arXiv:1311.7169v2 [astro-ph.SR] 17 Dec 2013

Astronomy & Astrophysics manuscript no. paper_gaia_linelist_lang © ESO 2014 April 5, 2014

A new procedure for defining a homogenous line-list for solar-type stars^⋆

S. G. Sousa^{1,2,4}, N. C. Santos^{1,2}, V. Adibekyan^1, E. Delgado-Mena^1 , H.M. Tabernero^3, J.I. González Hernández^{4,5}, D. Montes^3, R. Smiljanic^{6,7}, A. J. Korn^8, M. Bergemann^9, C. Soubiran^{10}, and S. Mikolaitis^{11,12}

1 Centro de Astrofísica, Universidade do Porto, Rua das Estrelas, 4150-762 Porto, Portugal 2 Departamento de Física e Astronomia, Faculdade de Ciências, Universidade do Porto, Rua do Campo Alegre, 4169-007 Porto, Portugal 3 Dpto. de Astrofisica, Facultad de CC. Fisicas, Universidad Complutense de Madrid, E-28040 Madrid, Spain 4 Instituto de Astrofisica de Canarias, Cl. Via Lactea s/n, E-38200 La Laguna, Tenerife, Spain 5 Dept. Astrofisica, Universidad de La Laguna (ULL), E-38206 La Laguna, Tenerife, Spain 6 European Southern Observatory, Karl-Schwarzschild-Str. 2, 85748 Garching bei München, Germany 7 Department for Astrophysics, Nicolaus Copernicus Astronomical Center, ul. Rabiańska 8, 87-100 Toruń, Poland 8 Department of Physics and Astronomy, Division of Astronomy and Space Physics, Uppsala University, Box 516, 75120 Uppsala, Sweden 9 Max Planck Institute for Astrophysics, Karl-Schwarzschild str. 1, 85741 Garching 10 Université de Bordeaux 1 – CNRS – Laboratoire d’Astrophysique de Bordeaux, UMR 5804, BP 89, 33271 Floirac Cedex, France 11 Laboratoire Lagrange (UMR 7293), Université de Nice Sophia Antipolis, CNRS, Observatoire de la Côte d’Azur, BP 4229, 06304 Nice Cedex 04, France 12 Institute of Theoretical Physics and Astronomy, Vilnius University, Goštauto 12, Vilnius 01108, Lithuania

ABSTRACT

Context. The homogenization of the stellar parameters is an important goal for large observational spectroscopic surveys, but it is very difficult to achieve it because of the diversity of the spectroscopic analysis methods used within a survey, such as spectrum synthesis and the equivalent width method. To solve this problem, constraints to the spectroscopic analysis can be set, such as the use of a common line-list.

Aims. We present a procedure for selecting the best spectral lines from a given input line-list, which then allows us to derive accurate stellar parameters with the equivalent width method.

Methods. To select the lines, we used four very well known benchmark stars, for which we have high-quality spectra. From an initial line-list, the equivalent width of each individual line was automatically measured for each benchmark star using ARES, then we performed a local thermodynamic equilibrium analysis with MOOG to compute individual abundances. The results allowed us to choose the best lines which give consistent abundance values for all the benchmark stars from which we then created a final line-list. Results. To verify its consistency, the compiled final line-list was tested for a small sample of stars. These stars were selected to cover different ranges in the parameter space for FGK stars. We show that the obtained parameters agree well with previously determined values.

Key words. Stars: fundamental parameters - Stars: abundances - Stars: statistics - Methods: data analysis

1. Introduction

The detailed characterization of stars is of extreme importance in several fields of astrophysics, for instance from the detailed study of individual objects to the wider study of many stars, as the one that is needed to identify and understand the different populations of stars that are part of our Galaxy’s structure. Spectroscopy is a very powerful technique for this purpose, and is often explored in many observational surveys.

Large observational surveys typically need for significant and expert man-power to obtain and analyse the data. This extends from the preparation of the observations, and the actual collection of the data, to the data reduction. The final product for such large surveys may include radial velocities, rotational velocities, but also very importantly, the homogeneous spectro-

⋆ Table 2 is fully available in electronic form at the CDS via anonymous ftp to cdarc.u-strasbg.fr (130.79.128.5) or via http://cdsweb.u-strasbg.fr/cgi-bin/qcat?J/A+A/ scopic stellar parameters and detailed chemical abundances for the observed targets.

In this work we focus on the Equivalent Width (EW) method spectroscopic analysis, more specifically, on selecting the lines that best allow us to derive homogeneous parameters to study solar-type stars in different evolutionary stages that cover different metallicity regimes. The procedure presented here can be easily adapted for any other constraints, such as the use of other atmospheric models or of a different preliminary list of iron lines, or even another chemical element.

