arXiv:1006.3229v1 [astro-ph.SR] 16 Jun 2010

Astronomy & Astrophysics manuscript no. erratum © ESO 2019 May 6, 2019

Erratum: SPITZER-IRS spectral fitting of discs around binary post-AGB stars.

C. Gielen^{1,⋆}, H. Van Winckel^1, M. Min^{17}, L.B.F.M. Waters^{1,2}, T. Lloyd Evans^3, M. Matsuura^{4,5}, P. Deroo^6, C. Dominik^{2,7}, M. Reyniers^8, A. Zijlstra^9, K. D. Gordon^{11}, F. Kemper^9, R. Indebetouw^{12,16}, M. Marengo^{13}, M. Meixner^{11}, G.C. Sloan^{14}, A. G. G. M. Tielens^{15}, and P. M. Woods^9

1 Instituut voor Sterrenkunde, Katholieke Universiteit Leuven, Celestijnenlaan 200D, 3001 Leuven, Belgium

e-mail: clio.gielen@ster.kuleuven.be 2 Sterrenkundig Instituut ’Anton Pannekoek’, Universiteit Amsterdam, Kruislaan 403, 1098 Amsterdam, The Netherlands 3 SUPA, School of Physics and Astronomy, University of St Andrews, North Haugh, St Andrews, Fife KY16 9SS, United Kingdom 4 UCL-Institute of Origins, Department of Physics and Astronomy, University College London, Gower Street, London WC1E 6BT, United Kingdom 5 UCL-Institute of Origins, Mullard Space Science Laboratory, University College London, Holmbury St. Mary, Dorking, Surrey RH5 6NT, United Kingdom 6 Jet Propulsion Laboratory, 4800 Oak Grove Drive, Pasadena, CA 91109, US 7 Department of Astrophysics, Radboud University Nijmegen, PO Box 9010, 6500 GL Nijmegen, The Netherlands 8 The Royal Meteorological Institute of Belgium, Department Observations, Ringlaan 3, 1180 Brussels, Belgium 9 Jodrell Bank Centre for Astrophysics, Alan Turing Building, University of Manchester, Oxford Road, Manchester, M13 9PL, United Kingdom 10 SUPA, School of Physics and Astronomy, University of St Andrews, North Haugh, St Andrews, Fife KY16 9SS, United Kingdom 11 Space Telescope Science Institute, 3700 San Martin Drive, Baltimore, MD 21218, USA 12 Department of Astronomy, University of Virginia, PO Box 3818, Charlottesville, VA 22903-0818, USA 13 Harvard-Smithsonian Center for Astrophysics, 60 Garden Street, MS 65, Cambridge, MA 02138-1516, USA 14 Department of Astronomy, Cornell University, Ithaca, NY 14853-6801, USA 15 Leiden Observatory, J.H. Oort Building, Niels Bohrweg 2, 2333 CA Leiden, The Netherlands 16 National Radio Astronomy Observatory, 520 Edgemont Road, Charlottesville, VA 22906, USA 17 Astronomisch Instituut Utrecht, Universiteit Utrecht, Princetonplein 5, 3584 CC Utrecht, The Netherlands

Received ; accepted

ABSTRACT

Aims. no abstract Methods. no abstract Results. no abstract

Key words. stars: AGB, post-AGB - stars: binaries - stars: circumstellar matter - stars: abundances - Magellanic Clouds

Recently, we have discovered an error in our Monte-Carlo spectral fitting routine, more specifically where the errors on the fluxes were rescaled to get a reduced χ^2 of 1. The rescaled errors were too big, resulting in too wide a range of ’good’ fits in our 100 step Monte-Carlo routine.

This problem affects Figs. 7-9 and Table A.1-A.2 in Gielen et al. (2008), Table 3 in Gielen et al. (2009a), and Table 4 in Gielen et al. (2009b).

We corrected for this error and present the new values and errors in the tables below. The new values and errors nearly all

⋆ Postdoctoral Fellow of the Fund for Scientific Research, Flanders fall within the old error range. Our best χ^2 values and overall former scientific results are not affected. With these new errors some possible new trends in the dust parameters might be observed. These will be discussed in an upcoming paper where we extend the sample presented in Gielen et al. (2008) with newly obtained SPITZER-IRS data.

