arXiv:1103.5438v1 [astro-ph.GA] 28 Mar 2011

The VLBA Calibrator Search for the BeSSeL Survey

K. Immer^{1,2}, A. Brunthaler^1, M. J. Reid^2, A. Bartkiewicz^3, Y. K. Choi^1, K. M. Menten^1, L. Moscadelli^4, A. Sanna^1, Y. W. Wu^5, Y. Xu^5, B. Zhang^1, X. W. Zheng^6

kimmer@mpifr-bonn.mpg.de

Received ; accepted

1Max-Planck-Institut für Radioastronomie, Auf dem Hügel 69, 53121 Bonn, Germany 2Harvard-Smithsonian Center for Astrophysics, 60 Garden Street, 02138 Cambridge, MA, USA 3Toruń Centre for Astronomy, Nicolaus Copernicus University, Gagarina 11, 87-100 Toruń, Poland

4Osservatorio Astrofisico di Arcetri, INAF, Largo E. Fermi 5, 50125 Firenze, Italia 5Purple Mountain Observatory, Chinese Academy of Sciences, 2 West Beijing Road, Nanjing 210008, P.R. China

6Department of Astronomy, Nanjing University, 22 Hankou Road, Nanjing 210093, P.R.China

– 2 –

Abstract

We present the results of a survey of radio continuum sources near the Galactic plane using the Very Long Baseline Array (VLBA). Our observations are designed to identify compact extragalactic sources of milliarcsecond size that can be used for parallax measurements in the Bar and Spiral Structure Legacy Survey. We selected point sources from the NVSS and CORNISH catalogs with flux densities above 30 mJy and within 1.5^∘ of known maser targets. Of the 1529 sources observed, 199 were detected. For sources detected on 3 or more baselines, we determined accurate positions and evaluated their quality as potential calibrators. Most of the 1330 sources that were not detected with the VLBA are probably of extragalactic origin.

Subject headings: Galaxy: general — HII regions — astrometry — surveys — radio continuum

– 3 –

1. Introduction

The Very Long Baseline Array (VLBA) calibrator search is a preparatory survey for the Bar and Spiral Structure Legacy (BeSSeL) survey (Brunthaler et al. 2011) which will study the spiral structure and kinematics of the Milky Way. The BeSSeL survey will determine distances, via trigonometric parallax, and proper motions for methanol and water masers at 6.7 and 22 GHz in several hundred high mass star forming regions in our Galaxy. These results will allow us to locate spiral arms and determine the 3-dimensional motions of massive, young stellar objects in the Galaxy. (for further information about the BeSSeL survey see http://www.mpifr-bonn.mpg.de/staff/abrunthaler/BeSSeL/index.shtml) Currently the VLBA calibrator search list contains information on compact radio sources from the surveys of Ma et al. (1998); Beasley et al. (2002); Fomalont et al. (2003); Fey et al. (2004); Petrov et al. (2005, 2006, 2008); Kovalev et al. (2007). Recently Petrov et al. (2011) published the results of a survey of 489 calibrator sources close to water masers in the Galactic plane for the Japanese VLBI Exploration of Radio Astrometry^1 (VERA) project. However, a search for background sources near any given maser target with the VLBA calibrator search tool usually yields a source within about 3^∘ on the sky. Since transfering interferometer phases over such a large angular distance often provides poor results, such background sources are not always preferable for accurate parallax measurements. Since systematic errors scale approximately linearly with the separation between target and calibrator source, it is valuable to find background sources as close to the target as possible.

This paper presents the results from our calibrator survey. While this survey was tailored for finding compact extragalactic sources for the BeSSeL parallax observations, it should also be useful for other VLBA observations. Also, the compact sources found in this survey should

1http://veraserver.mtk.nao.ac.jp/

– 4 –

be useful for future EVLA and ALMA observations. Since, historically, there has been a shortage of good calibrators near the Galactic plane, this survey should be especially valuable for interferometric observations of Galactic sources.

2. Source Selection and Observation

Point-like sources from the NVSS (sizes < 20^{′′}) and CORNISH catalogs (provided by Condon et al. 1998; Purcell et al. 2008) with flux densities above 30 mJy and within circles with a radius of 1.5^∘ around the 109 target maser sources formed the survey list. Since a Bessel parallax observation benefits from at least one calibrator with a milliarcsecond-accurate position, we added between 1 and 3 sources from the ICRF2^2 catalog (Fey et al. 2009) that were within 5^∘ of each target maser position. Since some target masers were separated by less than 3^∘, a number of candidates were observed 2 or more times and the total areal coverage was ∼ 600 square degrees. However, the calibrator survey is not complete to 30 mJy, since time restrictions typically allowed observing only the ≈ 25 most promising sources for each target position. Thus, in some search fields, a small number of the weaker and more distant sources were not observed.

In total, 1529 sources were selected for observations with the VLBA. Figure 1 shows the covered area of the survey in Galactic coordinates. The black dots mark the positions of the target masers, the black ellipses represent the circular area on the sky searched for calibrators. All sources were observed at X-band in left-circular polarization. We used eight 16-MHz bands, with band center frequencies spanning the range from 8109.49 to 8583.49 MHz. The bands were spaced in a minimum redundancy configuration to sample, as uniformly as possible, all frequency differences in order to minimize multi-band delay sidelobes. Each survey source was observed for three minutes. Three strong fringe-finders were observed at the beginning and the end of the

2International Celestial Reference Frame

– 5 –

typically five-hour tracks.

