arXiv:1203.5992v1 [astro-ph.CO] 27 Mar 2012

NO EVIDENCE FOR A SYSTEMATIC FEII EMISSION LINE REDSHIFT IN TYPE 1 AGN

Jack W. Sulentic Instituto de Astrofísica de Andalucía, CSIC, Spain

sulentic@iaa.es

Paola Marziani INAF, Astronomical Observatory of Padova, Italy

paola.marziani@oapd.inaf.it

Sebastian Zamfir University of Wisconsin, Stevens Point, USA

szamfir@uwsp.edu

and Zachary A. Meadows University of Wisconsin, Stevens Point, USA

Zachary.A.Meadows@uwsp.edu

ABSTRACT

We test the recent claim by Hu et al. (2008) that FeII emission in Type 1 AGN shows a systematic redshift relative to the local source rest frame and broad-line Hβ. We compile high s/n median composites using SDSS spectra from both the Hu et al. sample and our own sample of the 469 brightest DR5 spectra. Our composites are generated in bins of FWHM Hβ and FeII strength as defined in our 4D Eigenvector 1 (4DE1) formalism. We find no evidence for a systematic FeII redshift and consistency with previous assumptions that FeII shift and width (FWHM) follow Hβ shift and FWHM in virtually all sources. This result is consistent with the hypothesis that FeII emission (quasi-ubiquitous in type 1 sources) arises from a broad-line region with geometry and kinematics the same as that producing the Balmer lines.

– 2 –

1. Introduction

Spectra of Type 1 AGN show a diversity of broad and narrow emission lines that provide direct insights into the structure and kinematics of photoionized, and otherwise excited, gas in the vicinity of the putative central massive object. Broad emission lines, like much studied Hβ (e.g., Zamfir et al. 2010, hereafter Z10), are thought to arise in or near an accretion disk acting as the fuel reservoir for the central supermassive black hole (log M∼ 7 − 9.5 M_⊙). Hβ shows a diversity of line widths as well as profile shifts and asymmetries (Sulentic et al. 2000a). Despite this diversity some systematics have emerged and are best highlighted via the concept of two Type 1 AGN populations (Sulentic et al. 2000b).

Population A show the smallest broad-line widths FWHM Hβ=1000-4000 km s^{−1}and includes the Narrow line Seyfert 1 (NLSy1) sources (FWHM < 2000 km s^{−1}). Pop. A Hβ profiles are currently best fit by a single Lorentz function. Population B sources show FWHM Hβ=4000-12000 km s^{−1}and require two Gaussians (one unshifted and one redshifted) for a reasonable profile description. “Broad-line” Hβ profiles as narrow as FWHM = 500 km s^{−1}(Zhou et al. 2006) and as broad as FWHM = 40000 km s^{−1}(Wang et al. 2005) have been found. Pop. A is predominantly radio-quiet while pop. B involves a mix of radio-quiet and the majority of radio-loud quasars.

Broad- and narrow-line profile shifts are known and the phenomenology can be confusing. Narrow emission lines like [OIII]ł5007Å are regarded as a reliable measure of the local quasar rest frame except in the case of “blue outliers”, usually found in sources with FWHM Hβ= 1500-3500 km s^{−1}and weak [OIII] (Véron-Cetty et al. 2001; Zamanov et al. 2002; Marziani et al. 2003b; Boroson 2005). Blue outliers show [OIII] blueshifts as large as ∼1000 km s^{−1}. No pop. B sources with blueshifted [OIII] are known at low z (or luminosity). Careful use of [OIII] and Hβ narrow line as rest frame measures suggests that broad Hβ in pop. A sources rarely shows a systematic red or blue shift above the FWHM profile level. A blueshifted component or asymmetry is observed in some extreme FeII strong pop. A sources (Marziani et al. 2010). Pop. B sources show more complex line shift properties. The Hβ profile usually shows two components: 1) a “classical” broad component (BC; FWHM = 4000 – 5000 km s^{−1}) with zero or small (red or blue) shift, and 2) a very broad (VBC; 10000 km s^{−1}) and redshifted (^>∼ 1000 km s^{−1}) component. Composites involving the 469 brightest SDSS-DR5 quasars^1 suggest that these two components represent the underlying stable structure of Hβ in pop. B sources.

