arXiv:0802.1037v2 [astro-ph] 14 Jun 2009

A Survey of Star Clusters in the M31 Southwest Field.

UBV RI Photometry and Multiband Maps

D. Narbutis^1, V. Vansevičius^1, K. Kodaira^2, A. Bridžius^1, and R. Stonkutė^1

ABSTRACT

A new survey of star clusters in the southwest field of the M31 disk based on the high resolution Subaru Suprime-Cam observations is presented. The UBV RI aperture CCD photometry catalog of 285 objects (V ≲ 20.5 mag; 169 of them identified for the first time) is provided. Each object is supplemented with multiband color maps presented in the electronic edition of the Astrophysical Journal Supplement. Seventy seven star cluster candidates from the catalog are located in the Hubble Space Telescope archive frames.

Subject headings: galaxies: individual (M31) — galaxies: star clusters

1. Introduction

Detailed studies of the star clusters in M31 are essential to understanding the evolution mechanisms of disk galaxies and of the cluster population itself. Many observational surveys of this galaxy have been devoted to globular clusters; see, e.g., Kim et al. (2007) and references therein. Due to crowding, plausible detection and analysis of star clusters projected on the disk of M31 became feasible only with high-resolution imaging; see Krienke & Hodge (2007) for an extensive discussion of the problem. However, Hubble Space Telescope (HST ) observations cover only a small part of the M31 disk, and up-to-date cluster population studies (e.g., Krienke & Hodge 2007) are based on HST fields scattered over the area of M31.

A homogeneous (in object detection and photometry) survey of star clusters in the southwest field of the M31 disk was conducted by Kodaira et al. (2004) (hereafter Paper I) over an area of ∼500 arcmin^2, making use of the high-resolution imaging capability of

1Institute of Physics, Savanoriu̧ 231, Vilnius LT-02300, Lithuania, wladas@astro.lt

2The Graduate University for Advanced Studies (SOKENDAI), Shonan Village, Hayama, Kanagawa 240-0193, Japan

– 2 –

the Subaru Suprime-Cam (Miyazaki et al. 2002). In Paper I we presented a catalog of 49 prominent compact objects and a catalog of 52 emission objects. Structural parameters of 49 compact and 2 emission objects brighter than V ∼ 19.0 mag were derived from the V -band Suprime-Cam image by Šablevičiūtė et al. (2006, 2007), showing that they are fainter and span a slightly wider half-light radius range than the M31 clusters studied by Barmby et al. (2002, 2007). The UBV RI (R and I bands are in Cousins system) photometry of these clusters was performed on the Local Group Galaxy Survey (LGGS; Massey et al. 2006) images by Narbutis et al. (2006), resulting in a smaller scatter in color-color diagrams than photometry data of the same objects taken from the Revised Bologna Catalogue of M31 globular clusters and candidates compiled by Galleti et al. (2004).

Promising results from these studies motivated us to extend a sample of star clusters up to V ∼ 20.5 mag. Here we present the results of UBV RI aperture CCD photometry for 285 star cluster candidates located in the same Suprime-Cam field of the M31 disk (see Figure 1). The multiband color maps, combined from GALEX, LGGS, 2MASS, Spitzer (24 μm), and HI (21 cm) images, are provided in the electronic edition of the Supplement.

We describe the object selection procedure in section 2, photometry and calibration in section 3, and present the catalog in section 4.

2. Object Selection

The Suprime-Cam survey of star cluster-like objects was conducted in the southwest (SW) field of the M31 disk (∼17.^′5×28.^′5 in size), centered at α_{J2000} = 0^h40.^m9 and δ_{J2000} = +40^∘45^′ (Figure 1). Visual inspection of the high-resolution Suprime-Cam mosaic images, with characteristic full width at half-maximum (FWHM) of the point-spread function (PSF) of ∼0.7^{′′}, enabled us to select the initial sample of ∼600 star cluster candidates up to V ∼ 21^m.

In addition, several objects that were not recognized as cluster candidates in our survey, were appended to the initial Suprime-Cam object sample from the Revised Bologna Catalogue of M31 globular clusters and candidates v.3.2, July 2007^1 (Galleti et al. 2007) and from the recent HST survey of the M31 disk cluster population conducted by Krienke & Hodge (2007). About 40 objects, included in Galleti et al. (2007) and overlapping with our survey field originally come from the recent survey by Kim et al. (2007), however, ∼50% of these objects were omitted from our catalog because their surface brightness profiles closely

1See http://www.bo.astro.it/M31/.

– 3 –

resemble that of stars.

To study selection effects inherent to the initial cluster candidate sample, archival HST frames (see Appendix A) were employed. A completeness of ∼70% in the visual selection of star cluster candidates at the limiting magnitude of the catalogue (V ∼ 20.5 mag) was estimated by comparing our initial sample of ∼600 objects with an overlapping sample studied by Krienke & Hodge (2007). We also checked our objects against available archival HST images, and some of our cluster candidates were classified as asterisms. Moreover, few new star cluster candidates, overlooked during a visual inspection of the Suprime-Cam images, were found on HST frames. Summing up results of these tests, we find the completeness of our cluster candidate sample to be higher than ∼50% at V = 20.5 mag. This is a conservative magnitude limit for objects that can be identified as star clusters on the Suprime-Cam images. However, it is difficult to estimate the completeness of the present cluster candidate sample more accurately, since it depends on a strongly varying background object density across the surveyed area, and the clusters’ luminosities, colors, and concentrations.

A strong contamination of young star cluster samples selected in M31 by asterisms has been demonstrated recently by Cohen et al. (2005). Therefore, in order to clean our cluster candidate sample (V ≲ 20.5 mag), we determined cluster structural parameters, by employing the BAOLAB/ISHAPE program package (Larsen 1999) and using the analysis technique described in Šablevičiūtė et al. (2006). Unresolved objects with determined intrinsic sizes of ≲ 0.2^{′′} have been removed as suspected stars. The analysis of multiband color maps and ISHAPE results revealed several red objects, possessing smooth elliptical surface brightness distributions. They were also removed from the sample as probable background galaxies. We did not include KWC13 and KWC24 from Paper I either, suspecting them to be background galaxies. After performing this cleaning, we ended up with the final catalog containing 285 star cluster candidates (169 of them identified for the first time). The final cluster candidate sample includes 77 objects observed by HST .

3. Photometry

For the star cluster aperture photometry, we used LGGS^2 U, B, V , R, and I band mosaic images of four M31 fields (F6, F7, F8, and F9) overlapping with the field studied in Paper I. The mosaic camera used for LGGS consists of eight CCDs. Each CCD chip covers a 9^′×18^′ field and has an individual set of color equations. The observations and data reductions are described in detail by Massey et al. (2006).

2LGGS: http://www.lowell.edu/users/massey/lgsurvey.html.

– 4 –

We considered mosaic images, cleaned of cosmic rays and cosmetic defects, to be preferable to individual exposure images for star cluster aperture photometry. The dithering pattern of five individual exposures is the same for each field (maximum shifts up to 1^′ from the first exposure), with an exception of the U-band mosaic of the F9 field, which is combined ofrom six individual exposures. Massey et al. (2006) do not recommend a straightforward use of their mosaic images for accurate photometry, therefore, we treated each CCD chip area in the mosaic image separately, taking special care of objects residing in different CCDs of the combined individual exposures.

3.1. PSF homogenization

PSFs of the LGGS mosaic images used for aperture photometry differ significantly (see Table 1). Moreover, four of them have a coordinate-dependent PSF with a FWHM varying by more than 0.2^{′′} across the field. That would lead to a variable aperture correction and, if not properly corrected, to a cluster color bias for the small apertures (diameter of ∼3^{′′}) used in this study. Since the intrinsic surface brightness distribution profiles of star cluster candidates are unknown, we homogenized mosaic image PSF shapes, instead of using variable aperture corrections. This also ensures a consistency in aperture selection, photometric error and photometric background estimates.

We applied the DAOPHOT package (Stetson 1987) from the IRAF program system (Tody 1993) to compute original PSFs for all mosaic images. By convolving the widest PSF (FWHM = 1.3^{′′}) with the Gaussian kernel, a reference PSF of FWHM = 1.^{′′}5 was produced. The IRAF’s psfmatch procedure was employed to compute the required convolution kernels for individual mosaic images with respect to the reference PSF. These kernels were symmetrized by replacing their cores with the best-fitting Gaussian profiles, and their wings with the best-fitting exponential profiles, truncated at 3.5^{′′}. The IRAF’s convolve procedure was employed to produce mosaic images possessing unique and coordinate-independent PSFs of FWHM = 1.5^{′′}. The homogenized images were photometrically calibrated and used for star cluster photometry. The maximum difference of the aperture corrections in different pass-bands is less than 0.02 mag. A test of photometric accuracy of the entire PSF homogenization procedure suggests that errors do not exceed 0.01 mag.

– 5 –

3.2. Calibrations

For the UBV RI cluster photometry calibration we selected well-isolated stars of high photometric accuracy (<0.03 mag), measured in each pass-band more than 3 times, from Table 4 of Massey et al. (2006). The calibration stars were measured on the homogenized mosaic images through the circular aperture of 3.0^{′′} in diameter by employing the IRAF’s

phot procedure. The aperture correction (aperture magnitude minus total magnitude) of

0.27 mag was determined for all homogenized mosaic images.

Massey et al. (2006) provide color equations for individual CCD chips of the mosaic camera (see their Table 2). We solved those equations by fitting photometric zero-points of all pass-bands for every individual field and CCD chip. Typically, 80 (ranging from 20 to 140) calibration stars per chip were used. The final errors of derived zero-points are less than 0.01 mag with typical fitting rms < 0.03 mag for the I band and < 0.02 mag for other passbands. Color equations given by Massey et al. (2006), supplemented with the derived zeropoints, were used to transform instrumental magnitudes to the standard system. For objects located in the mosaic image areas combined from different CCDs, we used color equations of corresponding CCDs and performed independent transformations to the standard system.

