arXiv:1802.07996v1 [astro-ph.SR] 22 Feb 2018

Multicolor photometric behavior of the young stellar object V1704 Cygni

Sunay Ibryamov^1, Evgeni Semkov^2, Stoyanka Peneva^2, Uğur Karadeniz^3

1 Department of Physics and Astronomy, University of Shumen, 115, Universitetska Str., 9700 Shumen, Bulgaria 2 Institute of Astronomy and National Astronomical Observatory, Bulgarian Academy of Sciences, 72, Tsarigradsko Shose Blvd., 1784 Sofia, Bulgaria 3 Department of Physics, Izmir Institute of Technology, Urla, 35430 Izmir, Turkey sibryamov@shu.bg (Submitted on; Accepted on)

Abstract. Results from BV RI photometric observations of the pre-main sequence star V1704 Cyg collected during the time period from August 2010 to December 2017 are presented. The star is located in the star-forming HII region IC 5070 and it exhibits photometric variability in all-optical passbands. After analyzing the obtained data, V1704 Cyg is classified as a classical T Tauri star.

Key words: stars: pre-main sequence, stars: variables: T Tauri, star: individual: (V1704 Cyg)

1. Introduction

One of the most frequent types of pre-main sequence (PMS) stars are the low-mass (M ≤ 2M_⊙) T Tauri stars (TTSs). The first study of the TTSs as a separate class of variables with the prototype star T Tau was made by Joy (1945). These stars show irregular photometric variability and emission spectra.

TTSs are divided into two sub-classes: classical T Tauri stars (CTTSs) still actively accreting from their massive circumstellar disks and the weak-line T Tauri stars (WTTSs) without evidence of disk accretion (Ménard & Bertout 1999).

According to the classification scheme for the light curves of the CTTSs proposed by Ismailov (2005) can clearly distinguish five principal types based on the light curve shape: (Type I): constant mean brightness without changes in the amplitude of the rapid brightness variability; (Type II): constant mean brightness with changes in the amplitude of the rapid variability; (Type III): varying mean brightness without changes in the amplitude of the rapid variability; (Type IV): variations of both the mean brightness and the amplitude of the rapid variability; and (Type V): the variable is often bright, and rare brightness decreases are observed. The possible physical mechanisms responsible for the different light curve shapes are given in Ismailov (2005).

The long-term multicolor observations are of particular importance to the find and the classification of PMS stars. The number of the studied PMS stars is not large. Each individual study in this direction is important and contributes to the overall shaping of the scientific ideas about the star formation process.

V1704 Cygni (also known as LkH_α 155 and [KW97] 50-45) was included in the list of H_α emission-line stars published by Herbig (1958). The spectrum of the star taken by Mendoza et al. (1990) shows spectral type K3 and strong hydrogen (W_λ(H_α)=98.8 Å and W_λ(H_β)=36.7 Å) and forbidden emission lines. He I (λ 5876 Å and λ 7065 Å), [O II] (λ 3727-9 Å) and [S II] (λ 6717 plus λ

Bulgarian Astronomical Journal xx, 2018

6731 Å) emission lines are present. Guieu et al. (2009) included V1704 Cyg in their list of young stellar object candidates.

Section 2 in the present paper gives information about the telescopes and cameras used to collect the photometric observations. Section 3 describes the derived results and their interpretation.

2. Observations and Data reduction

The BV RI photometric observations of V1704 Cyg were performed from August 2010 to December 2017 with the 2-m Ritchey-Chrétien-Coudé (RCC), the 50/70-cm Schmidt and the 60-cm Cassegrain telescopes administered by the Rozhen National Astronomical Observatory in Bulgaria and the 1.3-m Ritchey-Chrétien (RC) telescope administered by the Skinakas Observatory^1 of the University of Crete in Greece. The total number of the nights used for observations is 212.