2 C. Gielen et al.: Erratum: SPITZER-IRS spectral fitting of discs around binary post-AGB stars.

Fig. 1. Erratum for Fig. 7 in Gielen et al. (2008): The fraction of large grains in the amorphous component versus the fraction of large grains in the crystalline component, using the fitting with grain sizes of 0.1 μm and 2.0 μm. Crystalline grains are almost completely made up of large 2.0 μm grains.

Fig. 2. Erratum for Fig. 8 in Gielen et al. (2008): The mass fraction in large grains (4.0 μm) plotted against the mass fraction in crystalline grains, as derived from our best-fit parameters.

Fig. 3. Erratum for Fig. 9 in Gielen et al. (2008): The continuum-to-dust ratio of the observed spectra plotted against the mass fraction on large grains (4.0 μm).

C. Gielen et al.: Erratum: SPITZER-IRS spectral fitting of discs around binary post-AGB stars. 3

Table 1. Erratum for Table A.1 in Gielen et al. (2008): Best-fit parameters deduced from our full spectral fitting. Listed are the χ^2, dust and continuum temperatures and their relative fractions.

N^∘ Name χ^2 T_{dust1} T_{dust2} Fraction T_{cont1} T_{cont2} Fraction (K) (K) T_{dust1}- T_{dust2} (K) (K) T_{cont1}-T_{cont2} 1 EP Lyr 56.7 100^{50}_{50} 200^{50}_{50} 0.90^{0.05}_{0.10} − 0.10^{0.10}_{0.05} 200^{50}_{50} 994^{50}_{103} 0.98^{0.01}_{0.01} − 0.02^{0.01}_{0.01} 2 HD 131356 3.5 200^{50}_{50} 1000^{50}_{50} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 200^{50}_{50} 500^{50}_{50} 0.90^{0.01}_{0.01} − 0.10^{0.01}_{0.01} 3 HD 213985 4.4 184^{50}_{87} 1000^{50}_{50} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 200^{50}_{50} 884^{50}_{87} 0.98^{0.01}_{0.01} − 0.02^{0.01}_{0.01} 4 HD 52961 72.2 200^{50}_{50} 800^{50}_{50} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 100^{50}_{50} 1000^{50}_{50} 0.99^{0.01}_{0.01} − 0.01^{0.01}_{0.01} 5 IRAS 05208 4.5 292^{50}_{95} 923^{78}_{113} 0.80^{0.05}_{0.10} − 0.20^{0.10}_{0.05} 200^{50}_{50} 400^{50}_{50} 0.85^{0.01}_{0.01} − 0.15^{0.01}_{0.01} 6 IRAS 09060 3.6 200^{50}_{50} 728^{73}_{130} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 228^{73}_{130} 834^{141}_{237} 0.93^{0.02}_{0.02} − 0.07^{0.02}_{0.02} 7 IRAS 09144 6.1 200^{50}_{50} 504^{111}_{50} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 200^{50}_{50} 