A comparison of three published stellar photometry data sets in the SW field of the M31 disk (Narbutis, Stonkutė & Vansevičius 2006) suggests caution when using tertiary standards as local photometric standards. However, a careful reduction, calibration, and internal consistency check performed by Massey et al. (2006) resulted in millimagnitude differences between the photometry results of overlapping fields. To our knowledge, this is the most accurately calibrated photometry data set in the M31 galaxy to date.

3.3. Results

The aperture UBV RI photometry was carried out by employing the IRAF’s XGPHOT package. The images of all objects, except for five saturated in the I band, are free of visible defects. Apertures were centered on clusters’ luminosity distribution peaks in the Suprime-Cam V -band mosaic image and transformed to individual LGGS image coordinate systems with the IRAF’s geoxytran procedure. In order to minimize cluster photometry contamination by background objects in crowded fields, we decided to use individual small circular (elliptical for the two bright objects KW102 and KW141 to avoid obvious nearby background stars) apertures; their sizes are provided in Table 2. The photometric background was determined in individually selected and object-centered circular annuli with typical inner and outer radii of 3^{′′} and 8^{′′}, respectively. For some clusters, located on a largely

– 6 –

variable background, circular background determination zones were selected individually in representative areas.

The catalog of 285 star cluster candidates consists of 138 and 141 objects measured in two and three different LGGS fields, respectively, while six objects have been measured in one field. Two main types of error sources determine the final accuracy of the photometry: the photon noise – σ_n (estimated by XGPHOT) and the calibration procedure – σ_c. The V - band magnitude and colors, derived in different LGGS fields for each object, were examined interactively. Weighted averages were calculated taking into account individual σ_n and downweighting data derived in the mosaic image areas combined from different CCDs. The rms of averaged magnitudes and colors characterize calibration errors in general, therefore, they were assigned to σ_c. The lowest possible calibration errors of 0.010, 0.015, 0.020 mag were set for objects having 3, 2, and 1 independent measurements, respectively. The final photometric errors, provided in the catalog (Table 2), are calculated as σ = (σ^2_n +σ^2_c )^{1/2}. The photometric error values, σ_V , for corresponding V -band magnitudes are plotted in Figure 2.

In order to check the aperture size effect on the color accuracy and possible bias due to a contamination by background stars, all objects were measured through four additional apertures, changing the adopted size by ±0.6^{′′} and ±1.2^{′′}. The results of the aperture size test, published by Narbutis et al. (2007), show that contaminating background stars have the strongest influence in I band. The U −B color of red objects tends to be systematically bluer, and an opposite effect is observed for the V −I of blue objects. However, in most cases the final photometric errors provided in the catalog (Table 2) represent the accuracy of cluster colors well. A comparison of our photometry data with HST observations of the same objects by Krienke & Hodge (2007) shows a reasonably good agreement (Narbutis et al. 2007).

4. The Catalog

The photometric catalog of 285 star cluster candidates in the SW M31 field is presented in Table 2. Object coordinates, V -band aperture magnitudes, U − B, B − V , V − R, and R−I colors with their photometric errors, a flag for 77 objects located in HST frames, and cross-identifications with Galleti et al. (2007), Krienke & Hodge (2007), and Paper I (69, 24, and 58 clusters, respectively) are provided.

All catalog objects, overlaid on the Spitzer 24 μm image, are shown in Figure 1. Elliptical ring segments, indicating distances (6 – 18 kpc) from the M31 center in the galaxy’s disk plane, were drawn assuming the following M31 parameters: a distance modulus of m − M =

– 7 –

24.47 (McConnachie et al. 2005), center coordinates α_{J2000} = 0^h42^m44.^s3, δ_{J2000} = 41^∘16^′09^{′′} (NASA Extragalactic Database), a major axis position angle of 38^∘ (de Vaucouleurs 1958), and a disk inclination angle to the line of sight of 75^∘ (Gordon et al. 2006).

V -band magnitude and B − V color histograms of the catalog objects are shown in Figure 2. Shaded histograms show a sub-sample of 77 objects identified in the HST frames.

Observed color-color diagrams of star cluster candidates, overplotted with simple stellar population (SSP) models of metallicity Z = 0.008 and ages ranging from 1 Myr to 15 Gyr, computed with PÉGASE (Fioc & Rocca-Volmerange 1997), are presented in Figure 3. Default PÉGASE parameters and a universal initial mass function (Kroupa 2002) were applied. Reddening vectors are depicted by applying the standard extinction law: a V -band extinction to color excess ratio A_V /E(B−V ) = 3.1 and color excess ratios E(U −B)/E(B−V ) = 0.72, E(R−I)/E(B −V ) = 0.69. The Milky Way interstellar extinction in the direction of the M31 SW field is E(B−V ) = 0.062 (Schlegel et al. 1998).

Figure 3, together with multiband color maps, suggests that the present sample covers a wide range of stellar populations, from old globular clusters through young massive clusters. Some objects, suspected to be young and heavily reddened in the U −B vs. B−V diagram, are displaced in opposite R−I directions from the bulk of objects in the R−I vs. B −V diagram, making a large scatter. A detailed color analysis of these cases, taking into account multiband color maps, reveals two main reasons: R−I is increased due to an additional flux from red background stars in the I-band, and R−I is decreased by an additional contribution from the Hα emission in the R band.

Combined multiband color maps (Figure Set 4.001-4.285; see Appendix B for description) of 285 objects are provided in the electronic edition of the Supplement. They serve as an illustrative material showing the objects’ structure, the location of the aperture used for photometry, individual background conditions, and position in the survey field. These maps are also a valuable tool for revealing cluster interrelations with a global framework of various M31 galaxy components.

5. Summary

We have performed the Suprime-Cam survey of star clusters in the southwest field of the M31 disk up to V ∼ 20.5 mag, providing the UBV RI CCD aperture photometry catalog of 285 cluster candidates. The catalog includes 77 objects located in the HST frames. Photometry was performed trough individually selected small apertures. Object cross-identifications with Galleti et al. (2007) and Krienke & Hodge (2007) are provided for

– 8 –

69 and 24 objects, respectively. Multiband color maps combined from LGGS (U, B, V , I, and Hα bands), GALEX (NUV, FUV), 2MASS (J, H, and K_s bands), Spitzer (24 μm), and HI (21 cm) images, are available in the electronic edition of the Supplement.

This catalog contains an almost complete homogeneous sample of target objects in the surveyed area and will serve as a basis for follow-up imaging or spectroscopic studies. The presented materials suggest that the sample in the catalog covers a wide range of stellar population – from old globular clusters through young massive clusters. An analysis of the catalog will be forthcoming (Vansevičius et al. 2009).

We are indebted to Ieva Šablevičiūtė for her help with the BAOLAB/ISHAPE package. We are thankful to the anonymous referee for constructive suggestions. This work was financially supported in part by a Grant of the Lithuanian State Science and Studies Foundation. The star cluster survey is based on the Suprime-Cam images, collected at the Subaru Telescope, which is operated by the National Astronomical Observatory of Japan. The research is based in part on archival data obtained with the Spitzer Space Telescope, and has made use of the NASA/IPAC Extragalactic Database (NED) and the NASA/IPAC Infrared Science Archive, which are operated by the Jet Propulsion Laboratory, California Institute of Technology, under contract with the National Aeronautics and Space Administration; the SAOImage DS9, developed by Smithsonian Astrophysical Observatory; and the USNOFS Image and Catalogue Archive operated by the United States Naval Observatory, Flagstaff Station. The data presented in this paper were partly obtained from the Multimission Archive at the Space Telescope Science Institute.

A. HST Frames

The Multimission Archive at the Space Telescope Science Institute (MAST)^3 was searched for HST frames overlapping with the Suprime-Cam survey field and publicly available to the date of 7 August 2007. Flat-fielded frames were cleaned of cosmic rays and corrected for distortions by employing procedures of the IRAF’s STSDAS package. The World Coordinate System information was corrected for all HST frames by referencing the Suprime-Cam V -band image, which was registered to the USNO-B1.0 catalog system. The numbers of analyzed HST data sets/telescope pointings overlapping with the studied Suprime-Cam field are: 222/29 (WFPC2), 9/3 (ACS), 43/6 (STIS), and 75/19 (NICMOS). Star cluster candidates from the catalog, presented in Table 2, have been identified only in the WFPC2 (71)

3HST : http://archive.stsci.edu/hst/search.php.

– 9 –

and the ACS (6) frames – 77 objects in total.

B. Multiband Color Maps

The LGGS mosaic images (Massey et al. 2006) in the U, B, V , I, and Hα bands of the F7 or F8 fields were used for a multiband map construction. For objects located to the south of the F7 field, images of lower resolution from field F8 were substituted.

The 2MASS J, H, and K_s band “1×” and “6×” survey images were retrieved from the NASA/IPAC Infrared Science Archive^4 and co-added to increase their signal-to-noise ratio. In general, the “6×” co-added image was used, except for the gap region in the north of the surveyed field, where the “1×” image was substituted. The GALEX NUV and FUV images by Gil de Paz et al. (2006) were retrieved from the GALEX Atlas of Nearby Galaxies^5 and co-added to increase a signal-to-noise ratio. The Spitzer MIPS (24 μm) post-BCD (basic calibrated data) images of M31 (Program ID 99; PI: G. Rieke) were retrieved from the Spitzer Space Telescope Science Center Data Archive^6, and mosaicked using the SWarp^7 package (author E. Bertin).

The HI (21 cm) image was retrieved from the National Radio Astronomy Observatory image gallery^8 (image courtesy of NRAO/AUI and David Thilker [JHU], Robert Braun [AS- TRON], WSRT). It was converted from the TIFF to the FITS format using ImageTOOLSca^9. The sky coordinate grid indicated by Westmeier et al. (2005) in their Figure 1 on the same HI image, was used for the initial registration. Fine adjustments were made assuming a global correlation between the Spitzer (24 μm) and HI (21 cm) source distributions, noted by Gordon et al. (2006).