The data reduction was conducted with the National Radio Astronomy Observatory’s^3 Astronomical Image Processing System, using the scripting software ParselTongue^4 (Kettenis et al. 2006). In the first step, we corrected the data for the latest Earth Orientation Parameter (EOP) values. With the AIPS task TECOR, we derived corrections for the ionospheric Faraday rotation from maps of total electron content, which are available in the CDDIS^5 data archive. Then, one scan on a strong fringe-finder was used to solve for single-band delays and to align the phases of all IFs. To remove clock offsets, mini-geodetic block sources were fringe fitted. Next, we determined multi-band delays and fringe-rates for the fringe-finder blocks placed at the beginning and end of the observations. We averaged these values for each block and removed their effects from the survey data. Afterwards, the residual multi-band delays and fringe rates for the candidate sources were modeled as owing to source position offsets and revised positions were determined by least-squares fitting. In addition, we generated plots of interferometer visibility amplitude versus the baseline length by vector averaging the data over each scan for each interferometer baseline in order to determine the source compactness.

3. Detections

199 candidate sources were detected on at least one VLBA baseline, of which 70 are sources of the ICRF2 catalog and 30 were previously detected by Petrov et al. (2011). Our goal was to determine reliable positions for the candidate calibrator sources. For 25 of the ICRF2 sources,

3The National Radio Astronomy Observatory (NRAO) is a facility of the National Science Foundation operated under cooperative agreement by Associated Universities, Inc.

4http://www.radionet-eu.org/rnwiki/ParselTongue 5NASA’s Crustal Dynamics Data Interchange System

– 6 –

the ICRF2 catalog position was significantly better than our measured source position. For these sources, we replaced the source coordinates by an average of the measured and the ICRF2 coordinates.

Depending on a source’s compactness, a grade from A to D was assigned, representing their quality as a potential calibrator. Compactness was determined by examining the visibility plots by eye and estimating the maximum baseline length (in wavelength units) for which the normalized fringe visibility was greater than 0.2. For grade A sources, which are the most compact, the normalized fringe visibility falls below this threshold at > 200 Mλ. Grade B and C sources are defined to have normalized visibilities greater than 0.2 for baselines longer than 100 and 50 Mλ, respectively. Grade D sources were more resolved than grade C sources, but still detected on 3 or more baselines. Finally, grade F sources were detected on only one or two baselines. The two shortest VLBA baselines have lengths of 236 km (PT–LA) and 417 km (KP–PT). Grade F sources were not used in the following statistical analysis.

Figure 2 shows examples of the visibility plots for sources of each grade, A through D. Since we could not reliably detect sources with correlated flux density < 30 mJy, it was not always possible to measure weak sources < 100 mJy with a normalized fringe visibility of 0.2.

Due to overlapping observing fields around the target masers, some sources were observed multiple times. Since the observations took place at different times, the fitted coordinates, uncertainties, and assigned grades can differ among observations. For sources with grades A through D that were observed two or more times, we determined weighted means and standard deviations for the coordinates in Right Ascension and Declination. The formal position variances from the delay and rate fits served as the weights. To guard against unrealistically small variances, which can come from limited data, we established a lower limit of 0.003^{′′} for individual position uncertainties. We found the rms position deviations were generally larger than that expected from the formal position uncertainties, indicating the levels of systematic errors present in our

– 7 –

“snap-shot” VLBA observations.

While most sources that were observed multiple times had the same compactness grade, some borderline cases were found that had mixed grades. Therefore, we assigned numerical grades of 4 through 1 for grades A through D, and obtained an (unweighted) average source grade. The multiple observed sources were then placed in four groups according to their average grade. The grade A group contained all sources with numerical grades above 3.5, the grade B group between 2.5 and 3.5, the grade C group between 1.5 and 2.5, and the grade D group below 1.5. 17% of the observed ICRF2 sources have a bad grade (C or D).

Finally, we calculated the average of the individual position standard deviations for all sources in each group. In order to avoid the rare very poor measurement from biasing the average deviation, we discarded individual sources with position standard deviations exceeding 50 mas. The average standard deviations (global grade errors) serve as empirical indications of true source position uncertainties and are summarized in Table 1.

The empirically determined position errors for each grade were then used as an “error floor” for the position errors reported in Table 2. Since, in this first-pass processing potentially unreliable formal errors were used for weighting, we recalculated the mean coordinates and the standard errors of the mean with data weights formed from the geometric mean of the formal fitting errors and the error floors for the appropriate source grade. For the 30 sources in common with the Petrov et al. (2011) survey, their positions agree within the joint uncertainties. A comparison with the ICRF2 catalog is not meaningful for the 25 sources whose positions have been improved by averaging the measured and the ICRF2 coordinates. The coordinates of the remaining 45 ICRF2 sources coincide with the ICRF2 catalog positions within the joint uncertainties.

Table 2 lists all detected sources together with the estimated coordinates (Column 2,3), position uncertainties (Column 4,5), grades (Column 6), fluxes (Column 7), and the number of observations (Column 8). This table also contains the grade F sources for which the coordinates

– 8 –

come from the NVSS catalog. The histogram in Fig. 3 shows the distribution of the sources over the four grade groups.

