arXiv:1512.03550v1 [astro-ph.IM] 11 Dec 2015

The East-Asian VLBI Network

Kiyoaki Wajima,^1 Yoshiaki Hagiwara,^2 Tao An,^3 Willem A. Baan,^3 Kenta Fujisawa,^4 Longfei Hao,^5 Wu Jiang,^3 Taehyun Jung,^1 Noriyuki Kawaguchi,^6 Jongsoo Kim,^1 Hideyuki Kobayashi,^6 Se-Jin Oh,^1 Duk-Gyoo Roh,^1 Min Wang^7 Yuanwei Wu,^6 Bo Xia,^3 and Ming Zhang^7

1Korea Astronomy and Space Science Institute, Daejeon, Korea;

wajima@kasi.re.kr

2Toyo University, Tokyo, Japan

3Shanghai Astronomical Observatory, Shanghai, China

4Yamaguchi University, Yamaguchi, Japan

5Yunnan Astronomical Observatory, Yunnan, China

6National Astronomical Observatory of Japan, Tokyo, Japan

7Xinjiang Astronomical Observatory, Xinjiang, China

Abstract.

The East-Asian VLBI Network (EAVN) is the international VLBI facility in East Asia and is conducted in collaboration with China, Japan, and Korea. The EAVN consists of VLBI arrays operated in each East Asian country, containing 21 radio telescopes and three correlators. The EAVN will be mainly operated at 6.7 (C-band), 8 (X-band), 22 (K-band), and 43 GHz (Q-band), although the EAVN has an ability to conduct observations at 1.6 – 129 GHz. We have conducted fringe test observations eight times to date at 8 and 22 GHz and fringes have been successfully detected at both frequencies. We have also conducted science commissioning observations of 6.7 GHz methanol masers in massive star-forming regions. The EAVN will be operational from the second half of 2017, providing complementary results with the FAST on AGNs, massive star-forming regions, and evolved stars with high angular resolution at cm- to mm-wavelengths.

1. Introduction

A new VLBI array in East Asia, the East-Asian VLBI Network (EAVN), is being planned under the collaboration of the East Asia Core Observatory Association (EA- COA). VLBI facilities are developing and operating in each East Asian country, the Chinese VLBI Network (CVN; Li et al. 2008) in China, the Korean VLBI Network (KVN; Lee et al. 2014) in Korea, the Japanese VLBI Network (JVN; Doi et al. 2006) and VLBI Exploration of Radio Astrometry (VERA; Kobayashi et al. 2003) in Japan, and various international collaboration programs, such as the KVN and VERA Array (KaVA), is ongoing by using those facilities. On the basis of this background, a small task force ‘the EAVN Tiger Team’ was organized in June 2013, consisting of 17 members from China, Japan, and Korea, to handle various issues related to EAVN, such as 1

2 Wajima et al.

promotion of VLBI test observations, clarification of the problems for future regular operation of EAVN, and so on. The work of this task force is carried out as part of activities in ‘the East Asian VLBI Consortium’, which is one of working groups under the EACOA.

2. Overview of EAVN

Figure 1 shows an overall image of the EAVN, which consists of 21 potential telescopes, 5 from China, 12 from Japan, and 4 from Korea, and two correlator sites, Korea-Japan Correlation Center (KJCC) in KASI, and Shanghai Astronomical Observatory. Details of the telescopes and brief specifications of the EAVN are shown in Tables 1 and 2, respectively. In Table 1, filled symbols indicate telescopes which have participated in fringe test observations to be described in Section 3, open squares show antennas participated in VLBI observations of methanol masers in massive star-forming regions at 6.7 GHz conducted in 2010 and 2011 (Fujisawa et al. 2014), and open and filled triangles correspond to antennas constituting the KaVA, which is operational at 22 and 43 GHz (Matsumoto et al. 2014; Niinuma et al. 2014).