The Suprime-Cam V -band mosaic image coordinate system was used as a reference to register and transform all images to the homogeneous pixel scale of 0.2^{′′} pixel^{−1}. The IRAF’s

geotran procedure was used for the LGGS, GALEX, and 2MASS image transformations;

the wregister procedure was used for the Spitzer (24 μm) and HI (21 cm) images. Most

42MASS: http://irsa.ipac.caltech.edu/.

5GALEX: http://archive.stsci.edu/prepds/galex atlas/index.html.

6Spitzer: http://ssc.spitzer.caltech.edu/archanaly/.

7See http://terapix.iap.fr/.

8HI: http://www.nrao.edu/imagegallery/php/level3.php?id=475.

9See http://arnholm.org/software/index.htm.

– 10 –

defects were masked prior to transformations. Since the LGGS images cover a wide wavelength range, they served as a reference for registering other images. A visual inspection was carried out to ensure an accurate coordinate match of the images prepared for a multiband map production. The FWHM and original pixel scale values of those images are provided in Table 1.

The sub-images of 80^{′′}×80^{′′}, centered on the objects’ position, were cut out from the transformed images. SAOImage DS9 was employed to combine them into multiband color maps. The LGGS, 2MASS, and GALEX sub-images are displayed in a linear intensity scale, and the Spitzer sub-images are displayed in a square root scale. The minimal shown data level is individual for each sub-image, depending on the background intensity; however, the range of displayed intensities was kept constant for all objects. The constant displayed intensity limits across the surveyed area were applied only for HI (21 cm) sub-images and are overplotted with contour lines. A gray-shaded inset shows a global HI emission intensity, with black standing for the highest and white – for the lowest signal level over the survey area. Note, however, that the HI image is converted from the TIFF format and does not represent a real 21 cm emission distribution, serving for illustrative purposes only.

An example of the online multiband color maps and a layout template are shown in Figure 4. Since the displayed intensity range is kept constant for all objects, colors of individual objects are roughly preserved. However, the real emission level at 24 μm should be estimated by referencing the object’s position in the global Spitzer image of the survey field. Multiband maps for all 285 objects are provided in a Figure Set 4.001-4.285, published only in the electronic edition of the Journal.

REFERENCES

Barmby, P., Holland, S., & Huchra, J. P. 2002, AJ, 123, 1937

Barmby, P., McLaughlin, D. E., Harris, W. E., Harris, G. L. H., & Forbes, D. A. 2007, AJ, 133, 2764

Cohen, J. G., Matthews, K., & Cameron, P. B. 2005, ApJ, 634, L45

Fioc, M., & Rocca-Volmerange, B. 1997, A&A, 326, 950

Galleti, S., Federici, L., Bellazzini, M., Fusi Pecci, F., & Macrina, S. 2004, A&A, 416, 917

Galleti, S., Bellazzini, M., Federici, L., Buzzoni, A., & Fusi Pecci, F. 2007, A&A, 471, 127

Gil de Paz, A., et al. 2007, ApJS, 173, 185

– 11 –

Gordon, K. D., et al. 2006, ApJ, 638, L87 Kim, S. C., et al. 2007, AJ, 134, 706 Kodaira, K., Vansevičius, V., Bridžius, A., Komiyama, Y., Miyazaki, S., Stonkutė, R., Šablevičiūtė, I., & Narbutis, D. 2004, PASJ, 56, 1025 (Paper I) Krienke, O. K., & Hodge, P. W. 2007, PASP, 119, 7 Kroupa, P. 2002, Science, 295, 82 Larsen, S. S. 1999, A&AS, 139, 393 Massey, P., Olsen, K. A. G., Hodge, P. W., Strong, S. B., Jacoby, G. H., Schlingman, W., & Smith, R. C. 2006, AJ, 131, 2478 McConnachie, A. W., Irwin, M. J., Ferguson, A. M. N., Ibata, R. A., Lewis, G. F., & Tanvir, N. 2005, MNRAS, 356, 979 Miyazaki, S., et al. 2002, PASJ, 54, 833 Narbutis, D., Vansevičius, V., Kodaira, K., Šablevičiūtė, I., Stonkutė, R., & Bridžius, A.

2006, Baltic Astronomy, 15, 461 Narbutis, D., Stonkutė, R., & Vansevičius, V. 2006, Baltic Astronomy, 15, 471 Narbutis, D., Vansevičius, V., Kodaira, K., Bridžius, A., & Stonkutė, R. 2007, Baltic Astronomy, 16, 409 Šablevičiūtė, I., Vansevičius, V., Kodaira, K., Narbutis, D., Stonkutė, R., & Bridžius, A.

2006, Baltic Astronomy, 15, 547 Šablevičiūtė, I., Vansevičius, V., Kodaira, K., Narbutis, D., Stonkutė, R., & Bridžius, A.

2007, Baltic Astronomy, 16, 397 Schlegel, D. J., Finkbeiner, D. P., & Davis, M. 1998, ApJ, 500, 525 Stetson, P. B. 1987, PASP, 99, 191 Tody, D. 1993, Astronomical Data Analysis Software and Systems II, 52, 173 de Vaucouleurs, G. 1958, ApJ, 128, 465 Westmeier, T., Braun, R., & Thilker, D. 2005, A&A, 436, 101

This preprint was prepared with the AAS L^ATEX macros v5.2.

– 12 –

Table 1. Parameters of Original Images.

Source Images FWHM [^{′′}] Scale [^{′′}pixel^{−1}]

Suprime-Cam B, V , R, Hα 0.6–0.7 0.20 LGGS^a U, B, V , R, I, Hα 0.7–1.3 0.27 GALEX^b FUV, NUV ∼ 4.5, ∼ 5.5 1.50 2MASS J, H, K_s ∼ 3.5 1.00 Spitzer 24 μm ∼ 6.0 2.45 HI^c 21 cm · · · 10.3

aMosaic images of the F6–F9 fields.

bA strongly variable asymmetric PSF.

cA TIFF format image.

– 13 –

Table 2. UBV RI photometry data of the star cluster candidates in the M31 SW field.

ID^a α_{J2000} δ_{J2000} V^b U −B B−V V −R R−I σ_V σ_{U−B} σ_{B−V} σ_{V−R} σ_{R−I} n^c Ap^dHST^e CrossID^f