4. Non-Detections

A total of 1330 objects were not detected with the VLBA. Their coordinates, position uncertainties, and flux densities are extracted from the NVSS and CORNISH point source catalogs (see Table 3, the entire table will be published in the online version). The non-detected sources could be galactic (e.g. HII regions, SNRs) or extragalactic (e.g. lobes of radio sources). A comparison with catalogs of Galactic HII regions (Kuchar & Clark 1997; Paladini et al. 2003; Quireza et al. 2006) yields less than 50 possible identifications. In order to determine if the remaining objects are likely extragalactic, we estimated the number of detectable extragalactic sources from extragalactic source counts. Since most of the non-detected sources were selected from the NVSS catalog at 1.4 GHz, we used a normalized differential source count at this frequency provided by Condon (1984). Since most of the sources in our non-detection list have flux densities above ∼ 50 mJy, we chose this value as a lower limit for the source count calculations. Integrating the source number function as a function of flux density from 50 mJy to ∼ 1 Jy yields a predicted value of ∼ 12000 radio sources per steradian. Since our survey covered an area of ≈ 600 square degrees, one would have expected ∼ 1300 detections, which is consistent with our observations. Thus, we assume that most of the non-detected sources are extragalactic.

5. Concluding Remarks

In this paper, we present the results of a calibrator search for the BeSSeL survey. Of the 1529 radio continuum sources observed, 199 candidate calibrator sources were detected. Most of the 1330 undetected sources are probably of extragalactic origin. The list of calibrator candidates will

– 9 –

be made available on the homepage of the BeSSeL survey. Furthermore, the ALMA and EVLA communities can use this list as a starting point for their own calibrator surveys.

– 10 – REFERENCES Beasley, A. J., Gordon, D., Peck, A. B., Petrov, L., MacMillan, D. S., Fomalont, E. B., Ma, C.

2002, ApJS, 141, 13 Brunthaler, A., et al. 2011, ArXiv e-prints Condon, J. J. 1984, ApJ, 287, 461 Condon, J. J., Cotton, W. D., Greisen, E. W., Yin, Q. F., Perley, R. A., Taylor, G. B., Broderick, J. J. 1998, AJ, 115, 1693 Fey, A. L., et al. 2004, AJ, 127, 3587 Fey, A. L., Gordon, D., Jacobs, C. S., & et al. 2009, IERS Technical Note, 35, 1 Fomalont, E. B., Petrov, L., MacMillan, D. S., Gordon, D., & Ma, C. 2003, AJ, 126, 2562 Kettenis, M., van Langevelde, H. J., Reynolds, C., & Cotton, B. 2006, in ASP Conf. Ser. 351, Astronomical Data Analysis Software and Systems XV, ed. C. Gabriel, C. Arviset, D. Ponz, & S. Enrique, 497 Kovalev, Y. Y., Petrov, L., Fomalont, E. B., & Gordon, D. 2007, AJ, 133, 1236 Kuchar, T. A. & Clark, F. O. 1997, ApJ, 488, 224 Ma, C., et al. 1998, AJ, 116, 516 Paladini, R., Burigana, C., Davies, R. D., Maino, D., Bersanelli, M., Cappellini, B., Platania, P., Smoot, G. 2003, A&A, 397, 213 Petrov, L., Kovalev, Y. Y., Fomalont, E., & Gordon, D. 2005, AJ, 129, 1163 Petrov, L., Kovalev, Y. Y., Fomalont, E. B., & Gordon, D. 2006, AJ, 131, 1872

– 11 – Petrov, L., Kovalev, Y. Y., Fomalont, E. B., & Gordon, D. 2008, AJ, 136, 580 Petrov, L., Kovalev, Y. Y., Fomalont, E. B., & Gordon, D. 2011, ArXiv e-prints Purcell, C. R., Hoare, M. G., & Diamond, P. 2008, in ASP Conf. Ser. 387, Massive Star Formation:

Observations Confront Theory, ed. H. Beuther, H. Linz, & T. Henning, 389 Quireza, C., Rood, R. T., Balser, D. S., & Bania, T. M. 2006, ApJS, 165, 338

This manuscript was prepared with the AAS L^ATEX macros v5.2.

– 12 –

Fig. 1.—: Areal coverage of the survey with Galactic longitude l and Galactic latitude b. The black dots mark the positions of the target maser sources, the black ellipses show the circular area on the sky over which radio point sources were selected as candidate calibrator sources.

– 13 –

(a) J0256+6827 - Grade A source (b) J1825-1718 - Grade B source

(c) J1751-2523 - Grade C source (d) J1758-2343 - Grade D source

Fig. 2.—: Examples of the visibility amplitude versus baseline length plots for the four different compactness grades.

– 14 –

Fig. 3.—: Histogram of the distribution of sources by compactness grade.

– 15 –

Table 1:: Results of the position error analysis of the detected sources.