796^{50}_{111} 0.94^{0.01}_{0.01} − 0.06^{0.01}_{0.01} 8 IRAS 10174 13.9 300^{50}_{50} 400^{50}_{50} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 100^{50}_{50} 300^{50}_{50} 0.97^{0.01}_{0.01} − 0.03^{0.01}_{0.01} 9 IRAS 16230 4.9 200^{50}_{50} 500^{50}_{50} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 100^{50}_{50} 500^{50}_{50} 0.95^{0.05}_{0.05} − 0.05^{0.05}_{0.05} 10 IRAS 17038 2.9 317^{85}_{50} 871^{61}_{80} 0.80^{0.10}_{0.10} − 0.20^{0.10}_{0.10} 200^{50}_{50} 591^{50}_{96} 0.97^{0.01}_{0.02} − 0.03^{0.02}_{0.01} 11 IRAS 17243 2.3 200^{50}_{50} 486^{50}_{89} 0.90^{0.05}_{0.10} − 0.10^{0.10}_{0.05} 200^{50}_{50} 600^{50}_{50} 0.90^{0.01}_{0.01} − 0.10^{0.01}_{0.01} 12 IRAS 19125 3.9 100^{50}_{50} 200^{50}_{50} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 482^{50}_{309} 788^{50}_{206} 0.86^{0.01}_{0.05} − 0.14^{0.05}_{0.01} 13 IRAS 19157 5.5 200^{50}_{50} 695^{50}_{106} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 200^{50}_{50} 705^{106}_{50} 0.96^{0.01}_{0.01} − 0.04^{0.01}_{0.01} 14 IRAS 20056 3.8 100^{50}_{50} 200^{50}_{50} 0.10^{0.20}_{0.10} − 0.90^{0.10}_{0.20} 200^{50}_{50} 600^{50}_{50} 0.88^{0.01}_{0.01} − 0.12^{0.01}_{0.01} 15 RU Cen 3.4 287^{50}_{91} 575^{50}_{176} 0.90^{0.05}_{0.30} − 0.10^{0.30}_{0.05} 200^{50}_{50} 599^{50}_{50} 0.99^{0.01}_{0.01} − 0.01^{0.01}_{0.01} 16 SAO 173329 3.1 200^{50}_{50} 702^{139}_{50} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 200^{50}_{50} 600^{50}_{50} 0.93^{0.01}_{0.01} − 0.07^{0.01}_{0.01} 17 ST Pup 8.4 200^{50}_{50} 500^{50}_{50} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 200^{50}_{50} 500^{50}_{50} 0.95^{0.01}_{0.01} − 0.05^{0.01}_{0.01} 18 SU Gem 1.8 154^{105}_{54} 558^{96}_{59} 0.80^{0.10}_{0.10} − 0.20^{0.10}_{0.10} 200^{50}_{50} 800^{50}_{50} 0.95^{0.01}_{0.01} − 0.05^{0.01}_{0.01} 19 SX Cen 4.3 257^{50}_{58} 968^{50}_{69} 0.80^{0.10}_{0.10} − 0.20^{0.10}_{0.10} 200^{50}_{50} 691^{50}_{96} 0.94^{0.01}_{0.01} − 0.06^{0.01}_{0.01} 20 TW Cam 2.3 261^{50}_{62} 400^{50}_{50} 0.60^{0.10}_{0.05} − 0.40^{0.05}_{0.10} 100^{50}_{50} 500^{50}_{50} 0.95^{0.01}_{0.01} − 0.05^{0.01}_{0.01} 21 UY CMa 2.9 200^{50}_{50} 726^{76}_{50} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 200^{50}_{50} 500^{50}_{50} 0.83^{0.01}_{0.01} − 0.17^{0.01}_{0.01}