KW001 10.042834 40.607317 18.791 -0.259 0.295 0.306 0.450 0.012 0.022 0.022 0.016 0.025 3 3.2 W 1:BH02 KW002 10.044094 40.580988 19.963 0.197 0.636 0.473 0.524 0.016 0.027 0.025 0.022 0.028 3 3.0 W · · · KW003 10.045193 40.897594 19.575 -0.256 0.211 0.241 0.353 0.013 0.035 0.022 0.018 0.022 2 3.0 · · · · · · KW004 10.045684 40.603264 18.497 -0.419 0.203 0.222 0.268 0.013 0.031 0.017 0.017 0.017 3 3.0 W 2:37, 3:C01 KW005 10.049319 40.585042 19.467 -0.599 0.945 0.690 0.750 0.019 0.025 0.025 0.023 0.020 3 3.0 W · · · KW006 10.054298 40.605353 18.711 -0.231 0.283 0.284 0.429 0.013 0.023 0.021 0.021 0.026 3 3.4 W · · · KW007 10.054684 40.691637 20.513 0.124 0.618 0.510 0.651 0.028 0.031 0.037 0.037 0.047 2 3.0 · · · · · · KW008 10.056707 40.638101 19.640 -0.282 0.379 0.354 0.426 0.016 0.020 0.022 0.022 0.032 3 3.0 W · · · KW009 10.057000 40.767726 20.620 -0.362 0.331 0.837 1.527 0.030 0.029 0.038 0.037 0.026 2 3.0 W · · · KW010 10.057682 40.675488 20.114 0.285 0.801 0.593 0.837 0.019 0.037 0.031 0.030 0.030 2 3.6 · · · · · · KW011 10.059244 40.655842 18.783 -0.263 0.255 0.226 0.332 0.025 0.020 0.030 0.030 0.023 3 3.6 · · · 3:C02 KW012 10.059651 40.604218 19.863 0.084 0.287 0.219 0.240 0.016 0.033 0.034 0.026 0.032 3 3.0 W 2:44 KW013 10.060667 40.622445 18.562 -0.399 0.041 0.095 0.122 0.011 0.017 0.016 0.016 0.017 3 3.0 W 3:C03 KW014 10.061770 40.772343 20.357 -0.208 0.531 0.467 0.694 0.020 0.028 0.030 0.031 0.041 2 3.4 · · · · · · KW015 10.062032 40.757713 20.441 0.262 0.583 0.366 0.345 0.018 0.030 0.027 0.030 0.048 2 3.0 W · · · KW016 10.064046 40.615179 18.571 -0.215 0.308 0.262 0.405 0.025 0.039 0.030 0.027 0.017 3 3.2 W 1:SK043B, 3:C04 KW017 10.064532 40.666578 18.484 -0.269 0.303 0.286 0.387 0.011 0.016 0.016 0.016 0.016 3 3.4 · · · 1:B189D, 3:C05 KW018 10.064682 40.773154 19.800 0.074 0.603 0.469 0.535 0.016 0.027 0.025 0.025 0.026 2 3.0 · · · 1:SK078C KW019 10.065037 40.588203 20.126 0.112 0.365 0.279 0.434 0.016 0.031 0.029 0.024 0.042 3 3.0 W · · · KW020 10.065188 40.598566 20.333 0.178 0.693 0.464 0.513 0.019 0.040 0.036 0.027 0.036 3 3.4 W · · · KW021 10.066683 40.760506 20.316 -0.916 -0.032 0.056 -0.146 0.021 0.024 0.029 0.038 0.082 2 3.0 · · · · · · KW022 10.071942 40.651375 18.121 -0.431 0.119 0.159 0.235 0.011 0.020 0.021 0.016 0.022 3 3.6 · · · 1:B322, 3:C06 KW023 10.072371 40.791581 19.538 -0.113 0.449 0.447 0.841 0.015 0.025 0.024 0.022 0.023 2 3.6 · · · · · · KW024 10.072486 40.546082 20.335 -0.333 0.246 0.262 0.486 0.030 0.029 0.036 0.037 0.038 3 3.0 · · · · · · KW025 10.072892 40.580773 19.894 0.420 1.053 0.684 0.842 0.019 0.053 0.035 0.025 0.028 3 4.0 W · · · KW026 10.073128 40.655588 18.558 -0.290 0.078 0.117 0.171 0.012 0.021 0.021 0.017 0.019 3 3.0 · · · 3:C07 KW027 10.073624 40.552309 19.865 -0.149 0.328 0.314 0.479 0.017 0.026 0.027 0.024 0.034 3 3.0 · · · · · · KW028 10.076114 40.545728 18.562 0.114 0.413 0.293 0.386 0.013 0.017 0.018 0.018 0.021 3 3.6 · · · 1:B323, 3:C08 KW029 10.076494 40.661792 19.977 -0.409 -0.025 0.053 0.114 0.018 0.023 0.024 0.029 0.047 3 3.0 · · · · · · KW030 10.078454 40.520986 19.320 0.279 1.570 0.768 0.854 0.015 0.048 0.027 0.022 0.031 2 3.0 · · · 1:SK044B, 3:C09 KW031 10.078486 40.668040 18.491 -0.516 0.079 0.155 0.277 0.011 0.019 0.016 0.016 0.020 3 3.4 · · · · · · KW032 10.079443 40.635403 19.525 -0.172 0.438 0.405 0.575 0.013 0.021 0.021 0.019 0.021 3 3.0 · · · · · · KW033 10.080917 40.624806 18.688 -0.195 0.383 0.336 0.470 0.012 0.019 0.018 0.017 0.017 3 3.0 · · · 1:B442, 3:C10 KW034 10.081736 40.589773 20.542 -0.137 0.342 0.352 0.568 0.028 0.033 0.036 0.039 0.047 3 3.0 W · · · KW035 10.081742 40.711390 19.522 -0.206 0.265 0.257 0.371 0.014 0.022 0.020 0.026 0.032 2 3.0 · · · · · · KW036 10.082864 40.591933 19.476 -0.426 0.523 0.551 0.791 0.017 0.031 0.028 0.021 0.020 3 3.0 W · · · KW037 10.082959 40.513220 18.735 -0.180 0.160 0.140 0.171 0.012 0.020 0.020 0.020 0.021 2 3.4 · · · 3:C11 KW038 10.083860 40.509409 19.816 0.153 0.455 0.355 0.435 0.014 0.030 0.029 0.021 0.023 2 3.0 · · · · · · KW039 10.084620 40.732913 15.688 0.366 0.984 0.597 99.999 0.010 0.018 0.014 0.018 99.999 2 7.0 · · · 1:B005 KW040 10.086591 40.556094 18.933 -0.210 0.254 0.238 0.329 0.017 0.017 0.021 0.021 0.018 3 3.0 · · · 1:B443 KW041 10.087815 40.627581 20.416 -0.303 0.138 0.102 0.232 0.022 0.029 0.033 0.031 0.044 3 3.0 · · · · · · KW042 10.089288 40.620743 19.610 0.160 0.491 0.342 0.498 0.014 0.025 0.025 0.020 0.023 3 3.2 · · · · · · KW043 10.093248 40.637963 19.522 -0.329 0.379 0.395 0.550 0.014 0.020 0.021 0.020 0.020 3 3.0 · · · · · · KW044 10.096228 40.513202 17.471 0.003 0.681 0.463 0.543 0.016 0.016 0.019 0.019 0.015 2 6.8 · · · 1:B325, 3:C12 KW045 10.096736 40.621046 19.783 0.089 0.342 0.319 0.542 0.016 0.022 0.022 0.022 0.023 3 3.0 · · · · · · KW046 10.097930 40.649232 19.162 -0.410 0.243 0.228 0.408 0.014 0.023 0.020 0.020 0.022 3 3.2 · · · · · ·

– 14 –

Table 2—Continued

ID^a α_{J2000} δ_{J2000} V^b U −B B−V V −R R−I σ_V σ_{U−B} σ_{B−V} σ_{V−R} σ_{R−I} n^c Ap^dHST^e CrossID^f

KW047 10.098491 40.520264 19.921 -0.157 0.304 0.297 0.450 0.019 0.027 0.028 0.026 0.029 2 3.0 · · · · · · KW048 10.100420 40.606290 16.876 -0.491 0.212 0.281 0.448 0.010 0.022 0.014 0.014 0.015 3 4.4 · · · 1:B327 KW049 10.100878 40.533352 19.198 -0.326 0.124 0.158 0.157 0.013 0.030 0.029 0.020 0.024 3 3.0 · · · · · · KW050 10.101098 40.685456 19.818 -0.351 -0.004 0.057 0.062 0.017 0.023 0.025 0.030 0.045 2 3.0 · · · · · · KW051 10.101208 40.617240 20.514 -0.049 0.127 0.122 -0.032 0.028 0.028 0.035 0.046 0.080 3 3.0 · · · · · · KW052 10.101897 40.905033 20.000 -0.484 0.551 0.345 0.375 0.023 0.032 0.033 0.033 0.035 2 3.2 · · · · · · KW053 10.103406 40.812996 19.224 0.167 0.556 0.426 0.583 0.013 0.023 0.020 0.022 0.022 2 3.0 · · · 1:SK014A, 3:C14 KW054 10.103628 40.816919 19.689 0.227 0.794 0.580 0.661 0.018 0.033 0.030 0.027 0.026 2 3.0 · · · 3:C15 KW055 10.104183 40.554877 19.615 -0.340 0.116 0.118 0.170 0.016 0.023 0.023 0.028 0.035 3 3.0 · · · · · · KW056 10.105344 40.813521 19.331 0.158 0.589 0.420 0.587 0.014 0.021 0.021 0.020 0.022 2 3.6 · · · · · · KW057 10.108014 40.628148 19.320 0.169 1.160 0.777 0.834 0.013 0.032 0.029 0.017 0.020 3 3.0 · · · 3:C16 KW058 10.109058 40.758864 20.155 -0.057 0.505 0.474 0.798 0.021 0.029 0.029 0.030 0.029 2 3.0 W 1:SK015A KW059 10.110855 40.792590 19.254 0.134 0.550 0.436 0.689 0.013 0.022 0.022 0.021 0.021 2 3.0 · · · · · · KW060 10.111907 40.948786 19.837 -0.182 0.011 0.023 -0.024 0.022 0.030 0.031 0.034 0.045 1 3.0 · · · · · · KW061 10.112229 40.532622 19.951 0.177 0.728 0.554 0.804 0.019 0.039 0.032 0.025 0.025 3 3.0 · · · · · · KW062 10.113666 40.756774 18.727 -0.218 0.215 0.239 0.347 0.012 0.020 0.020 0.020 0.021 2 3.0 W 2:46, 3:C17 KW063 10.114264 40.734285 18.523 -1.080 -0.167 0.021 0.032 0.012 0.019 0.020 0.021 0.031 2 3.0 W 3:E09 KW064 10.114489 40.667752 19.901 -0.239 0.319 0.282 0.440 0.020 0.022 0.026 0.027 0.031 3 3.0 · · · · · · KW065 10.114689 40.511684 20.458 -0.005 0.311 0.251 0.116 0.024 0.048 0.044 0.036 0.049 2 3.0 · · · · · · KW066 10.115251 40.528377 19.549 -0.475 0.067 0.138 0.253 0.014 0.038 0.037 0.022 0.031 3 3.0 · · · · · · KW067 10.115544 40.772098 20.276 -0.190 1.152 0.792 0.942 0.021 0.079 0.076 0.031 0.029 2 3.0 W · · · KW068 10.117164 40.544111 20.416 0.186 0.417 0.273 0.359 0.028 0.037 0.037 0.035 0.036 3 3.0 · · · · · · KW069 10.118468 40.770439 20.088 -0.074 0.623 0.488 0.609 0.019 0.032 0.031 0.029 0.031 2 3.0 W · · · KW070 10.121350 40.858484 20.322 0.716 1.200 0.759 0.856 0.023 0.052 0.039 0.033 0.033 2 3.0 · · · · · · KW071 10.121597 40.624824 20.409 -0.322 0.249 0.221 0.335 0.029 0.039 0.038 0.045 0.062 3 3.0 · · · · · · KW072 10.122547 40.604198 15.288 -0.522 0.191 0.232 0.355 0.013 0.020 0.016 0.016 0.022 3 7.0 · · · 1:VDB0 KW073 10.122585 40.779680 20.393 -0.474 0.071 0.130 0.353 0.031 0.032 0.041 0.053 0.078 2 3.0 W · · · KW074 10.123130 40.689759 20.147 -0.068 0.623 0.510 0.796 0.017 0.039 0.026 0.027 0.030 2 3.0 · · · · · · KW075 10.123280 40.545685 20.124 0.101 0.524 0.353 0.456 0.020 0.031 0.029 0.029 0.036 3 3.0 · · · · · · KW076 10.123870 40.638422 20.309 0.236 0.538 0.393 0.527 0.022 0.033 0.030 0.030 0.033 3 3.0 · · · · · · KW077 10.124485 40.515316 20.516 0.240 0.505 0.381 0.505 0.024 0.056 0.037 0.038 0.042 2 3.0 · · · · · · KW078 10.127077 40.758183 16.387 -0.696 0.003 0.120 0.254 0.010 0.018 0.014 0.014 0.023 2 3.0 W 1:BH05 KW079 10.127645 40.748311 17.835 -0.846 -0.055 0.119 0.483 0.012 0.020 0.017 0.021 0.024 2 3.0 W 1:BH06 KW080 10.128343 40.708480 19.666 -1.154 0.146 0.628 -0.604 0.019 0.030 0.030 0.028 0.048 2 3.0 W 3:E11 KW081 10.128610 40.836477 20.220 0.272 0.673 0.523 0.651 0.023 0.031 0.031 0.030 0.032 2 3.0 · · · · · · KW082 10.128724 40.784160 19.422 -0.252 0.224 0.198 0.270 0.013 0.032 0.029 0.020 0.025 2 3.0 W · · · KW083 10.128995 40.712495 18.858 -1.047 -0.147 -0.066 -0.078 0.013 0.020 0.018 0.025 0.035 2 3.0 W · · · KW084 10.130689 40.752391 19.818 -0.905 -0.047 0.198 0.649 0.031 0.043 0.045 0.044 0.044 2 3.0 W 2:50 KW085 10.132159 40.517604 20.587 -0.034 0.327 0.437 0.948 0.022 0.035 0.035 0.034 0.032 2 3.0 · · · · · · KW086 10.133395 40.744845 19.180 -0.650 0.011 0.053 0.027 0.019 0.026 0.027 0.028 0.035 2 3.0 W 2:51 KW087 10.134043 40.774174 20.437 0.222 0.831 0.528 0.667 0.024 0.046 0.038 0.037 0.044 2 3.0 W · · · KW088 10.135427 40.857746 20.646 -1.006 0.007 0.505 -1.037 0.023 0.025 0.030 0.034 0.118 2 3.0 · · · 3:E16 KW089 10.135717 40.837140 19.140 -0.128 0.258 0.230 0.284 0.012 0.020 0.017 0.021 0.023 2 3.0 · · · 3:C18 KW090 10.135866 40.624524 19.979 -0.449 0.193 0.178 0.247 0.020 0.039 0.025 0.027 0.032 3 3.0 · · · · · · KW091 10.139704 40.721005 18.688 -0.917 -0.112 -0.004 0.037 0.015 0.022 0.021 0.023 0.031 2 3.0 W 2:53 KW092 10.140931 40.546191 19.461 -0.579 0.824 0.167 -0.522 0.016 0.028 0.027 0.026 0.047 3 3.6 · · · 3:E18

