arXiv:1101.3325v1 [astro-ph.HE] 17 Jan 2011

First–year Results of Broadband Spectroscopy of the Brightest Fermi–GBM Gamma–Ray Bursts

Elisabetta Bissaldi^{1,2}, Andreas von Kienlin^1, Chryssa Kouveliotou^3, Michael S. Briggs^4, Valerie Connaughton^4, Jochen Greiner^1, David Gruber^1, Giselher Lichti^1, P. N. Bhat^4, J. Michael Burgess^4, Vandiver Chaplin^4, Roland Diehl^1, Gerald J. Fishman^3, Gerard Fitzpatrick^5, Suzanne Foley^1, Melissa Gibby^6, Misty Giles^6, Adam Goldstein^4, Sylvain Guiriec^4, Alexander J. van der Horst^7, Marc Kippen^8, Lin Lin^4, Sheila McBreen^5, Charles A. Meegan^7, William S. Paciesas^4, Robert D. Preece^4, Arne Rau^1, Dave Tierney^5 and Colleen Wilson–Hodge^3

Received ; accepted

1Max-Planck-Institut für extraterrestrische Physik, Giessenbachstrasse 1, 85748 Garching, Germany

2Current address: Institute of Astro and Particle Physics, University Innsbruck, Technikerstrasse 25, 6176 Innsbruck, Austria

3Space Science Office, VP62, NASA/Marshall Space Flight Center, Huntsville, AL 35812, USA

4University of Alabama in Huntsville, 320 Sparkman Drive, Huntsville, AL 35809, USA 5University College, Dublin, Belfield, Stillorgan Road, Dublin 4, Ireland 6Jacobs Technology, Inc., Huntsville, Alabama 7Universities Space Research Association, 320 Sparkman Drive, Huntsville, AL 35809, USA

8Los Alamos National Laboratory, PO Box 1663, Los Alamos, NM 87545, USA

– 2 –

ABSTRACT

We present our results of the temporal and spectral analysis of a sample of 52 bright and hard gamma–ray bursts (GRBs) observed with the Fermi Gamma–ray Burst Monitor (GBM) during its first year of operation ( July 2008 – July 2009). Our sample was selected from a total of 253 GBM GRBs based on the event peak count rate measured between 0.2 and 40 MeV. The final sample comprised 34 long and 18 short GRBs. These numbers show that the GBM sample contains a much larger fraction of short GRBs, than the CGRO/BATSE data set, which we explain as the result of our (different) selection criteria and the improved GBM trigger algorithms, which favor collection of short, bright GRBs over BATSE. A first by–product of our selection methodology is the determination of a detection threshold from the GBM data alone, above which GRBs most likely will be detected in the MeV/GeV range with the Large Area Telescope (LAT) onboard Fermi. This predictor will be very useful for future multiwavelength GRB follow ups with ground and space based observatories. Further we have estimated the burst durations up to 10 MeV and for the first time expanded the duration– energy relationship in the GRB light curves to high energies. We confirm that GRB durations decline with energy as a power law with index approximately −0.4, as was found earlier with the BATSE data and we also notice evidence of a possible cutoff or break at higher energies. Finally, we performed time–integrated spectral analysis of all 52 bursts and compared their spectral parameters with those obtained with the larger data sample of the BATSE data. We find that the two parameter data sets are similar and confirm that short GRBs are in general harder than longer ones.

Subject headings: Methods: data analysis — Gamma-ray burst: general

– 3 –

1. Introduction

The most exciting results in the last decade of gamma–ray burst (GRB) science at MeV–GeV energies came from the combined observations of the Burst And Transient Source Experiment (BATSE, Fishman et al. 1993) with the Energetic Gamma–Ray Experiment Telescope (EGRET, Fichtel et al. 1994). Both instruments operated between 1991 and 2000 on board the Compton Gamma–Ray Observatory (CGRO) and covered the energy bands from 20 keV to 20 MeV and from 20 MeV to 30 GeV, respectively. BATSE observed 2704 bursts (Paciesas et al. 1999), providing the largest GRB database from a single experiment thus far. Out of this sample, only five bursts were detected with EGRET above 100 MeV and only one of these, GRB 930131 (Sommer et al. 1994), had high–energy emission that was consistent with an extrapolation from its spectrum obtained with BATSE between 25 keV and 4 MeV (see also Dingus 2003). However, later analysis of the combined data from the BATSE/Large Area Detectors (LADs) and the EGRET calorimeter, the Total Absorption Shower Counter (TASC), uncovered an MeV component in GRB 941017 described by a power law with photon index approximately −1 up to about 200 MeV (González et al. 2003). González et al. (2009) subsequently searched the TASC data for a response to 68 bright BATSE bursts. They found that only 21 showed emission detectable by TASC and of these, only three contained spectra with peak energy, E_{peak} > 2 MeV. As these spectra were only found in a time–resolved analysis, González et al. (2009) claimed that the high energy component could be hidden in the brightness of the synchrotron emission in a time–integrated spectrum. They suggested that the existence of the high energy component indicated additional non–thermal processes at the source.

With the successful launch on 2008 June 11 of the Fermi Gamma–ray Space Telescope (FGST, hereafter Fermi), it is now possible to search and confirm the spectral signatures from GRBs up to very high energies. Fermi is an international and multi–agency space

– 4 –

observatory that studies the Cosmos over an unprecedented broad energy range (10 keV to 300 GeV). The Gamma–Ray Burst Monitor (GBM) is the secondary instrument onboard Fermi, operating between ∼8 keV and ∼40 MeV. The search for higher energy GRB emission is carried out with the primary instrument, the Large Area Telescope (LAT, Atwood et al. 2009), a pair conversion telescope, like EGRET, operating in the energy range between 20 MeV and 300 GeV. GBM alone provides a much wider energy coverage than any other current GRB mission, such as Swift (Gehrels et al. 2004). As of November 2010, joint high–energy GBM/LAT observations have been carried out for 19 GRBs above 100 MeV (see e.g. Pelassa et al. 2011). This number represents ∼3% of the total number of GRBs observed with GBM.

The small number of LAT GRB detections may be due to instrumental bias. The combined GBM/LAT GRB spectra are usually well–described in the MeV–GeV range by a single power law with an index in the approximate range of −1 to −3 (see e.g. Abdo et al. 2009a). This result is in agreement with the distributions of the high–energy power–law indices observed with BATSE in the ∼30 keV–∼2 MeV energy range (Kaneko et al. 2006, hereafter K06). Consequently, photon counts above ∼1 MeV are usually very low, and this, combined with the limited Field–of–View (FoV) of the LAT, results in much fewer GRBs observed in the multi–MeV band than in the keV–band. Currently, detailed calculations of LAT upper limits are being performed for the brightest bursts detected with GBM (Abdo et al. 2011a).

In this paper we establish a well–defined sample of 52 bright GBM GRBs with broad–band spectral coverage and with statistically significant high spectral resolution. All events were collected during the first year of GBM operations (July, 14, 2008 – July 15, 2009) and were detected up to MeV energies with GBM alone. In Section 2 we discuss the GBM instrumentation and data types and in Section 3 we describe the selection

– 5 –

methodology for our sample, mainly based on the peak count rates measured above 500 keV. In Section 4 we present the temporal analysis of our sample over several energy bands. In Section 5 we describe the results of our time–integrated spectral analysis using different photon models to fit each spectrum, and discuss the distributions and correlations of the spectral parameters for the best models. Our conclusions are presented in Section 6.