Grade No. calibrators with σ_{R.A.cos(Dec.)} No. Calibrators with σ_{Dec.} σ_{R.A.cos(Dec.)} < 50 mas [mas] σ_{Dec.} < 50 mas [mas] A 23 1.60 23 2.68 B 13 2.22 13 5.07 C 13 8.64 13 11.89 D 11 11.42 11 13.54

Note. — Column 1 gives the compactness grade described in the text. Columns 2 and 4 give the number of calibrators (per grade) with position standard deviations smaller than 50 mas. Column 3 and 5 contain the empirically estimated uncertainties in Right Ascension and Declination for each grade.

– 16 –

Table 2. Detected sources

Name R.A. Dec. 1σ-Unc 1σ-Unc Grade Flux No. (J2000) (J2000) R.A. cos(Dec.) Dec. Obs (hh mn ss.sssss) (dd^{′′ ′′′′}.^{′′′′′′′′}) (mas) (mas) (Jy)

J0012+6551 00 12 37.67279 +65 51 10.8236 12.1 14.1 D 0.20 1 J0035+6130 00 35 25.31071 +61 30 30.7637 3.4 4.0 A 0.23 1 J0037+6236 00 37 04.33092 +62 36 33.3045 4.6 6.5 B 0.25 1 J0244+6228 02 44 57.69662 +62 28 06.5172 3.7 5.9 B 2.00 1 J0248+6214 02 48 58.89198 +62 14 09.6783 4.6 6.5 B 0.10 1 J0251+6824 02 51 45.79153 +68 24 01.7686 5.2 5.7 A 0.06 1 J0256+6827 02 56 10.82729 +68 27 51.0042 5.2 5.7 A 0.07 1 J0304+6821 03 04 22.00321 +68 21 37.4748 10.1 10.4 A 0.60 1 J0306+6243 03 06 42.65955 +62 43 02.0244 3.4 4.0 A 0.40 1 J0308+6955 03 08 27.81517 +69 55 58.9545 10.2 11.2 B 0.07 1 J0455+4653 04 55 53.20678 +46 53 30.2520 9.3 10.3 B 0.05 1 J0455+4803 04 55 07.17204 +48 03 47.3791 3.7 5.9 B 0.07 1 J0502+4729 05 02 22.33186 +47 29 12.0753 8.2 8.4 A 0.06 1 J0507+4645 05 07 23.65891 +46 45 42.3372 4.3 4.8 A 0.30 1 J0507+4720 05 07 20.43482 +47 20 36.3146 5.2 5.7 A 0.08 1 J0509+3951 05 09 48.81719 +39 51 54.6176 7.2 7.5 A 0.25 1 J0512+4041 05 12 52.54295 +40 41 43.6188 3.4 4.0 A 1.00 1 J0514+4025 05 14 02.81508 +40 25 24.0477 10.5 13.3 C 0.08 1 J0523+3926 05 23 51.23640 +39 26 57.7358 3.7 5.9 B 0.06 1 J0529+3209 05 29 28.21154 +32 09 46.9452 5.2 5.7 A 0.08 1

– 17 –

Table 2—Continued

Name R.A. Dec. 1σ-Unc 1σ-Unc Grade Flux No. (J2000) (J2000) R.A. cos(Dec.) Dec. Obs (hh mn ss.sssss) (dd^{′′ ′′′′}.^{′′′′′′′′}) (mas) (mas) (Jy)

J0535+3249 05 35 52.08521 +32 49 17.3790 14.1 14.3 A 0.05 1 J0539+3308 05 39 09.67217 +33 08 15.4957 3.7 5.9 B 0.06 1 J0540+2507 05 40 14.34318 +25 07 55.3565 3.3 3.7 A 0.09 2 J0541+3126 05 41 35.23810 +31 26 44.2135 21.1 21.6 B 0.05 1 J0541+3301 05 41 49.43590 +33 01 31.8900 7.2 7.5 A 0.08 1 J0545+3217 05 45 16.48160 +32 17 27.0506 5.2 5.7 A 0.07 1 J0549+3054 05 49 54.18174 +30 54 47.5885 6.2 6.6 A 0.08 1 J0550+2326 05 50 47.39145 +23 26 48.1628 6.2 6.6 A 0.26 1 J0557+2413 05 57 04.71415 +24 13 55.2844 6.2 6.6 A 1.00 1 J0603+2159 06 03 51.55708 +21 59 37.6982 3.7 5.9 B 0.08 1 J0607+2129 06 07 59.56570 +21 29 43.7200 3.7 5.9 B 0.01 1 J0607+2218 06 07 17.43600 +22 18 19.0800 3.7 5.9 B 0.01 1 J0608+2229 06 08 34.31090 +22 29 42.9810 3.7 5.9 B 0.06 1 J0649+0008 06 49 16.33743 +00 08 56.0797 3.4 4.0 A 0.13 1 J0650+0358 06 50 38.13429 +03 58 08.4420 3.4 4.0 A 0.15 1 J0656+0315 06 56 59.18022 +03 15 53.4395 4.6 6.5 B 0.05 1 J0657+0224 06 57 12.36716 +02 24 32.7362 3.4 4.0 A 0.09 1 J0703–0051 07 03 19.08675 –00 51 03.1574 3.4 4.0 A 0.50 1 J0721–1530 07 21 13.49140 –15 30 41.0088 4.3 4.8 A 0.15 1 J0721–1630 07 21 49.13771 –16 30 19.7464 6.2 6.6 A 0.12 1