– 15 –

Table 2—Continued

ID^a α_{J2000} δ_{J2000} V^b U −B B−V V −R R−I σ_V σ_{U−B} σ_{B−V} σ_{V−R} σ_{R−I} n^c Ap^dHST^e CrossID^f

KW093 10.142016 40.721744 17.036 -0.641 0.556 0.407 0.442 0.011 0.021 0.016 0.015 0.023 2 3.0 W · · · KW094 10.143789 40.808330 20.148 -0.147 0.645 0.658 0.897 0.023 0.043 0.044 0.032 0.030 2 3.0 · · · · · · KW095 10.144465 40.594830 19.332 -0.774 0.464 0.562 0.067 0.016 0.026 0.022 0.022 0.027 3 3.0 · · · 3:E19 KW096 10.148474 40.930105 20.596 -0.067 0.839 0.670 0.781 0.033 0.044 0.046 0.044 0.042 1 3.0 · · · · · · KW097 10.149876 40.651920 19.560 -0.109 0.588 0.400 0.527 0.034 0.020 0.037 0.036 0.021 3 3.0 · · · 1:SK051B KW098 10.150477 40.621818 20.461 -0.783 0.041 0.089 0.115 0.022 0.024 0.029 0.036 0.052 3 3.0 · · · · · · KW099 10.151301 40.849434 19.733 0.236 0.774 0.526 0.566 0.015 0.026 0.025 0.023 0.023 2 3.0 · · · · · · KW100 10.152200 40.670904 19.026 0.029 0.636 0.460 0.568 0.016 0.019 0.021 0.020 0.017 3 3.0 · · · 1:B448, 3:C19 KW101 10.154751 40.556076 20.194 0.327 0.736 0.516 0.643 0.026 0.060 0.044 0.034 0.032 3 3.0 W 1:BH09 KW102 10.155186 40.654073 19.152 -0.076 0.671 0.456 0.585 0.019 0.019 0.023 0.022 0.019 3 3.4 · · · 3:C20 KW103 10.155619 40.812697 19.253 -0.152 0.300 0.239 0.288 0.013 0.021 0.022 0.022 0.027 2 3.0 · · · 1:B006D, 3:C21 KW104 10.155877 40.923688 19.642 0.912 1.611 1.057 1.255 0.024 0.052 0.038 0.032 0.030 1 3.0 · · · · · · KW105 10.158370 40.774675 20.487 -0.253 0.195 0.136 0.101 0.027 0.030 0.034 0.044 0.075 2 3.0 W · · · KW106 10.160499 40.748158 20.337 0.339 0.758 0.516 0.602 0.021 0.037 0.034 0.030 0.030 2 3.0 · · · · · · KW107 10.161471 40.528937 20.553 0.153 0.401 0.213 -0.060 0.022 0.032 0.032 0.043 0.080 3 3.0 · · · · · · KW108 10.163799 40.625910 20.089 -0.981 0.385 0.782 -0.331 0.020 0.029 0.033 0.024 0.029 3 3.2 · · · 3:E25 KW109 10.163812 40.581285 18.497 -0.156 0.631 0.427 0.493 0.011 0.019 0.017 0.016 0.016 3 3.0 W · · · KW110 10.164209 40.802038 20.169 0.179 0.608 0.345 0.180 0.019 0.041 0.039 0.031 0.055 2 3.4 · · · · · · KW111 10.172061 40.819370 20.224 -0.643 0.007 0.075 -0.014 0.020 0.023 0.025 0.033 0.057 2 3.0 · · · · · · KW112 10.173634 40.641151 18.726 0.509 1.218 0.753 0.889 0.013 0.025 0.019 0.017 0.016 3 3.4 · · · 1:B335, 3:C22 KW113 10.176121 40.601310 19.227 0.204 0.757 0.472 0.551 0.012 0.019 0.018 0.017 0.023 3 3.0 · · · 1:B449, 3:C23 KW114 10.176708 40.760944 19.928 0.560 1.262 0.821 1.087 0.018 0.049 0.040 0.025 0.023 2 3.0 · · · · · · KW115 10.178076 40.839455 20.103 -0.233 0.176 0.191 0.310 0.016 0.023 0.025 0.028 0.038 2 3.0 · · · · · · KW116 10.179689 40.830911 20.544 -0.899 0.004 0.164 0.194 0.028 0.025 0.035 0.041 0.057 2 3.0 · · · · · · KW117 10.182641 40.958843 20.265 -0.675 0.233 0.295 0.251 0.027 0.033 0.037 0.041 0.048 1 3.0 · · · · · · KW118 10.184256 40.754105 20.108 -1.064 -0.034 0.405 -0.793 0.016 0.030 0.025 0.028 0.076 2 3.0 · · · 3:E30 KW119 10.184457 40.567926 19.583 -0.231 0.511 0.410 0.598 0.014 0.020 0.021 0.020 0.021 3 3.0 · · · · · · KW120 10.185198 40.620481 19.679 0.444 1.167 0.755 0.923 0.013 0.028 0.022 0.018 0.017 3 3.0 · · · · · · KW121 10.186508 40.508358 19.959 0.166 0.750 0.527 99.999 0.014 0.027 0.023 0.026 99.999 2 3.2 · · · · · · KW122 10.187020 40.885639 19.810 0.283 0.652 0.444 0.666 0.016 0.036 0.034 0.023 0.052 2 3.0 W 1:BH10 KW123 10.192081 40.959220 19.902 -0.062 0.187 0.168 0.160 0.022 0.031 0.032 0.032 0.035 1 3.0 · · · · · · KW124 10.193355 40.861358 19.178 -0.191 0.389 0.319 0.435 0.013 0.021 0.022 0.020 0.023 2 3.2 · · · 3:C25 KW125 10.195821 40.682801 19.361 0.211 0.790 0.477 0.536 0.013 0.024 0.020 0.022 0.026 2 3.6 W 1:DAO38 KW126 10.198084 40.668783 20.351 -0.136 1.414 0.687 0.893 0.022 0.048 0.044 0.038 0.038 3 4.0 · · · · · · KW127 10.198833 40.632812 20.110 0.420 0.870 0.557 0.653 0.022 0.041 0.029 0.027 0.022 3 3.0 · · · · · · KW128 10.199074 40.985069 18.459 -1.351 0.401 0.291 -0.499 0.012 0.024 0.019 0.017 0.022 2 4.0 · · · 1:V203, 3:E33 KW129 10.199189 40.926257 19.706 -0.045 0.261 0.230 0.287 0.021 0.039 0.036 0.031 0.033 2 3.0 · · · 1:V202 KW130 10.200178 40.517261 19.787 0.194 0.716 0.453 0.528 0.014 0.025 0.024 0.021 0.026 2 3.0 · · · · · · KW131 10.200306 40.677835 20.196 0.378 0.958 0.617 0.902 0.020 0.040 0.034 0.028 0.029 2 4.0 · · · 1:SK088C KW132 10.201478 40.866229 18.619 -0.435 0.262 0.317 0.493 0.015 0.032 0.019 0.019 0.020 3 3.0 · · · 3:C27 KW133 10.201479 40.585044 18.412 -0.113 0.294 0.250 0.387 0.011 0.016 0.016 0.016 0.017 3 3.0 · · · 1:B452, 3:C26 KW134 10.202329 40.960126 19.282 0.259 0.548 0.390 0.573 0.013 0.022 0.019 0.019 0.022 2 3.0 · · · 3:C28 KW135 10.203616 40.565628 19.646 -0.229 0.269 0.283 0.433 0.017 0.025 0.026 0.025 0.027 3 3.0 · · · · · · KW136 10.204916 40.648672 19.671 0.064 0.455 0.312 0.406 0.014 0.020 0.021 0.021 0.031 3 3.0 · · · · · · KW137 10.205833 40.692273 18.282 0.260 0.804 0.502 0.622 0.011 0.020 0.019 0.015 0.019 2 3.4 W 1:B018, 3:C29 KW138 10.206908 40.890597 20.041 -0.351 0.051 0.094 0.312 0.021 0.022 0.027 0.032 0.059 3 3.0 · · · · · ·