2. Instrumentation and Data Types

The primary role of GBM was to augment the science return from Fermi in the study of GRBs by making observations at lower energies (∼8 keV to ∼40 MeV) and thus bridging the gap with those of the LAT. The GBM flight hardware comprises a set of 12 Thallium–doped Sodium Iodide crystals (NaI(Tl), hereafter NaI) and two Bismuth Germanate crystals (Bi_4Ge_3O_{13}, commonly abbreviated as BGO). The individual NaI detectors are mounted around the spacecraft in four groups of three. Their arrangement results in an exposure of the whole sky unocculted by the Earth in orbit. The NaI detectors are able to detect γ–rays in the energy range between ∼8 keV and ∼1 MeV. The two BGO detectors are mounted on opposite sides of the Fermi spacecraft. With their energy range between ∼0.2 and ∼40 MeV, they provide the overlap in energy with the LAT instrument and are crucial in the study of high–energy, hard bursts.

To trigger the GBM flight software (FSW), two or more NaI detectors must have a simultaneous statistically significant rate increase above the background rate (usually > 5σ). This requirement increases the threshold against statistical fluctuations and suppresses triggering due to non–astrophysical events that appear in only one detector, such as phosphorescence spikes. Before performing any spectral analysis, the detector geometry with respect to the GRB direction must be carefully taken into account. Detectors which see the burst at an angle >50^∘, or which suffer from blockages (by the solar panels, by the

– 6 –

LAT or by the spacecraft itself) were excluded. Sometimes these criteria result in a single NaI detector to be chosen for the spectral analysis, which is then fitted together with the mostly illuminated BGO detector. The best detector combination for each burst is given in columns 4 (NaIs) and 5 (BGO) of Table 1.

All three GBM data types, namely CSPEC, CTIME and TTE data, were used for the analysis presented in the following sections. A detailed description of these data types can be found in Meegan et al. (2009). CTIME and CSPEC data were used in burst–mode, i. e. at 64 ms and 1.024 s temporal resolution, respectively. The BGO peak count–rate analysis and the determination of the burst durations in the integrated BGO energy range are based on CTIME files, which have the finest temporal resolution (64 ms) with modest energy resolution consisting of 8 energy channels. For the determination of the duration dependence on energy, we used TTE data both for the NaI and the BGO detectors. CSPEC and TTE data provide an energy resolution consisting of 128 energy channels and were used for all spectral analyses. The coarse time–resolution CSPEC data are normally used as pre–trigger background data for the TTE data, since the latter only include ∼ 30 s before the trigger time. TTE data are then collected up to 300 s post–trigger, and in all cases discussed hereafter cover the whole burst duration. For each GRB, the data type used for spectral analysis is listed in column 7 of Table 1.

3. Sample Selection Methodology

We selected our sample based on two requirements: (i) a significant count rate excess above background (> 3σ) measured by the most illuminated NaI detectors in the 50–300 keV energy range, to ensure good statistics; and (ii) a significant count rate excess above background measured by the most illuminated BGO detector in the 500 keV–1 MeV during the main burst emission episode (T_{90}). This combination allows a broadband spectral

– 7 –

analysis of GBM data, which spans about three decades in energy (10 keV–10 MeV). It also represents a significant difference from previous selection criteria adopted by K06, which were mainly based on peak photon flux and fluence values measured in the 50–300 keV energy range. Criterion (ii) was afforded by the good performance of the BGO detectors at those energies (> 400 keV), where the effective area of the NaI detectors rapidly decreases (Bissaldi et al. 2009). Below, we discuss the methodology employed for the burst sample selection.

The first coarser burst selection was based on the analysis of the GBM telemetry packets, which are automatically produced during a trigger and contain all trigger information such as locations, classifications and accumulated rates (Meegan et al. 2009). The so–called GBM “maximum rates” observed over a short period after trigger time (<4 s) are produced from the accumulations made for the trigger algorithms and are evaluated as statistical significance (signal over noise ratio; SNR) versus the background. Typically, the FSW background interval ranges from about −36 s to −4 s with respect to the trigger time, thus excluding the most recent few seconds of data and avoiding in most cases the contamination by pre–trigger data from the burst. We automatically selected bursts showing an increase of more than 80 counts/s over background in at least one BGO detector over the full BGO energy range (∼250 keV to ∼40 MeV).

The refined burst selection was based on the analysis of BGO CTIME light curves. As previously mentioned, CTIME data have a 64 ms temporal resolution during burst–mode and spectral resolution of 8 energy channels. Channel edges are controlled using the specific Lookup Tables (LUTs), which map the 4096 raw channels into the 8 energy channels (Meegan et al. 2009). Exact channel boundaries can vary from detector to detector (BGO 0 or 1) and from burst to burst. The BGO CTIME background was computed including pre– and post–trigger time intervals, usually from −300 s to +300 s in case of long bursts

– 8 –

and from −50 s to +50 s for short bursts, excluding the interval of the burst itself. The background–subtracted light curve was then examined for the maximum or “peak” count rate on the 64 ms–timescale over each individual CTIME energy channel.

The resulting total number of GRBs included in this spectral analysis is 52, which approximately represents ∼20% of all bursts detected during the first year of GBM operation. These bursts are listed in Table 1. The first three columns list the GBM trigger number, the GRB name^1, and the burst trigger time (in MET). The numbers of the NaI (from 0 to 11) and BGO (0 and 1) detectors used for the temporal and spectral analysis are reported in columns 4 and 5. Column 6 gives the angle (θ) of the burst with respect to the LAT boresight. The LAT FoV covers those events which are located at θ < 65^∘. This value represents the initial angle from the source calculated at trigger time and can vary during the burst in the case of a slew of the spacecraft (the so–called autonomous repoint recommendation or ARR). The GBM data type and time interval (with respect to the burst trigger time, T_0) adopted for the spectral analysis are listed in the last three columns.

The full sample of 52 bursts was further subdivided according to the detection significance of the event peak in a BGO energy channel. GRBs detected with more than 3 σ significance in the first six BGO energy channels constitute the corresponding Channel sample. All bursts in the full sample are detected in Ch.0 (∼200–500 keV) and Ch.1 (∼500–1000 keV), 28 bursts are detected in Ch.2 (∼1–2 MeV), 14 bursts are detected in Ch.3 (∼2–5 MeV), and 6 bursts are detected in Ch.4 (∼5–10 MeV).

Figure 1 shows an example light curve of one of the brightest GBM bursts in our

1The naming convention follows the Gamma–ray bursts Coordinates Network (GCN) publication policy. Bursts which were not reported in a GCN circular are not given a name in column 2.

