arXiv:1102.3735v3 [hep-lat] 22 Feb 2011

Chiral effective field theory beyond the power-counting regime

Jonathan M. M. Hall, Derek B. Leinweber and Ross D. Young

Special Research Centre for the Subatomic Structure of Matter (CSSM), School of Chemistry & Physics, University of Adelaide, SA 5005, Australia

Abstract. Novel techniques are presented, which identify the chiral power-counting regime (PCR), and realize the existence of an intrinsic energy scale embedded in lattice QCD results that extend outside the PCR. The nucleon mass is considered as a benchmark for illustrating this new approach. Using finite-range regularization, an optimal regularization scale can be extracted from lattice simulation results by analyzing the renormalization of the low energy coefficients. The optimal scale allows a description of lattice simulation results that extend beyond the PCR by quantifying and thus handling any scheme-dependence. Preliminary results for the nucleon magnetic moment are also examined, and a consistent optimal regularization scale is obtained. This indicates the existence of an intrinsic scale corresponding to the finite size of the source of the pion cloud.

Keywords: effective field theory, power-counting regime, chiral extrapolation, lattice QCD PACS: 12.39.Fe, 12.38.Aw, 12.38.Gc

INTRODUCTION

Chiral perturbation theory (χPT) provides a formal approach to counting the powers of low energy momenta and quark masses, so that an ordered expansion in the quark mass (or pion mass, through m_q ∝ m^2_π ) can be constructed. χPT indicates that, in general, the most singular non-analytic contributions to hadron properties lie in the low order meson loop of the hadron. For example, the leading non-analytic behaviour of a baryon mass is proportional to m^{3/2}_q or m^3_π . More generally, baryon masses can be written as an ordered expansion in quark mass or m^2_π .

To establish a model-independent framework in χPT, the expansion must display the properties of a convergent series for the terms considered. There is a power-counting regime (PCR) where the quark mass is sufficiently small such that higher order terms in the expansion are negligible beyond the order calculated. That is, within the PCR, the truncation of the chiral expansion is reliable to a prescribed precision [1, 2].

The asymptotic nature of the chiral expansion places the focus on the first few terms of the expansion. In chiral effective field theory (χEFT), calculations beyond one-loop are time-consuming and there are no two-loop calculations which incorporate the effects of placing a baryon in a finite volume. With only a few terms of the expansion known for certain, knowledge of the PCR of χEFT is as important as knowledge of the expansion itself.

Numerical simulations of QCD on a spacetime lattice are complemented by χEFT through a model-independent formalism for connecting lattice simulation results to the physical region. Simulations at finite volume and a variety of quark masses are related to the infinite-volume and physical quark masses through this formalism. However, it is accurate only within the PCR of the truncated expansion. In particular, truncated expansions are typically applied to a wide range of quark (or pion) masses with little regard to a careful determination of the PCR.

Through the consideration of a variety of renormalization schemes and associated parameters, new techniques to identify the PCR have been established in Ref [3]. Consider the nucleon mass: a benchmark for illustrating this approach.

EFFECTIVE FIELD THEORY FOR NUCLEONS

Using the standard Gell-Mann–Oakes–Renner relation connecting quark and pion masses, m_q ∝ m^2_π [4], the formal chiral expansion of the nucleon mass can be written as the sum of a polynomial expansion in m^2_π and the meson-loop integral contributions:

M_N = {a_0 + a_2m^2_π + a_4m^4_π + O(m^6_π )} + Σ_N + Σ_Δ + Σ_{tad} . (1)

The pion cloud corrections are considered in the heavy-baryon limit, with loop integrals, Σ_N, Σ_Δ and Σ_{tad} . The coefficients a_i of the analytic polynomial in Eq. (1) are related to the low energy constants of χPT. In this investigation, they will be determined by fitting to lattice simulation results. These coefficients will be referred to as the residual series coefficients. These bare coefficients undergo renormalization due to contributions from the loop integrals Σ_N , Σ_Δ and Σ_{tad} .