Figure 2 shows examples of (u, v) coverage for an EAVN observation at 22 GHz with the various declination of a source. The EAVN can sample visibilities of a wide range of baseline lengths from 20 km (JVN-Tsukuba – JVN-Kashima) to 5,000 km (CVN-Nanshan – VERA-Ogasawara), allowing us to obtain a round-shaped synthe-

Table 1. Potential EAVN Telescopes.

Name Array Longitude Latitude Diameter Observation Band [^∘ N] [^∘ E] [m] C X K Q

Kunming CVN 25.027 102.796 40 ∘ • Miyun CVN 40.558 116.976 50 ∘ Nanshan CVN 40.399 116.239 26 ∘ • • Sheshan CVN 31.099 121.200 25 □ • • Tianma CVN 31.092 121.136 65 ∘ • ∘ ∘ Gifu JVN 35.468 136.737 11 ∘ Hitachi JVN 36.697 140.692 32 □ • • Kashima JVN 35.956 140.660 34 ∘ ∘ ∘ Takahagi JVN 36.699 140.695 32 • Tomakomai JVN 42.674 141.597 11 ∘ Tsukuba JVN 36.103 140.089 32 • ∘ Usuda JVN 36.132 138.363 64 □ ∘ Yamaguchi JVN 34.216 131.557 32 □ • ∘ Iriki VERA 31.748 130.440 20 □ • ▲ △ Ishigakijima VERA 24.412 124.171 20 □ • ▲ △ Mizusawa VERA 39.134 141.133 20 □ • ▲ △ Ogasawara VERA 27.092 142.217 20 □ • ▲ △ Sejong — 36.520 127.303 22 • Tamna KVN 33.289 126.460 21 ▲ △ Ulsan KVN 35.546 129.250 21 ∘ • ▲ △ Yonsei KVN 37.565 126.941 21 ▲ △

The East-Asian VLBI Network 3

Table 2. Specifications of EAVN.

Number of (potential) telescopes 21 Frequency coverage 6.7 GHz (12 stations), 8 GHz (16), 22 GHz (17), 43 GHz (9) Angular resolution 1.5 mas (8 GHz), 0.6 mas (22 GHz), 0.7 mas (43 GHz) 7-σ Fringe detection sensitivity 1.6 mJy (8 GHz), 9.5 mJy (22 GHz) (for a continuum source, τ = 60 s) Recording rate ≥ 1 Gbps (B = 256 MHz) Correlator Korea-Japan Joint VLBI Correlator (KASI), DiFX (KASI/SHAO)

Figure 1. Location of EAVN sites. Photos of potential EAVN telescopes (yellow points) and correlator sites (brown points) are overlaid on ‘the Blue Marble’ image (image credit: NASA’s Earth Observatory).

sized beam with very low noise level thanks to a lot of large antennas, as shown in Table 1.

3. Results of Fringe Test Observations

We have carried out test observations with the EAVN eight times since 2013 at 8 and 22 GHz in order to get fringes between international baselines of the EAVN, and to clarify the problems associating with the scheduling, correlation, and data reduction.

Figure 2. Examples of (u, v) coverage for an EAVN observation at 22 GHz with the source’s declination of +60^∘ (top left), +30^∘ (top right), 0^∘ (bottom left), and −29^∘ (bottom right). Total observation duration of 10 hours is assumed for all cases.

16 telescopes have participated in fringe tests one or more times at either 8 or 22 GHz, or at both frequencies (see Table 1).