– 9 –

sample, namely the long GRB 081215A, which is detected up to > 5 MeV in BGO. The top panel shows the 8–200 keV band, covered by the most illuminated NaI detector(s). The other panels show the BGO light curve in different energy ranges, covering five CTIME energy channels (Ch.0–Ch.4). This very bright burst was also marginally detected by the LAT. Indeed, θ ∼86^∘, which means that neither directional nor energy information could be obtained with the standard analysis procedures. However, Pelassa et al. (2010) recently presented a new technique to recover the signal from the GRB prompt emission between ∼30 MeV and 100 MeV, which differs from the standard LAT analysis (the so–called “LAT Low–Energy” technique, or LLE). Using such non–standard data selection, over 100 events above background are detected within a 0.5 s interval in coincidence with the main GBM peak. The significance of this excess is greater than 8σ (see also McEnery et al. 2008).

3.1. BGO Effective–Area Correction

In order to correct for the dependence of the BGO effective area on the incidence angle, we calculated an additional scaling factor accounting for the angle between the burst position and the BGO detectors. This was mainly necessary since the peak count rate analysis was performed on data without taking the instrument response into account. In Bissaldi et al. (2009), the off–axis response of the BGO detectors was measured at different energies for both flight module detectors at various angles between 0^∘ (i.e., on axis) and 90^∘. A scaling factor could be calculated for each incident direction and then used to correct the peak count rates. The correction factors are relatively small out to ∼40^∘ and strongly increase toward 90^∘. At higher energies, the correction factor is not as high as at lower energies. This mainly reflects the strong absorption of low–energy photons by the BGO photomultiplier tubes (PMTs).

– 10 –

3.2. LAT Detections

An interesting result of the BGO peak count–rate analysis emerges by considering only those bursts, which are located either inside or at the edge of the LAT FoV. (i.e. θ <65^∘ or 65^∘< θ < 90^∘ from the LAT boresight, respectively). Figure 2 shows the BGO peak count rate measured in Ch.1 for 15 and 11 bursts, which respectively fulfill these conditions. The GBM trigger IDs and numbers for both subsamples are listed on the top right corner of each plot. Circles (green), stars (orange) and squares (red) represent firm, marginal or no LAT detections, respectively. The dotted line marks a “detection limit”, which was arbitrarily placed at 30 (top panel) and 100 cps (bottom panel) in the Ch.1 peak count rate. For those bursts with lower rates in Ch.1 no detection has been yet reported from the LAT. The very promising Pelassa et al. (2010) LLE technique may recover the signal to confirm the LAT marginal detections and even reveal undiscovered emission from some of the Figure 2 BGO bursts lying below these arbitrary thresholds.

The significance of the above analysis lies in its potential to provide a good predictor for LAT detections of GBM GRBs. We plan to implement the relevant software into the GBM FSW. Thus, starting from the burst location relative to the LAT FoV, the code would perform a finer computation of the BGO Ch.1 count rate as measured between 500 keV and 1 MeV. This information would then be sent to the ground, where it would be rapidly and automatically analyzed, and subsequently (as the case maybe) provide a prompt alert of space– and ground–based GRB observatories.

– 11 –

4. Temporal analysis

4.1. Duration distributions

We used the CTIME data of the most illuminated NaI detector for each GRB to compute the T_{90} duration (Kouveliotou et al. 1993) in the BATSE energy range of 50–300 keV (for comparison reasons). The background model was determined by fitting a low–order (≤ 4) polynomial function over at least a few hundred seconds before and after the trigger time. All standard T_{90} durations in the 50–300 keV energy range were computed with the spectral analysis software RMfit^2 (version 3.8) (see e. g., Mallozzi, Preece, & Briggs 2005), which was also employed for the spectral analysis presented in §5. The resulting durations were thus estimated in photon space (i.e., the time it took to collect 90% of the burst photons). A different approach (since the BGO data were not yet programmed in RMfit at that time) was adopted to compute the burst durations in the 300 keV–10 MeV energy range, where we estimated the T_{90}’s in count space using software developed at MPE, thus obtaining a measure of the so–called “BGO–duration”. Figure 3 includes both data sets for demonstration purposes. Although these are not directly comparable (photon versus count durations) they serve as qualitative trend indicators as we discuss below.

The initially selected sample of 52 GRBs includes 18 bursts with a duration T_{90}< 3 s (50–300 keV, short GRBs), and 34 bursts with a duration T_{90}> 3 s (50–300 keV, long GRBs). The three longest bursts in the sample, with durations greater than 100 s, are GRB 081009, GRB 090323 and GRB 096018, while the three shortest ones are GRB 081226B, GRB 090328B and GRB 090228. The top panel of Figure 3 shows the distribution of T_{90}, calculated in the 50–300 keV and in the 300 keV–10 MeV energy

2An ad–hoc version of RMFIT for GBM and LAT analysis was developed by the GBM Team and is publicly available at http://fermi.gsfc.nasa.gov/ssc/data/analysis/.

– 12 –

ranges, for all 52 bursts. We note that the duration bimodality found in the BATSE data (Kouveliotou et al. 1993) is evident even in this small sample of GBM data and in both count and photon – space durations. We fitted each distribution with a double Gaussian function to estimate the medians and deviations. We found that short bursts peak at 1.2 ±0.3 s (1.04 ±0.16 s) in the 50–300 keV (300 keV–10 MeV) bands, while long bursts peak at 33 ±5 s (25 ±8 s), respectively. In the bottom panel of Figure 3 we plot the T_{90} distributions against each other. The dashed line represents a linear fit applied to the data, It has a slope of 0.98 ± 0.03, and lies below the bisector (continuous line), indicating that on the average, the BGO durations are smaller than the NaI’s. This result agrees qualitatively with the earlier findings of Richardson et al. (1996) that GRB durations decline with energy. In §4.2 we explore and expand this relationship to the MeV range for the first time.

4.2. Evolution of Duration with Energy

We followed the approach described by Richardson et al. (1996), who presented the analysis of 72 intense GRBs from the BATSE 3B catalog. They measured their T_{90} in four broad energy channels, namely 25–50 keV, 50–100 keV, 100–300 keV, and >300 keV. The bursts used for their study were uniformly selected by their peak photon flux on the 64 ms time scale. Thanks to the broader BGO energy coverage, we can measure T_{90} over the five additional energy channels described in § 3 (the only exception is Ch.0, which is here defined between 300–500 keV, to match the upper edge of the BATSE T_{90} values, for comparison reasons). The T_{90} calculated using NaI only data in the 50–300 keV energy band represents our lowest measurement; this energy interval was not further subdivided.

The energy intervals used for our analysis are listed in the first column of Table 2. Columns 2–4 give the number of bursts detected over the different energy intervals, where T indicates the total number of GRBs, and L and S indicate long and short bursts,

– 13 –

respectively. The average T_{90} values calculated using NaI only data in the 50–300 keV for each subgroup (again in photon space) are given in columns 5 and 6. It is worth noting that the bursts detected up to higher energies are systematically longer. This behavior is seen for both long and short GRBs.

We then fitted the energy versus duration values for each burst in the sample, excluding the NaI data points (to ensure a homogeneous set) to a power–law function given by

T_{90} = A_{90} E^{α90} (1)

using a χ^2 minimization technique. We used the central energy value to represent each energy channel in the fit. The distribution of the best fit indexes, α_{90}, over all energy intervals is shown in Figure 4. Blue and red shaded histograms represent the distributions of long and short GRBs, respectively. The average value of α_{90} calculated with this technique is −0.39 ± 0.04 (0.34), where the first error is the error in the mean, and the error given in parenthesis is the standard deviation of the distribution. This value is in good agreement with the result of Richardson et al. (1996) and indicates that the same overall trend of declining duration versus energy in the GRB light curves continues up to at least 10 MeV.