In Section 2, we review our spectroscopic analysis method based on equivalent widths. We describe some of the different approaches that can be adopted, especially regarding the atomic data of spectroscopic lines, and describe the way to perform a differential analysis. In Section 3, we describe homogenization constraints that may be imposed on large spectroscopic surveys. In Section 4 we present the benchmark stars used for the work, referring to the best adopted parameters that we can choose from

Article number, page 1 of 9 other works. In Section 5, we describe the procedure of selecting the best lines using the benchmark stars and the respective adopted parameters. Subsequently, in Section 6 we present some results derived with the method and the selected lines, and compare with to other results found in literature. In Section 7 we conclude with a brief summary.

2. Equivalent width method - ARES+MOOG

There are two main approaches that are commonly used to analyse spectroscopic data. One is usually referred to as the synthetic method, which compares synthetic spectra with the observed spectrum and find the best reproduction. The other, referred to as EW method, uses the opposite approach. It begins directly with the observed spectrum, normally analysing it line by line, measuring each line’s strength, typically through the EW, and computing individual abundances. The two approaches have their own advantages and disadvantages. For example, one of the advantages of the EW method is its higher efficiency for the spectral analysis, which is focused on a well-defined set of lines, while the synthetic method typically requires more complicated computations to generate synthetic spectra for comparison or, alternatively, a large grid of pre-computed synthetic spectra. On the other hand, one of the advantages of the synthetic method is that it can be applied to fast-rotator stars, while the analysis of individual lines through the EW method becomes impossible for these cases because of the severe line blending.

2.1. Standard equivalent width method

A standard technique for deriving stellar atmospheric parameters using the EW method is based on the iron ionization and excitation balance. Iron produces many absorption lines for solar-type stars, and therefore it is used frequently for this method. The standard method starts with the adoption of a given stellar atmosphere model, characterized by its stellar effective temperature, surface gravity, microturbulence, and metallicity (where [Fe/H] is used as a proxy). Then, using a set of Fe i and Fe ii lines, iterates these parameters until the correlation coefficients between the abundance of Fe i with the excitation potential (sensitive to temperature) and the reduced EW (log(EW/λ), sensitive to micro turbulence) are zero. The abundances derived from the Fe ii lines (sensitive to the surface gravity) are forced to be equal to those obtained from the Fe i lines (less sensitive to surface gravity). The final atmospheric parameters, and the resulting iron abundances may be found in this way.

There are several processes to find the best stellar atmosphere that fits the measured EWs. One simple approach is to find each parameter independently, step by step, or, using a more correct approach, to apply complex minimization algorithms that allow one to keep the parameters free and that better explores all the unknown interdependences between the parameters. The EW method has been applied in the past by several other groups (e.g. Santos et al. 2004b; Sousa et al. 2008; Ghezzi et al. 2010; Mucciarelli et al. 2013; Magrini et al. 2010; Tabernero et al. 2012)

2.2. Equivalent width measurement with ARES

The measurement of EWs is one of the main key points. In many previous works, this measurement has been performed using interactive routines (e.g. splot on IRAF), where it is necessary to define the position of the continuum manually, and tp iden-

Fig. 1. Abundance derived for a selection of iron lines with atomic data taken directly from VALD and EWs derived from a solar spectrum. The full-drawn line represents the iron solar abundance as 7.47. The dashed line represents the mean abundance.

tify all the absorption lines that are present and are required to be correctly identified for a good and proper fitting in the case of blended lines. This procedure, repeated individually for each line in each spectrum, is not only very time-consuming, but more importantly, is a subjective procedure, and therefore susceptible to provide different systematics on the measurements. More recently, many authors have started to use automatic tools to measure the EWs (e.g. ARES (Sousa et al. 2007), DAOSPEC (Stetson & Pancino 2008)). The advantages of these tools include the higher efficiency in obtaining the measurements for many lines, and they allow one to keep the individual measurements consistent regarding the continuum determination and the identification of the blended lines to be fitted. However, there are disadvantages to the automatic tools, namely the uncertainty that we can have in each individual measurement, which can be overcome either with a very good selection of the lines to be analyzed, or by using large set of lines that can be used together to identify the poor measurements (e.g. using an outlier removal when computing the mean abundance values).

2.3. Abundances with MOOG

We used MOOG^1 (Sneden 1973) to compute the line-by-line abundance for each star assuming local termodynamic equilibrium. In our standard method we used a grid of Kurucz Atlas 9 plane-parallel model atmospheres (Kurucz 1993) to generate the stellar atmosphere model that was inserted into MOOG to compute the abundances through the driver abfind.