Throughout those fringe tests, we could detect fringes at both frequencies. Figure 3 shows examples of fringe test results conducted on 2015 February 12 at 8 GHz. Four telescopes, Tsukuba (JVN), Ulsan (KVN), Sheshan and Kunming (CVN), participated in the observation, with a bright AGN 3C 454.3 being a target source. Fringes were successfully detected between all international baselines in China, Japan, and Korea. Although discontinuous fringe phases and amplitudes can be seen between each IF channel in the raw visibility, those are well-calibrated after fringe fitting and amplitude correction. Discontinuous fringe phases appear in the international baselines between trans-CVN baselines (i.e., Sheshan/Kunming – Tsukuba/Ulsan baselines), although those cannot be seen in the visibility of Sheshan – Kunming and Tsukuba – Ulsan baselines. This phenomenon is probably due to the different bit assignment in the backend system between CVN and KVN/JVN stations. This can be compensated

Figure 3. Results of the fringe test observation conducted on 2015 February 12 at 8 GHz. (Left) Raw visibility phases (upper) and amplitudes (lower) for each baseline. (Right) Calibrated visibility phases and amplitudes with the AIPS task FRING and ACCOR. Note that a priori amplitude calibration with the AIPS task APCAL is not applied.

by the correlator and good fringe phases and amplitudes can be obtained after fringe fitting and amplitude calibration, as shown in Figure 3.

4. Future Plan and Synergy with the FAST

4.1. Future Plan of the EAVN Test Observation

On the basis of the results obtained with eight-time fringe tests, we will start imaging test observations with the EAVN from the end of 2015. We conduct test observations at 8 and 22 GHz as a first step, whereas we will also begin both fringe tests and imaging observations from 2016 at 6.7 and 43 GHz, both of which are common observing frequencies and science commissioning observations have already been conducted with part of EAVN telescopes, as mentioned in Section 1. As of this stage, we will begin to invite observing proposals for the EAVN from the second half of 2017.

4.2. Synergy and Collaboration with the FAST/Other Arrays

The FAST telescope will have a capability of the data reception system at 70 MHz – 3 GHz, while some of EAVN telescopes have receivers at 1.6 and/or 2 GHz. The minimum sensitivity for 7-σ fringe detection of a few hundred mJy will be achieved at both 1.6 and 2 GHz between the FAST and the Usuda 64 m telescope of the JVN, assuming the antenna diameter of 300 m, the aperture efficiency of 20%, and the system noise temperature of 25 K for the FAST, and the integration time of 60 seconds. The extremely high sensitivity allows us to investigate relatively weak radio sources such as low-luminosity AGNs, and to detect much more OH (mega-)maser sources in galactic and extragalactic objects.

In the Asia-Pacific region, the Long Baseline Array (LBA) in Australia has already been made regular operation, and collaborative work between the EAVN and the LBA has been made as a part of the framework in the Asia-Pacific Telescope (APT). The maximum baseline length of longer than 10,000 km can be obtained with the combined EAVN and APT array in the north-south direction. This enable us to obtain better

6 Wajima et al.

angular resolution and (u, v) coverage toward sources at low declination and southern sources. A new VLBI array project, the Thai VLBI Network (TVN), is also in progress in Thailand, and we are planning to pursue collaboration with both LBA and TVN in the near future,

References

Doi, A., Fujisawa, K., Harada, K., et al. 2006, in Proc. 8th European VLBI Network Symp., ed.

W. Baan, R. Bachiller, R. Booth et al. (Bonn: MPIfR), 71 Fujisawa, K., Sugiyama, K., Motogi, K., et al. 2014, PASJ, 66, 31 Kobayashi, H., Sasao, T., Kawaguchi, N., et al. 2003, in ASP Conf. Ser. 306, New Technologies in VLBI, ed. Y. C. Minh (San Francisco, CA: ASP), 48 Lee, S.-S., Petrov, L., Byun, D.-Y., et al. 2014, AJ, 147, 77 Li, J. L., Guo, L., & Zhang, B. 2008, in Proc. IAU Symp. 248, A Giant Step: from Milli- to Micro-arcsecond Astrometry, ed. W. J. Jin, I. Platais, & M. A. C. Perryman (Cambridge: Cambridge Univ. Press), 182 Matsumoto, N., Hirota, T., Sugiyama, K., et al. 2014, ApJL, 789, L1 Niinuma, K., Lee, S.-S, Kino, M., et al. 2014, PASJ, 66, 103