We now proceed to explore the duration–energy relation in subsamples of our 52 GRBs selected according to their highest detection in each of the 5 BGO channels described above. The sample sizes are defined in Table 2; e.g., 22 long GRBs are detected up to Ch.1 and a mere 4 up to Ch.5. For each subsample, we first average the values of T_{90} for each energy channel, and then fit a power law to these data as we did in the total sample. These fits were computed separately for long and short bursts and are shown in two panels in Figure 5. The values of their α_{90} are given in columns 7 and 8 of Table 2. The left panel of Figure 5 clearly exhibits the trend for the longest subsample to extend to higher energies; we can see the same trend in the short GRB subsample albeit with lesser statistical significance. Whether this trend is simply a selection effect or an intrinsic GRB property remains to

– 14 –

be determined with a larger GRB sample, including events with LAT detections possibly extending this relation to higher energies. We find evidence for slight curvature of T_{90} versus Energy in both duration modes indicating a potential cut off. The detailed study of these relations using a uniform data set and time–resolved binning of the NaI durations is the subject of another publication, currently in preparation (Bissaldi et al. 2011). We note here that the red subsamples include GRBs that have indeed been detected with the LAT in GeV energies.

5. Spectral Analysis

During the BATSE era, GRB spectra were well represented by a broken power–law (the empirical Band function, Band et al. 1993) in the BATSE energy band (K06). In our spectral analysis, we fitted the time–integrated spectra of the 52 bright bursts in Table 1 with two functions: (i) the Band function, and (ii) the Comptonized (Comp) model. The second represents a low–energy power law with an exponential high–energy cutoff, which is equivalent to the Band function without a high–energy power law (i. e., β → −∞). More details regarding both spectral functions can be found in K06. Since we excluded faint or soft GRBs from our sample, the simple power–law model was not used. Moreover, no additional extra–components were fitted to both spectral models. For a detailed time–integrated spectral analysis of a subsample of three short GRBs exploring several multi–component emission models see Guiriec et al. (2010). Guiriec et al. (2011) have also identified an additional spectral component in the time–integrated analysis of GRB 100724B; the appearance of these components in the high–energy part of the GBM spectrum could be another predictor for the bursts expected to be seen with the LAT.

We performed broadband spectroscopy simultaneously on the ∼ 8 keV to 1 MeV NaI data and the ∼ 250 keV to ∼38 MeV BGO data. In some cases an effective area

– 15 –

correction had to be fit to the BGO data (see e. g. Abdo et al. 2009b) to match the model normalizations given by the NaI data; this correction is usually consistent with the uncertainties in the GBM detector responses (<10%). Columns 8 and 9 of Table 1 list the time intervals used for each burst. All times are referred to the burst trigger time T_0.

The time–integrated spectral best fit results are presented in Table 3 for each burst. The GRB trigger number is given in column 1, while the best model for the spectral fit is listed in column 2. The spectral parameters are given in columns 3–7. Column 8 lists the effective area correction factors. The quality of fit in terms of CSTAT^3 over degrees–of–freedom (DOF) is listed in column 9. The Band function was preferred for those bursts for which an improvement of > 10 was observed in the CSTAT statistic over the Comp function. This assures that the spectra have a well–identifiable high–energy power–law component. We find that the Band function is preferred over the Comp model in 27 out of 52 cases (52 %). Most short bursts are best fit by a Comp model: Only 5 out of 18 short GRBs are best fit by the Band function. Three of those are the brightest bursts in our sample, for which Guiriec et al. (2010) have reported the presence of an extra power–law component in the GBM data. We proceed below in the description of the spectral parameter distributions, their correlations and their comparisons with empirical relationships in the literature.

5.1. Distributions of Spectral Parameters

The distribution of the two parameters of the Comp model (index λ and E_{peak}) are shown in Figure 6; those of the Band function parameters are displayed in Figure 7. In

3The CSTAT statistics is equivalent to the XSPEC (Arnaud 1996) implementation of the Cash statistic (Cash 1979).

– 16 –

both figures the E_{peak} parameter distribution is plotted at the bottom. In Figure 7, the two top panels show the low–energy index α and the high–energy index β. In all plots of the following sections, blue, red, and black histograms represent the distributions of 34 long, 18 short, and the entire sample of 52 bright GRBs, respectively.

The spectral parameter distributions show that short bursts tend to have larger α (λ) and smaller β values. The four short bursts best fitted with a Band function show higher E_{peak} than long bursts (Figure 7, bottom panel); in three of them we found a value of β < −2.6. The Comp model is preferred for the other 13 short bursts. The Comp E_{peak} distribution of the total sample peaks at ∼ 800 keV, while the Band E_{peak} is much lower, around 200 keV. Below we compare our results with those of K06.

5.2. Comparison to the BATSE bright burst catalog

We compare the spectral parameter distributions of our 52 bright GBM bursts with the distributions of bursts from the BEST^4 sample of K06. Our sample is much smaller than the one recently used by Nava et al. (2011), which comprises the entire GBM GRB database. The K06 spectral catalog comprises 350 bright GRBs observed with BATSE (∼20 keV–2 MeV) and is the most comprehensive study of spectral properties of GRB prompt emission to date, thus representing a perfect sample for comparing with GBM burst properties. Comparison histograms of GBM and BATSE low–energy (α), high–energy (β) and E_{peak} spectral parameter distributions are shown in Figure 8. The GBM distributions (black empty histograms) are overplotted on the BATSE ones (gray filled histograms). The

4Kaneko et al. (2006) designated the model with the more constrained parameters as the best–fit (BEST) model.

– 17 –

former follow the right y–axis and are rescaled for comparison purposes.

While the two β distributions look similar, differences appear in the α and E_{peak} distributions. After one year of operations, GBM detected a sample of bright bursts which tend to have larger α and higher E_{peak} values than what was observed in 10 years with the BATSE instrument.

The energy fluence distribution for both samples is calculated in the (BATSE) energy range of 25–2000 keV and is also shown in the bottom right panel of Figure 8. It becomes immediately evident that the two samples were selected following different criteria. The K06 sample comprises more GRBs with higher fluence than the GBM sample. This difference is even more clearly demonstrated in Figure 9, where we plot the GBM burst T_{90} durations versus their fluences (top right panel) and peak fluxes (calculated over 128–ms, bottom right panel) between 8 keV–40 MeV. A comparison of the two panels shows that a high–fluence criterion would have included by far less short GRBs in our sample, as their total energies are much smaller than those of the long events, while their peak fluxes span a broader range. With 18 short GRBs out of 52 selected bright bursts (∼30%), the first year of GBM sample contains many more bright short and hard bursts than K06. In fact, only 17 out of 350 BATSE bright bursts are short, representing ∼5% of the sample. Another reason for the difference between the two samples is likely the improved trigger algorithms implemented in the GBM FSW. BATSE had three time–interval algorithms (based on one energy interval), while GBM currently employs 28 trigger algorithms at various time and energy channel combinations. These algorithms have vastly improved the capability of the instrument to trigger on short and hard GRBs, compared to BATSE.