2.4. Differential analysis

Another important step to define this method is the selection of the lines for the individual spectral analysis. The number of lines selected for the method has strongly increased with the new automatic tools. However, some caution needs be taken and one needs to determine whether all the selected lines are suitable for an automatic measurement for the different spectral types of stars. A procedure to select “stable” lines has been used in Sousa et al. (2008). Using a sample of different stars with preliminary parameters, each abundance derived from each automatically measured line was compared with the average abun-

1 http://www.as.utexas.edu/∼chris/moog.html

Article number, page 2 of 9

S. G. Sousa et al.: A new procedure for defining a homogenous line-list for solar-type stars

Table 1. Reference stars and adopted parameters

Adopted values Stats from PASTEL ID Star Teff logg [Fe/H] Log(Fe) ξ_t < T e f f > < logg > < [Fe/H] > (K) dex dex dex km/s (K) dex dex MRD Sun 5777 4.44 0.00 7.47 1.00 - - - MPD μ Cas 5320 4.45 -0.83 6.64 0.90 5315(90) 4.49(0.18) -0.82(0.12) MRG μ Leo 4540 2.10 0.15 7.62 1.80 4495(97) 2.38(0.25) 0.22(0.18) MPG Arcturus 4247 1.59 -0.54 6.93 1.80 4316(62) 1.68(0.31) -0.54(0.10)

dance, identifying this way all unstable lines which were systematically given higher or lower relative abundances.

The atomic data for each selected line is fundamental for deriving accurate and precise spectroscopic parameters. Typically, one uses atomic data derived in the laboratory or the atomic data used before by other authors. The differential analysis was invented because the atomic parameters available for the lines are not only poorly determined. These values can be derived in the laboratory, but can have large uncertainties of the order of 10-20%, which can produce a wide dispersion in the abundance determination. As an example, we present in Fig. 1 the abundance derived for a selection of iron lines with atomic data taken directly from the Vienna Atomic Line Data-base (VALD: Piskunov et al. (1995); Kupka et al. (1999); Ryabchikova et al. (1999) - http://www.astro.uu.se/htbin/vald) and EWs derived from a solar spectrum. Although we are quite certain of the solar atmospheric parameters and iron abundance for the Sun, whose values varying around 7.47 (Anders & Grevesse 1989; Lodders et al. 2009; Asplund et al. 2009), and errors of the order of 0.05 dex, the figure clearly shows a huge dispersion (∼ 0.60 dex) and a significant offset for the expected iron abundance (∼ 7.58). This high dispersion and offset may be partially explained by the significant number of lines that give an overestimated abundance in the top-right part of the figure. These lines should of course be discarded or corrected for in a proper spectral analysis. This simple exercise clearly shows that a large portion of the adopted atomic data values are not adequate for an accurate and precise analysis.

To correct for these uncertainties a benchmark star with very well constrained parameters is typically compared with the star to be studied. In our case the benchmark star typically was the Sun, and therefore it is expected that this procedure works well for solar-type stars.

Assuming the same atomic data for every star, the trick in this analysis is to recompute the astrophysical oscillator strength values (log g f ) using an inverse analysis. We first measured the EW for our selected lines. This was normally done using very high quality spectra of the benchmark star, ideally obtained with the same instrument and in the same conditions as used to observe the other stars. Secondly, assuming stellar parameters for our benchmark star (e.g. for the Sun: T_{e f f} = 5777K, log g = 4.44 dex, ξ_t = 1.00 kms^{−1} , and log(Fe) = 7.47), the values for each log g f were then changed until we derived the observed EW value for the line measured before. This process can be carried out using MOOG with the ewfind driver in an iterative way for each line in the list.

Using a spectroscopic differential analysis relative to the Sun, one can eliminate both the errors on the atomic parameters and also part of the measurement errors on the equivalent widths that are still present. When we measure the lines in the benchmark star we also include errors given by the spectrum itself. An example are small blends, or the inaccurate position of the continuum in that region of the spectrum. When we compute the log g f for these lines we include all these errors, which may partially compensate for the errors for the systematic measurement of the EW of the same line for the stars that are analysed.

2.5. Applications

The method described here has been applied by our team in several different works in the past, allowing us to derive homogeneous and precise parameters for studying extrasolar planets (Santos et al. 2004a; Sousa et al. 2006, 2007, 2008, 2011a,b; Gómez Maqueo Chew et al. 2013) and deriving homogeneous chemical abundances with the same tools (Neves et al. 2009; Delgado Mena et al. 2010; González Hernández et al. 2010; Adibekyan et al. 2012). It is also being used for the followup of asteroseismic targets, where its accuracy has been tested (Doğan et al. 2013; Huber et al. 2012; Grigahcène et al. 2012; Creevey et al. 2012). In many of these works, several comparisons with other methods have been presented, showing generally consistent results.

3. Homegenization constraints

3.1. MARCS models

For this work we chose to use the MARCS models^2 from Uppsala (Gustafsson et al. 2008). This is a grid of one-dimensional, hydrostatic, plane-parallel, and spherical LTE model atmospheres that may be used together with atomic and molecular spectral-line data and software for radiative transfer to generate synthetic stellar spectra. Alternatively, the models can be adopted to be used in MOOG, which together with derived EWs can be use to compute the respective abundance.