Acknowledgements. CG and HVW acknowledge support of the Fund for Scientific Research of Flanders (FWO) under the grant G.0178.02. and G.0470.07. This work is based on observations made with the Spitzer Space Telescope, which is operated by the Jet Propulsion Laboratory, California Institute of Technology, under a contract with NASA.

References

Gielen, C., van Winckel, H., Matsuura, M., et al. 2009a, A&A, 503, 843 Gielen, C., Van Winckel, H., Min, M., Waters, L. B. F. M., & Lloyd Evans, T. 2008, A&A, 490, 725 Gielen, C., Van Winckel, H., Reyniers, M., et al. 2009b, A&A, 508, 1391

4 C. Gielen et al.: Erratum: SPITZER-IRS spectral fitting of discs around binary post-AGB stars.

Table 2. Erratum for Table A.2 in Gielen et al. (2008): Best-fit parameters deduced from our full spectral fitting. The abundances of small (2.0 μm) and large (4.0 μm) grains of the various dust species are given as fractions of the total mass, excluding the dust responsible for the continuum emission. The last column gives the continuum flux contribution, listed as a percentage of the total integrated flux over the full wavelength range.

N^∘ Name Olivine Pyroxene Forsterite Enstatite Continuum Small - Large Small - Large Small - Large Small - Large 1 EP Lyr 0.00^{0.00}_{0.00} − 0.00^{0.00}_{0.00} 15.36^{12.96}_{9.25} − 61.34^{10.71}_{23.01} 14.43^{4.61}_{2.17} − 0.02^{0.00}_{0.02} 0.00^{0.00}_{0.00} − 8.85^{4.49}_{3.90} 53.51^{3.36}_{1.43} 2 HD 131356 0.00^{0.00}_{0.00} − 30.48^{1.50}_{1.44} 2.87^{1.79}_{1.77} − 53.91^{2.57}_{2.72} 12.06^{0.65}_{0.62} − 0.03^{1.00}_{0.03} 0.00^{0.00}_{0.00} − 0.65^{1.34}_{0.56} 76.34^{0.30}_{0.24} 3 HD 213985 0.00^{0.00}_{0.00} − 36.08^{2.20}_{2.21} 12.58^{3.42}_{9.92} − 29.27^{25.84}_{6.99} 8.02^{1.79}_{1.63} − 7.74^{3.26}_{4.86} 0.00^{0.00}_{0.00} − 6.31^{2.09}_{4.45} 76.21^{0.57}_{1.51} 4 HD 52961 0.00^{0.00}_{0.00} − 0.00^{0.00}_{0.00} 70.65^{1.61}_{1.93} − 0.00^{0.00}_{0.00} 20.84^{3.81}_{3.57} − 8.40^{5.18}_{4.94} 0.00^{0.00}_{0.00} − 0.12^{2.07}_{0.12} 65.66^{0.57}_{0.62} 5 IRAS 05208 0.00^{0.00}_{0.00} − 9.52^{2.49}_{2.52} 33.16^{1.52}_{1.29} − 0.00^{0.00}_{0.00} 25.76^{1.34}_{1.10} − 0.00^{0.00}_{0.00} 2.10^{2.13}_{1.67} − 29.47^{2.80}_{3.27} 69.06^{0.38}_{0.38} 6 IRAS 09060 0.06^{1.80}_{0.06} − 32.70^{4.64}_{4.58} 39.74^{3.00}_{2.66} − 0.48^{4.21}_{0.49} 14.95^{1.37}_{1.81} − 1.11^{2.97}_{1.11} 0.01^{0.40}_{0.01} − 10.95^{3.37}_{2.51} 72.43^{1.24}_{2.20} 7 IRAS 09144 0.00^{0.00}_{0.00} − 39.21^{2.04}_{4.59} 17.77^{1.54}_{2.65} − 34.88^{7.04}_{3.03} 7.99^{0.75}_{0.63} − 0.00^{0.00}_{0.00} 0.00^{0.00}_{0.00} − 0.14^{1.21}_{0.14} 72.51^{0.39}_{0.30} 8 IRAS 10174 8.70^{4.93}_{3.38} − 39.99^{4.24}_{6.00} 