– 18 –

5.3. Correlation among Spectral Parameters – Empirical Relations

Empirical correlations among spectral parameters have been previously found with smaller GRB samples either within individual bursts or for collections of time–resolved parameters of multiple events. K06 found no indication of global correlations among the time–integrated spectral parameters of their BEST sample (discussed in § 5.2), while they found strong correlations among the time–resolved spectral parameters. They also noted that it is best to look for parameter correlations within individual bursts to eliminate possible effects due to cosmological redshift that varies from burst to burst. Since no time–resolved spectral analysis was performed in this work, we limit our correlation analysis to comparisons of the low– and high–energy spectral parameters against E_{peak} values and against each other.

Figure 10 shows the scatter plot of the Band function high–energy index β versus E_{peak} for the GBM data alone (top panel), and for the combined data sets of GBM and BATSE (bottom panel). The most distinct differences between the two samples is the larger E_{peak} span of the GBM data, and the larger β spread of the BATSE data. The reasons for the former have been elaborated in § 5.2; the latter is the effect again of the K06 selection for fluence and not for hardness (as in the GBM sample) and constitutes, therefore, a more representative characteristic of the GRB population as a whole. The GBM subsample of the bright, hard events, also includes – not quite unexpectedly – the majority of the LAT GRBs, and falls well within the BATSE β range.

Figure 9 displays the E_{peak} and T_{90} distributions against energy fluences and peak fluxes measured over the entire GBM energy band, i.e., 8 keV–40 MeV. E_{peak} is plotted against fluences for short and long GBM GRBs (red and blue data points, top left panel) and for GBM and BATSE bright GRBs (black and grey data points, bottom left panel). Short, low–fluence bursts show higher E_{peak} values, while long, high–fluence bursts tend to

– 19 –

have lower E_{peak} values. The distribution of T_{90} measured in the standard BATSE energy range of 50–300 keV versus energy fluence in the GBM 8 keV–40 MeV band is shown in the top right panel of Figure 9. This panel clearly exhibits the trend already shown with the Swift data that short bursts have lower fluences than longer ones and that high fluences unambiguously correspond to longer durations (Pizzichini et al. 2009). The lower right panel exhibits that both long and short GRBs have a similar (broad) peak flux range.

Finally, we plot in Figure 11 the distribution of hardness ratios versus T_{90}. The hardness ratios are defined by the ratio of counts collected in the BGO energy range over those collected in the NaI energy range (1000–40000/8–1000, in keV units). Although the current sample is not very large, it allows us to distinguish that shorter bursts in general tend to have harder spectra than the long ones.

Amati et al. (2002) reported a relation of E_{iso} versus E_{peak} using the BATSE data set. However, Nakar & Piran (2005a) and Band & Preece (2005) showed that their results may have suffered from strong selection effects and were inconsistent with a larger set of GRB data obtained with BATSE. We tested here the Amati relation for those bursts included in the BGO–bright burst sample with a redshift measurement. We only had 7 cases, namely six long GRBs (GRB 080916C, z = 4.35 (Greiner et al. 2009); GRB 090102, z = 1.55; GRB 090323, z = 3.57; GRB 090328, z = 0.74; GRB 090424, z = 0.54; and GRB 090618, z = 0.54) and one short burst (GRB 090510, z = 0.90). We note that long bursts nicely follow the E_{peak}–E_{iso} relation, as was also recently pointed out by Amati (2010), and the only outlier is the short burst. A recent study by Goldstein et al. (2011) explores the Amati relationship in detail using the entire GBM data set.

– 20 –

6. Conclusions

We have studied here a sample of 52 bright and hard GRBs collected during the first year of the GBM operation. We have performed temporal and time–integrated spectral analysis of all these events and studied the distributions and evolution of the derived parameters. The new spectral capabilities afforded with the GBM BGO detectors have enabled us to produce a predicting filter using GBM data alone of potential GRB detections with the LAT on Fermi. This filter will be implemented in the GBM FSW and alerts will be distributed to the wide scientific community to allow timely multi–wavelength follow up observations and, thus, broadband spectral energy distribution studies in GRBs.

Our temporal evolution analysis has, for the first time, extended the duration–energy relationship (found earlier in the BATSE data) to the MeV energy range. Although the LAT GeV detections seem to be longer in some GRBs (even up to hundreds of seconds, as in the case of GRB 090323 and GRB 090328, see Abdo et al. 2011b), there seems to be a single power law relation (of index −0.4) between duration and energy in the keV to MeV prompt gamma−ray emission. Whether the GeV emission seen with the LAT in several of these GRBs is related to the prompt or the afterglow emission is still an open question, which requires more data for definite conclusions.

Finally, we show that the novel GBM trigger algorithms have improved the collection of short and hard GRBs, compared to the BATSE sample. We confirm that their spectral parameter distributions are overall similar to those of the K06 sample, and that short GRBs are in general harder than longer events. The small subsample of GRBs with known distances in our data, is not sufficient to test the various empirical relations in the literature.

Support for the German contribution to GBM was provided by the Bundesministerium für Bildung und Forschung (BMBF) via the Deutsches Zentrum für Luft– und

– 21 –

Raumfahrt (DLR) under contract number 50 QV 0301. A.v.K. was supported by the Bundesministeriums für Wirtschaft und Technologie (BMWi) through DLR grant 50 OG 1101. A.J.v.d.H. was supported by NASA grant NNH07ZDA001–GLAST. S.MB. acknowledges support of the European Union Marie Curie European Reintegration Grant within the 7th Program under contract number PERG04–GA–2008–239176.

– 22 – REFERENCES Abdo, A. A., et al., 2009a, Science, 323, 1688 Abdo, A. A., et al., 2009b, ApJ, 706, 138 Abdo, A. A., et al., 2011, ApJin preparation Abdo, A. A., et al., 2011, ApJin preparation Amati, L., et al., 2002, A&A, 390, 81 Amati, L., Guidorzi, C., Frontera, F., Della Valle, M., Finelli, F., Landi, R., & Montanari, E., 2008, MNRAS, 391, 577 Amati, L., 2010, IPS Conf. Proc., 102, 71 Arnaud, K. A., 1996, ASP Conf. Proc., 101, 17 Atwood, W. B., et al., 2009, ApJ, 697, 1071 Band, D., et al., 1993, ApJ, 413, 281 Band, D., & Preece, R. D., 2005, ApJ, 627, 319 Bissaldi, E., et al., 2009, ExA, 24, 47 Bissaldi, E., et al., 2011, ApJ, in preparation Cash, W., 1979, ApJ, 228, 939 Connaughton, V., et al., 2010, IPS Conf. Proc., 102, 173 Dingus, B. L., 2003, AIPC, 662, 240 Fichtel, C. E., et al., 1994 ApJS, 94, 551