Under the most general considerations, each loop integral, when evaluated, produces an analytic polynomial in m^2_π and non-analytic terms. Using finite-range regularization, expanding out each integral yields:

Σ_N = χ_N 2π^2 ∫ d^3k k^2u^2(k^2 ;Λ)

ω^2(k)

= b^N_0 + b^N_2 m^2_π + χ_Nm^3_π + b^N_4 m^4_π + O(m^5_π ), (2)

Σ_Δ = χ_Δ 2π^2 ∫ d^3k k^2u^2(k^2 ;Λ) ω(k)(Δ + ω(k))

= b^Δ_0 + b^Δ_2 m^2_π + b^Δ_4 m^4_π + 3 4πΔ χ_Δm^4_π log m_π μ + O(m^5_π ), (3) Σ_{tad} = c_2m^2_π ( χ_t 1 4π ∫ d^3k

2u^2(k^2 ;Λ) ω(k)

− b^t_0 ) = c_2 ( b^t_2m^2_π + b^t_4m^4_π + χ_t m^4_π log m_π μ + O(m^5_π ) ) , (4) where u(k^2 ;Λ) is a regulator function described below. These integrals are expressed in terms of the pion energy ω(k) = √ k^2 + m^2_π and the delta-nucleon mass splitting Δ. χ_N , χ_Δ and χ_t denote the model-independent chiral coefficients of the terms that are nonanalytic in the quark mass. The b_i coefficients are renormalization-scheme dependent, as are the a_i coefficients.

The process of renormalization in finite-range regularized χEFT proceeds by combining the renormalization-scheme dependent coefficients to provide the physical low energy coefficients, which are denoted as c_i. Thus, the nucleon mass expansion takes on the standard form:

M_N = c_0 + c_2m^2_π + χ_N m^3_π + c_4m^4_π + ( − 3 4πΔ χ_Δ + c_2χ_t ) m^4_π log m_π μ + O(m^5_π ). (5)

By comparing Eqs. (1) and (5), the following renormalization procedure is obtained:

c_0 = a_0 + b^N_0 + b^Δ_0 , (6)

c_2 = a_2 + b^N_2 + b^Δ_2 + c_2b^t_2 , (7) c_4 = a_4 + b^N_4 + b^Δ_4 + c_2b^t_4 , etc. (8)

The coefficients c_i are scheme-independent quantities, and this property will be demonstrated when determined within the PCR.

For the purposes of this investigation, the regulator function u(k ;Λ) is chosen to be a dipole form:

u(k ;Λ) = ( 1 + k^2 Λ^2 )_{−2} . (9)

More extensive discussions of different finite-range regulator functional forms can be found in Refs [1, 5, 6, 7]. An analysis of results for the nucleon mass for a family of dipole-like forms is reported in Ref [3].

In order to accommodate the effect of the finite volume, the continuous loop integrals are transformed into a sum over discrete momentum values k_i = n_i 2π/L, for integers n_i. The difference between a loop sum and its corresponding loop integral is the finitevolume correction, which should vanish for all integrals as m_π L becomes large [8].

THE INTRINSIC SCALE

The χEFT extrapolation scheme will be used in conjunction with lattice QCD data from CP-PACS [9] and PACS-CS [10] to predict the nucleon mass M_N for any value of m^2_π . When using lattice QCD results beyond the PCR, there is a scheme-dependence in the extrapolation. That is, the result of an extrapolation will be dependent on the choice of regulator. To demonstrate this, consider the infinite-volume extrapolation of the CP- PACS data as the regularization scale is changed. Figure 1 shows that the extrapolations diverge in the chiral regime, where the non-analytic behaviour of the loop integrals dominate.

Identification of the intrinsic scale: a toy model

Is there a ‘best’ regularization scale indicated by lattice QCD data? By constructing a toy model, a method is developed to identify an in-built scale by analyzing the low energy coefficients. Ideal pseudodata is created with a known scale Λ_c, and an examination of the renormalization flow of the low energy coefficients c_i allows one to recover the value of the scale Λ_c.

FIGURE 1. Left: example dipole extrapolation based on CP-PACS data [9], box size: 2.3 − 2.8 fm. Right: close zoom of the regulator-dependence of the extrapolation.

FIGURE 2. Left: Behaviour of c_0 vs. Λ. Right: Behaviour of c_2 vs. Λ. Both plots are based on infinitevolume pseudodata created with a dipole regulator at Λ_c = 1.0 GeV (based on lightest four data points from PACS-CS). Each curve follows from fits of Eq. (1) to pseudodata, with a different upper value of pion mass m^2_{π,max} considered.

Based on PACS-CS data, a dense and precise set of pseudodata is generated at infinite volume and Λ_c = 1.0 GeV, entirely within the PCR. As the pseudodata are extended beyond the PCR (by increasing m^2_{π,max}), a scale-dependence in the renormalization is realized, as shown for c_0 and c_2 in Figure 2.

However, the correct values of c_0 and c_2 (known by construction) are recovered at exactly Λ = Λ_c, where the renormalization is independent of the range of m^2_π used. It is not correct in general to assume that the asymptotic value of c_i at large Λ is the best estimate of the true c_i. Note that the intersection point is at the same value of Λ for both c_0 and c_2. This indicates that the optimal regulator for the pseudodata is the value Λ = Λ_c.