Broad FeII emission has been found in type 1 quasars since the era of photographic

1We acknowledge the use of SDSS quasar spectra: http://www.sdss.org/collaboration/credits.html

– 3 –

spectroscopy in the ’60s. FeII emission blends are almost ubiquitous in a sample of the brightest (usually highest s/n) SDSS quasars (Z10). Circumstantial evidence has accumulated supporting the assumption that FeII emission arises in or near the emitting clouds that produce other low ionization lines like Hβ (see e.g., Boroson & Green 1992; Marziani et al. 2003a; Sulentic et al. 2006). FWHM FeII appears to correlate with FWHM Hβ over the full range where FeII can be detected (FWHM=1000-12000 km s^{−1}). This can be clearly seen at low z by observing the shape (e.g., smoothness) of the FeII 4450-4700 Å blue blend (and the FeII multiplet 42 line at 5018 Å) near [OIII]ł5007Å. In pop. A sources the blend resolves into individual lines while it becomes much smoother in pop. B sources. Sources with the strongest FeII emission also show a weakening of Hβ emission as expected if the latter is collisionally quenched in the same dense medium where strong FeII emission can be produced (Gaskell 1985).

2. A Systematic FeII Redshift?

Obviously systematic line shifts place important constraints on models for the geometry and kinematics of the broad line region. The most famous example involves a systematic blueshift of high ionization lines (e.g., CIV ł1549Å) relative to low ionization lines (e.g., Balmer) especially in pop. A sources (e.g., Gaskell 1982; Sulentic et al. 2007; Richards et al. 2011; Wang et al. 2011). Evidence was recently advanced (Hu et al. 2008, hereafter H08) for the existence of a systematic redshift of FeII relative to [OIII]ł5007 (and hence the Balmer lines) in a majority of Type 1 quasars. This result, along with a narrower estimated FeII line width, has been ascribed to FeII emission arising in a region with dynamics dominated by infall and located at larger radius than the region producing the bulk of Hβ. H08 argue that the amplitude of the shifts correlates inversely with source Eddington ratio (L/L_{Edd}≡η). Interpretations for such an FeII redshift have already appeared (Ferland et al. 2009; Shields et al. 2010; Boroson 2011) reflecting the potential importance of such a first-order kinematic signature. Having worked on line spectra and profile shifts for many years we were surprised by the H08 claims and decided to test the hypothesis of a systematic FeII redshift. Could we have missed it?

First let us consider what we know. Most pop. A quasars show relatively symmetric unshifted Lorentz-like Hβ profiles with FWHM<4000 km s^{−1}. In our work using the brightest (g < 17.5 or i < 17.5; Zamfir et al. 2008) SDSS DR5 quasars we processed spectra for ∼260 pop. A sources (from a sample of 469 quasars; Z10) and we found no evidence for a systematic shift of FeII lines relative to Hβ or [Oiii]λ5007. Such an FeII shift should be easiest to detect in the brightest pop. A SDSS spectra with narrowest broad-line profiles and strongest FeII

– 4 –

emission. It is immediately suspicious that more and larger FeII redshifts are claimed for pop. B sources. In only one pop. A source in our sample SDSS J0946+0139 do we find a large Hβ peak (90% intensity level) redshift of 1830 km s^{−1}. This source is similar to OQ208 (Marziani et al. 1993 and discussed in H08) which shows Δ v_r>2000 km s^{−1}. SDSS J0946 is the only pop. A source with a large FeII redshift in our Z10 sample (1/260). Z10 found 19 quasars with an Hβ peak (9/10 fractional intensity) blueshifted more than -320 km s^{−1}and 4 sources with the peak redshift more than +320 km s^{−1}. The remaining 241 pop. A sources showed no significant Hβ peak shift (figure 8 of Z10). Best FeII template fits to these sources show no significant difference in centroid redshift between FeII and Hβ. There are two possible causes of small and spurious Hβ (or FeII) shifts: 1) host galaxy contamination and 2) blue outliers.Except in rare cases host galaxy contamination is unlikely to induce systematic redshifts with the amplitudes reported by H08.

Extreme blue outliers with [OIII] blueshifts in the range 400-1000 km s^{−1}are rare and therefore cannot be the cause of the large and systematic shifts reported in H08. In fact H08 selection criteria rejected sources likely to be seriously affected by 1) or 2).