The observations were performed with four different types of CCD cameras: VersArray 1300B at the 2-m RCC telescope, ANDOR DZ436-BV at the 1.3-m RC telescope, FLI PL16803 at the 50/70-cm Schmidt telescope, and FLI PL09000 at the 60-cm Cassegrain telescope. The technical parameters and specifications for the cameras used are given in Ibryamov et al. (2015). All frames were taken through a standard Johnson−Cousins BV RI set of filters. The frames are dark (bias) frame subtracted and flat field corrected. The photometric data were reduced using idl based daophot subroutine. As a reference, the BV RI comparison sequence of eleven stars in the field around V2492 Cyg reported in Ibryamov et al. (2018) was used. All data were analyzed using the same aperture, which was chosen to have a 4^{′′} radius, while the background annulus was taken from 9 to 14^{′′}. The average value of the errors in the reported magnitudes is 0.01−0.02 mag for the I- and R-band data and 0.01−0.03 mag for the V - and B-band data.

3. Results and Discussion

V1704 Cyg is located in the field of the Pelican Nebula (IC 5070) at 1^′ from the well-studied young star V2492 Cyg. The results from our long-term BV RI photometric monitoring of V1704 Cyg are summarized in Tab. 1^2. The available photometric data of the star are plotted on Fig. 1.

Table 1: Photometric CCD observations of V1704 Cyg.

Date J.D. (24...) I [mag] R [mag] V [mag] B [mag] Telescope CCD

26.08.2010 55435.339 14.66 16.24 17.61 19.24 1.3-m AND 07.09.2010 55447.457 14.60 16.11 17.20 - Sch FLI 08.09.2010 55448.298 14.57 16.07 17.25 - Sch FLI 09.09.2010 55449.378 14.62 16.14 17.32 - Sch FLI

1 Skinakas Observatory is a collaborative project of the University of Crete, the Foundation for Research and Technology, Greece, and the Max-Planck-Institut für Extraterrestrische Physik, Germany.

2 The table is available also via CDS Vizier Online Data Catalog.

Table 1: Continued.

Date J.D. (24...) I [mag] R [mag] V [mag] B [mag] Telescope CCD

11.10.2010 55481.316 14.24 15.69 16.92 18.27 1.3-m AND 29.10.2010 55499.210 14.51 15.98 17.20 18.71 2-m VA 30.10.2010 55500.184 14.50 15.98 17.20 18.69 2-m VA 31.10.2010 55501.178 14.46 15.98 - - Sch FLI 31.10.2010 55501.253 14.47 15.97 17.19 18.67 2-m VA 01.11.2010 55502.178 14.48 15.97 17.15 18.57 2-m VA 02.11.2010 55503.188 14.39 15.82 - - Sch FLI 