– 18 –

Table 2—Continued

Name R.A. Dec. 1σ-Unc 1σ-Unc Grade Flux No. (J2000) (J2000) R.A. cos(Dec.) Dec. Obs (hh mn ss.sssss) (dd^{′′ ′′′′}.^{′′′′′′′′}) (mas) (mas) (Jy)

J0724–1545 07 24 59.00632 –15 45 29.3698 8.2 8.4 A 0.08 1 J0729–1320 07 29 17.81773 –13 20 02.2600 3.4 4.0 A 0.15 1 J0735–1735 07 35 45.81270 –17 35 48.5023 3.4 5.0 B 0.29 2 J0738–2403 07 38 09.99020 –24 03 56.3766 6.2 6.6 A 0.07 1 J0739–2301 07 39 24.99814 –23 01 31.8848 4.3 4.8 A 0.08 1 J0740–2444 07 40 14.71735 –24 44 36.6991 4.6 6.5 B 0.40 1 J0741–1937 07 41 52.78735 –19 37 34.8280 3.4 4.0 A 0.06 1 J0742–2043 07 42 32.10076 –20 43 41.2244 21.8 23.3 C 0.07 1 J0745–1828 07 45 19.43909 –18 28 24.7985 3.4 4.0 A 0.08 1 J0745–2451 07 45 10.26453 –24 51 43.7704 4.3 4.8 A 0.60 1 J0749–2344 07 49 51.77926 –23 44 48.7882 3.4 4.0 A 0.12 1 J0750–2451 07 50 00.40201 –24 51 36.6085 3.4 4.0 A 0.09 1 J1712–3514 17 12 05.13526 –35 14 34.1834 23.0 24.2 D 0.09 1 J1712–3736 17 12 38.79641 –37 36 46.7341 13.2 15.5 C 0.18 1 J1717–3342* 17 17 36.03045 –33 42 08.7942 7.8 9.6 D 1.40 2 J1717–3948 17 17 38.59784 –39 48 52.5572 18.9 20.2 D 0.15 1 J1719–3354 17 19 34.35417 –33 54 48.8743 1000.1 1000.1 D 0.08 1 J1723–3936 17 23 32.18591 –39 36 41.9943 11.8 13.9 D 0.09 1 J1733–3722* 17 33 15.19300 –37 22 32.3955 2.4 2.8 A 2.00 2 J1743–3058 17 43 17.88572 –30 58 18.6690 23.0 24.2 D 0.14 1

– 19 –

Table 2—Continued

Name R.A. Dec. 1σ-Unc 1σ-Unc Grade Flux No. (J2000) (J2000) R.A. cos(Dec.) Dec. Obs (hh mn ss.sssss) (dd^{′′ ′′′′}.^{′′′′′′′′}) (mas) (mas) (Jy)

J1751–1950 17 51 41.34380 –19 50 47.5060 2.5 3.3 B 0.08 2 J1751–2523 17 51 51.26230 –25 24 00.0730 13.2 15.5 C 0.23 1 J1751–2524* 17 51 51.26204 –25 24 00.0588 10.8 12.6 C 0.25 2 J1752–2956 17 52 33.10790 –29 56 44.8983 18.2 19.9 C 0.07 1 J1752–3001 17 52 30.95041 –30 01 06.6526 15.2 15.8 B 0.14 1 J1755–2232* 17 55 26.28462 –22 32 10.6128 5.6 6.5 C 0.25 4 J1758–2343 17 58 23.01669 –23 43 12.1257 7.7 8.9 D 0.25 3 J1800–2107 18 00 44.51594 –21 07 33.7637 170.4 170.5 D 0.05 1 J1801–2214 18 01 43.54953 –22 14 28.8094 10.8 11.5 D 0.10 4 J1805–2512 18 05 23.54818 –25 12 38.7469 9.1 12.3 C 0.08 1 J1807–2506* 18 07 40.68757 –25 06 25.9440 4.0 5.2 A 0.23 3 J1808–1822 18 08 55.51552 –18 22 53.3897 3.9 4.8 C 0.08 7 J1809–1520 18 09 10.20936 –15 20 09.6991 3.4 4.0 A 0.07 1 J1809–1546 18 09 09.25000 –15 46 53.8000 · · · · · · F · · · 1 J1810–1626 18 10 39.85118 –16 26 52.9225 5.6 6.9 C 0.08 5 J1811–2055 18 11 06.79427 –20 55 03.2781 7.8 8.9 D 0.15 4 J1813–2015 18 13 16.87269 –20 15 44.0791 10.7 11.9 D 0.05 2 J1815–1836 18 15 30.46000 –18 36 14.0000 · · · · · · F · · · 1 J1818–1705 18 18 02.90348 –17 05 40.8859 9.0 10.1 D 0.16 3 J1819–2036 18 19 36.89582 –20 36 31.5519 8.6 10.4 D 0.09 2

– 20 –

Table 2—Continued

Name R.A. Dec. 1σ-Unc 1σ-Unc Grade Flux No. (J2000) (J2000) R.A. cos(Dec.) Dec. Obs (hh mn ss.sssss) (dd^{′′ ′′′′}.^{′′′′′′′′}) (mas) (mas) (Jy)