26.10^{2.29}_{3.10} − 25.21^{4.19}_{3.46} 0.00^{0.00}_{0.00} − 0.00^{0.00}_{0.00} 0.00^{0.00}_{0.00} − 0.00^{0.00}_{0.00} 31.48^{0.54}_{0.49} 9 IRAS 16230 0.00^{0.00}_{0.00} − 47.54^{2.35}_{2.30} 0.00^{0.00}_{0.00} − 29.46^{2.01}_{2.39} 18.20^{0.90}_{0.98} − 4.23^{1.38}_{1.50} 0.00^{0.00}_{0.00} − 0.58^{1.51}_{0.54} 75.74^{0.29}_{0.25} 10 IRAS 17038 0.00^{0.00}_{0.00} − 31.29^{2.25}_{2.85} 0.03^{0.92}_{0.03} − 31.02^{4.33}_{2.54} 21.65^{0.77}_{0.91} − 0.00^{0.00}_{0.00} 0.00^{0.00}_{0.00} − 16.00^{1.89}_{2.13} 81.71^{0.23}_{0.35} 11 IRAS 17243 0.49^{7.03}_{0.49} − 42.74^{2.73}_{2.29} 20.13^{10.90}_{3.29} − 14.61^{5.25}_{9.18} 17.34^{0.90}_{0.95} − 0.00^{0.00}_{0.00} 0.00^{0.00}_{0.00} − 4.69^{1.76}_{2.60} 83.22^{0.41}_{0.29} 12 IRAS 19125 8.22^{7.72}_{6.32} − 6.24^{6.47}_{4.96} 8.66^{8.00}_{4.28} − 45.53^{5.92}_{20.03} 7.98^{0.98}_{0.74} − 7.87^{1.34}_{1.22} 0.00^{0.00}_{0.00} − 15.50^{2.65}_{1.34} 69.72^{7.00}_{0.44} 13 IRAS 19157 0.00^{0.00}_{0.00} − 63.21^{5.31}_{3.12} 8.43^{4.28}_{3.41} − 12.05^{6.89}_{8.01} 14.58^{1.36}_{1.49} − 0.02^{0.94}_{0.02} 0.00^{0.00}_{0.00} − 1.70^{2.00}_{1.35} 82.28^{0.61}_{0.53} 14 IRAS 20056 0.45^{2.96}_{0.45} − 31.83^{3.62}_{3.94} 34.60^{2.35}_{2.66} − 0.30^{5.33}_{0.30} 15.86^{1.04}_{1.10} − 0.02^{0.85}_{0.02} 0.00^{0.00}_{0.00} − 16.93^{1.80}_{1.77} 83.48^{0.20}_{0.64} 15 RU Cen 0.00^{0.00}_{0.00} − 27.92^{2.17}_{2.49} 1.24^{2.06}_{1.06} − 27.81^{3.82}_{3.95} 28.63^{1.83}_{1.80} − 3.34^{2.71}_{2.68} 0.00^{0.00}_{0.00} − 11.06^{1.71}_{2.11} 80.62^{0.34}_{0.76} 16 SAO 173329 0.00^{0.00}_{0.00} − 52.55^{1.74}_{2.35} 0.02^{0.50}_{0.02} − 28.64^{2.15}_{2.47} 9.21^{1.09}_{0.77} − 0.02^{0.00}_{0.02} 0.00^{0.00}_{0.00} − 9.56^{2.63}_{1.85} 82.54^{0.44}_{0.20} 17 ST Pup 0.00^{0.00}_{0.00} − 32.87^{1.29}_{1.23} 0.71^{1.86}_{0.66} − 51.93^{1.79}_{3.17} 13.19^{0.57}_{0.46} − 0.03^{0.83}_{0.03} 0.00^{0.00}_{0.00} − 1.27^{1.16}_{0.90} 54.60^{0.53}_{0.37} 18 SU Gem 0.00^{0.00}_{0.00} − 58.69^{3.60}_{3.77} 0.70^{2.88}_{0.69} − 12.03^{3.93}_{5.11} 23.41^{2.31}_{1.75} − 2.30^{3.69}_{1.96} 0.00^{0.00}_{0.00} − 2.87^{3.03}_{2.11} 88.40^{0.44}_{0.43} 19 SX Cen 0.00^{0.00}_{0.00} − 48.37^{3.30}_{4.76} 9.19^{11.44}_{5.82} − 23.70^{12.70}_{23.67} 10.82^{3.64}_{1.97} − 0.53^{4.29}_{0.53} 0.00^{0.00}_{0.00} − 7.39^{4.69}_{3.15} 76.16^{1.50}_{1.16} 20 TW Cam 0.00^{0.00}_{0.00} − 84.42^{1.81}_{2.04} 0.00^{0.00}_{0.00} − 0.00^{0.00}_{0.00} 15.20^{1.47}_{1.73} − 0.00^{0.00}_{0.00} 0.00^{0.00}_{0.00} − 0.37^{1.84}_{0.37} 90.63^{0.15}_{0.18} 21 UY CMa 0.00^{0.00}_{0.00} − 15.55^{2.31}_{1.96} 2.54^{2.53}_{2.02} − 58.59^{3.01}_{3.68} 16.18^{2.50}_{1.78} − 4.48^{2.93}_{3.42} 0.00^{0.00}_{0.00} − 2.65^{1.53}_{1.43} 78.14^{0.62}_{0.42}