– 16 –

Table 2—Continued

ID^a α_{J2000} δ_{J2000} V^b U −B B−V V −R R−I σ_V σ_{U−B} σ_{B−V} σ_{V−R} σ_{R−I} n^c Ap^d HST^e CrossID^f

KW139 10.211783 40.677370 20.463 0.536 1.044 0.643 0.798 0.021 0.064 0.032 0.032 0.036 2 3.0 W 1:BH11 KW140 10.214572 40.557683 19.300 0.169 0.655 0.447 0.687 0.015 0.026 0.021 0.020 0.025 3 3.2 · · · 1:B198D, 3:C30 KW141 10.215041 40.735078 17.985 -0.448 0.740 0.669 1.114 0.011 0.019 0.019 0.015 0.019 2 4.2 W 1:B011D, 3:C31 KW142 10.217001 40.583774 19.985 -0.139 0.403 0.334 0.494 0.018 0.027 0.029 0.030 0.034 3 3.0 W · · · KW143 10.217610 40.534843 20.585 0.042 0.366 0.236 0.358 0.021 0.046 0.030 0.041 0.047 3 3.0 · · · · · · KW144 10.217733 40.978228 19.444 0.236 0.623 0.449 0.568 0.013 0.035 0.022 0.018 0.019 2 3.0 · · · 1:B012D, 3:C33 KW145 10.217768 40.898999 19.287 0.407 0.937 0.568 0.662 0.012 0.025 0.019 0.017 0.018 3 3.2 · · · 1:B246, 3:C32 KW146 10.220359 40.868819 20.292 0.349 0.847 0.552 0.686 0.017 0.030 0.027 0.026 0.030 3 3.0 · · · · · · KW147 10.220614 40.588774 18.883 0.278 0.875 0.580 0.690 0.013 0.025 0.021 0.021 0.020 3 4.4 W 2:74, 3:C34 KW148 10.220852 40.538287 19.640 -0.883 0.217 0.568 0.095 0.014 0.019 0.020 0.020 0.020 3 3.0 · · · 3:E35 KW149 10.221971 40.732549 20.285 -0.346 0.570 0.307 0.232 0.021 0.035 0.034 0.033 0.058 2 3.0 W 2:75 KW150 10.222354 40.827422 20.577 0.434 1.391 0.752 0.865 0.019 0.047 0.038 0.026 0.028 3 3.0 · · · · · · KW151 10.223014 40.718869 20.596 0.331 0.643 0.529 0.682 0.020 0.035 0.029 0.028 0.032 2 3.0 W 2:76 KW152 10.223746 40.614171 20.354 0.246 0.928 0.595 0.655 0.038 0.038 0.045 0.042 0.029 3 3.0 W 2:77 KW153 10.224476 40.671365 20.480 0.191 0.447 0.239 0.154 0.021 0.030 0.031 0.038 0.069 3 3.0 W 2:78 KW154 10.228397 40.592104 19.799 -0.010 0.429 0.327 0.378 0.020 0.025 0.026 0.027 0.035 3 3.0 W 2:79, 2:80 KW155 10.228465 40.738911 20.106 0.205 0.744 0.465 0.562 0.017 0.027 0.025 0.025 0.031 2 3.0 · · · · · · KW156 10.230713 40.622441 20.550 0.026 0.573 0.435 0.697 0.019 0.028 0.028 0.029 0.032 3 3.0 · · · · · · KW157 10.232157 40.589603 20.103 -0.408 0.135 0.220 0.438 0.018 0.037 0.025 0.028 0.038 3 3.0 W 2:81 KW158 10.233583 40.706303 20.060 0.241 0.769 0.532 0.778 0.016 0.029 0.025 0.023 0.026 2 3.0 W · · · KW159 10.234748 40.578257 20.204 -0.017 0.397 0.293 0.493 0.019 0.027 0.027 0.030 0.042 3 3.0 W 2:83 KW160 10.236023 40.573705 19.473 -0.093 0.312 0.257 0.310 0.013 0.019 0.020 0.020 0.023 3 3.0 W 2:85 KW161 10.237263 40.609178 20.533 0.490 1.062 0.663 0.942 0.021 0.063 0.039 0.028 0.027 3 3.0 W 2:87 KW162 10.238067 40.587143 20.372 -0.326 0.261 0.240 0.224 0.021 0.029 0.031 0.035 0.057 3 3.0 W 2:88 KW163 10.238529 40.602163 19.722 -1.147 0.443 0.837 -0.145 0.016 0.025 0.024 0.021 0.028 3 3.0 W 3:E37 KW164 10.239532 40.740927 19.079 0.388 1.273 0.812 0.857 0.012 0.022 0.019 0.020 0.020 2 3.0 · · · 3:C35 KW165 10.239760 40.548735 19.803 -0.290 0.308 0.315 0.483 0.018 0.022 0.024 0.025 0.028 3 3.0 · · · · · · KW166 10.240497 40.572721 19.767 -0.451 0.025 0.090 0.272 0.015 0.025 0.021 0.026 0.035 3 3.0 W 2:93 KW167 10.242480 40.822994 19.969 0.061 0.364 0.320 0.338 0.016 0.021 0.023 0.024 0.036 3 3.0 · · · · · · KW168 10.243214 40.890785 20.425 0.019 1.421 0.728 0.982 0.020 0.056 0.040 0.029 0.030 3 3.0 · · · · · · KW169 10.243519 40.609815 19.084 -0.261 0.425 0.390 0.624 0.015 0.019 0.020 0.020 0.019 3 3.0 · · · · · · KW170 10.245036 40.573454 19.583 -0.144 0.317 0.337 0.506 0.014 0.021 0.021 0.020 0.021 3 3.0 W 2:97 KW171 10.245314 40.596664 14.259 0.122 0.808 0.505 99.999 0.010 0.014 0.014 0.022 99.999 3 10.0 W 1:B338 KW172 10.245397 40.718050 20.188 0.889 1.558 0.922 1.022 0.019 0.066 0.053 0.024 0.022 2 4.0 W · · · KW173 10.246629 40.584500 19.838 -0.182 0.345 0.302 0.361 0.016 0.032 0.024 0.024 0.037 3 3.0 W 2:100 KW174 10.247275 40.565062 20.288 0.058 0.339 0.288 0.491 0.022 0.031 0.031 0.035 0.041 3 3.0 · · · · · · KW175 10.249220 40.608032 19.908 -0.946 0.064 0.122 -0.082 0.016 0.024 0.024 0.029 0.050 3 3.0 · · · · · · KW176 10.251109 40.574466 19.989 -0.042 0.901 0.598 0.786 0.016 0.035 0.025 0.022 0.021 3 3.0 W · · · KW177 10.260625 40.840829 20.408 -0.090 0.309 0.312 0.428 0.021 0.025 0.029 0.038 0.051 3 3.0 · · · · · · KW178 10.260707 40.804317 19.365 0.498 1.672 0.794 0.846 0.013 0.038 0.026 0.019 0.023 3 3.6 · · · 1:SK092C KW179 10.260999 40.578872 19.587 -0.139 0.171 0.185 0.386 0.017 0.039 0.024 0.026 0.029 3 3.0 W 2:113 KW180 10.261423 40.564231 19.404 -0.182 0.250 0.257 0.354 0.013 0.019 0.019 0.020 0.023 3 3.2 · · · · · · KW181 10.261856 40.696440 20.364 0.237 0.720 0.460 0.647 0.019 0.027 0.027 0.028 0.033 2 3.0 · · · · · · KW182 10.262026 40.582932 18.804 -0.223 0.240 0.239 0.344 0.012 0.017 0.017 0.023 0.023 3 3.0 W 1:BH12 KW183 10.262293 40.943278 20.384 0.559 1.164 0.653 0.697 0.021 0.053 0.034 0.030 0.036 2 3.0 · · · · · · KW184 10.265131 40.929020 20.307 0.349 0.885 0.553 0.719 0.021 0.034 0.031 0.029 0.032 2 3.0 · · · · · ·

– 17 –

Table 2—Continued

ID^a α_{J2000} δ_{J2000} V^b U −B B−V V −R R−I σ_V σ_{U−B} σ_{B−V} σ_{V−R} σ_{R−I} n^c Ap^dHST^e CrossID^f