To use MARCS models in our standard automatic procedure, it was necessary to adopt the interpolation code available on the MARCS models web page. This interpolation code needs to be fed by the correct models around the interpolation point in the space of parameters. The selection of the correct models needs to be provided as an input. Therefore, to automatize this process, we built a script^3 around the provided interpolation code. The simple job of this script is to receive the parameters for which one requests a MARCS atmospheric model, and perform the correct and automatic selection of models for the interpolation.

There are two different grids for the MARCS models. One assumes plane-parallel approximation, the other assuming spherical symmetry. The first is more adequate for modelling the atmosphere of dwarf stars, the second is more appropriate for giant stars. The interpolation code jumps between the grids depending on the surface gravity that is asked for the interpolation. Lower surface gravities (log g < 3.5) will use the spherical approximation grid, while for the higher log g we used the plane-parallel

2 http://marcs.astro.uu.se/ 3 The script will be made available by the authors upon request

Article number, page 3 of 9

Fig. 2. For each benchmark star we present the abundance as a function of excitation potential (left panels) and reduced EW (right panels). Filled circles represent Fe i lines, while the filled stars represent Fe ii lines. For each benchmark star the mean iron abundance and the respective standard deviation are indicated.

grid. However, MOOG interprets spherical models as plane parallel, which may introduce some differences between the two MARCS grids. These differences are not important for the F, G, and K giants (see Heiter & Eriksson 2006).

Finally, a slight modification was made to the provided interpolation code to have the output interpolated model in the format needed for it to be correctly applied to MOOG.

3.2. Master line-list

An important constraint that may be imposed for large spectroscopic analysis is the use fix atomic data making impossible to use a differencial analysis like in our standard method. For these work we use the master linelist defined within the Gaia-Eso Survey (GES - (Gilmore et al. 2012)). The input master linelist was kindly provided by the GES linelist subworking group prior to publication (Heiter et al. in prep.).

The fixed atomic data adopted for each element line that is used for the whole analysis process is of course an important step for the homogenization, but it is also a drawback for our standard method where we used a differential analysis, as described before. This forced our group to use an alternative approach, which is described in detail in the following sections.

We emphasize here that if correctly adapted, the procedure presented here can also be used for other types of stars, which may require different atmospheric models and a different set of lines to start with. Therefore the initial line-list may be compiled from whatever source and the analysis can also be performed using other model atmospheres (e.g. Kurucz models).

4. Benchmark stars

The benchmark stars were selected from an exercise developed within a work group for spectra analysis. There are four different stars covering different ranges of metallicity and evolutionary stages: MPD - metal-poor dwarf; MRD - metal-rich dwarf; MPG metal-poor giant; and MRG metal-rich giant. This exercise was made by several nodes within the work group. A detailed description of this exercise and respective results will be presented in a separate work (Smiljanic et al. in prep.). As stated before, the work presented here was developed in the framework of the

Article number, page 4 of 9

S. G. Sousa et al.: A new procedure for defining a homogenous line-list for solar-type stars

Fig. 3. Relative abundance for each iron line for the four benchmark stars. The filled lines and the dashed lines represent the threshold for acceptance of Fe i and Fe ii lines, respectively. MPD - metal poor dwarf; MRD - metal rich dwarf; MPG - metal poor giant; MRG - metal rich giant.

Fig. 4. Difference between the mean iron abundance derived for each line-list and the iron abundance adopted in Table 1 for each star (Δ log( f eI)). The line-lists used for this comparison are presented in Sousa et al. (2008) (SOU08), Meléndez et al. (2012) (MEL12), Ramírez et al. (2013) (RAM13), and the linelist derived with the procedure described in this work (this).

work group. In this section we only intend to present the benchmark stars used to calibrate our procedure.

4.1. Adopted parameters

We used the same four stars that were provided for the exercise. They were selected in a way to test the different methods in different parameter regimes. The four stars are clearly divided into two regimes: a metallicity regime (metal-rich vs. metal-poor), and evolutionary-state regime (dwarf vs. giant). This last regime strongly depends on temperature, since the giants that are observable are usually cooler stars.

For the Sun we adopted the typical values used by our team in previous works, for the other stars we considered the values adopted for the exercise in the work group and values from the literature for each star. We used the PASTEL catalogue (Soubiran et al. 2010) to find the range of values for the parameters of the benchmark stars. Using only the rows of the catalogue that present three parameters (T_{e f f} , logg and [Fe/H]), we show the respective standard deviation of the values in Table 1. It is clear that the dispersion is quite large, particularly for the surface gravity and the iron abundance, which shows how difficult it is to be consistent when using different methods even if sometimes the same data are used. From the several values from the literature, we selected those that lie close to the average presented in

Article number, page 5 of 9 the PASTEL catalogue. Therefore the adopted values are well within the interval of values from the literature. An exception is the gravity of μ Leo, for which there were two rows from the PASTEL catalogue with very high values, pushing the average for higher (overestimated) values. Interestingly, these same rows also present higher values for the temperature.