H08 chose 4000+ sources from SDSS DR5 with computed s/n ≥ 10. Z10 also used DR5 where ∼94% of sources show s/n ≥ 10. Our sample was magnitude-limited with a slightly shallower redshift upper limit (z=0.7 instead of 0.8). Why do we reach different conclusions about FeII shifts? A big part of the answer could involve how s/n was computed. H08 compute s/n over the range 4430–5500Å. This procedure overestimates the quality of the data because it includes major emission lines in the computation. We compute s/n in the range 5600-5800Å, which is free of strong lines and represents as close as one can approach to an estimate of continuum s/n near Hβ. Using our range the H08 sample shows mean and median s/n values of 10.6 and 7.4, respectively; approx. 65% show s/n < 10. We find that only 182 spectra of our bright sample are included in the H08’s. The majority of the H08’s sources are lower s/n than those in our sample.

3. specfit Analysis

3.1. A2 and B1 Composite Spectra

One cannot estimate reliable FeII line shifts using individual SDSS spectra for sources fainter than about g∼17-17.5. In rough order of importance our studies indicate that the accuracy of FeII shift measures depends on: 1) FeII strength and FeII/Hβ profile widths, 2) spectral s/n and 3) if estimates depend heavily on fits to the 4430-4680 Å blend, strength of HeII 4686 emission. Typical individual spectra used by H08 show too low s/n to allow

– 5 –

convincing conclusions about FeII shift and width – typical parameter uncertainties for individual sources are much larger than the ones connected with our high s/n composites (for a typical A2 source with s/n≈20 uncertainties of shift estimates are larger than ±1500km s^{−1}). Individual source spectra with large quoted FeII redshift and s/n near the sample median were extracted from the H08 sample and specfit modelled. Using an FeII template with fixed shifts ranging from zero up to the largest values quoted by H08, χ^2 cannot distinguish between zero and e.g., 1000 km s^{−1}redshift in the majority of the sources.

The best recourse is to generate high s/n composite spectra. H08 argue that one cannot confirm or refute the existence of a systematic FeII redshift using composite spectra because of the large dispersion of FWHM, shifts and flux values for both Hβ and FeII. This is likely true for composites generated from random subsamples of sources but not true if one generates composites over more limited ranges of parameter values. One can generate binned composites over limited ranges of FWHM Hβ and FeII strength using the 4DE1 formalism (Sulentic et al. 2002; Bachev et al. 2004; Sulentic et al. 2007; Z10). 4DE1 bins A2 (FWHM Hβ= 1000-4000 km s^{−1}, 0.5 ≤ R_{FeII}≤ 1.0) and B1 (FWHM Hβ=4000 – 8000 km s^{−1}, R_{FeII}≤ 0.5) are of particular interest because they include the largest numbers of sources in random samples. specfit analysis (Kriss 1994; details in Marziani et al. 2009) of an A2 median composite involving n = 130 Z10 sources (s/n 90) gives a best-fit consistent with zero FeII redshift. The situation for the B1 composite (n=131 sources from Z10; s/n 110) is less constraining because lines are broader and FeII weaker. Table 1 reports FeII template shifts and 2σ uncertainties for specfit tests discussed in this paper. We also report peak shifts of Hβ BC extracted from the best specfit solutions along with Hβ “core” shifts measured at the centroid of the line peak after Hβ NC subtraction. In no case do we find a significant shift between FeII and the rest frame or between FeII and Hβ. We also do not find any significant FeII shifts if we restrict to sources with L/L_{Edd} ratio η ≤ 0.1 (H08 suggested the shifts might be largest for low L/L_{Edd} sources).

3.2. A2 Composites Involving Only Sources with Large FeII Shifts?

Since we find no evidence for systematic FeII redshifts in our Z10 bright quasar sample composites it is useful to generate FeII shift composites using the H08 sample. We generate them within the 4DE1 context thereby restricting the ranges of FWHM Hβ, FeII relative strength (and likely also FWHM FeII) for each composite. Since the distribution of FeII shifts shown in H08 is continuous we focus on the sources with largest quoted shift values. If these shifts are not confirmed then smaller shifts are even less likely to be real. We therefore focus on constructing median composites for all H08 sources falling in 4DE1 bins A2 and B1