– 23 – Fishman, G. J., et al., 1993 A&AS, 97, 17 Friedman, A. S., & Bloom, J. S., 2005, ApJ, 627, 1 Gehrels, N., et al., 2004, ApJ, 611 , 1005 Ghirlanda, G., Ghisellini, G., & Firmani, C., 2005, MNRAS, 361, 10 Goldstein, A., et al., 2011, ApJsubmitted González, M. M., et al., 2003, Nature, 424, 749 González, M. M., et al., 2009, ApJ, 696, 2155 Greiner, J., et al., 2009, A&A, 498, 89 Guiriec, S., et al., 2010, ApJ, 725, 225 Guiriec, S., et al., 2011, ApJin press Kaneko, Y., et al. (K06), 2006, ApJS, 166, 298 Kouveliotou, C., et al., 1993, ApJ, 413, L101 Mallozzi, R. S., Preece, R. D. & Briggs, M. S., RMFIT, A Light Curve and Spectral Analysis Tool, © 2005 Robert D. Preece, University of Alabama in Huntsville McEnery, J., et al., 2008, GCN 8684 Meegan, C. A., et al., 2009, ApJ, 702, 791 Nakar, E., & Piran, T., 2005a, MNRAS, 360, 73 Nakar, E., & Piran, T., 2005b, arXiv: 0503517 Nava, L., Ghirlanda, G., Ghisellini, G., & Celotti, A., 2011, A&Asubmitted, arXiv:

1012.3968

– 24 – Paciesas, W. S., et al., 1999, ApJS, 122, 465 Pelassa, V., et al., 2010, Fermi Symposium, eConf Proc., arXiv: 1002.2617 Pelassa, V., et al., 2011, AIPC GRB 2010 Conference Annapolis in preparation Pizzichini, G., Maiorano, E., Genghini, M., & Munz, F. V., 2009, Fermi Symposium, eConf Proc., arXiv: 0912.2982 Richardson, G., Koshut, T., Paciesas, W. S., & Kouveliotou, C., 1996, AIPC, 384, 87 Sommer, M., et al., 1994, ApJ, 422, L63

This manuscript was prepared with the AAS L^ATEX macros v5.2.

– 25 –

Fig. 1.— Background–subtracted light curves of the long GRB 081215 observed with the GBM detectors. The panels show the sum of the counts in different energy bands as seen by (top histogram) the most illuminated NaI detector in the 8–200 keV energy range, and (bottom five histograms), the BGO detectors covering the first five CTIME energy channels. The bin width is 128 ms.

– 26 –

Fig. 2.— BGO peak count rate measured in Ch.1 (500 keV – 1MeV) for those bursts inside (top panel) and at the edge (bottom panel) of the LAT FoV. Circles (green), stars (orange) and squares (red) represent firm, marginal or no LAT detections, respectively. The dotted line marks the arbitrary “detection limit” placed at 30 (top panel) and 100 (bottom panel) counts/s.

– 27 –

Fig. 3.— Top Panel: Burst duration distributions in the 50–300 keV (gray filled histogram) and in the 300 keV–10 MeV (black empty histogram) energy ranges for 52 bursts of our bright–burst sample. Both distributions show a bimodal shape. Bottom Panel: Scatter plot of the burst duration distributions. The continuous line represents perfect linearity, while the dotted line represents the fit applied to the data.

– 28 –

Fig. 4.— Distribution of the best fit indexes α_{90} of power–law fits to the burst durations over different energy channels. Blue and red histograms represent the distributions of long and short GRBs, respectively. The black histogram represents the entire sample.

– 29 –

Fig. 5.— Evolution of the T_{90} duration with respect to energy for four subsamples of 12 long GRBs (left panel) and 7 short GRBs (right panel). Energy bands are over the 5 BGO CTIME channels. Different curves correspond to different burst sets for which such duration measurements were possible (see also text and Table 2).

– 30 –

Fig. 6.— Index λ (top panel) and E_{peak} (bottom panel) distribution of the time–integrated spectra which are best fitted with the Comp model. Blue and red histograms represent the distributions of long and short GRBs, respectively.

– 31 –

Fig. 7.— Low–energy index α, high–energy index β (top panels) and E_{peak} (bottom panel) distribution of the time–integrated spectra best fitted with the Band function. Blue and red histograms represent the distributions of long and short GRBs, respectively.

– 32 –

Fig. 8.— Low–energy index α (top left panel), high–energy index β (bottom left panel), E_{peak} (top right panel) and energy fluence (bottom right panel) distributions of time–integrated spectra from 350 bright BATSE bursts (grey filled histogram) from K06 (BEST sample) and 52 bright GBM bursts (black histogram). The GBM energy fluence is computed in the standard BATSE energy range, namely between 25 and 2000 keV. The GBM parameter distributions follow the right y–axis.

– 33 –

Fig. 9.— Left panels: Distribution of E_{peak} versus energy fluence calculated over the entire GBM energy range (top left panel, 8 keV–40 MeV) and over the BATSE energy range (bottom left panel, 25–2000 keV). Blue and red data points represent long and short GRBs, respectively; Grey data points represent 350 GRBs from the K06 sample. Right panels: Distribution of T_{90} (50–300 keV) versus energy fluence (8 keV–40 MeV, top right panel) and versus 128 ms peak photon fluxes (8 keV–40 MeV, bottom right panel).

– 34 –

Fig. 10.— Scatter plot of the GBM spectral parameter pair E_{peak}–β for 22 long GRBs and 5 short GRBs (blue and red data points in the top panel). Gray data points in the bottom panel represent 350 GRBs from the K06 sample. Bursts fully or marginally detected by the LAT are marked with green stars.

– 35 –

Fig. 11.— Distribution of hardness ratios versus T_{90} (50–300 keV). The hardness ratios are defined as the ratio of counts collected between 1–40 MeV over those collected between 8–1000 keV. Bursts fully or marginally detected by the LAT are marked with green stars.

– 36 –

Table 1. Basic properties of 52 bright GRBs

GBM GRB Trig. Time NaI BGO LAT Angle Data Time Interval^a Trig. # Name (T_0, MET) Det. Det. (deg) Type Start Stop

(1) (2) (3) (4) (5) (6) (7) (8) (9)

