arXiv:0710.4206v1 [nucl-ex] 23 Oct 2007

Measurement of^{25}Mg(p, γ)^{26}Al resonance strengths via gamma spectrometry

A Formicola^1, A Best^2, G Imbriani^3, M Junker^1, D Bemmerer^4, R Bonetti^5, C Broggini^6, A Caciolli^6, F Confortola^7, P Corvisiero^7, H Costantini^7, Z Elekes^8, Zs Fulop^8, G Gervino^9, A Guglielmetti^5, Gy Gyürky^8, C Gustavino^1, A Lemut^7, B Limata^{10}, M Marta^4, C Mazzocchi^5, R Menegazzo^6, P Prati^7, V Roca^{10}, C Rolfs^2, C Rossi Alvarez^6, E Somorjai^8, O Straniero^3, F Strieder^2, F Terrasi^{10}, H P Trautvetter^2

1 Laboratori Nazionali del Gran Sasso, INFN, Assergi Italy 2 Insitut für Physik mit Ionenstrahlen, Ruhr-Universität-Bochum, Bochum Germany 3 Osservatorio Astronomico di Collurania, Teramo and INFN Sezione di Napoli, Italy 4 Forschungszentrum Dresden-Rossendorf, Dresden, Germany 5 Istituto di Fisica Generale Applicata, Università di Milano and INFN Sezione di Milano, Italy 6 Istituto Nazionale di Fisica Nucleare (INFN), Sezione di Padova, Italy 7 Università di Genova and INFN Sezione di Genova,Genova Italy 8 Institue of Nuclear Research (ATOMKI),Debrecen,Hungary 9 Dipartimento di Fisica Sperimentale, Università di Torino and IFNN Sezione di Torino, Torino Italy 10 Dipartimento di Scienze Fisiche, Università Napoli ”Federico II” and INFN Sezione di Napoli, Napoli, Italy

E-mail: formicola@lngs.infn.it

Abstract. The COMPTEL instrument performed the first mapping of the 1.809 MeV photons in the Galaxy, triggering considerable interest in determing the sources of interstellar^{26}Al. The predicted^{26}Al is too low compared to the observation, for a better understanding more accurate rates for the^{25}Mg(p, γ)^{26} Al reaction are required.

The^{25}Mg(p, γ)^{26}Al reaction has been investigated at the resonances at E_r‡= 745, 418, 374, 304 keV at Ruhr-Universität-Bochum using a Tandem accelerator and a 4π NaI detector. In addition the resonance at E_r = 189 keV has been measured deep underground laboratory at Laboratori Nazionali del Gran Sasso, exploiting the strong suppression of cosmic background. This low resonance has been studied with the 400 kV LUNA accelerator and a HPGe detector. The preliminary results of the resonance strengths will be reported.

1. The^{25}Mg(p, γ)^{26}Al reaction

The^{25}Mg(p, γ)^{26}Al is the slowest reaction of the Mg-Al cycle. The^{26}Al ground state (T_{1/2} = 7∗10^5 yr) decays via β^+ and EC to the the 2^+ first excited state of^{26}Mg. This

‡ As a general notation in this work, E_r is the resonance energy in the center of mass system.

Figure 1. Level scheme of^{26}Al.

level decays to the ground state of^{26}Mg with the emission of a 1.809 MeV γ-ray, one of the most important lines in γ astronomy. The direct observation of this radiation from COMPTEL [2] and INTEGRAL [3] instruments provides an evidence that^{26}Al production is still active on a large scale. Moreover, the observation of^{26}Mg isotopic enrichment (extinct^{26}Al) in carbonaceous meteorites [1] shows that the^{26}Al had been produced before the formation of the solar system (4.6 ∗ 10^9 yr). Any astrophysical scenario must be concordant with both observations. Stellar nucleosynthesis studies have not yet identified which one of the possible^{26}Al sources could explain the observed evidences. Existing stellar models predict that 30-50% of the production of^{26}Al comes from hydrogen-burning shell (HBS) of massive stars (core collapse Supernovae and Wolf-Rayet stars). The remaining should come elsewhere, for example from HBS of low mass AGB or from the nucleosynthesis of Novae. Hence, solving the controversy for different astrophysical production sites of^{26}Al demands a better understanding of the rates for the^{25}Mg(p, γ)^{26}Al reaction.

Figure 1 shows the level scheme of^{26}Al. The Q-value of the reaction is Q = 6306 keV. Any internal transition from the isomeric state^{26}Al^m (T_{1/2} = 6.35 s) to the ground state of^{26}Al are inhibited due to the large spin difference. In the past the levels down to 6496 keV, corresponding to the resonance E_r = 189 keV have been directly and indirectly studied [4, 5, 6, 7]. A recent publication by Arazi et al. [8] making use of the AMS technique gives resonance strengths down to the resonance energy at E_r = 189 keV. The main difference, between AMS results and the previous data in literature, concerns the value of the resonance strength at E_r = 189 keV, where Arazi et al. [8] quoted a value about 5 times smaller than the value published previously [9, 6].

Figure 2. Comparison between experimental spectrum (black curve) acquired at E_r = 304 keV and a simulated one (red curve).