4.2. Spectral data

The spectra used for the Sun (MRD) and Arcturus (MPG) are the visible and near-infrared atlases at very high resolution (R > 100000) of Hinkle et al. (2000). The MPD mu Cas was observed with NARVAL, the spectropolarimeter on the 2m Telescope Bernard Lyot at the top of Pic du Midi. It provides complete coverage of the optical spectrum (from 370 to 1050 nm) in a single exposure with a resolving power of 78000 on average in spectroscopic mode. The MRG mu Leo was observed with ES- PaDOnS at the 4m Canada-France-Hawaii Telescope, in polarimetric mode at a resolving power of R ∼ 68 000. NARVAL and ESPaDOnS are twin spectropolarimeters with the same spectral coverage and the same reduction pipeline. The four spectra have a high signat-to-noise ratio (> 600). The spectra were also prepared to cover the wavelength range provided by UVES. Details can be found in Blanco Cuaresma et al. (in prep.) and in Smiljanic et al. (in prep.).

The only necessary treatment performed on the provided spectra was correction for the radial velocity, which is essential to identify the lines in the ARES code.

5. Line selection procedure

As noted before, if one of the constraints is to fix the atomic data, we are unable to use our method, which is based on a differential analysis. Since we of course use the same fixed atomic data for the lines as everyone else, we therefore adopted a special procedure to select the best lines to derive accurate spectroscopic parameters. For that purpose, we used the benchmark stars presented before. The procedure of finding the best lines is quite simple: adopting fix parameters for the stars, we then determine those lines that give reliable iron abundance for all the stars, and discard the lines that yield values with a significant offset due to either atomic parameters, or poor automatic measurements of the EWs.

Table 2. Sample of the final derived line-list.

λ (Å) χ_l log g f Ele. 4808.15 3.25 -2.690 FeI 4809.94 3.57 -2.620 FeI 4869.46 3.55 -2.420 FeI 4875.88 3.33 -1.920 FeI 4892.86 4.22 -1.290 FeI 4946.39 3.37 -1.170 FeI 4950.11 3.42 -1.670 FeI 4961.91 3.63 -2.190 FeI 4962.57 4.18 -1.182 FeI 4969.92 4.22 -0.710 FeI 4979.59 3.64 -2.677 FeI 4985.55 2.87 -1.340 FeI 4999.11 4.19 -1.640 FeI 5012.69 4.28 -1.690 FeI 5023.19 4.28 -1.500 FeI ... ... ... ...

5.1. Equivalenth width measurements

For the four benchmark stars we automatically measured the EWs for all the iron lines included in the master line-list that were detected in all the spectra. The EWs were measured with the ARES code following the standard input parameters (smoothder=4 - the recommended parameter for the smoothing of the derivatives used for the lines identification, space=3.0 - the interval in wavelength for each side of the central line that is used for the computation, rejt=0.997/0.998 - the important parameter that is used to determine the local continuum which strongly depends on the signal-to-noise ratio, lineresol=0.1 Åthe minimum resolution accepted by ARES to separate individual lines). The details of these parameters can be found in Sousa et al. (2007). We started with a total of 586 iron lines and, as expected, the number of detected lines in the benchmark stars strongly depends on their metallicity. This effect is compensated for in the case of the metal-poor giants, because giant stars in general have stronger lines.

Note that the automatic measurements with ARES are by fitting Gaussian profiles. This is acceptable for weak absorption lines (EW < 200 mÅ). At this point we chose to keep all the lines, but in our standard procedure we neglected the stronger lines in the spectroscopic analysis to avoid systematics caused by poor fitting of these lines. We also neglected very weak lines (EW < 10 mÅ) that are strongly affected by sources of error.

5.2. Line-by line abundances

Using the adopted parameters for each benchmark star (see Table 1), we interpolated a MARCS model to compute the individual iron abundance (using MOOG) for each iron line presented in the common line-list. The result is presented in Figure 2. Although the observed dispersion is quite large, the mean iron abundances derived for each star are quite consistent with the adopted values. We also note that the dispersion is larger for the giant stars. This is because these stars are cooler and therefore have a higher density of lines in their spectra, which makes it more difficult to measure individual lines because of the stronger blending effects. In addition, the lines in giant stars become stronger, and the Gaussian fit that we used for these stronger lines is not as good as that for weaker lines. More importantly, it is fundamental that no evident correlations are found between the abundances and excitation potential or the reduced EW, meaning that the adopted parameters presented in Table 1 were chosen well.