– 6 –

with H08 FeII redshift estimates ≥ 1000 km s^{−1} (figure 1). Two composites were constructed for each spectra bin: 1) one with no restriction on FeII width (H08 do not constrain FWHM FeII in their template fits so it is sometimes very different from FWHM Hβ ) and 2) one with FeII width constrained to the FWHM range of Hβ in a particular bin (i.e., ≤ 4000km s^{−1} for A2 and 4000 − 8000 km s^{−1} for B1). Upper and lower panels of figure 1 show bins A2 (FWHM Hβ < 4000 km s^{−1}) and B1 (FWHM Hβ=4000-8000 km s^{−1}), respectively (n=156 for bin A2 and n=240 for bin B1). The s/n ∼ 55-60 for both composites. Spectra show bestfit specfit models superimposed. The left and center panels involved FeII templates fixed to the best fit and 1500 km s^{−1}shifts, respectively. Our template prescription is described in Marziani et al. (2009)

Graphical results for the best-fits are shown in the right panels of figure 1. Fits were performed over the range ≈ 4470 – 5450 Å, where FeII and continuum emission account for the total flux making it the safest region for normalized χ^2 computations. χ^2 values are shown for the range of adopted FeII shifts. In order to estimate confidence intervals we considered a set of fits with displacements Δv_r= +500n, for integer n = 0...4, along with the best fit and a few additional Δv_r cases in proximity to the minimum χ^2. One can see a clear preference for zero or near-zero fits. The significance of χ^2 variations is described by F statistics appropriate for ratios of χ^2 values (Bevington 1969). Given the large number of degrees of freedoms in the sampling range (4500 – 4630, 5040 – 5090, 5310 – 5360 Å) any χ^2 differences between two fits become significant at a 95% confidence level if χ^2/χ^2_{min} ≈ 1.24. The χ^2 values indicate that zero shift and “best shift” values in table 1 are not significantly different. All fits involving shifts^>∼ 500 km s^{−1} are statistically significant. The middle panel of figure 1 upper row demonstrates visually that the fit with Δ v_r= +1500 km s^{−1} (and even more the fits with larger displacement) do not reproduce the observed FeII emission.

Both the residuals and χ^2 results rule out any systematic redshift for at least half of the H08 sample (pop. A). Note especially the fits to the two relatively isolated multiplet 42 FeII lines between Hβ and [OIII]ł4959 and on the red wing of [OIII]ł5007. The redshifted fit fails to include the blue side of the 4450 – 4700 blend and the red side is confused by the frequent presence of HeII ł4686. The latter line is not mentioned in the H08 study leaving us to conclude that it was not included in their fits. It can certainly give the impression of a redshift of the FeII blue blend, which is the most useful FeII diagnostic in the optical spectra of low redshift quasars (the red FeII blend is frequently affected by coronal lines as well as MgII host galaxy absorption in lower redshift sources). Pioneering principal component analysis of the BQS survey (Boroson & Green 1992) found that HeIIł4686 equivalent width anticorrelates with sources luminosity (it is Eigenvector 2). There is a tendency for the H08 sources with largest FeII redshifts to favor a smaller and lower (log L ∼ 40.3 − 41.0) range of source luminosity than those with near zero shifts (log L ∼ 40.3 − 42.0). Thus the effect

– 7 –

of HeII will tend to play a larger role in the sources where the largest FeII redshifts have been found. H08 show composite spectra for five bins of FeII redshift in their Figure 12. The three bins involving largest FeII redshift sources show a prominent HeII signature that, if not subtracted, will increase the apparent significance of any assumed FeII redshift. Only the bin involving sources with no FeII redshift (within the uncertainties) shows no evidence of HeII emission.

3.3. What about Population B Sources?

Figure 9a of H08 suggests that a larger fraction of quasars with FWHM Hβ > 4000 km s^{−1}(Population B) show large FeII redshifts. The lower panels of our Figure 1 show specfit models superimposed on a B1 median composite constructed from all H08 sources with quoted FeII redshift greater than 1000 km s^{−1}. The situation is certainly more ambiguous than for the A2 composite. It is hard to identify individual FeII features. Lines are broad, FeII is weak and under these conditions there are serious limitations on the reliability of FWHM and shift estimates for FeII (cf. Fig. 3 of Marziani et al. 2003a). The same analysis as done for A2 composite shows much poorer constraints on the FeII shift. The best fit yields Δ v_r≈ 760 km s^{−1} but is not distinguishable from a zero shift solution. If one actually computes χ^2 values over the ranges 4474 – 4640 Å, 5040 – 5105 Å, 5320 – 5400 Å, the χ^2 monotonically increases from 0 shift (figure 1, lower rightmost panel), although the increase remains insignificant until ≈ 1100 km s^{−1}, where χ^2/χ^2_{min} ≈ 1.21. B1 FeII is too faint and the lines are too broad to make inferences about line shifts and widths. The claim of large FeII shifts are not, and cannot be, confirmed.