2. Measurements of^{25}Mg(p, γ)^{26}Al strengths

In the framework of LUNA, the resonances at E_r = 304, 374, 418, and 745 keV have been investigated [10] at Ruhr-Universität-Bochum using the 4MV Dynamitron- Tandem accelerator, with an average proton beam current of 100nA, and a 12^”x12^” 4π NaI summing crystal [11]. The Mg targets have been produced evaporating MgO powder isotopically enriched in^{25}Mg (98%) on Ta backing. The same technique for target production was also used for low energy measurements. The efficiency in the energy range 3000keV< E_γ <7000keV was determined to be about 70% using a Monte Carlo code based on Geant4 [12] simulation. In the simulation the branching ratios of the resonances and known levels in^{26}Al from literature [13, 6] have been used to reproduce the complex decay scheme of the^{25}Mg(p, γ)^{26}Al reaction. In this way the simulated γ-spectra could be directly fitted to the experimental spectra and no additional information about average multiplicity was necessary (see e.g. [14]). The uncertainty of this procedure was estimated by variing the branching ratios in a reasonable range [10]: no significant influence was observed. The code was tested with calibrated sources [10] and, moreover, a perfect agreement with the results of [11] was obtained. A detailed discussion of these measurements will be presented in a forthcoming article [15]. Figure 2 shows a comparison between the experimental spectrum recorded at E_r = 304 keV, and a simulated one. The strength values are shown in fig. 3. The ωγ results are in good agreement with previous work in particular [7, 6] and disagree with [8].

In addition, the resonance at E_r= 189 keV has been investigated using the 400kV LUNA accelerator facility installed in a deep underground laboratory in the Laboratori Nazionali del Gran Sasso. The peculiarities of this accelerator have been described elsewhere [16]. The detector used was a HPGe detector (119% efficiency), placed at θ = 55^∘ relative to the beam direction. The distance between the target and the

Figure 3. Resonance strengths versus the energy in the center of mass. Filled in data points are the results from Bochum analysis [10], the open triangles are from AMS measurements [8], the open square are from Nacre compilation [9], and the open circle is the experimental value measured by Powell et al. [7].

front face of the detector was 3.5 cm, in order to guarantee a high detection efficiency. Due to this geometry significant corrections due to the summing effect had to be applied. The efficiency curve for the measurement of the E_r= 189 keV resonance energy was determined using the^{14}N(p,γ)^{15}O (E_r= 259 keV) and^{24}Mg(p,γ)^{25}Al (E_r= 224 keV) reactions as well as^{137}Cs and^{207}Bi calibrated sources. Spectra were collected with the detector at three different distances from the target, with the aim of investigating in detail the summing in and the summing out effects. In order to prevent build-up of impurities on the target, a LN-cooled trap was mounted directly to the front face of the target. Repeated measurement of the resonance profile during longterm high beam bombardments (average current 250μA) allowed for monitoring the 25Mg target quality and purity. Figure 4 shows the experimental spectrum acquired at E_r= 189 keV with a total charge of 25C. This set-up improves the knowledge of the γ-ray cascade structure of the resonance. We observed the complex γ-ray cascade including the transition to the ground state. We also were able to identify the principal background contamination reactions:^{11}B(p, γ)^{12}C and^{19}F(p, αγ)^{16}O. After a preliminary analysis we are able to quote the branching ratio for the ground state transition to be 6%. Due to the difficulties in the determination of summing out correction, we are able to give a preliminary range for the resonance strength at E_r = 189 keV, 6.8 ∗ 10^{−7}eV < ωγ < 7.7 ∗ 10^{−7}eV . This range is in perfect agreement with the value given by Iliadis et al (7.4 ± 1.0) ∗ 10^{−7}eV [6]. The analysis of the full data set is still in progress, as well as a new γ-measurement with a BGO summing crystal at LNGS, aiming the first direct detection of the resonance at E_r = 93 keV.

Figure 4. Undergroumd γ-spectrum of the^{25} Mg(p, γ)^{26} Al reaction recorded at resonance energy E_r = 189 keV.

3. Acknowledgments

”We would like to thank Helmut Baumeister, University of Münster (Germany) and Massimo Loriggiola, INFN Laboratori Nazionali di Legnaro (Itlay) for the Magnesium target production. This work was supported by INFN and in part by the European Union (TARI RII3-CT-2004-506222), the Hungarian Scientific Research Fund (K68801 and T49245) and the Deutsche Forschung Gemeinschaft (DFG) (Ro429/41).” - References

[1] R.Diehl et al.,A&A, 298 (1995) 445 [2] J.Knödlseder et al.,A&A, 345 (1999) 813 [3] R.Diehl et al.,A&A, 411 (2003) L451L455 [4] A. E. Champagne et al., Nucl.Phys.A 402 (1983) 179 [5] P.M.Endt et al., Nucl.Phys.A 459 (1986) 61 [6] Ch.Iliadis et al., Nucl.Phys.A 512 (1990) 509 [7] D.C.Powell et al., Nucl.Phys.A 644 (1998) 263 [8] A.Arazi et al., PRC 74 (2006) 025802 [9] C.Angulo et al. Nucl.Phys.A 656(1999)3 [10] A.Best Diploma Thesis, Ruhr-Universität-Bochum, January 2007 [11] M.Mehrhoff et al., Nucl.Instr.Meth.A 132 (1997) 671 [12] Geant4 Collaboration, Nucl.Instr.Meth.A 506 (2003) 250, http://geant4.cern.ch [13] P.M.Endt, P.De Wit, C.Alderliesten, Nucl.Phys.A 476 (1988) 333 [14] A.Spyrou et al., Phys.Rev.C 76 (2007) 015802 [15] A.Best et al., to be published [16] A.Formicola et al., Nucl.Instr.Meth.A 507 (2003) 609