5.3. Selecting the best lines

Figure 3 shows the relative abundance for each iron line as a function of wavelength for each benchmark star. Only the lines that were simultaneously found in the spectra of all four benchmark stars are present in this figure, that is, lines that cannot be measured in at least one benchmark star were immediately discarded. We then set a value for the percentage threshold to accept the best lines. These lines should present a relative abundance within the threshold for the four benchmark stars simultaneously. After testing with different values, we adopted 3.5% and 4.5% as the threshold to accept Fe i lines and Fe ii lines, respectively. The threshold for Fe ii lines is higher to keep a significant number of these lines since they are essential for determining the surface gravity using the ionization equilibrium.

Article number, page 6 of 9

S. G. Sousa et al.: A new procedure for defining a homogenous line-list for solar-type stars

Fig. 5. Comparison between the derived (new) and the reference spectroscopic stellar parameters (ref). The star symbols represent the benchmark stars used to select the lines. The filled squares represent the extra stars used to test the ARES+MOOG method with the new line-list.

Using this simple procedure, we compiled a final line-list composed of 140 Fe i lines and 11 Fe ii lines^4. A sample of the line-list is presented in Table 2. These lines have reliable atomic data, as is shown for the benchmark stars, and are present in the different types of stars covered by the benchmark stars used in the process.

6. Testing the new method

6.1. Comparing with other linelists

To test the line-list derived with the procedure presented here, we compared it with other line-lists used in other works to derive of parameters of solar-type stars. The line-lists chosen for this comparison are presented in Sousa et al. (2008) (here as SOU08), Meléndez et al. (2012) (here as MEL12), and Ramírez et al. (2013) (here as RAM13). The test consisted of using the benchmark stars to derive the Fe i abundance for each one of the linelists, including the one that we defined in this work. To computate these abundances we considered that the different line-lists were compiled for the use of different models (namely Kurucz and Marcs models) using each model for the computation accordingly and assuming the adopted values presented in Table 1. Moreover, the MEL12 and SOU08 line-lists adapted their log gf to fit the Sun (differential analysis), while in the other line-lists the log gf were adopted from other sources and were fixed (see respective references for more details).

Figure 4 shows the difference between the mean iron abundance derived for each line-list and the iron abundance adopted in Table 1 for each star. The error bars reflect the dispersion of the abundances for each line-list. The values presented in the figure were obtained after a three sigma clipping for each line list. Like in the standard methods this allowed us to remove line measurements either because of bad continuum fits, or strong blending effects. All line-lists yield consistent abundances for the four benchmark stars. As expected for the dwarf stars and

4 The final line-list is available online at CDS, and at http://www.astro.up.pt/~sousasag/sousa2013_table/ specifically for the Sun, the dispersion from SOU8 and MEL12 is quite small because they used a differential analysis. We also point out that the small difference in abundance seen for the SUN in MEL12 is probably related to the different adopted solar iron abundance. For the giant benchmark stars the trend is opposite: these two line-lists, together with the RAM13, present the largest dispersions of the abundances. From the figure we see that the line-list presented here is appropriate to derive homogeneous stellar parameters for these four types of stars. This result comes from the process itself, but it is interesting to see the clear increase of the dispersion for the other line-lists from dwarfs to cool giant stars.

We would also like to point out that for our line-list the number of lines used for the four stars remains nearly constant, while the same does not occur for the other line-lists, where many of the lines are not identified (e.g. too weak in metal-poor stars), or there are lines that became so strong in giants that they needed to be discarded for a proper analysis. This is an extra additional point in favour of the line-list compiled with this process in terms of homogenization for the parameters derived for different stars.

6.2. Testing with other stars

The ARES+MOOG method was applied using the MARCS models and the list of lines defined as discussed above. To test the method, spectroscopic parameters were derived for the benchmark stars and for eight other stars. These stars were selected from previously studied HARPS samples for which highquality spectra and spectroscopic stellar parameters are available. The additional stars were chosen in a way to fill the parameter’s range of applicability, that is, from F to K stars, from dwarfs to giants, and from metal-poor to metal-rich stars. Figure 5 shows the direct comparison of the derived spectroscopic parameters with the ones presented in Table 1 for the benchmark stars, and with values derived in previous works (Sousa et al. 2008, 2011a, 2011b) for the additional stars. The parameters derived with the new line-list and the comparison parameters are presented in Table 3. The errors were derived as in previ-

Article number, page 7 of 9

Table 3. Stars used for the test and respective stellar parameters.