03.11.2010 55504.219 14.41 15.92 - - Sch FLI 04.11.2010 55505.175 14.44 15.98 - - Sch FLI 05.11.2010 55506.206 14.47 15.98 17.18 - Sch FLI 06.11.2010 55507.207 14.50 15.99 - - Sch FLI 01.01.2011 55563.188 14.49 16.04 - - Sch FLI 06.01.2011 55568.169 14.31 15.67 16.62 17.85 2-m VA 08.01.2011 55570.171 14.49 15.93 17.09 18.52 2-m VA 09.01.2011 55571.173 14.34 15.85 16.95 18.30 2-m VA 11.01.2011 55573.215 14.62 16.02 17.18 - 2-m VA 12.01.2011 55574.240 14.59 16.10 17.28 - 2-m VA 07.02.2011 55599.675 14.58 16.12 17.52 - Sch FLI 04.04.2011 55656.484 14.56 16.00 - - Sch FLI 08.04.2011 55659.502 14.37 15.80 - - 2-m VA 21.05.2011 55703.401 14.66 - - - Sch FLI 23.05.2011 55705.398 14.54 - - - Sch FLI 25.05.2011 55707.379 14.63 - - - Sch FLI 08.06.2011 55721.357 14.61 16.07 - - 2-m VA 21.06.2011 55734.405 14.66 - - - Sch FLI 23.06.2011 55736.468 14.72 - - - Sch FLI 16.08.2011 55790.302 14.62 - - - 1.3-m AND 17.08.2011 55791.306 14.68 16.29 17.61 19.14 1.3-m AND 23.08.2011 55797.310 14.64 - - - Sch FLI 10.09.2011 55815.428 14.72 16.33 17.66 19.14 1.3-m AND 11.09.2011 55816.415 14.66 16.22 17.53 - 1.3-m AND 19.09.2011 55824.258 14.55 16.06 17.29 18.69 1.3-m AND 23.09.2011 55828.268 14.57 - - - Sch FLI 07.10.2011 55842.288 14.46 15.88 - - 1.3-m AND 13.10.2011 55848.252 14.67 16.28 17.62 18.94 1.3-m AND 29.10.2011 55864.210 14.70 16.17 17.43 - 2-m VA 31.10.2011 55866.256 14.47 15.93 17.02 18.36 2-m VA 26.11.2011 55892.192 14.35 15.77 16.91 - 2-m VA 29.11.2011 55895.188 14.49 15.92 - - Sch FLI 30.11.2011 55896.201 14.53 15.99 - - Sch FLI 29.12.2011 55925.190 14.52 - - - Sch FLI 01.01.2012 55928.172 14.53 - - - Sch FLI 17.03.2012 56003.552 14.52 - - - Sch FLI 29.03.2012 56015.527 14.57 - - - 2-m VA 15.06.2012 56094.409 14.58 16.07 17.27 - 2-m VA 17.06.2012 56096.374 14.57 16.00 - - Sch FLI 11.07.2012 56120.350 14.62 16.10 17.32 - Sch FLI 12.07.2012 56121.313 14.64 16.17 17.36 - Sch FLI 13.07.2012 56122.375 14.57 16.13 17.25 - Sch FLI 14.07.2012 56123.347 14.56 16.08 17.28 18.64 Sch FLI 01.08.2012 56141.399 14.54 16.02 17.23 - 1.3-m AND 02.08.2012 56142.285 14.53 16.02 17.22 - 1.3-m AND 03.08.2012 56143.269 14.59 16.10 17.23 - 1.3-m AND 12.08.2012 56151.614 14.55 16.05 17.25 - 1.3-m AND 19.08.2012 56159.326 14.64 16.20 17.39 - Sch FLI 20.08.2012 56160.303 14.69 16.32 17.58 - Sch FLI 21.08.2012 56160.540 14.66 16.26 17.56 - 1.3-m AND

