arXiv:1111.0955v1 [cond-mat.soft] 3 Nov 2011

Condensation of Silica Nanoparticles on a Phospholipid Membrane

V. E. Asadchikov^a, V. V. Volkov^a, Yu. O. Volkov^a, K. A. Dembo^a , I. V. Kozhevnikov^a, B. S. Roshchin^a,

D. A. Frolov^a, and A. M. Tikhonov^{b,1}

aA. V. Shubnikov Institute of Crystallography, Russian Academy of Sciences, Leninskii pr. 59, Moscow, 119333 Russia bP. L. Kapitza Institute for Physical Problems, Russian Academy of Sciences, ul. Kosygina 2, Moscow, 119334, Russia March 11, 2018

Abstract

The structure of the transient layer at the interface between air and the aqueous solution of silica nanoparticles with the size distribution of particles that has been determined from small-angle scattering has been studied by the X-ray reflectometry method. The reconstructed depth profile of the polarizability of the substance indicates the presence of a structure consisting of several layers of nanoparticles with the thickness that is more than twice as large as the thickness of the previously described structure. The adsorption of 1,2-distearoyl-sn-glycero-3-phosphocholine molecules at the hydrosol/air interface is accompanied by the condensation of anion silica nanoparticles at the interface. This phenomenon can be qualitatively explained by the formation of the positive surface potential due to the penetration and accumulation of Na^+ cations in the phospholipid membrane.

Silica sol (the solution of SiO_2 nanoparticles in water containing a small amount of NaOH) forms a strongly polarized interface with air [1]. The gradient of the surface potential in this system appears due to the difference between the potentials of the electric image forces for Na^+ cations and nanoparticles (macroions) with a large negative charge (∼ 1000 electrons). For this reason, the plane of the closest approach of anion particles with the surface is ∼ 10 nm, whereas cations are accumulated directly at the interface. It was previously reported that unique boundary conditions make it possible to form macroscopically planar lipid membranes on the surface of hydrosol

1 tikhonov@kapitza.ras.ru

1

Figure 1. Molecular structure of 1,2-distearoyl-sn-glycero-3-phosphocholine.

[2]. In this work, we study the distribution of nanoparticles in a wide transient layer at the interface with the lipid membrane of 1,2- distearoyl-sn-glycero-3-phosphocholine (DSPC) molecules (Fig. 1). According to our data, the adsorption of phosphocholine molecules at the hydrosol/air boundary is accompanied by the condensation of silica nanoparticles at this interface.

The DSPC films were prepared and studied in a fluoroplastic dish with a diameter of about 100 mm according to the method reported in [1]. Using a Hamilton 10 μl syringe, two or three drops (with the total volume of about 10 μl) of the solution of phospholipid in chloroform (∼ 3 × 10^3 mole/l) were deposited on the surface of the liquid substrate. The amount of the substance is enough to form no more than two monolayers of lipid. The substrates were Ludox SM-30 (30 wt % SiO_2 and 0.2 wt % Na) and Ludox TM-50 (50 wt % SiO_2 and 0.3 wt % Na) standard solutions (Grace Davison) [3]. Drop spreading over the surface was accompanied by a decrease in the surface tension of the air/hydrosol from ∼ 74 to ∼ 50 mN/m, which was detected by the Wilhelmy method using an NIMA PS-2 surface pressure sensor. Then, the sample was placed in equilibrium at room temperature in an air-tight cell for ∼ 12 h.

To facilitate the interpretation of the scattering data and to reveal the effect of the polydispersity in the size distribution of particles, we preliminarily examined silica solutions by the small-angle scattering method [4]. The bulk hydrosol sample was prepared in a glassy capillary and the measurements were performed using an AMUR-K X-ray diffractometer [5]. Figure 2 shows the distributions obtained for particles in the SM-30 and TM-50 solutions.

The results indicate that the characteristic diameter of particles d for the SM-30 solution is ∼ 10 nm; this solution contains a small amount of larger particles with a size of d ∼ 20 nm. The distribution of particles in the TM-50 solution exhibits a narrow peak at d =

Figure 2. Diameter distribution F of particles in the (solid line) SM-30 and (dashed line) TM-50 silica solutions according to small-angle scattering.

27 nm.

All X-ray reflectometry experiments were performed using a multifunctional X-ray diffractometer with a mobile tube-detector system [6]. The measurements were performed at a wavelength of λ ∼ 1.54 Å (δλ/λ ∼ 10^{−4}) at an angular resolution of ∼ 10^{−4} rad.

Figures 3 and 4 show the coefficient of reflection R from the air/hydrosol interface as a function of the glancing angle θ. Oscillations of the coefficient of reflection at θ > 0.18^∘ are due to the inhomogeneous depth distribution of particles in the surface transient layer.

Using the experimental angular dependencies of the coefficients of reflection R (Figs. 3 and 4), we reconstructed the profiles of the polarizability of the substance δ = Re(1 − ϵ) (where ϵ is the complex dielectric constant) with the method proposed in [7]. These dependencies are rather complicated, but similar for all of the systems (Fig. 5). Variations in the profile of the polarizability are attributed to spatial inhomogeneities in the distribution of SiO_2 and their length is naturally related to the size of silica particles.