Reference Parameters New Results Star Teff logg [Fe/H] ξ_t T e f f logg [Fe/H] ξ_t (K) dex dex km/s (K) dex dex km/s MRD 5777 ± 50 4.44 ± 0.10 0.00 ± 0.05 1.00 ± 0.05 5768 ± 78 4.35 ± 0.11 0.01 ± 0.06 0.90 ± 0.07 MPD 5320 ± 90 4.45 ± 0.15 -0.83 ± 0.12 0.90 ± 0.20 5358 ± 74 4.39 ± 0.12 -0.79 ± 0.06 0.65 ± 0.11 MRG 4540 ± 100 2.10 ± 0.25 0.15 ± 0.22 1.80 ± 0.20 4556 ± 94 2.12 ± 0.19 0.06 ± 0.07 1.84 ± 0.06 MPG 4247 ± 100 1.59 ± 0.30 -0.54 ± 0.10 1.80 ± 0.20 4314 ± 80 1.45 ± 0.16 -0.58 ± 0.06 1.75 ± 0.03 HD125455 5162 ± 41 4.52 ± 0.10 -0.19 ± 0.02 0.70 ± 0.10 5109 ± 139 4.39 ± 0.21 -0.18 ± 0.14 0.22 ± 1.17 HD179949 6287 ± 28 4.54 ± 0.04 0.21 ± 0.02 1.36 ± 0.03 6254 ± 78 4.36 ± 0.12 0.23 ± 0.12 1.13 ± 0.06 HD2071 5719 ± 14 4.47 ± 0.02 -0.09 ± 0.01 0.95 ± 0.01 5697 ± 82 4.34 ± 0.12 -0.06 ± 0.06 0.61 ± 0.10 HD72769 5640 ± 27 4.35 ± 0.04 0.30 ± 0.02 0.98 ± 0.03 5598 ± 96 4.18 ± 0.13 0.30 ± 0.08 0.94 ± 0.13 HD102200 6185 ± 65 4.59 ± 0.04 -1.10 ± 0.04 1.52 ± 0.23 6089 ± 104 4.16 ± 0.13 -1.17 ± 0.08 0.59 ± 0.17 HD221580 5322 ± 24 2.68 ± 0.04 -1.13 ± 0.02 1.97 ± 0.04 5230 ± 69 2.19 ± 0.11 -1.19 ± 0.06 1.43 ± 0.04 HD22918 4924 ± 43 3.61 ± 0.10 0.02 ± 0.03 0.73 ± 0.08 4866 ± 109 3.51 ± 0.18 0.11 ± 0.10 0.36 ± 0.33 HD105671 4748 ± 103 4.42 ± 0.23 -0.02 ± 0.07 0.90 ± 0.34 4787 ± 159 4.44 ± 0.34 -0.07 ± 0.08 1.18 ± 0.29

ous works (for details see Sousa et al. (2011a) and references within).

The temperatures and [Fe/H] show very consistent results within the error bars. For log g, the consistency is good in general, but there are specific cases that are not covered by the error bars. For these cases it is interesting, however, that the temperatures and [Fe/H] remain consistent and show little dependence on the derived surface gravity.

This procedure can be used to define a common line-list for different groups using an EW method. Something similar could also be used to define a good set of lines to derive homogeneous and accurate abundances for other elements if there are good benchmark abundances. The procedure can also be used or easily adapted for other surveys or even for the individual analysis of any given solar-type star.

7. Summary

The work presented can be essential for homogeneously determining spectroscopic parameters and chemical abundances for any large spectroscopic survey data using an EW method.

We presented a technical overview of the standard spectroscopic method used by our team, which is based on the measurement of EWs of iron lines. In previous works our team has been using a differential approach, which cannot be adopted if strong constraints are imposed. To overcome this situation, we proposed here an alternative procedure that allows one to perform an optimal selection of the lines.

Using a small sample of stars that cover different ranges of stellar parameters, we showed that the use of the selected final line-list together with our ARES+MOOG method derives homogeneous and consistent spectroscopic parameters.

To ensure a homogeneous derivation of spectroscopic stellar parameters, a final and fixed line-list can be obtained with this procedure to be used by other groups that use the EW method.

Acknowledgements. S.G.S, EDM, and V.Zh.A. acknowledge support from the Fundação para a Ciência e Tecnologia (Portugal) in the form of grants SFRH/BPD/47611/2008, SFRH/BPD/76606/2011, SFRH/BPD/70574/2010, respectively . NCS thanks for the support by the European Research Council/European Community under the FP7 through a Starting Grant. We also acknowledge support from FCT and FSE/POPH in the form of grants reference PTDC/CTE-AST/098528/2008, PTDC/CTE-AST/098754/2008, and PTDC/CTE-AST/098604/2008. We are also greatful for the support of FP7 through the GREAT-ITN project FP7-PEOPLE-2010-ITN & PITN-GA-2010- 264895. The results presented here benefited from discussions in three Gaia- ESO workshops supported by the ESF (European Science Foundation) through the GREAT (Gaia Research for European Astronomy Training) initiative (Science meetings 3855, 4127 and 4415), HT acknowledges the Ministerio de Economía y Competitividad (MINECO) under grants AYA2011-30147-C03-02* and BES-2009-012182, and the ESF and GREAT for a n exchange grant 4158. HT and DM acknowledge The Universidad Complutense de Madrid (UCM) and The Comunidad de Madrid under PRICIT Project AstroMadrid (CAM S2009/ESP-1496). J.I.G.H. acknowledges financial support from the Spanish Ministry project MINECO AYA2011-29060, and also from the Spanish Ministry of Economy and Competitiveness (MINECO) under the 2011 Severo Ochoa Program MINECO SEV-2011-0187. AJK acknowledges support by the Swedish National Space Board (SNSB).