Table 3. Erratum for Table 3 in Gielen et al. (2009a): Best-fit parameters deduced from our full spectral fitting. Listed are the χ^2, dust, and continuum temperatures and their relative fractions. Best-fit parameters deduced from our full spectral fitting. The abundances of small and large grains of the various dust species are given as fractions of the total mass, excluding the dust responsible for the continuum emission. The last column gives the continuum flux contribution, listed as a percentage of the total integrated flux over the full wavelength range.

Name χ^2 T_{dust1} T_{dust2} Fraction T_{cont1} T_{cont2} Fraction (K) (K) T_{dust1}- T_{dust2} (K) (K) T_{cont1}-T_{cont2} EP Lyr 5.4 100^{50}_{50} 200^{50}_{50} 0.90^{0.10}_{0.05} − 0.10^{0.05}_{0.10} 100^{50}_{50} 643^{302}_{50} 0.98^{0.01}_{0.04} − 0.02^{0.04}_{0.01} HD 52961 50.0 200^{50}_{50} 700^{50}_{50} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 100^{50}_{50} 1000^{50}_{50} 0.99^{0.01}_{0.01} − 0.01^{0.01}_{0.01}

Name Olivine Pyroxene Forsterite Enstatite Continuum Small - Large Small - Large Small - Large Small - Large EP Lyr 0.24^{16.83}_{0.24} − 8.74^{7.92}_{7.64} 7.17^{13.69}_{4.79} − 8.09^{12.67}_{7.24} 35.18^{3.04}_{2.78} − 2.08^{2.61}_{1.89} 0.00^{0.00}_{0.00} − 38.50^{4.30}_{3.46} 57.99^{2.53}_{3.60} HD 52961 0.00^{0.00}_{0.00} − 0.00^{0.00}_{0.00} 59.17^{0.72}_{0.69} − 0.00^{0.00}_{0.00} 0.77^{1.46}_{0.69} − 40.06^{1.02}_{1.62} 0.00^{0.00}_{0.00} − 0.00^{0.00}_{0.00} 68.88^{0.42}_{0.46}

C. Gielen et al.: Erratum: SPITZER-IRS spectral fitting of discs around binary post-AGB stars. 5

Table 4. Erratum for Table 4 in Gielen et al. (2009b): Best-fit parameters deduced from our full spectral fitting. Listed are the χ^2, dust, and continuum temperatures and their relative fractions. Best-fit parameters deduced from our full spectral fitting. The abundances of small (0.1 μm) and large (2.0 μm) grains of the various dust species are given as fractions of the total mass, excluding the dust responsible for the continuum emission. The last column gives the continuum flux contribution, listed as a percentage of the total integrated flux over the full wavelength range.

Name χ^2 T_{dust1} T_{dust2} Fraction T_{cont1} T_{cont2} Fraction (K) (K) T_{dust1}- T_{dust2} (K) (K) T_{cont1}-T_{cont2} MACHO 79.5501.13 5.1 200^{50}_{50} 725^{83}_{50} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 346^{184}_{246} 623^{99}_{50} 0.21^{0.69}_{0.18} − 0.79^{0.18}_{0.69} MACHO 82.8405.15 3.9 200^{50}_{50} 519^{82}_{75} 0.90^{0.05}_{0.05} − 0.10^{0.05}_{0.05} 300^{50}_{50} 500^{50}_{50} 0.82^{0.03}_{0.02} − 0.18^{0.02}_{0.03}

Name Olivine Pyroxene Forsterite Enstatite Continuum Small - Large Small - Large Small - Large Small - Large MACHO 79.5501.13 0.00^{0.00}_{0.00} − 0.00^{0.00}_{0.00} 48.45^{4.75}_{7.00} − 0.37^{20.55}_{0.37} 0.00^{0.00}_{0.00} − 44.54^{3.47}_{3.32} 0.17^{2.86}_{0.17} − 6.47^{5.76}_{4.25} 89.27^{0.70}_{0.86} MACHO 82.8405.15 0.96^{7.13}_{0.95} − 4.13^{10.91}_{3.97} 52.80^{10.75}_{9.36} − 4.01^{18.56}_{3.92} 5.50^{2.76}_{2.26} − 20.52^{6.47}_{7.06} 0.14^{3.66}_{0.14} − 11.95^{5.93}_{5.83} 82.63^{1.86}_{1.86}