are variable either in an uncorrelated or moderately anti-correlated manner and the disc reflection variability is about a factor of 2 smaller than the coronal variability. The primary power-law emission from the hot corona is variable both in flux and spectral index. We find that the flux and spectral index variability are positively correlated with each other by ∼ 79 − 100 per cent, which can be explained in the context of Compton cooling of the soft seed photons in the hot corona. The lack of positive correlation between the hot coronal and inner disc reflected emission indicates that either the primary X-ray emitting hot corona is compact and moving closer or further from the central SMBH or the corona is extended and is expanding or contracting with time (see Wilkins et al. 2014). In this scenario, the total number of photons emitted from the source remains constant and the observed energy-dependent X-ray variability is mainly caused by changes in the location or geometry of the corona in terms of height if the corona is compact or radius if the corona is extended.

7 ACKNOWLEDGMENTS

We thank the anonymous referee for useful comments that improved the quality of the paper. LM gratefully acknowledges financial support from the University Grants Commission (UGC), Government of India. LM is highly grateful to the University of Cambridge for supporting an academic visit. WNA and ACF acknowledge support from the European Union Seventh Framework Programme (FP7/2013- 2017) under grant agreement no. 312789, StrongGravity. WNA, ACF and CP acknowledge support from the European Research Council through Advanced Grant 340442, on Feedback. This research has made use of archival data of XMM-Newton, Swift and NuSTAR observatories through the High Energy Astrophysics Science Archive Research Center Online Service, provided by the NASA Goddard Space Flight Center. This research has made use of the NASA/IPAC Extragalactic Database (NED), which is operated by the Jet Propulsion Laboratory, California Institute of Technology, under contract with the NASA. This research has made use of the XRT Data Analysis Software (XRTDAS) developed under the responsibility of the ASI Science Data Center (ASDC), Italy. This research has made use of the NuSTAR Data Analysis Software (NuSTARDAS) jointly developed by the ASI Science Data Center (ASDC, Italy) and the California Institute of Technology (Caltech, USA). This research has made use of ISIS functions (ISISs-

MNRAS 000, 1–21 (0000)

20 L. Mallick et al.

cripts) provided by ECAP/Remeis observatory and MIT (http://www.sternwarte.uni-erlangen.de/isis/). Figures in this paper were made with the graphics package pgplot and GUI scientific plotting package veusz. This research made use of the python packages numpy, scipy and matplotlib.

REFERENCES

Arnaud K. A., 1996, ASPC, 101, 17 Asplund M., Grevesse N., Sauval A. J., Scott P., 2009, ARA&A, 47, 481 Arévalo P., Papadakis I. E., Uttley P., McHardy I. M., Brinkmann W., 2006, MNRAS, 372, 401 Arévalo P., Uttley P., 2006, MNRAS, 367, 801 Arévalo P., McHardy I. M., Summons D. P., 2008, MNRAS, 388, 211 Alston W. N., Vaughan S., Uttley P., 2013, MNRAS, 435, 1511 Alston W. N., Parker M. L., Markeviciute J., 2015, MNRAS, 449, 467 Alston W. N. et al., 2018, arXiv:1803.10444 Blackburn J. K., 1995, in Shaw R. A., Payne H. E., Hayes J. J.