Table 1: Continued.

Date J.D. (24...) I [mag] R [mag] V [mag] B [mag] Telescope CCD

21.08.2012 56161.323 14.70 16.32 17.54 - Sch FLI 22.08.2012 56162.315 14.66 16.23 17.48 - Sch FLI 02.09.2012 56173.310 14.64 16.23 17.52 19.08 1.3-m AND 03.09.2012 56174.274 14.64 16.27 17.51 19.07 1.3-m AND 07.09.2012 56178.280 14.63 16.18 17.35 18.74 1.3-m AND 08.09.2012 56179.449 14.55 16.10 17.28 - 1.3-m AND 09.09.2012 56180.281 14.50 15.96 17.07 18.40 1.3-m AND 10.09.2012 56181.267 14.52 16.02 17.16 18.52 1.3-m AND 11.09.2012 56182.222 14.50 16.00 17.13 18.51 1.3-m AND 12.09.2012 56183.346 14.59 16.15 17.34 18.78 1.3-m AND 22.09.2012 56193.254 14.59 16.13 17.27 18.68 1.3-m AND 22.09.2012 56193.317 14.60 16.16 17.36 18.77 Sch FLI 23.09.2012 56194.301 14.50 15.93 17.22 18.48 Sch FLI 07.10.2012 56208.229 14.69 16.27 17.42 - Sch FLI 08.10.2012 56209.232 14.65 16.21 17.42 - Sch FLI 09.10.2012 56210.214 14.65 16.20 17.42 - Sch FLI 11.10.2012 56212.241 14.59 16.11 17.29 - 60-cm FLI 13.10.2012 56214.223 14.60 16.14 17.37 18.88 2-m VA 25.10.2012 56226.298 14.61 16.19 17.37 - Sch FLI 26.10.2012 56227.406 14.61 16.17 17.40 - Sch FLI 17.11.2012 56249.191 14.69 16.32 17.56 - Sch FLI 18.11.2012 56250.201 14.63 16.18 17.38 18.76 Sch FLI 12.12.2012 56274.189 14.62 16.12 17.37 - 2-m VA 14.12.2012 56276.191 14.62 16.08 17.29 18.81 2-m VA 31.12.2012 56293.225 14.57 16.12 17.35 - Sch FLI 01.01.2013 56294.205 14.49 15.96 17.15 - 60-cm FLI 03.01.2013 56296.253 14.63 16.13 - - 60-cm FLI 19.01.2013 56312.197 14.52 16.04 17.23 - 2-m VA 05.02.2013 56329.182 14.78 16.33 - - Sch FLI 06.03.2013 56357.621 14.51 16.00 17.22 - 60-cm FLI 12.04.2013 56394.505 14.52 15.92 17.05 18.48 Sch FLI 18.03.2013 56396.585 14.55 16.06 17.31 19.05 2-m VA 04.05.2013 56417.438 14.64 16.14 17.41 19.11 2-m VA 15.05.2013 56428.423 14.64 16.15 - - 60-cm FLI 17.05.2013 56430.426 14.67 16.26 - - 60-cm FLI 30.05.2013 56443.403 14.52 16.06 17.19 18.70 Sch FLI 31.05.2013 56444.375 14.58 16.12 17.31 18.73 Sch FLI 04.07.2013 56478.389 14.68 16.20 17.46 19.01 2-m VA 01.08.2013 56506.376 14.68 16.21 17.48 19.05 2-m VA 02.08.2013 56507.386 14.66 16.23 17.54 19.20 2-m VA 03.08.2013 56508.395 14.63 16.18 17.47 19.06 2-m VA 04.08.2013 56509.310 14.61 16.18 17.37 - Sch FLI 05.08.2013 56510.365 14.62 16.19 17.49 - Sch FLI 05.08.2013 56510.392 14.60 16.14 17.40 - 60-cm FLI 06.08.2013 56511.432 14.65 16.23 17.42 - 60-cm FLI 07.08.2013 56512.379 14.60 16.12 17.32 - Sch FLI 07.08.2013 56512.423 14.56 16.11 17.32 - 60-cm FLI 08.08.2013 56513.401 14.62 16.20 17.33 - 60-cm FLI 09.08.2013 56514.369 14.57 16.09 17.30 - 60-cm FLI 04.09.2013 56540.298 14.58 16.08 17.32 18.63 Sch FLI 05.09.2013 56541.292 14.59 16.10 17.27 18.60 Sch FLI 07.09.2013 56543.426 14.71 16.23 17.52 19.12 2-m VA 08.09.2013 56544.280 14.72 16.26 17.50 - 2-m VA 11.09.2013 56547.408 14.64 16.16 17.36 - 60-cm FLI 17.09.2013 56553.262 14.61 16.20 17.43 - 1.3-m AND 11.10.2013 56577.327 14.57 16.15 17.32 - 60-cm FLI 12.10.2013 56578.352 14.59 16.18 17.42 - 60-cm FLI

Table 1: Continued.