080723.557 080723B 238512142 4 0 107 CSPEC 0.004 60.161 080723.985 − 238549063 5,2 0 113 CSPEC -2.304 50.945 080725.541 − 238683564 6,7 1 50 TTE -0.064 0.384 080802.386 080802 239361311 4,5 0 125 TTE -0.064 0.448 080807.993 080807 239845833 0,1,2 0 74 CSPEC -1.376 21.152 080816.989 080816B 240623035 b,7 1 70 TTE -0.064 4.480 080817.161 080817A 240637931 2,5 0 80 CSPEC 0.004 60.417 080825.593 080825C 241366429 9,a 1 60 CSPEC 0.004 25.216 080905.499 080905A 242308736 6,7 1 28 TTE -0.064 1.024 080906.212 080906B 242370312 0,1,3 0 32 CSPEC 0.004 3.712 080916.009 080916C 243216766 3,4 0 52 CSPEC 0.004 70.145 080925.775 080925 244060556 6,7 1 38 CSPEC 0.004 25.856 081006.604 081006 244996175 0,3 0 16 TTE -0.384 3.392 081009.690 − 245262818 8,b 1 96 CSPEC -2.688 40.321 081012.045 081012B 245466323 9,a 1 66 TTE -0.128 0.768 081024.891 081024B 246576161 6,9 1 16 TTE -0.128 0.128 081101.532 081101B 247236325 5,2 0 116 CSPEC 0.003 8.704 081110.601 081110 248019944 7,8 1 67 TTE -0.192 12.096 081121.858 081121 248992528 a,b 1 140 CSPEC 0.003 21.504 081122.520 081122 249049693 0,1 0 21 (ARR) CSPEC 0.002 25.600 081125.496 081125 249306820 a,b 1 126 CSPEC 0.003 10.368 081126.899 081126 249428050 0,1 0 18 CSPEC -12.160 40.065 081129.161 081129 249623525 a,b 1 118 CSPEC -2.944 28.800 081207.680 081207 250359527 9,a 1 56 CSPEC 0.003 100.354 081209.981 081209 250558317 8,b 1 107 TTE -0.056 0.256 081215.784 081215A 251059717 9,a 1 89 CSPEC 0.004 7.424 081216.531 081216 251124240 8,b 1 99 TTE -0.128 0.960 081224.887 081224 251846276 6,9 1 17 (ARR) CSPEC 0.002 16.544 081226.509 081226B 251986391 6,7 1 22 TTE -0.064 0.192 081231.140 081231 252386462 6,9 1 21 CSPEC 0.003 28.672 090102.122 090102 252557732 a,b 1 87 CSPEC 0.003 28.928 090131.090 090131 255060563 9 1 40 CSPEC 0.003 38.145 090217.206 090217 256539404 6,9,7 1 34 CSPEC 0.003 29.824 090219.074 090219 256700780 5,2 0 137 TTE -0.064 0.576 090227.310 090227 257412359 0,3 0 20 CSPEC 0.003 15.232 090227.772 090227B 257452263 1,2,5 0 72 (ARR) TTE -0.128 0.384 090228.204 090228 257489602 0,1,3 0 16 TTE -0.128 0.512 090305.052 090305B 257908477 0,3,1 0 40 TTE -0.128 1.344 090308.734 090308B 258226586 3,7,4 0,1 50 TTE 0.000 1.536 090323.002 090323 259459364 9 1 53 (ARR) CSPEC 0.003 71.681 090328.401 090328 259925808 7,8 1 63 (ARR) CSPEC 0.003 30.720 090328.713 090328B 259952826 9,10 1 74 (ARR) TTE -0.064 0.128 090330.279 090330 260088144 7,9,b 1 50 CSPEC -38.913 31.745 090424.592 090424 262275130 7,8,b 1 71 CSPEC 0.002 14.592 090429.753 090429D 262721039 0,1 0 33 TTE -0.128 0.512 090510.016 090510 263607781 6,7,9 1 13 (ARR) TTE 0.512 1.024 090528.516 090528B 265206153 7,8 1 65 CSPEC 0.003 80.897 090531.775 090531B 265487758 6,7,9 1 26 TTE -0.128 0.832 090618.353 090618 267006508 4 0 130 CSPEC 8.704 125.442 090620.400 090620 267183385 6,7,b 1 60 CSPEC 0.003 11.520 090623.107 090623 267417259 7,8,b 1 73 CSPEC -1.920 49.281 090626.189 090626 267683530 0 0 15 CSPEC 0.003 48.897

Note. —^a The time range values are given in s relative to the trigger time T_0. They represent the interval used for the time–integrated spectral analysis

– 37 –

Table 2. Duration versus Energy parameters

Energy Range N. of bursts ⟨T^{90}(50 − 300 keV)⟩ ⟨α^{90}⟩ T L S L S L S

300 keV – 2 MeV 9 6 3 43.1 ± 0.7 1.08 ± 0.18 −0.41 ± 0.04 −0.42 ± 0.17 300 keV – 5 MeV 4 2 2 52.9 ± 0.5 0.92 ± 0.15 −0.38 ± 0.04 −0.42 ± 0.17 300 keV – 10 MeV 6 4 2 76.7 ± 0.6 2.24 ± 0.16 −0.32 ± 0.02 −0.40 ± 0.12

– 38 –

Table 3. Summary of time–integrated spectral fit results OF 52 bright GRBs

GBM Best A E_{peak} index α β A_{eff} CSTAT/

Trig. # Model (ph. s^{−1} cm^{−2} keV^{−1}) (keV) Corr. DOF (1) (2) (3) (4) (5) (6) (7) (8) (9)

080723.557 Band 0.035 ± 0.0008 219

(_{+9} −8 ) . . . −0.858 (_{+0.023} −0.023 ) -2.63

(_{+0.12} −0.15 ) 0.83 384/235

080723.985 Comp 0.0111 ± 0.0003 445

(_{+24} −22 ) -0.949

(_{+0.027} −0.026 ) . . . . . . . . . 496/359 080725.541 Comp 0.0135 ± 0.0009 1670

(_{+760}

−540 ) -0.89

(_{+0.14} −0.11 ) . . . . . . . . . 362/359 080802.386 Comp 0.0166 ± 0.0025 600

(_{+150}

−150 ) -0.65

(_{+0.21} −0.18 ) . . . . . . . . . 402/358 080807.993 Comp 0.0043 ± 0.0002 790

(_{+260}

−170 ) -1.01

(_{+0.07} −0.06 ) . . . . . . . . . 577/481 080816.989 Comp 0.0039 ± 0.0002 1550

(_{+300}

−280 ) -0.51

(_{+0.12} −0.11 ) . . . . . . . . . 390/360 080817.161 Band 0.0147 ± 0.0004 425

(_{+26} −25 ) . . . -0.99 ± 0.02 -2.31

(_{+0.10} −0.14 ) . . . 544/361

080825.593 Band 0.0617 ± 0.0033 176 ± 7 . . . -0.64 ± 0.04 -2.52

(_{+0.10} −0.14 ) 0.80 418/357

080905.499 Comp 0.0090 ± 0.0016 500

(_{+180}

−110 ) -0.20

(_{+0.4} −0.29 ) . . . . . . . . . 471/361 080906.212 Band 0.1152 ± 0.0110 147

(_{+8} −7 ) . . . -0.37 ± 0.06 -2.39

(_{+0.10} −0.12 ) . . . 522/479

080916.009 Band 0.0166 ± 0.0002 540

(_{+32} −30 ) . . . -1.06 ± 0.02 -2.24

(_{+0.08} −0.10 ) . . . 533/358

080925.775 Band 0.0272 ± 0.0016 138 ± 8 . . . -0.96 ± 0.04 -2.27

(_{+0.08} −0.10 ) . . . 430/359

081006.604 Comp 0.0038 ± 0.0004 840

(_{+520}

−240 ) -0.43

(_{+0.3} −0.26 ) . . . . . . . . . 423/362 081009.690 Band 0.0296 ± 0.0143 63

(_{+15} −11 ) . . . -0.53

(_{+0.3} −0.24 ) -1.76

(_{+0.04} −0.05 ) 0.70 502/358

081012.045 Comp 0.0123 ± 0.0011 750

(_{+300}

−160 ) -0.44

(_{+0.23} −0.20 ) . . . . . . . . . 368/355 081024.891 Comp 0.0096 ± 0.0014 1300

(_{+540}

−410 ) -0.46

(_{+0.3} −0.22 ) . . . . . . . . . 326/359 081101.532 Comp 0.0251 ± 0.0008 290 ± 30 -0.686 ± 0.04 . . . . . . . . . 360/360