E., eds, ASP Conf. Ser. Vol. 77, Astronomical Data Analysis Software and Systems IV. Astron. Soc. Pac., San Francisco, p. 367 Burrows D. N. et al. 2005, Space Sci. Rev., 120, 165 Churazov E., Gilfanov M., Revnivtsev M., 2001, MNRAS, 321, 759 Crummy J., Fabian A. C., Gallo L., Ross R. R., 2006, MNRAS, 365, 1067 Cackett E. M., Fabian A. C., Zogbhi A., Kara E., Reynolds C., Uttley P., 2013, ApJ, 764, L9 den Herder J. W. et al., 2001, A&A, 365, L7 De Marco B. et al. 2011, MNRAS, 417, L98 De Marco B. et al. 2013, MNRAS, 431, 2441 Dewangan G. C., Griffiths R. E., Dasgupta S., Rao A. R., 2007, ApJ, 671, 1284 Done C., Davis S. W., Jin C., Blaes O., Ward M., 2012, MNRAS, 420, 1848 Du P. et al. 2015, ApJ, 806, 22D Edelson R. et al., 2002, ApJ, 568, 610 Emmanoulopoulos D., McHardy I. M., Papadakis I. E., 2011, MN- RAS, 416, L94 Fabian A. C., Rees M. J., Stella L., White N. E., 1989, MNRAS, 238, 729 Fabian A. C. et al., 2009, Nature, 459, 540 Fabian A. C., 2012, ARA&A, 50, 455 Fabian A. C., Zoghbi A., Wilkins D., Dwelly T., Uttley, P. et al., 2012, MNRAS, 419, 116 Gehrels N., et al., 2004, ApJ, 611, 1005 Gierliński M., Zdziarski A. A., 2005, MNRAS, 363, 1349 García J. et al., 2014, ApJ, 782, 76 García J. et al., 2016, MNRAS, 462, 751 Haardt F., Maraschi L., 1991, ApJ, 380, 51 Haardt F., Maraschi L., 1993, ApJ, 413, 507 Houck J. C., DeNicola L. A., 2000, in Manset N., Veillet C., Crabtree D., eds, ASP Conf. Ser., Vol. 216, Astronomical Data Analysis Software and Systems IX. Astron. Soc. Pac., San Francisco, p. 591 Harrison F. A., Craig W. W., Christensen F. E., et al. 2013, ApJ, 770, 103 Hogg J. D., Reynolds C. S., 2016, ApJ, 826, 40 Jansen F. et al., 2001, A&A, 365, L1 Jiang J. et al., 2018, MNRAS, 477, 3711 Kaastra J. S., Mewe R., Nieuwenhuijzen H., 1996, in Yamashita K., Watanabe T., eds, UV and X-ray Spectroscopy of Astrophysical and Laboratory Plasmas, Universal Academy Press, Tokyo, p. 411 Kallman T., Bautista M. 2001, ApJS, 133, 221 Kotov O., Churazov E., Gilfanov M., 2001, MNRAS, 327, 799 King A. R., Pringle J. E., Hofmann J. A., 2008, MNRAS, 385, 1621 Kormendy J., Ho L. C., 2013, ARA&A, 51, 511 Kara E., Fabian A. C., Cackett E. M., Uttley P., Wilkins D. R., Zoghbi A., 2013, MNRAS, 434, 1129 Kara E. et al., 2014, MNRAS, 445, 56 Kara E. et al., 2015, MNRAS, 449, 234 Laor A., 1991, ApJ, 376, 90 Lohfink A. M., Reynolds C. S., Miller J. M., Brenneman L. W., Mushotzky R. F., Nowak M. A., Fabian A. C., 2012, ApJ, 758, 67 Lobban A. P., Porquet D., Reeves J. N., Markowitz A., Nardini E., Grosso N., 2018, MNRAS, 474, 3237 Miyamoto S., Kitamoto S., Mitsuda K., Dotani T., 1988, Nature, 336, 450 Markowitz A., Edelson R., Vaughan S., 2003, ApJ, 598, 935 Markowitz A., Papadakis I., Arévalo P., Turner T. J., Miller L., Reeves J. N., 2007, ApJ, 656, 116 McHardy I. M., Papadakis I. E., Uttley P., Page M. J., Mason K.

O., 2004, MNRAS, 348, 783 Miniutti G. et al., 2007, PASJ, 59S, 315 Miller L., Turner T. J., Reeves J. N., Braito V., 2010, MNRAS, 408, 1928 Matt G. et al. 2014, MNRAS, 439, 3016 Marinucci A. et al., 2014, ApJ, 787, 83 Mallick L., Dewangan G.C., Gandhi P., Misra R., Kembhavi A.