J1821–0502* 18 21 11.80930 –05 02 20.0900 6.4 7.9 B 0.20 1 J1821–1224 18 21 23.27826 –12 24 12.9142 10.5 13.3 C 0.04 1 J1821–2110 18 21 05.46937 –21 10 45.2453 4.2 5.8 C 0.12 2 J1825–0737* 18 25 37.60958 –07 37 30.0129 2.5 3.3 B 0.08 2 J1825–1551 18 25 11.72184 –15 51 34.4066 13.2 15.5 C 0.08 1 J1825–1718* 18 25 36.53225 –17 18 49.8474 1.3 2.1 B 0.30 8 J1827–0405* 18 27 45.04040 –04 05 44.5800 3.7 5.9 B 0.13 1 J1828–0530* 18 28 40.15371 –05 30 50.8918 9.1 12.3 C 0.07 1 J1828–0912 18 28 56.02434 –09 12 31.1181 15.9 17.4 D 0.07 1 J1832–0610 18 32 42.23000 –06 10 26.5000 · · · · · · F · · · 1 J1832–1035 18 32 20.83656 –10 35 11.2006 15.2 16.8 D · · · 1 J1832–2039* 18 32 11.04646 –20 39 48.1974 2.5 3.3 B 0.50 2 J1833–0323 18 33 23.90553 –03 23 31.4656 6.4 7.9 B 0.12 1 J1833–0855 18 33 19.58200 –08 55 27.2100 15.2 16.8 D · · · 1 J1834–0301* 18 34 14.07459 –03 01 19.6268 1.6 2.5 B 0.20 7 J1837–0653 18 37 58.03336 –06 53 31.2470 9.8 11.1 D 0.07 2 J1841–0348 18 41 27.31540 –03 48 44.3323 7.5 8.5 D 0.10 5 J1846–0003 18 46 03.78257 –00 03 38.2834 8.0 9.7 C 0.10 3 J1846–0651* 18 46 06.30024 –06 51 27.7472 2.9 4.3 B 0.11 2 J1847–0004 18 47 04.96160 –00 04 47.2000 20.1 21.0 D 0.05 2

– 21 –

Table 2—Continued

Name R.A. Dec. 1σ-Unc 1σ-Unc Grade Flux No. (J2000) (J2000) R.A. cos(Dec.) Dec. Obs (hh mn ss.sssss) (dd^{′′ ′′′′}.^{′′′′′′′′}) (mas) (mas) (Jy)

J1848+0138 18 48 21.81035 +01 38 26.6322 3.7 5.9 B 0.12 1 J1849+0349 18 49 29.17000 +03 49 55.0000 · · · · · · F · · · 1 J1851+0035 18 51 46.72295 +00 35 32.3649 5.9 6.9 D 0.07 4 J1852+0308 18 52 37.01000 +03 08 38.9000 · · · · · · F · · · 1 J1853–0010 18 53 10.26917 –00 10 50.7398 9.3 10.7 D 0.07 3 J1853–0048 18 53 41.98921 –00 48 54.3307 5.4 7.2 C 0.08 3 J1854+0542 18 54 36.12843 +05 42 59.3068 9.5 12.5 C 0.10 1 J1855+0215 18 55 00.11300 +02 15 41.1000 100.7 100.9 D 0.03 1 J1855+0251* 18 55 35.43646 +02 51 19.5629 2.4 3.8 C 0.12 4 J1856+0610* 18 56 31.83900 +06 10 16.7678 3.5 5.3 C 0.25 2 J1857+0051 18 57 49.55000 +00 51 19.2000 · · · · · · F · · · 1 J1857–0048 18 57 51.35860 –00 48 21.9496 3.4 4.0 A 0.11 1 J1858+0313 18 58 02.35272 +03 13 16.3116 12.1 13.3 D 0.70 2 J1900+0003 19 00 17.57016 +00 03 55.9078 13.4 15.2 D 0.07 1 J1900+0303 19 00 33.59944 +03 03 46.0646 11.3 12.9 D 0.14 2 J1900–0009 19 00 49.56848 –00 09 15.3823 50.7 51.4 C 0.05 1 J1903+0145 19 03 53.06326 +01 45 26.3108 3.2 3.8 B 0.18 2 J1904+0110 19 04 26.39738 +01 10 36.7078 3.2 3.8 B 0.12 2 J1905+0952 19 05 39.89889 +09 52 08.4071 1.8 2.1 A 0.25 4 J1906+0139 19 06 12.96214 +01 39 13.6688 15.2 16.8 D 0.10 1

– 22 –

Table 2—Continued

Name R.A. Dec. 1σ-Unc 1σ-Unc Grade Flux No. (J2000) (J2000) R.A. cos(Dec.) Dec. Obs (hh mn ss.sssss) (dd^{′′ ′′′′}.^{′′′′′′′′}) (mas) (mas) (Jy)