KW185 10.266634 40.539275 20.004 0.177 0.564 0.482 1.011 0.021 0.026 0.027 0.027 0.024 3 3.6 · · · · · · KW186 10.268358 40.664087 20.215 0.238 0.568 0.366 0.495 0.016 0.026 0.023 0.025 0.035 3 3.0 · · · · · · KW187 10.268969 40.578992 19.243 -0.501 0.234 0.305 0.475 0.013 0.018 0.019 0.018 0.019 3 3.0 · · · · · · KW188 10.271079 40.757788 20.259 0.140 0.644 0.427 0.545 0.026 0.031 0.034 0.037 0.040 2 3.0 · · · · · · KW189 10.272325 40.858677 19.936 -0.169 0.247 0.201 0.360 0.016 0.030 0.022 0.024 0.033 3 3.0 · · · · · · KW190 10.272486 40.583171 18.745 -0.375 0.229 0.289 0.501 0.013 0.017 0.017 0.017 0.016 3 3.0 · · · · · · KW191 10.274384 40.899863 19.984 0.125 0.502 0.405 0.453 0.020 0.028 0.027 0.029 0.037 3 3.4 · · · · · · KW192 10.275912 40.615670 20.309 -0.167 0.465 0.341 0.474 0.022 0.031 0.034 0.031 0.037 3 3.0 · · · · · · KW193 10.276009 40.603827 20.227 0.025 0.229 0.178 0.241 0.025 0.047 0.033 0.037 0.047 3 3.0 · · · · · · KW194 10.278571 40.574739 19.146 -0.223 0.313 0.286 0.379 0.012 0.026 0.018 0.018 0.026 3 3.0 · · · 1:B200D, 3:C36 KW195 10.280424 40.906253 20.343 0.192 0.587 0.335 0.156 0.021 0.030 0.031 0.035 0.056 3 3.6 · · · · · · KW196 10.283061 40.883640 18.698 0.237 0.947 0.585 0.613 0.015 0.019 0.020 0.019 0.021 3 3.0 · · · 1:B248, 3:C37 KW197 10.283193 40.812401 20.385 -0.037 0.543 0.398 0.540 0.021 0.028 0.029 0.030 0.034 3 3.0 · · · · · · KW198 10.284429 40.547855 19.056 0.159 0.611 0.492 0.672 0.012 0.018 0.018 0.017 0.016 3 4.0 · · · 1:B201D KW199 10.288141 40.598100 16.567 0.270 0.898 0.562 0.615 0.011 0.024 0.015 0.015 0.014 3 5.2 · · · 1:B341 KW200 10.291607 40.969815 19.010 0.251 0.725 0.459 0.585 0.012 0.019 0.018 0.017 0.025 2 3.0 · · · 1:B017D, 3:C38 KW201 10.291765 40.533081 20.573 0.072 0.279 0.206 0.315 0.019 0.027 0.029 0.032 0.039 3 3.0 · · · · · · KW202 10.296751 40.697354 20.480 -0.186 0.178 0.142 0.267 0.023 0.026 0.031 0.043 0.060 2 3.0 · · · · · · KW203 10.297747 40.805569 19.058 -0.393 0.271 0.344 0.635 0.013 0.031 0.018 0.018 0.018 3 3.0 · · · · · · KW204 10.298723 40.588541 20.321 -0.065 0.359 0.262 0.398 0.021 0.032 0.032 0.034 0.052 2 3.0 · · · · · · KW205 10.299204 40.738821 20.569 0.252 0.768 0.462 0.378 0.025 0.036 0.037 0.036 0.064 2 3.0 · · · · · · KW206 10.299839 40.963784 20.412 0.262 0.776 0.510 0.821 0.020 0.041 0.029 0.029 0.033 2 3.0 · · · · · · KW207 10.302041 40.673833 20.195 0.224 0.786 0.542 0.800 0.019 0.031 0.030 0.028 0.027 2 3.0 · · · · · · KW208 10.303265 40.571554 18.102 -0.165 0.255 0.267 0.520 0.011 0.019 0.019 0.019 0.022 2 3.6 · · · 1:G085, 3:C39 KW209 10.304612 40.647583 20.563 0.217 0.465 0.287 0.390 0.018 0.030 0.027 0.029 0.050 2 3.0 A · · · KW210 10.307544 40.566140 18.313 -0.159 0.230 0.214 0.308 0.011 0.016 0.016 0.019 0.025 2 3.6 · · · 1:V014, 3:C40 KW211 10.310518 40.930886 15.695 0.155 0.839 0.538 99.999 0.010 0.019 0.018 0.018 99.999 2 8.0 W 1:B027 KW212 10.314922 40.818686 19.906 -0.388 0.042 0.033 -0.049 0.016 0.022 0.022 0.027 0.046 3 3.0 · · · · · · KW213 10.317812 40.868973 20.281 0.054 0.417 0.288 0.353 0.017 0.025 0.026 0.027 0.041 3 3.0 · · · · · · KW214 10.318702 40.984344 16.971 0.101 0.778 0.516 0.593 0.010 0.029 0.018 0.018 0.022 2 6.4 · · · 1:B028 KW215 10.318876 40.650869 19.069 -0.329 0.258 0.181 0.320 0.012 0.017 0.017 0.017 0.029 2 3.0 A · · · KW216 10.319850 40.807304 20.562 0.110 0.294 0.194 -0.082 0.027 0.027 0.033 0.043 0.084 3 3.0 · · · · · · KW217 10.323727 40.729072 20.248 0.181 0.518 0.399 0.552 0.021 0.026 0.028 0.030 0.037 2 3.0 · · · · · · KW218 10.324434 40.726544 20.487 -0.562 1.003 0.660 0.615 0.022 0.049 0.037 0.032 0.035 2 3.0 · · · 1:SK023A KW219 10.325588 40.733722 19.187 0.226 0.542 0.362 0.515 0.012 0.021 0.021 0.018 0.022 2 3.2 · · · 3:C41 KW220 10.326650 40.650434 19.156 -0.364 0.531 0.483 0.716 0.013 0.022 0.020 0.022 0.027 2 3.0 A · · · KW221 10.328017 40.954437 17.676 0.847 1.438 0.831 0.911 0.010 0.021 0.019 0.018 0.020 2 4.0 W 1:B030, 3:C42 KW222 10.328305 40.602414 20.129 0.449 0.846 0.564 0.755 0.018 0.053 0.047 0.028 0.029 2 4.4 W 2:127 KW223 10.329911 40.751170 18.912 0.245 0.967 0.585 0.696 0.016 0.019 0.021 0.023 0.020 2 3.4 · · · 1:SK077B KW224 10.335542 40.607217 20.567 -0.324 0.059 0.080 0.004 0.021 0.023 0.027 0.035 0.064 2 3.0 W 2:129 KW225 10.337147 40.984619 18.108 0.600 1.185 0.685 0.764 0.011 0.021 0.016 0.015 0.019 2 3.4 · · · 1:B031, 3:C43 KW226 10.337538 40.737319 20.156 0.201 0.530 0.436 0.632 0.016 0.026 0.026 0.026 0.027 2 3.0 · · · · · · KW227 10.337729 40.703663 19.922 0.163 0.597 0.396 0.619 0.018 0.024 0.024 0.025 0.026 2 3.0 · · · · · · KW228 10.340206 40.684549 19.515 -0.049 0.472 0.348 0.427 0.017 0.023 0.023 0.022 0.024 2 3.0 · · · · · · KW229 10.342502 40.832947 20.421 0.399 1.051 0.660 0.831 0.017 0.031 0.028 0.024 0.026 3 3.0 · · · 1:SK025A KW230 10.346623 40.737447 20.572 0.182 0.453 0.317 0.388 0.028 0.034 0.038 0.042 0.050 2 3.0 · · · · · ·

– 18 –

Table 2—Continued

ID^a α_{J2000} δ_{J2000} V^b U −B B−V V −R R−I σ_V σ_{U−B} σ_{B−V} σ_{V−R} σ_{R−I} n^c Ap^dHST^e CrossID^f