Kovačević et al. (2010) recently report an FeII study of SDSS quasars and any FeII redshifts they measure (their figure 16) are much smaller than those reported by H08 (the average FeII shift relative to the narrow lines is 100 ± 240 km s^{−1}).

Returning to our previous list of major sources of uncertainty for FeII shift and FWHM estimates leads us to suggest that low spectral s/n and above average HeII strength are the culprits. The fit to the 4430 – 4680 blue blend drives the best fit χ^2 results. The exclusion of HeIIł4686 from the H08 fits likely results in a tendency for HeII to “redshift” the blue FeII blend. This effect in a typically low luminosity sample, where HeII is stronger than average, likely drove the conclusion that FeII was systematically redshifted. We tested this conclusion omitting the HeII line from our fits to the bin A2 and B1 composites generated from the H08 sample. FeII shifts in lines 2 and 5 of table 1 increase from -60 to +770km/s and from 730 to 1570km/s, respectively. The more constraining A2 results suggest that HeII can produce the entire systematic redshift claimed by H08.

– 8 –

4. Conclusions

We do not confirm large FeII redshifts relative to narrow [OIII] and broad Hβ emission in Type 1 AGN but cannot rule out the existence of small red (or blue) shifts in particular subsamples. Fitting median composites built from spectra with large claimed FeII shifts (≥ 1000 km s^{−1}) indicates small shifts with an upper limit ≈ 300 km s^{−1} for bin A2. In the case of B1 the best fit suggests ≈700 km s^{−1} but the shift is very poorly constrained. In both cases the shifts are not significantly different from 0. These results do not support the origin of FeII emission from a dynamical disjoint region from the one emitting the broad core of Hβ. Our result also challenges the usefulness of FeII shift as orientation parameter. Small systematic shifts of FeII with respect to the rest frame seem plausible but a reliable analysis is possible only on spectra of high s/n ratio.

REFERENCES

Bachev, R., Marziani, P., Sulentic, J. W., Zamanov, R., Calvani, M., & Dultzin-Hacyan, D.

2004, ApJ, 617, 171

Bevington, P. R. 1969, Data reduction and error analysis for the physical sciences (New York: McGraw-Hill)

Boroson, T. 2005, AJ, 130, 381

Boroson, T. A. 2011, ApJ, 735, L14+

Boroson, T. A., & Green, R. F. 1992, ApJS, 80, 109

Ferland, G. J., Hu, C., Wang, J., Baldwin, J. A., Porter, R. L., van Hoof, P. A. M., & Williams, R. J. R. 2009, ApJ, 707, L82

Gaskell, C. M. 1982, ApJ, 263, 79

—. 1985, Nature, 315, 386

Hu, C., Wang, J.-M., Ho, L. C., Chen, Y.-M., Bian, W.-H., & Xue, S.-J. 2008, ApJ, 687, 78 (H08)

Kovačević, J., Popović, L. Č., & Dimitrijević, M. S. 2010, ApJS, 189, 15

Kriss, G. 1994, Astronomical Data Analysis Software and Systems III, A.S.P. Conference Series, 61, 437

– 9 –

Marziani, P., Sulentic, J. W., Calvani, M., Perez, E., Moles, M., & Penston, M. V. 1993, ApJ, 410, 56 Marziani, P., Sulentic, J. W., Negrete, C. A., Dultzin, D., Zamfir, S., & Bachev, R. 2010, MNRAS, 409, 1033 Marziani, P., Sulentic, J. W., Stirpe, G. M., Zamfir, S., & Calvani, M. 2009, A&Ap, 495, 83 Marziani, P., Sulentic, J. W., Zamanov, R., Calvani, M., Dultzin-Hacyan, D., Bachev, R., & Zwitter, T. 2003a, ApJS, 145, 199 Marziani, P., Zamanov, R. K., Sulentic, J. W., & Calvani, M. 2003b, MNRAS, 345, 1133 Richards, G. T., et al. 2011, AJ, 141, 167 Shen, Y. et al. 2011, ApJS, 194, 45 Shields. G., et al 2010, ApJ, 687, 78 Sulentic, J. W., Bachev, R., Marziani, P., Negrete, C. A., & Dultzin, D. 2007, ApJ, 666, 757 Sulentic, J. W., Marziani, P., & Dultzin-Hacyan, D. 2000a, ARA&A, 38, 521 Sulentic, J. W., Marziani, P., Zamanov, R., Bachev, R., Calvani, M., & Dultzin-Hacyan, D.