FIGURE 3. Left: Behaviour of c_0 vs. Λ, based on CP-PACS data, to order O(m^3_π ). Right: Behaviour of c^μ_0 vs. Λ, based on QCDSF data, to order O(m_π ). In both plots a dipole regulator is used. A few points are selected to indicate the general size of the statistical error bars.

Lattice simulation results

In the toy model, a method was developed for extracting the intrinsic scale from some ideal pseudodata. This leads one to ponder if actual lattice simulation results contain an intrinsic scale. Since lattice data usable for an extrapolation generally extend outside the PCR, an optimal regularization scale may be recovered. Renormalization flow curves can be constructed for lattice simulation results by constraining the fit window with varying values of m^2_{π,max}, sequentially including data points extending further outside the PCR.

The results for the renormalization of the low energy coefficients c_0, the nucleon mass in the chiral limit, and c^μ_0 , the magnetic moment of the nucleon in the chiral limit, are shown in Figure 3. Lattice simulation results from CP-PACS are used to analyze the nucleon mass, and preliminary results from QCDSF are used to analyze the magnetic moment. Similar to the pseudodata case, a greater degree of regulator-dependence is observed as more data are included in the fit. There is also a reasonably well defined regularization scale at which the renormalization of c_0 is insensitive to the truncation of the data. This indicates that there exists an optimal regularization scale embedded in the lattice simulation results themselves.

It is also intriguing that the optimal regularization scale obtained from independent lattice results for different observables is approximately the same value for the same regulator functional form. This suggests that the optimal regularization scale indicates the existence of an intrinsic scale in the nucleon-pion interaction.

A measure of the systematic uncertainty in the optimal regularization scale, evident in Figure 3, can be obtained by constructing a χ^2-style analysis. By plotting χ^2 against the regularization scale Λ, a measure of the spread of the renormalization flow curves can be calculated, and the intersection point obtained. The corresponding χ^2 (per degree of freedom) plots are shown in Figure 4.

FIGURE 4. Left: Behaviour of χ^2_{do f} vs. Λ, for the renormalization flow of c_0 to order O(m^3_π ), based on CP-PACS data. Right: Behaviour of χ^2_{do f} vs. Λ, for the renormalization flow of c^μ_0 to order O(m^3_π ), based on QCDSF data. In both plots a dipole regulator is used.

SUMMARY

Using finite-range regularized chiral effective field theory, a technique for obtaining an optimal regularization scale from lattice results was demonstrated for pseudodata, in addition to actual simulation results for the nucleon mass and simulation results for the nucleon magnetic moment. By analyzing the renormalization flow of the low energy coefficients with respect to Λ, a step-wise extension of the data beyond the PCR allowed the identification of an optimal regularization scale. This scale of approximately 1.2 GeV is the value at which the renormalization is least sensitive to truncation of the lattice data. Lattice simulation results for the nucleon mass and nucleon magnetic moment yielded consistent values for the optimal scale. Thus an intrinsic scale was uncovered, which characterizes the energy scale of the pion dressing of the nucleon.

ACKNOWLEDGMENTS

This research is supported by the Australian Research Council.

REFERENCES

1. D. B. Leinweber, A. W. Thomas, and R. D. Young, Nucl. Phys. A755, 59–70 (2005), hep-lat/

0501028.

2. R. D. Young, J. M. M. Hall, and D. B. Leinweber (2009), 0907.0408. 3. J. M. M. Hall, D. B. Leinweber, and R. D. Young, Phys. Rev. D82, 034010 (2010), 1002.4924. 4. M. Gell-Mann, R. J. Oakes, and B. Renner, Phys. Rev. 175, 2195–2199 (1968). 5. D. B. Leinweber, A. W. Thomas, and R. D. Young, Phys. Rev. Lett. 92, 242002 (2004), hep-lat/

0302020.

6. V. Bernard, T. R. Hemmert, and U.-G. Meissner, Nucl. Phys. A732, 149–170 (2004), hep-ph/

0307115.

7. D. B. Leinweber, A. W. Thomas, and R. D. Young, PoS LAT2005, 048 (2006), hep-lat/

0510070.

8. S. R. Beane, Phys. Rev. D70, 034507 (2004), hep-lat/0403015. 9. A. Ali Khan, et al., Phys. Rev. D65, 054505 (2002), hep-lat/0105015. 10. S. Aoki, et al., Phys.Rev. D79, 034503 (2009), 0807.1661.