KW231 10.347251 40.632507 20.457 0.156 0.423 0.340 0.506 0.025 0.031 0.032 0.035 0.049 2 3.0 A 2:135 KW232 10.350351 40.613058 18.689 -0.217 0.143 0.139 0.224 0.016 0.020 0.023 0.020 0.034 2 4.0 W 1:B342, 3:C44 KW233 10.353653 40.755618 20.091 0.324 0.707 0.404 0.450 0.017 0.029 0.028 0.025 0.031 2 3.0 · · · 1:SK027A KW234 10.354185 40.879399 20.617 0.322 0.849 0.482 0.527 0.021 0.032 0.032 0.032 0.039 3 3.0 W · · · KW235 10.355823 40.514885 20.292 0.446 1.705 0.870 0.897 0.024 0.048 0.039 0.032 0.030 1 3.4 · · · 1:SK078B KW236 10.358149 40.560832 20.491 0.163 0.438 0.322 0.475 0.021 0.027 0.030 0.035 0.038 2 3.0 · · · · · · KW237 10.358338 40.588542 18.060 0.280 0.904 0.484 0.560 0.011 0.020 0.019 0.015 0.015 2 4.0 · · · 1:B203D KW238 10.360732 40.575055 19.364 -1.056 -0.144 -0.019 -0.114 0.017 0.020 0.021 0.024 0.030 2 3.0 · · · · · · KW239 10.362036 40.785281 20.471 -0.331 0.729 0.668 0.902 0.032 0.031 0.041 0.037 0.033 3 3.0 · · · 1:SK079B KW240 10.362442 40.693716 19.216 -0.054 0.434 0.338 0.446 0.013 0.029 0.026 0.021 0.030 2 3.0 · · · 1:SK080B, 3:C45 KW241 10.363461 40.782934 20.284 0.189 0.345 0.255 0.451 0.026 0.032 0.034 0.039 0.048 3 3.4 · · · · · · KW242 10.365117 40.803639 20.154 0.136 0.520 0.571 1.156 0.020 0.027 0.028 0.030 0.028 3 3.0 · · · · · · KW243 10.365311 40.676269 20.014 0.124 0.554 0.330 0.362 0.016 0.023 0.023 0.026 0.041 2 3.2 · · · · · · KW244 10.367149 40.897206 15.498 0.392 0.946 0.571 99.999 0.010 0.014 0.014 0.014 99.999 3 8.0 · · · 1:B034 KW245 10.372803 40.754689 19.732 0.157 0.396 0.278 0.452 0.015 0.024 0.024 0.025 0.030 2 3.0 · · · 1:DAO47 KW246 10.373172 40.832824 20.499 0.377 0.992 0.708 0.994 0.021 0.037 0.035 0.028 0.024 3 3.0 · · · · · · KW247 10.374923 40.640602 20.178 -0.263 0.258 0.287 0.557 0.017 0.024 0.023 0.027 0.035 2 3.0 · · · · · · KW248 10.376253 40.809082 20.448 0.192 0.209 0.090 0.099 0.022 0.032 0.034 0.041 0.066 3 3.0 · · · · · · KW249 10.378169 40.966970 19.136 0.292 1.434 0.780 0.950 0.014 0.028 0.024 0.019 0.019 2 5.0 W · · · KW250 10.378823 40.652302 20.254 0.215 0.760 0.478 0.623 0.017 0.034 0.031 0.024 0.030 2 3.0 · · · 1:SK098C KW251 10.379814 40.770182 19.463 0.155 0.305 0.209 0.262 0.013 0.022 0.019 0.023 0.028 3 3.0 · · · · · · KW252 10.382167 40.670940 20.522 -0.020 0.766 0.555 0.782 0.021 0.031 0.031 0.031 0.029 2 3.4 · · · · · · KW253 10.382816 40.748459 20.512 0.112 0.245 0.140 0.339 0.021 0.027 0.030 0.038 0.062 2 3.0 · · · · · · KW254 10.385014 40.817908 20.298 0.250 0.778 0.476 0.468 0.019 0.031 0.029 0.029 0.034 3 3.4 · · · · · · KW255 10.386049 40.790661 20.508 0.244 0.505 0.369 0.675 0.021 0.040 0.040 0.032 0.037 3 3.4 · · · · · · KW256 10.387682 40.656600 20.300 -0.131 0.366 0.286 0.586 0.020 0.026 0.029 0.033 0.037 2 3.0 · · · · · · KW257 10.388505 40.745833 20.572 0.268 0.686 0.504 0.752 0.027 0.042 0.041 0.040 0.042 2 3.0 · · · · · · KW258 10.389102 40.922379 20.481 0.247 1.525 0.917 1.010 0.023 0.069 0.066 0.028 0.023 2 3.2 · · · · · · KW259 10.389519 40.662337 20.295 0.106 0.330 0.180 0.140 0.019 0.027 0.028 0.033 0.047 2 3.0 · · · · · · KW260 10.389539 40.619104 19.726 -0.013 0.231 0.179 0.229 0.013 0.019 0.020 0.020 0.028 2 3.0 · · · · · · KW261 10.389918 40.821267 20.533 0.051 1.351 0.756 0.821 0.026 0.068 0.049 0.035 0.034 3 3.6 · · · · · · KW262 10.391737 40.638352 20.241 0.179 0.421 0.238 0.266 0.019 0.029 0.027 0.029 0.038 2 3.4 · · · · · · KW263 10.391747 40.706410 20.203 0.356 0.887 0.572 0.816 0.016 0.034 0.029 0.032 0.046 2 3.0 · · · 1:SK030A KW264 10.393275 40.870829 19.964 0.159 0.425 0.353 0.519 0.017 0.030 0.028 0.034 0.038 3 3.0 · · · · · · KW265 10.394927 40.873771 20.131 -0.110 0.623 0.531 0.690 0.019 0.028 0.027 0.027 0.029 3 3.0 · · · · · · KW266 10.395846 40.763424 19.814 0.220 0.677 0.425 0.507 0.015 0.023 0.022 0.022 0.041 2 3.0 · · · · · · KW267 10.398285 40.927451 19.739 0.430 1.859 0.831 0.839 0.015 0.039 0.029 0.023 0.025 2 3.0 W · · · KW268 10.398552 40.971065 20.399 0.118 0.765 0.517 0.546 0.022 0.033 0.034 0.032 0.036 2 3.0 · · · · · · KW269 10.399226 40.583480 20.532 -0.144 1.057 0.631 0.882 0.017 0.034 0.031 0.023 0.024 2 3.0 · · · · · · KW270 10.402374 40.963358 19.779 0.182 0.346 0.234 0.345 0.015 0.020 0.021 0.026 0.035 2 3.0 · · · · · · KW271 10.403081 40.789778 19.021 0.133 0.902 0.578 0.736 0.012 0.020 0.018 0.017 0.026 3 3.0 · · · 1:G099 KW272 10.403145 40.846700 20.266 0.398 1.219 0.797 0.975 0.021 0.048 0.037 0.028 0.024 3 3.0 · · · · · · KW273 10.403635 40.790430 18.731 0.191 0.470 0.332 0.415 0.013 0.018 0.019 0.018 0.019 3 3.0 · · · 1:G099, 3:C46 KW274 10.404677 40.946935 20.517 0.412 1.373 0.651 0.633 0.027 0.059 0.055 0.038 0.045 2 3.4 · · · · · · KW275 10.405306 40.680437 20.142 0.212 0.468 0.293 0.366 0.016 0.032 0.026 0.026 0.029 2 3.0 · · · · · · KW276 10.405555 40.889606 20.440 -0.013 0.272 0.217 0.305 0.022 0.025 0.029 0.035 0.046 3 3.0 W · · ·

– 19 –

Table 2—Continued

ID^a α_{J2000} δ_{J2000} V^b U −B B−V V −R R−I σ_V σ_{U−B} σ_{B−V} σ_{V−R} σ_{R−I} n^c Ap^dHST^e CrossID^f

KW277 10.406892 40.810644 20.359 0.350 0.872 0.599 0.848 0.020 0.039 0.036 0.027 0.028 3 3.6 · · · · · · KW278 10.408178 40.794982 19.757 0.261 0.516 0.393 0.589 0.018 0.034 0.027 0.029 0.030 3 3.0 · · · · · · KW279 10.408569 40.569612 18.947 -0.257 0.612 0.392 0.599 0.011 0.028 0.017 0.021 0.024 2 3.0 · · · 1:B205D, 3:C47 KW280 10.410253 40.974239 19.647 0.356 0.823 0.447 0.440 0.026 0.031 0.035 0.035 0.044 2 3.6 · · · 1:SK032A KW281 10.410497 40.826785 19.296 0.287 0.509 0.329 0.357 0.014 0.023 0.019 0.019 0.020 3 3.0 A 3:C48 KW282 10.411205 40.733145 18.791 -1.144 0.022 0.502 -0.385 0.012 0.031 0.020 0.016 0.021 2 3.6 · · · 1:SK083B, 3:E52 KW283 10.411669 40.799712 20.229 0.486 1.439 0.746 0.877 0.018 0.047 0.034 0.025 0.026 3 3.6 A · · · KW284 10.411797 40.681812 18.111 -0.213 0.270 0.239 0.307 0.011 0.032 0.019 0.015 0.015 2 3.0 · · · 1:B040, 3:C49 KW285 10.415594 40.942668 19.605 0.368 1.651 0.744 0.809 0.015 0.033 0.028 0.023 0.025 2 3.6 · · · 1:SK099C

Note. — R.A. and Decl. (J2000) coordinates of aperture centers are in the USNO-B1.0 catalogue system (degrees). An entry “99.999” is for R−I and σ_{R−I} of 5 objects saturated in the I-band images.

aID number of the star cluster candidate.

bAperture magnitude (note, it is not a total magnitude).

cNumber of independent measurements in the LGGS fields F6–F9.

dDiameter of circular aperture or major axis length of elliptical aperture (arc-seconds). Elliptical apertures (ratio of minor to major axis; position angle of the major axis, calculated counterclockwise from the North direction) are used for objects KW102 (0.75; 120^∘) and KW141 (0.70; 30^∘).

eIdentification of 77 objects in the HST instrument frames: W – WFPC2 (71), A – ACS (6).

f Cross identifications “catalog:id”. (1) – The Revised Bologna Catalogue of M31 globular clusters and candidates v.3.2, July 2007 (Galleti et al. 2007) – 69 objects. KW128 is identified with V203 and KW129 – with V202, however, coordinates are offset; KW271 and KW273 are identified as one object – G099. (2) – Krienke & Hodge (2007) “KHM31” numbers are given only for 24 objects not listed in (1). KW154 has two identifications: KHM31-79 and KHM31-80. (3) – Kodaira et al. (2004) “KWC” and “KWE” numbers are given for 58 objects. KW063 is identified with KWE09 and KW095 – with KWE19, however, center coordinates and apertures are slightly different.

– 20 –

Fig. 1.— Star cluster candidates (285 objects) in the M31 SW field are overlaid on the Spitzer (24 μm) image. Circle size corresponds to the V -band magnitude, and circle color represents the observed B−V (see the color bar for coding). Elliptical ring segments, indicating distances from the M31 center (6 – 18 kpc), are marked with dashed lines. The rectangle (dotted line) indicates the Suprime-Cam survey area. North is up, east is left.

– 21 –

Fig. 2.— Global characteristics of the star cluster candidate catalog (285 objects). Panels show (a) the photometric errors, σ_V , vs. V -band magnitudes (we adopted the lowest possible error of σ_V = 0.01 mag); (b) the observed V -band magnitude histogram (an object selection criterion is V ≲ 20.5 mag); (c) the observed B−V color histogram. Gray-shaded histograms are constructed for a sub-sample of 77 objects, located in the HST frames.

– 22 –

Fig. 3.— Observed color-color diagrams of 285 catalog objects (circles). PÉGASE SSP models of Z = 0.008 and ages ranging from 1 Myr to 15 Gyr are marked with solid lines. The reddening vectors of E(B−V ) = 0.5, corresponding to the standard extinction law, are indicated.

– 23 –

Fig. 4.— An example of multiband maps (top) and a corresponding layout template (bottom), indicating panel notations, is shown here as a guide to the individual multiband color maps, constructed for all objects, available in the electronic edition of the Supplement. The object’s ID, the V -band magnitude, and the B−V color are provided in the top-left corner. Panel a shows positions of 285 objects in the M31 SW field (circles); elliptical ring segments indicating distances from the M31 center (6 – 18 kpc) are marked with dashed lines overlaid on the Spitzer (24 μm) image; the object under consideration is indicated by a red square of a size equivalent to the size of panels c-f. In panels b-f of the layout template, passbands of images displayed in red, green, and blue color channels are indicated by corresponding colors. The LGGS images were used in panels as follows: (b-d) U, B, V , I, Hα bands of the original resolution; (e) the V -band of a homogenized PSF (FWHM = 1.5^{′′}); (f) the V and I bands of a homogenized PSF (FWHM = 3.5^{′′}) matching the PSF of 2MASS images. Contour lines in panel e) emphasize the HI distribution; the gray-shaded inset shows a global 21 cm emission intensity, black standing for the highest and white for the lowest signal level over the entire surveyed area. The size of panel b is 15^{′′}×15^{′′}, and the size of panels c-f is 80^{′′}×80^{′′}. The aperture used for the photometry is overlaid in panel b. The object in panels c-f is marked with a circle of 10^{′′} in diameter. North is up, east is left. [See the electronic edition of the Supplement for figures 4.1 – 4.285.]