K., 2016, MNRAS, 460, 1705 Mallick L., Dewangan G.C., McHardy I. M., Pahari M., 2017, MNRAS, 472, 174 Mallick L., Dewangan G.C., 2017, arXiv:1702.08383 Nowak M. A., Vaughan B. A., Wilms J., Dove J. B., Begelman M. C., 1999, ApJ, 510, 874 Nardini E., Fabian A. C., Reis R. C., Walton D. J. 2011, MNRAS, 410, 1251 Papadakis I. E., Nandra K., Kazanas D., 2001, ApJ, 554, 133 Pounds K. A., King A. R., Page K. L., O’Brien P. T., 2003, MN- RAS, 346, 1025 Ponti G., Papadakis I., Bianchi S., Guainazzi M., Matt G., Uttley P., Bonilla N. F., 2012, A&A, 542, 83 Pinto C., Kaastra J. S., Costantini E., de Vries C., 2013, A&A, 551, A25 Parker M. L. et al. 2015, MNRAS, 447, 72 Parker M. L. et al. 2017, Nature, 543, 83 Pinto C. et al., 2018, MNRAS, 476, 1021 Porquet D. et al., 2018, A&A, 609, 42 Ross R. R., Fabian A. C., 2005, MNRAS, 358, 211 Risaliti G. et al., 2013, Nature, 494, 449 Reeves J. N. et al., 2014, ApJ, 780, 45 Shakura N. I., Sunyaev R. A., 1973, A&A, 24, 337 Sunyaev R. A., Titarchuk L. G., 1980, A&A, 86, 121 Svensson R., Zdziarski A. A., 1994, ApJ, 436, 599 Strüder L. et al., 2001, A&A, 365, L18 Scargle J. D., Norris J. P., Jackson B., Chiang J., 2013, ApJ, 764, 167 Taylor R. D., Uttley P., McHardy I. M., 2003, MNRAS, 342, 31 Tombesi F., Sambruna R. M., Reeves J. N., Reynolds C. S., Braito V., 2011, MNRAS, 418, L89 Tomsick John A. et al., 2018, ApJ, 855, 3 Uttley P., Wilkinson T., Cassatella P., Wilms J., Pottschmidt K., Hanke M., Böck M., 2011, MNRAS, 414, 60 Vaughan B. A., Nowak M. A., 1997, ApJ, 474, L43 Vaughan S., Edelson R., Warwick R. S., Uttley P., 2003, MNRAS, 345, 1271

MNRAS 000, 1–21 (0000)

High-density disc reflection in Mrk 1044 21

Vaughan S., Uttley P., Pounds K. A., Nandra K., Strohmayer T.

E., 2011, MNRAS, 413, 2489 Wang T., Lu Y., 2001, A&A, 377, 52 Willingale R., Starling R. L. C., Beardmore A. P., Tanvir N. R., OB́rien P. T., 2013, MNRAS, 431, 394 Wilkins D. R., Kara E., Fabian A. C., Gallo L. C. 2014, MNRAS, 443, 2746 Zdziarski A. A., 1985, ApJ, 289, 514 Zoghbi, A., Fabian, A. C., Uttley, P., Miniutti, G., Gallo, L. C., Reynolds, C. S., Miller, J. M., Ponti, G., 2010, MNRAS, 401, 2419 Zoghbi A., Fabian A. C., Reynolds C. S., Cackett E. M., 2012, MNRAS, 422, 129

APPENDIX A: ADDITIONAL PLOTS

This paper has been typeset from a TEX/L^ATEX file prepared by the author.

MNRAS 000, 1–21 (0000)

22 L. Mallick et al.

Figure A1. The probability distributions of the observed absorption line energy (E_{abs}) and width (σ_{abs} ), inner (q_{in}) and outer (q_{out}) emissivity indices, break radius (r_{br}), SMBH spin (a), disc inclination angle (θ^∘), inner disc radius (r_{in}), photon index (Γ), Fe abundance (A_{Fe}), disc electron density (log n_e) and ionization parameter ( log ξ_{blur}). The results are obtained from a 10^6 length MCMC run on the best-fitting full band (0.3 − 10 keV) EPIC-pn spectral model parameters.

MNRAS 000, 1–21 (0000)

High-density disc reflection in Mrk 1044 23

Figure A2. The contour plots between various spectral parameters for the full band (0.3 − 10 keV) EPIC-pn spectrum. The dotted, dashed and solid lines correspond to 68, 90 and 99 per cent confidence levels, respectively. The star symbols represent the best-fitting values of the parameters. All the parameters are well constrained and non-degenerate.

MNRAS 000, 1–21 (0000)