Date J.D. (24...) I [mag] R [mag] V [mag] B [mag] Telescope CCD

07.11.2013 56604.286 14.58 16.09 17.22 - 60-cm FLI 09.12.2013 56636.209 14.55 16.05 - - 2-m VA 29.12.2013 56656.202 14.66 16.19 - - Sch FLI 23.01.2014 56681.208 14.61 16.16 - - Sch FLI 06.02.2014 56694.641 14.49 15.93 17.08 - 2-m VA 22.03.2014 56738.568 14.63 16.21 17.43 - Sch FLI 21.05.2014 56799.450 14.51 16.01 - - Sch FLI 23.05.2014 56801.411 14.60 16.13 17.40 - 2-m VA 23.06.2014 56832.439 14.54 16.00 17.24 - 2-m VA 25.06.2014 56834.400 14.55 16.01 17.19 - 2-m VA 25.07.2014 56864.345 14.66 - - - Sch FLI 03.08.2014 56873.383 14.67 - - - 2-m VA 29.08.2014 56899.292 14.58 16.13 - - 1.3-m AND 26.11.2014 56988.172 14.58 - - - Sch FLI 13.12.2014 57005.216 14.54 16.01 - - Sch FLI 14.12.2014 57006.246 14.48 15.91 - - Sch FLI 24.12.2014 57016.190 14.52 16.03 - - 2-m VA 21.02.2015 57074.619 14.40 15.83 - - Sch FLI 23.04.2015 57136.465 14.42 15.88 17.02 18.50 Sch FLI 25.04.2015 57138.472 14.52 16.05 17.24 18.79 Sch FLI 18.05.2015 57161.391 14.32 15.62 16.63 - Sch FLI 21.05.2015 57164.440 14.23 15.48 16.47 - Sch FLI 24.05.2015 57167.386 14.41 15.90 17.11 18.50 2-m VA 13.06.2015 57187.356 14.37 15.87 16.91 18.14 2-m VA 16.07.2015 57220.341 14.53 16.01 17.13 - Sch FLI 17.07.2015 57221.393 14.61 16.16 17.40 - Sch FLI 19.07.2015 57223.366 14.43 15.88 16.99 18.35 2-m VA 20.07.2015 57224.394 14.25 15.54 16.57 17.77 2-m VA 11.08.2015 57246.372 14.44 15.92 17.08 18.41 1.3-m AND 12.08.2015 57247.299 14.43 15.91 17.03 18.33 1.3-m AND 17.08.2015 57252.305 14.36 15.77 16.98 18.30 2-m VA 24.08.2015 57259.466 14.38 15.74 - - Sch FLI 25.08.2015 57260.364 14.29 15.68 - - Sch FLI 03.09.2015 57269.350 14.38 15.77 16.90 17.96 Sch FLI 04.09.2015 57270.433 14.38 15.85 16.86 18.18 2-m VA 05.09.2015 57271.411 14.42 15.83 16.96 18.29 2-m VA 06.09.2015 57272.406 14.25 15.60 16.62 17.83 2-m VA 03.11.2015 57330.215 14.35 15.75 16.82 - Sch FLI 04.11.2015 57331.201 14.44 15.87 16.96 - Sch FLI 05.11.2015 57332.204 14.59 16.17 17.51 - Sch FLI 06.11.2015 57333.202 14.51 16.02 17.23 - Sch FLI 07.11.2015 57334.199 14.42 15.84 16.94 - Sch FLI 12.12.2015 57369.186 14.48 15.93 17.16 18.56 2-m VA 13.12.2015 57370.163 14.51 16.04 17.32 18.89 2-m VA 14.12.2015 57371.177 14.49 16.01 17.19 - 2-m VA 15.12.2015 57372.193 14.41 15.85 16.92 18.35 Sch FLI 02.01.2016 57390.173 14.41 15.83 16.97 - Sch FLI 07.02.2016 57426.188 14.40 15.78 16.67 - Sch FLI 04.04.2016 57483.498 14.43 15.87 17.02 18.46 2-m VA 06.04.2016 57484.539 14.49 16.00 17.25 18.69 2-m VA 06.04.2016 57485.499 14.51 15.95 17.18 18.60 Sch FLI 27.04.2016 57506.420 14.31 15.63 16.74 18.10 Sch FLI 13.05.2016 57522.406 14.40 15.75 16.84 - Sch FLI 14.05.2016 57523.408 14.44 15.87 17.04 - Sch FLI 31.05.2016 57540.384 14.43 15.90 - - 2-m VA 25.06.2016 57565.442 14.44 15.85 17.06 - Sch FLI 11.07.2016 57581.363 14.38 15.80 17.00 - Sch FLI

Table 1: Continued.