081110.601 Comp 0.0105 ± 0.0004 470

(_{+70} −50 ) -1.064

(_{+0.046} −0.043 ) . . . . . . . . . 410/359 081121.858 Band 0.0266 ± 0.0049 158

(_{+18} −17 ) . . . -0.47

(_{+0.14} −0.12 ) -1.94

(_{+0.06} −0.07 ) . . . 456/356

081122.520 Comp 0.0093 ± 0.0006 207

(_{+21} −17 ) -0.90 ± 0.07 . . . . . . . . . 435/360

081125.496 Band 0.0932 ± 0.0051 164 ± 7 . . . -0.48 ± 0.05 -2.86

(_{+0.18} −0.26 ) 0.76 408/358

081126.899 Comp 0.0040 ± 0.0004 330

(_{+50} −40 ) -1.00 ± 0.07 . . . . . . . . . 488/360

– 39 –

Table 3—Continued

GBM Best A E_{peak} index α β A_{eff} CSTAT/

Trig. # Model (ph. s^{−1} cm^{−2} keV^{−1}) (keV) Corr. DOF (1) (2) (3) (4) (5) (6) (7) (8) (9)

081129.161 Band 0.0114 ± 0.0007 250 ± 30 . . . -0.96

(_{+0.06} −0.05 ) -2.20

(_{+0.15} −0.22 ) . . . 454/356

081207.680 Band 0.0095 ± 0.0002 430

(_{+30} −28 ) . . . -0.67 ± 0.03 -2.11

(_{+0.08} −0.09 ) . . . 501/356

081209.981 Band 0.0347 ± 0.0021 1100

(_{+400}

−300 ) . . . -0.68

(_{+0.14} −0.11 ) -2.23

(_{+0.26} −0.5 ) . . . 349/357

081215.784 Band 0.1074 ± 0.0014 458 ± 13 . . . -0.71

(_{+0.02} −0.02 ) -2.36

(_{+0.04} −0.05 ) . . . 519/356

081216.531 Band 0.0200 ± 0.0009 1270

(_{+260}

−300 ) . . . -0.81

(_{+0.07} −0.05 ) -2.54

(_{+0.40} −0.80 ) . . . 453/357

081224.887 Comp 0.0378 ± 0.0007 380 ± 11 -0.73 ± 0.02 . . . . . . 0.87 442/358

081226.509 Comp 0.0311 ± 0.0044 350

(_{+100} −70 ) -0.41

(_{+0.24} −0.20 ) . . . . . . . . . 414/360 081231.140 Band 0.0149 ± 0.0006 234

(_{+26} −20 ) . . . -1.06 ± 0.04 -2.26

(_{+0.17} −0.50 ) . . . 472/358

090102.122 Comp 0.0180 ± 0.0003 412

(_{+16} −15 ) -0.86 ± 0.02 . . . . . . 0.87 442/357

090131.090 Band 0.0321 ± 0.0030 61 ± 4 . . . -1.21

(_{+0.08} −0.06 ) -2.42

(_{+0.09} −0.10 ) . . . 348/236

090217.206 Comp 0.0125 ± 0.0002 633

(_{+35} −32 ) -0.91 ± 0.02 . . . . . . . . . 659/479

090219.074 Comp 0.0289 ± 0.0115 214

(_{+100} −55 ) -0.2

(_{+0.8} −0.5 ) . . . . . . . . . 353/361 090227.310 Comp 0.0055 ± 0.0002 1000

(_{+200}

−160 ) -0.86 ± 0.06 . . . . . . . . . 383/360

090227.772 Band 0.0762 ± 0.0016 2100 ± 100 . . . -0.51

(_{+0.03} −0.02 ) -3.33

(_{+0.27} −0.40 ) . . . 548/479

090228.204 Comp 0.0755 ± 0.0016 840 ± 50 -0.60 ± 0.03 . . . . . . . . . 540/480

090305.052 Comp 0.0126 ± 0.0006 890

(_{+150}

−120 ) -0.58

(_{+0.11} −0.09 ) . . . . . . . . . 570/480 090308.734 Comp 0.0193 ± 0.0080 664

(_{+60} −50 ) -0.53

(_{+0.08} −0.07 ) . . . . . . . . . 688/600 090323.002 Band 0.0178 ± 0.0003 530

(_{+26} −24 ) . . . -0.81 ± 0.02 -2.42

(_{+0.09} −0.12 ) . . . 568/237

090328.401 Band 0.0173 ± 0.0003 660 ± 40 . . . -0.93 ± 0.02 -2.44

(_{+0.14} −0.19 ) . . . 534/360

090328.713 Comp 0.0319 ± 0.0016 2000

(_{+680}

−520 ) -0.96 ± 0.07 . . . . . . . . . 376/356

090330.279 Band 0.0068 ± 0.0005 198 ± 19 . . . -0.92

(_{+0.07} −0.06 ) -2.28

(_{+0.15} −0.21 ) . . . 747/477

090424.592 Band 0.1419 ± 0.0026 146.2

(_{+2.8} −2.9 ) . . . -0.86 ± 0.02 -2.76 ± 0.08 0.78 843/478

090429.753 Comp 0.0150 ± 0.0008 1400

(_{+700}

−400 ) -1.06

(_{+0.09} −0.08 ) . . . . . . . . . 372/360

– 40 –

Table 3—Continued

GBM Best A E_{peak} index α β A_{eff} CSTAT/

Trig. # Model (ph. s^{−1} cm^{−2} keV^{−1}) (keV) Corr. DOF (1) (2) (3) (4) (5) (6) (7) (8) (9)

090510.016 Band 0.0427 ± 0.0009 4400

(_{+400}

−380 ) . . . -0.79 ± 0.03 -2.74

(_{+0.26} −0.40 ) . . . 486/479

090528.516 Band 0.0170 ± 0.0070 170

(_{+12} −11 ) . . . -1.10 ± 0.04 -2.21

(_{+0.08} −0.10 ) . . . 553/358

090531.775 Comp 0.0094 ± 0.0006 1750

(_{+370}

−320 ) -0.63

(_{+0.11} −0.09 ) . . . . . . . . . 632/481 090618.353 Band 0.0717 ± 0.0011 150.2 ± 2.7 . . . -1.12 ± 0.01 -2.50 ± 0.03 0.78 532/233

090620.400 Band 0.0920 ± 0.0045 150 ± 4 . . . -0.174 ± 0.05 -2.77

(_{+0.11} −0.13 ) 0.70 580/479

090623.107 Band 0.0084 ± 0.0004 307

(_{+36} −30 ) . . . -0.63

(_{+0.07} −0.06 ) -2.29

(_{+0.17} −0.3 ) 0.72 607/478

090626.189 Band 0.0440 ± 0.0014 160

(_{+8} −7 ) . . . -1.04 ± 0.03 -2.30

(_{+0.05} −0.06 ) 0.74 353/240

Note. —^a The time range values are given in s relative to the trigger time T_0. They represent the interval used for the time–integrated spectral analysis