In the case of a pure surface of hydrosol, the most pronounced fea-

Figure 3. Coefficient of reflection of the air/SM-30 hydrosol interface for the (circles) pure surface and (triangles) surface with lipid film. The solid lines are simulation by the method described in [7].

Figure 4. Coefficient of reflection of the air/TM-50 hydrosol interface for the (circles) pure surface and (triangles) surface with lipid film. The solid lines are simulation by the method described in [7].

Figure 5. Reconstructed profiles of the real part of the complex dielectric constant across the hydrosol/air interface (along the z axis) for (a) SM-30 and (b) TM-50 hydrosol. The dashed lines are for the pure hydrosol/air interface. The solid lines are for the interface with the adsorbed DSPC layer. For pure water, δ_w ≈ 0.75 × 10^{−5}.

ture is a dense layer of SiO_2 nanoparticles spaced at (SM-30) 15 and (TM-50) 25 nm from the interface with air (Fig. 5), in agreement with [1]. The second, weakly pronounced layer of nanoparticles at (SM-30) 30 and (TM-50) 55 nm from the surface is also observed. The reconstructed profile indicates that the separation region of silica sol is more extended (by more than a factor of 2) than that estimated in [1]. The determination of the structure of the transient layer is more accurate, probably because the monochromaticity of radiation in our experiments is one or two orders of magnitude higher than that in the experiment reported in [1].

The formation of the first dense layer of nanoparticles at the air/hydrosol interface is equivalent to the appearance of an additional interface at which the difference between the potentials of electric image forces for cations and anion particles in the volume of the sol. This leads to the formation of a second layer of nanoparticles deep inside the sol.

DSPC molecules are hydrated in the aqueous medium and form a strongly polarized hydrophilic surface [8], which leads to a sharp change in the distribution of SiO_2 particles in the transient layer. The maximum concentration of SiO_2 particles for SM-30 hydrosol is reached in the layer immediately adjacent to the lipid membrane (the polarizability of the membrane is ∼ δ_w [2]) and is higher than the bulk value by a factor of (δ_{max} − δ_w)/(δ_b − δ_w) ≈ 2, where δ_w ≈ 0.75·10^{−5} and δ_b ≈ 1.15δ_w are the polarizabilities of water and hydrosol, respectively. The maximum polarizability in the transient layer is δ_{max} ≈ 0.95·10^{−5} (see Fig. 5). In the case of TM-50 hydrosol, we also observed an increase in the surface density of silica particles 10 nm in diameter, which are apparently impurity.

Thus, silica particles are concentrated at the interface with the phospholipid wall. In this case, the surface concentration of nanoparticles, which is characterized by the ratio (δ_{max} − δ_w)/(δ_{min} − δ_w), where δ_{min} is the polarizability on the pure surface of hydrosol, increases by more than an order of magnitude. This process should be accompanied by the redistribution of the positive charge of Na^+ cations in the double electric surface layer. The capability of sodium ions to penetrate into phospholipid membranes and, thus, to create a positive surface potential, which evidently induces the condensation of negatively charged nanoparticles (their aggregation with the membrane), was discussed in [9, 10]. In this process, the volume of the sol is a reservoir for Na^+.

To summarize, the structure of the transient layer at the interface of the aqueous solution of silica nanoparticles has been studied by the X-ray reflectometry method. The reconstructed depth profile of the real part of the dielectric permittivity indicates the presence of a complicated structure consisting of several layers of nanoparticles with the thickness that is at least twice as large as the previously estimated value. According to our data, the adsorption of 1,2-distearoyl-sn-glycero-3-phosphocholine molecules at the hydrosol/air interface is accompanied by a significant increase in the surface concentration of silica nanoparticles, i.e., by their condensation. This phenomenon can be qualitatively explained by the formation of the positive surface potential due to the penetration and accumulation of Na^+ cations in the phospholipid membrane.

References

[1] A. M. Tikhonov, J. Phys. Chem. C 111, 930 (2007).

[2] A. M. Tikhonov, JETP Lett. 92, 356 (2010).

[3] F. Dumont, J. Warlus, and A. Watillon, J. Colloid Interface Sci. 138, 543 (1990).

[4] D. I. Svergun, P. V. Konarev, V. V. Volkov, et al., J.Chem. Phys. 113, 1651 (2000).

[5] L. Yu. Mogilevskii, A. T. Dembo, D. I. Svergun, et al., Sov. Phys. Crystallogr. 29, 1 (1984).

[6] V. E. Asadchikov, V. G. Babak, A. V. Buzmakov, et al., Instrum. Exp. Tech. 48, 364 (2005).

[7] I. V. Kozhevnikov, Nucl. Instrum. Methods Phys. Res. A 508, 519 (2003).

[8] D. M. Small, The Physical Chemistry of Lipids, Plenum Press, New York, 1986.

[9] S. A. Pandit and M. L. Berkowitz, Biophys. J. 82, 1818 (2002).

[10] S. Pandit, D. Bostick and M. L. Berkowitz, Biophys. J. 84, 3743 (2003).