References

Adibekyan, V. Z., Santos, N. C., Sousa, S. G., et al. 2012, A&A, 543, A89 Anders, E. & Grevesse, N. 1989, Geochim. Cosmochim. Acta, 53, 197 Asplund, M., Grevesse, N., Sauval, A. J., & Scott, P. 2009, ARA&A, 47, 481 Creevey, O. L., Doǧan, G., Frasca, A., et al. 2012, A&A, 537, A111 Delgado Mena, E., Israelian, G., González Hernández, J. I., et al. 2010, ApJ, 725, 2349 Doğan, G., Metcalfe, T. S., Deheuvels, S., et al. 2013, ApJ, 763, 49 Ghezzi, L., Cunha, K., Schuler, S. C., & Smith, V. V. 2010, ApJ, 725, 721 Gilmore, G., Randich, S., Asplund, M., et al. 2012, The Messenger, 147, 25 Gómez Maqueo Chew, Y., Faedi, F., Cargile, P., et al. 2013, ArXiv e-prints González Hernández, J. I., Israelian, G., Santos, N. C., et al. 2010, ApJ, 720, 1592 Grigahcène, A., Dupret, M.-A., Sousa, S. G., et al. 2012, MNRAS, 422, L43 Gustafsson, B., Edvardsson, B., Eriksson, K., et al. 2008, A&A, 486, 951 Heiter, U. & Eriksson, K. 2006, A&A, 452, 1039 Hinkle, K., Wallace, L., Valenti, J., & Harmer, D. 2000, Visible and Near Infrared Atlas of the Arcturus Spectrum 3727-9300 A Huber, D., Ireland, M. J., Bedding, T. R., et al. 2012, ApJ, 760, 32 Kupka, F., Piskunov, N., Ryabchikova, T. A., Stempels, H. C., & Weiss, W. W.

1999, A&AS, 138, 119 Kurucz, R. 1993, ATLAS9 Stellar Atmosphere Programs and 2 km/s grid. Kurucz CD-ROM No. 13. Cambridge, Mass.: Smithsonian Astrophysical Observatory, 1993., 13 Lodders, K., Palme, H., & Gail, H.-P. 2009, Landolt Börnstein, 44 Magrini, L., Randich, S., Zoccali, M., et al. 2010, A&A, 523, A11 Meléndez, J., Bergemann, M., Cohen, J. G., et al. 2012, A&A, 543, A29 Mucciarelli, A., Pancino, E., Lovisi, L., Ferraro, F. R., & Lapenna, E. 2013, ApJ, 766, 78 Neves, V., Santos, N. C., Sousa, S. G., Correia, A. C. M., & Israelian, G. 2009, A&A, 497, 563 Piskunov, N. E., Kupka, F., Ryabchikova, T. A., Weiss, W. W., & Jeffery, C. S.

1995, A&AS, 112, 525 Ramírez, I., Allende Prieto, C., & Lambert, D. L. 2013, ApJ, 764, 78 Ryabchikova, T. A., Piskunov, N. E., Stempels, H. C., Kupka, F., & Weiss, W. W.

1999, Physica Scripta Volume T, 83, 162 Santos, N. C., Bouchy, F., Mayor, M., et al. 2004a, A&A, 426, L19 Santos, N. C., Israelian, G., & Mayor, M. 2004b, A&A, 415, 1153 Sneden, C. 1973, Ph.D. Thesis, Univ. of Texas Soubiran, C., Le Campion, J.-F., Cayrel de Strobel, G., & Caillo, A. 2010, A&A, 515, A111

Article number, page 8 of 9

S. G. Sousa et al.: A new procedure for defining a homogenous line-list for solar-type stars

Sousa, S. G., Santos, N. C., Israelian, G., et al. 2011a, A&A, 526, A99+ Sousa, S. G., Santos, N. C., Israelian, G., Mayor, M., & Monteiro, M. J. P. F. G.

2006, A&A, 458, 873 Sousa, S. G., Santos, N. C., Israelian, G., Mayor, M., & Monteiro, M. J. P. F. G.

2007, A&A, 469, 783 Sousa, S. G., Santos, N. C., Israelian, G., Mayor, M., & Udry, S. 2011b, A&A, 533, A141 Sousa, S. G., Santos, N. C., Mayor, M., et al. 2008, A&A, 487, 373 Stetson, P. B. & Pancino, E. 2008, PASP, 120, 1332 Tabernero, H. M., Montes, D., & González Hernández, J. I. 2012, A&A, 547, A13

Article number, page 9 of 9