Date J.D. (24...) I [mag] R [mag] V [mag] B [mag] Telescope CCD

12.07.2016 57582.391 14.46 15.93 17.18 18.56 Sch FLI 13.07.2016 57583.377 14.31 15.70 16.76 - Sch FLI 01.08.2016 57602.356 14.37 15.87 16.94 18.33 2-m VA 04.08.2016 57605.360 14.60 16.15 17.38 18.95 Sch FLI 05.08.2016 57606.353 14.62 16.17 17.46 - Sch FLI 11.09.2016 57643.261 14.23 15.50 16.56 18.00 Sch FLI 02.10.2016 57664.230 - 15.81 16.91 - Sch FLI 05.11.2016 57698.260 14.35 15.68 16.77 18.05 Sch FLI 21.11.2016 57714.222 14.38 15.86 16.97 18.46 2-m VA 22.11.2016 57715.204 14.38 15.78 16.86 18.16 2-m VA 23.11.2016 57716.215 14.31 15.83 16.89 18.31 2-m VA 02.01.2017 57756.202 14.46 15.92 17.06 18.60 Sch FLI 17.02.2017 57801.603 14.42 15.89 17.09 - Sch FLI 05.03.2017 57817.549 14.45 15.83 - - Sch FLI 02.04.2017 57845.538 14.45 15.94 17.10 18.59 Sch FLI 03.04.2017 57846.567 14.53 16.05 17.18 18.61 Sch FLI 01.05.2017 57875.483 14.18 15.55 16.54 17.79 2-m VA 18.05.2017 57892.420 14.33 15.68 16.72 18.08 Sch FLI 19.05.2017 57893.422 14.33 15.78 16.85 18.06 2-m VA 01.08.2017 57967.382 14.49 15.98 17.13 - Sch FLI 02.08.2017 57968.322 14.42 15.81 16.89 - Sch FLI 03.08.2017 57969.336 14.32 15.63 16.72 - Sch FLI 12.08.2017 57978.495 14.43 15.79 16.90 18.26 Sch FLI 14.09.2017 58011.268 14.48 15.92 17.12 18.57 Sch FLI 15.09.2017 58012.286 14.50 15.94 17.15 18.61 Sch FLI 16.09.2017 58013.269 14.51 15.97 17.18 18.81 Sch FLI 12.10.2017 58039.223 14.38 15.82 17.00 18.43 Sch FLI 14.10.2017 58041.398 14.36 15.80 16.94 18.28 2-m VA 16.10.2017 58043.234 14.37 15.81 16.95 18.36 Sch FLI 16.10.2017 58043.272 14.38 15.85 16.99 18.33 2-m VA 17.10.2017 58044.295 14.39 15.79 16.99 18.42 Sch FLI 18.10.2017 58045.385 14.31 15.71 16.83 18.07 Sch FLI 22.11.2017 58080.245 14.45 15.92 17.06 - Sch FLI 23.11.2017 58081.257 14.38 15.81 16.96 - Sch FLI 21.12.2017 58109.266 14.35 15.81 16.89 18.39 Sch FLI 25.12.2017 58113.189 14.51 16.01 17.27 18.80 Sch FLI 26.12.2017 58114.223 14.46 15.90 17.13 18.57 Sch FLI

The data indicate that V1704 Cyg shows both active states with high amplitudes and quiet states with lower amplitudes, at the same brightness level. The registered amplitudes of the irregular brightness variations of the star during the whole time of observations are 1.47 mag for the B-band, 1.19 mag for the V -band, 0.85 mag for the R-band and 0.60 mag for the I-band. Such variability is typical of a CTTS and it could be due to the variations in the mass accretion rate and the modulation of the star’s brightness in the presence of hot spots on the stellar surface (see Herbst et al. 1994). Also, the shape of the light curves of V1704 Cyg is typical of the CTTSs of Type II in the classification scheme of Ismailov (2005).

According to Herbst et al. (1994) the hot spots on the CTTSs are small; in most cases they cover a few percent of the stellar surface area. The temperatures of the hot spots are typically 10 000 K. Such temperature is significantly higher than that of the stellar photosphere. Therefore, even hot spots with small sizes cause a significant modulation in the star’s brightness. The hot

Fig. 1. BV RI light curves of V1704 Cyg for the time period August 2010−December 2017.

spots are interpreted as accretion spots or zones, heated by the infall of a column of matter. Whereas cool spots may last for hundreds or thousands of rotations, hot spots appear to come and go on a much shorter time scale (Herbst et al. 1994). Probably during the quiet states of V1704 Cyg with lower amplitudes, the hot spots disappear (or change their sizes). Another possible cause is the decrease of the mass accretion rate. It is possible both events occur simultaneously.

2MASS JHK_s magnitudes of V1704 Cyg were used to construct a color−color (J − H versus H − K_s) diagram to check whether the star has infrared excess, which is a sure indication for the presence of a circumstellar disk. Fig. 2(left) shows the location of the main sequence (the black line) and the giant stars (the blue line) from Bessell & Brett (1988), and the location of the CTTSs (the red line) from Meyer et al. (1997). A correction to the 2MASS photometric system was performed following the procedure in Carpenter (2001). It can be seen from the figure that V1704 Cyg lies on the line of the CTTSs, i.e. the star has infrared excess indicating the presence of disk around it.