J1907+0127 19 07 11.99613 +01 27 08.9644 3.0 3.6 B 0.25 3 J1907+0907 19 07 41.96336 +09 07 12.3968 3.3 4.6 B 0.25 2 J1908+1201 19 08 40.32064 +12 01 58.8609 3.4 4.0 A 0.11 1 J1911+1611 19 11 58.25738 +16 11 46.8600 3.4 4.0 A 0.50 1 J1913+0932 19 13 24.02539 +09 32 45.3791 10.0 12.9 C 0.16 1 J1913+1307 19 13 14.00638 +13 07 47.3307 3.4 4.0 A 0.08 1 J1917+1405 19 17 18.06412 +14 05 09.7675 3.3 3.8 B 0.12 2 J1921+1625 19 21 57.38244 +16 25 01.9231 3.4 4.0 A 0.19 1 J1922+0841* 19 22 18.63360 +08 41 57.3780 5.2 5.7 A 0.10 1 J1922+1504 19 22 33.27275 +15 04 47.5388 9.1 12.3 D 0.08 2 J1922+1530 19 22 34.69942 +15 30 10.0340 6.4 8.5 C 0.40 3 J1924+1540 19 24 39.45589 +15 40 43.9380 2.3 2.8 B 0.50 3 J1925+1227* 19 25 40.81708 +12 27 38.0856 1.7 2.0 A 0.14 5 J1927+1847 19 27 32.31207 +18 47 07.9048 3.4 4.0 A 0.07 1 J1928+1859 19 28 42.71875 +18 59 24.5627 5.5 7.1 B 0.07 1 J1930+1532 19 30 52.76690 +15 32 34.4285 3.4 4.0 A 0.45 1 J1934+1043* 19 34 35.02560 +10 43 40.3660 3.4 4.0 A 0.08 1 J1936+2246 19 36 29.30467 +22 46 25.8540 3.4 4.0 A 0.08 1 J1936+2357 19 36 00.92503 +23 57 31.9722 3.4 4.0 A 0.20 1 J1938+2348 19 38 45.60688 +23 48 15.7092 15.2 16.8 D 0.06 1

– 23 –

Table 2—Continued

Name R.A. Dec. 1σ-Unc 1σ-Unc Grade Flux No. (J2000) (J2000) R.A. cos(Dec.) Dec. Obs (hh mn ss.sssss) (dd^{′′ ′′′′}.^{′′′′′′′′}) (mas) (mas) (Jy)

J1941+2307 19 41 55.11140 +23 07 56.5250 3.7 5.9 B 0.01 1 J1946+2255 19 46 22.29846 +22 55 24.6282 8.3 9.5 B 0.08 1 J1946+2300 19 46 06.25140 +23 00 04.4145 3.7 5.9 B 0.07 1 J1946+2418 19 46 19.96067 +24 18 56.9093 50.0 50.3 B 0.06 1 J1955+3233 19 55 56.35092 +32 33 04.5060 11.8 14.3 C 0.07 1 J1957+3216 19 57 43.00353 +32 16 33.5832 3.4 4.0 A 0.07 1 J1957+3338 19 57 40.54974 +33 38 27.9429 5.2 5.7 A 0.16 1 J1957+3427 19 57 34.44939 +34 27 54.6774 100.7 100.9 D 0.05 1 J2001+3216 20 01 16.77409 +32 16 46.9435 4.3 4.8 A 0.06 1 J2001+3323 20 01 42.20694 +33 23 44.7461 10.5 13.3 C 0.30 1 J2007+4029 20 07 44.94494 +40 29 48.6009 3.5 5.2 B 3.50 2 J2009+3543 20 09 57.63785 +35 43 18.0079 11.8 14.3 C 0.33 1 J2010+3322 20 10 49.72256 +33 22 13.8074 13.2 15.5 C 0.80 1 J2015+3410 20 15 28.83206 +34 10 39.4175 3.7 5.9 B 0.40 1 J2015+3710 20 15 28.72950 +37 10 59.5179 2.4 2.8 A 2.40 2 J2016+3600 20 16 45.61840 +36 00 33.3774 3.7 5.9 B 0.16 1 J2018+3812 20 18 42.84963 +38 12 41.3396 12.1 14.1 D 0.08 1 J2018+3851 20 18 31.02410 +38 51 19.3854 3.7 5.9 B 0.33 1 J2020+4057 20 20 36.17955 +40 57 53.0792 19.7 21.0 D 0.10 1 J2025+3343 20 25 10.84328 +33 43 00.1955 12.2 13.0 B 4.50 1

– 24 –

Table 2—Continued

Name R.A. Dec. 1σ-Unc 1σ-Unc Grade Flux No. (J2000) (J2000) R.A. cos(Dec.) Dec. Obs (hh mn ss.sssss) (dd^{′′ ′′′′}.^{′′′′′′′′}) (mas) (mas) (Jy)