2002, ApJL, 566, L71 Sulentic, J. W., Marziani, P., Zwitter, T., Dultzin-Hacyan, D., & Calvani, M. 2000b, ApJL, 545, L15 Sulentic, J. W., Repetto, P., Stirpe, G. M., Marziani, P., Dultzin-Hacyan, D., & Calvani, M.

2006, A&Ap, 456, 929 Véron-Cetty, M.-P., Véron, P., & Gonçalves, A. C. 2001, AAp, 372, 730 Wang, T. -G., Dong, X. -B., Zhang, X., -G., Zhou, H., -Y., Wang, J. -X. & Lu, Y., -J. 2005, ApJL, 625, L35 Wang, H., Wang, T., Zhou, H., Liu, B., Wang, J., Yuan, W., & Dong, X. 2011, ArXiv e-prints Zamanov, R., Marziani, P., Sulentic, J. W., Calvani, M., Dultzin-Hacyan, D., & Bachev, R.

2002, ApJL, 576, L9 Zamfir, S., Sulentic, J. W., & Marziani, P., 2008, MNRAS, 403, 1759

– 10 –

Zamfir, S., Sulentic, J. W., Marziani, P., & Dultzin, D. 2010, MNRAS, 387, 856 (Z10) Zhou, H., Wang, T., Yuan, W., Lu, H., Dong, X., Wang, J., & Lu, Y. 2006, ApJS, 166, 128

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 11 –

Table 1. FeII and Hβ shifts^a

Spectrum s ± δs(FeII) s(Hβ)^b s(Hβ) |Δ|^c N spectra BC core

A2 - Z10 -40 ± 90 10 0^<∼ 20 130 A2 - H08, s ≥ 1000 -60 ± 400 80 90 70 156 A2 - H08, η ≤ 0.1 -160 ± 375 100 10 45 194 B1 - Z10 -340 ± 400 -150 -80^<∼ 20 131 B1 - H08, s ≥ 1000 +730^{+400}_{−800} 0 100^<∼ 20 240 B1 - H08, η ≤ 0.1 +180 ± 450 -80 40^<∼ 20 410 B1 - H08 ∩ Z10, η ≤ 0.1 -150 ± 470 -170 -140 45 22 . aAll shifts in km s^{−1} with respect to average radial velocity of peaks of Hβ narrow component and of [OIII]ł5007.

b2σ uncertainties of the Hβ BC measurements are ±60 km s^{−1} and ±100 km s^{−1} for pop. A and B respectively.

cAbsolute value of peak radial velocity difference Hβ-[OIII]; Δ is always positive if larger than 20 km s^{−1}.

Note. — Median composites listed in the first column: A2 - Z10, B1 - Z10: A2 and B1 sources in the Z10 sample; A2 and B1 - H08 s ≥ 1000: H08 A2 and B1 sources with reported FeII shift s ≥ 1000km s^{−1}; A2 and B1 - H08 η ≤ 0.1: H08 A2 and B1 sources with Eddington ration η ≤ 0.1 (as estimated by H08). The last column indicates the numbers of spectra combined in the median composites. Z10-based composites have s/n >100, while lowest s/n H08-based composites have s/n > 50. For the H08 subsamples we used spectra from the SDSS quasar catalog of Shen et al. (2011)

– 12 –

Fig. 1.— Fits of the Hβ spectral range (left and middle panels) and normalized χ^2_ν (right panels) as a function of Δv_r of the FeII template. Top row: A2 median composite of spectra with reported FeII shift ≥ 1000 km s^{−1}; bottom row: same for a composite of spectral type B1. Thick black line: broad component of Hβ; thick red line: very broad component of Hβ; green line: FeII template; yellow lines: narrow lines ([Oiii]λ5007 and Hβ narrow component). On the right panel, black squares and gray spots indicate the normalized χ^2_ν computed on the composite with no restriction on FeII width, and with FeII width restricted to roughly match the distribution of Hβ width. Dot-dashed lines trace the minimum χ^2_ν ratio indicating a significant difference from the best fit case. Circled symbols identify the specfit best fit. The circled cross marks the best fit assuming no HeII ł4686 contribution. Composites with no FeII width restriction have higher s/n making it possible to obtain more stringent limits on the maximum FeII shift.