An important result from the photometric study of V1704 Cyg is the variation of the color indices with the star’s brightness. The measured color indices (V − I, V − R and B − V ) versus the stellar V -magnitude during the photometric monitoring of the star are plotted on Fig. 2(right). A clear dependence can be seen from the figure: the star becomes redder as it fades. Such color variations are typical for the TTSs, whose the variability is produced by the rotational modulation of spot(s) on the stellar surface.

The period04 (Lenz & Breger 2005) software was used to search for periodicity in the light curves of V1704 Cyg. In Fig. 3 is shown the obtained periodogram using the data in R-band. We found a significant peak in the

Fig. 2. (left): Color−color diagram for V1704 Cyg detected in the JHK_s-bands in the 2MASS catalogue; (right): Color indices versus the stellar V -magnitude of V1704 Cyg.

periodogram corresponding to 1 day period. This is parasite frequency, an artifact produced by the fact that we observe nightly or at close time-intervals. The other found peaks correspond to 1/2, 1/3 and 1/4 days overtones of the 1 day alias. The shapes of the phase-folded light curves according to periods of 1, 1/2, 1/3 and 1/4 days are identical. Apart from all data obtained during the whole time of observations we used data points from different time periods of observations for time-series analysis. During these analyzes, we did not find any reliable periodicity in the brightness variations of V1704 Cyg. The reason is probably the short life of the hot spots or that the variability of the star is not only due to hot spots but also to the variations in the mass accretion rate.

4. Conclusion

The long-term BV RI light curves, the color−magnitude and 2MASS two−color diagrams of V1704 Cyg were presented and discussed. We found that the variability of the star is typical of a CTTS. The shape of the light curves, the location on the two−color diagram, the spectrum of the star (reported by Mendoza et al. 1990) and the observed amplitudes in the brightness variations confirmed that conclusion. Evidence of reliable periodicity in the photometric behavior of V1704 Cyg is not detected. This study adds a new CTTS to the PMS stars family. We are continuing to collect photometric observations of the Pelican Nebula. In the future, we plan to study several dozen PMS stars located in this star-forming region.

Fig. 3. Periodogram analysis of timescales inferred from the photometric timeseries of V1704 Cyg.

Acknowledgements

This research has made use of the NASA’s Astrophysics Data System. This publication makes use of data products from the Two Micron All Sky Survey, which is a joint project of the University of Massachusetts and the Infrared Processing and Analysis Center/California Institute of Technology, funded by the National Aeronautics and Space Administration and the National Science Foundation (Skrutskie et al. 2006). The authors thank the Director of Skinakas Observatory Prof. I. Papamastorakis and Prof. I. Papadakis for the award of telescope time. This work was partly supported by the Bulgarian Scientific Research Fund of the Ministry of Education and Science under grants DM 08-2/2016, DN 08-1/2016, DN 08-20/2016 and DN 18-13/2017 and by funds of the project RD-08-112/2018 of the University of Shumen.

References

Bessell, M. S. & Brett, J. M., 1988, PASP, 100, 1134 Carpenter, J. M., 2001, AJ, 121, 2851 Guieu, S., et al., 2009, ApJ, 697, 787 Herbig, G. H., 1958, ApJ, 128, 259 Herbst, W., Herbst, D. K., Grossman, E. J. & Weinstein, D., 1994, AJ, 108, 1906 Ibryamov, S. I., Semkov, E. H. & Peneva, S. P., 2015, PASA, 32, e021 Ibryamov, S. I., Semkov, E. H. & Peneva, S. P., 2018, PASA, 35, e007 Ismailov, N. Z., 2005, Astronomy Reports, 49, 309 Joy, A. H., 1945, ApJ, 102, 168 Lenz, P. & Breger, M., 2005, CoAst, 146, 53 Ménard, F. & Bertout, C., 1999, In: The Origin of Stars and Planetary Systems, Eds. C. J.

Lada & N. D. Kylafis (Kluwer Academic Publishers), 341 Mendoza, E. E., Andrillat, Y. & Rolland, A., 1990, IBVS, 3417, 1 Meyer, M. R., Calvet, N. & Hillenbrand, L. A., 1997, AJ, 114, 288 Skrutskie, M. F., et al., 2006, AJ, 131, 1163