J2025+4335 20 25 18.96000 +43 35 24.0000 · · · · · · F · · · 1 J2027+3612 20 27 22.15431 +36 12 14.0702 10.5 12.0 D 0.12 2 J2030+3700 20 30 31.26724 +37 00 36.0379 12.5 14.4 D 0.20 1 J2032+4057 20 32 25.77049 +40 57 27.9154 10.7 12.2 D 0.10 2 J2033+4000 20 33 03.66147 +40 00 24.3573 11.8 13.9 D 0.09 1 J2038+5119 20 38 37.03480 +51 19 12.6592 3.1 3.6 A 1.80 2 J2056+4940 20 56 42.73987 +49 40 06.6010 3.4 3.9 A 0.09 2 J2059+4851 20 59 57.87249 +48 51 12.7002 4.3 4.8 A 0.10 1 J2100+5331 21 00 56.33534 +53 31 33.1413 3.7 5.9 B 0.09 1 J2102+4702* 21 02 17.05620 +47 02 16.2530 3.4 4.0 A 0.17 1 J2105+5356 21 05 12.79000 +53 56 09.4000 · · · · · · F · · · 1 J2114+4953 21 14 15.03646 +49 53 40.9540 4.0 4.4 A 0.12 2 J2117+5431* 21 17 56.48434 +54 31 32.5036 2.4 2.8 A 0.25 2 J2123+5452 21 23 46.83487 +54 52 43.4884 4.3 4.8 A 0.09 1 J2123+5500* 21 23 05.31345 +55 00 27.3253 2.4 2.8 A 0.25 2 J2125+6423* 21 25 27.44700 +64 23 39.3550 3.4 4.0 A 0.35 1 J2127+5528 21 27 32.27527 +55 28 33.9771 9.1 12.3 C 0.09 1 J2131+5214 21 31 58.22000 +52 14 15.9000 · · · · · · F · · · 1 J2137+5101 21 37 00.98625 +51 01 36.1292 2.4 2.8 A 0.35 2 J2139+5300 21 39 53.62438 +53 00 16.5993 3.7 5.9 B 0.12 1

– 25 –

Table 2—Continued

Name R.A. Dec. 1σ-Unc 1σ-Unc Grade Flux No. (J2000) (J2000) R.A. cos(Dec.) Dec. Obs (hh mn ss.sssss) (dd^{′′ ′′′′}.^{′′′′′′′′}) (mas) (mas) (Jy)

J2139+5540 21 39 32.61754 +55 40 31.7711 12.9 14.8 D 0.05 1 J2145+5147 21 45 07.66657 +51 47 02.2430 2.5 3.3 B 0.06 2 J2148+6107 21 48 16.04239 +61 07 05.7966 3.7 5.9 B 0.60 1 J2150+5103 21 50 14.26619 +51 03 32.2638 2.4 2.8 A 0.14 2 J2159+6606 21 59 24.68626 +66 06 52.2906 3.4 4.0 A 0.18 1 J2203+6750* 22 03 12.62260 +67 50 47.6730 3.4 4.0 A 0.22 1 J2209+5158* 22 09 21.48690 +51 58 01.8330 3.4 4.0 A 0.18 1 J2214+5250 22 14 55.76000 +52 50 58.2000 · · · · · · F · · · 1 J2217+5202 22 17 54.46074 +52 02 51.3698 4.3 4.8 A 0.06 1 J2225+5120 22 25 25.39414 +51 20 45.7403 20.1 20.6 B 0.08 1 J2243+6055 22 43 00.81457 +60 55 44.2156 3.1 3.7 B 0.06 2 J2250+5550 22 50 42.85149 +55 50 14.5730 9.1 9.4 A 0.35 1 J2254+6209 22 54 25.29266 +62 09 38.7227 2.4 3.6 B 0.08 4 J2257+5720 22 57 22.04611 +57 20 30.1966 11.1 11.3 A 0.15 1 J2258+5719 22 58 57.94146 +57 19 06.4599 6.8 7.0 A 0.18 2 J2301+5706 23 01 26.62714 +57 06 25.4987 10.1 10.4 A 0.12 1 J2302+6405 23 02 41.31514 +64 05 52.8506 3.0 4.1 B 0.12 2 J2314+5813 23 14 19.08325 +58 13 47.6474 9.1 12.3 C 0.07 1 J2339+6010* 23 39 21.12514 +60 10 11.8504 2.4 2.8 A 0.30 2

– 26 –

Note. — Columns 1 through 3 give the source name and its Right Ascension (R.A.) and Declination (Dec.). The asteriks mark sources for which the ICRF2 source position was averaged in with the source position. Weighted means are given for those calibrators that were observed more than once. Columns 4 and 5 give the coordinate uncertainties, determined from the quadrature sum of the formal fitting errors and the error floors for the appropriate compactness grade. For the grade F sources, the coordinates from the NVSS catalog were used. Column 6 and 7 contain the compactness grades, A through F, as well as the source fluxes. Column 8 gives the number of observations for each source.

– 27 –

Table 3:: Undetected sources.

Name R.A. (J2000) Dec. (J2000) Unc Flux (hh mm ss.ss) (dd^{′′ ′′′′}.^{′′}) (^{′′}) Jy J0022+6351 00 22 52.31 +63 51 21.8 0.7 0.030 J0023+6349 00 23 25.39 +63 49 45.5 0.9 0.022 J0027+6425 00 27 34.96 +64 25 55.1 0.7 0.041 J0028+6227 00 28 27.82 +62 27 12.8 0.6 0.148 J0028+6345 00 28 40.03 +63 45 59.9 0.6 0.074 J0029+6303 00 29 23.38 +63 03 35.5 0.6 0.096 J0029+6358 00 29 45.11 +63 58 41.5 0.6 2.992 J0031+6322 00 31 32.49 +63 22 08.5 0.6 0.108 J0032+6301 00 32 11.97 +63 01 00.7 0.7 0.041 J0033+6428 00 33 38.87 +64 28 45.4 0.6 0.107

Note. — The coordinates, coordinate uncertainties, and the fluxes are extracted from the CORNISH and NVSS point source catalogs. The entire table is available in the online version.