arXiv:0710.0303v1 [cond-mat.soft] 1 Oct 2007

Polyelectrolyte-Compression Forces between Spherical DNA Brushes

Kati Kegler,^1 Martin Konieczny,^2 Gustavo Dominguez-Espinosa,^1 Christof Gutsche,^1 Matthias Salomo,^1 Friedrich Kremer,^1 and Christos N. Likos^{2, 3} 1Institute for Experimental Physics I, University of Leipzig, Linéestraße 5, D-04103 Leipzig, Germany 2Institute for Theoretical Physics II: Soft Matter, Heinrich-Heine-Universität Düsseldorf, Universitätsstraße 1, D-40225 Düsseldorf, Germany 3The Erwin Schrödinger International Institute for Mathematical Physics, Boltzmanngasse 9, A-1090 Vienna, Austria (Dated: November 14, 2023)

Optical tweezers are employed to measure the forces of interaction within a single pair of DNAgrafted colloids in dependence of the molecular weight of the DNA-chains, and the concentration and valence of the surrounding ionic medium. The resulting forces are short-range and set in as the surface-to-surface distance between the colloidal cores reaches the value of the brush height. The measured force-distance dependence is analyzed by means of a theoretical treatment based on the compression of the chains on the surface of the opposite-lying colloid. Quantitative agreement with the experiment is obtained for all parameter combinations.

PACS numbers: 82.35.Rs, 82.70.Dd, 87.80.Cc

Surface treatment of colloidal particles and the ensuing manipulation and control of their interaction properties is a topic of high and lasting interest, on the grounds of both technological relevance and fundamental importance. On the first count, the main issue pertains to the fact that surface treatment is necessary to achieve colloidal stabilization by inducing thereby a repulsive force that acts against the ubiquitous dispersion attractions between the colloids. Charge stabilization and steric stabilization, the latter being caused by grafted polymer chains, are the two most common mechanisms, whereas grafting of polyelectrolyte (PE) chains on a colloid provides a natural combination of both and results to an electrosteric repulsion. On the second count, surface treatment by polymer grafting provides the possibility to tune the effective colloid interaction by ‘dressing’ the hard sphere potential with a soft tail, whose range, strength and overall functional form can be controlled by changing the properties of the polymer brush, e.g., its grafting density, height or charge. Systems interacting by a combination of a hard sphere potential and a subsequent short-range repulsion show a tremendous variety in their equilibrium [1, 2, 3, 4] and dynamical [5, 6, 7] properties.

Considerable work has been carried out in the study of the so-called osmotic PE-brushes [8, 9, 10], which result for high surface grafting densities and are characterized by the fact that they spherically condense the vast majority of the counterions released by the chains. These, in turn, bring about an entropic effective force between the brushes, which has been quantitatively analyzed for PE-brushes [11] and stars [12]. On the other hand, little is known for the opposite case of low surface grafting density, for which the theoretical considerations that lead to the interaction between osmotic brushes break down. In this Letter, we investigate by a combination of sensitive and accurate experiments and theoretical analysis the effective forces between spherical DNA brushes and establish a novel mechanism of interaction between those, which results from the mutual compression of PEchains of the colloids against the surface of each other. The quantitative characteristics of the resulting forces are vastly different from those between osmotic brushes.

The experimental investigation was based on the measurement of the force-distance dependence between the brushes employing optical tweezers. Optical tweezers offer unprecedented accuracy down to the pN-domain and 3 nm in measuring forces and position, respectively. By monitoring the force-distance dependencies between two grafted colloids it is possible to know how the different physicochemical properties (molecular weight, grafting density, ionic strength of the surrounding medium) affect the effective interaction between the grafted colloids. The force F (D) and the surface-to-surface separation D between two identical, negatively charged DNA-grafted colloids is measured using optical tweezers in a identical set-up as used in Ref. [13].

We employed colloidal particles with a hard core radius R_c = 1100 nm, on which DNA-strands with various numbers of base pairs (bp) and grafting densities σ were chemically anchored. The brush has only a slight deviation from planarity, which allows us to relate also to known facts from planar PE-brushes in what follows. The force separation dependence between DNA-grafted colloids with σ = 8.2 · 10^{−5} chains/nm^2 and varying molecular weights of the chains is shown in Fig. 1. By using shorter and shorter DNA-segments, the force displays a gradual transition from a soft to a hard sphere potential. The theoretical curves based on the model explained below are also incorporated. A reliable estimate for the brush thickness is deduced by determining the interaction length λ_F at forces of 2 pN, 4 pN, and 6 pN, see inset of Fig. 1. For molecular weights between 500 bp and 1000 bp, a linear scaling is observed, in accordance with

FIG. 1: F (D) curves between DNA-grafted colloids in buffered solution (10 mM C4H11NO3, pH 8.5) for grafting density σ = 8.2 · 10^{−5} nm^{−2} and various bp-number N, indicated in the legend. Symbols: experiments; lines: theory according to Eq. (2), with the values for L0 and Z_{eff} given in Table I. The inset illustrates the dependence of the interaction length λF on N for three different values of the force.

Ref. [9]. Deviations at chain length 250 bp are attributed to the relative increase of the interaction forces between uncoated surfaces.

In Fig. 2 we show the F (D) dependence on the concentration and valency of added salt, using the ionic strength I = ( ∑ i c_iz^2_i )/2 as a parameter, where the sum is carried over all salt ions of concentration c_i and valency z_i. In order to eliminate possible uncertainties due to variations among the colloids, the experiments for the data shown in Fig. 2 were carried out with one single pair of colloids for which the solvent is exchanged. With increasing salt concentration the force-separation dependence becomes shorter-range, reflecting the transition from an osmotic to a salted brush [13] and the concomitant shrinkage of the latter. The trends are the same independently of the counterion valency (NaCl, CaCl_2, and LaCl_3). As for the salt-free case, we obtain an estimate for the brush thickness as the interaction length λ_F at the force of 2 pN; results for this quantity are shown in Fig. 3. The slope of the brush thickness versus ionic strength is close to 0.3 ± 0.05, in good agreement with the scaling law [8]. The transition from the osmotic to the salted brush takes place when the external salt content equals the counterion concentration inside the brush. A contact between the solid surfaces of the particles is not observed at low salt concentration (< 1 mM NaCl) and high forces (up to 100 pN) in accordance with known results for planar brushes [14].

In order to gain a deeper understanding of the underlying physical mechanisms that give rise to the measured forces, we rely on recent theoretical and simulational work on star-branched polyelectrolytes and the related system of spherical polymer brushes [11, 12, 15]. It has been shown [12] that the main physical mechanism giving rise to a (soft) repulsion between star-shaped polyelectrolytes comes from the entropic contribution of the

FIG. 2: F (D) dependence for various ionic strengths I and types of salt. (a) NaCl; (b) CaCl2 ; (c) LaCl3. Here, N = 1000 bp and σ = 8.2 · 10^{−5} nm^{−2}. Symbols: experiment; lines: theory according to Eq. (2), L0 and Z_{eff} are given in Table I.

counterions that are spherically trapped within the star’s corona. This consideration has been extended to spherical brushes, which possess a rigid, colloidal core. An analytical expression for the entropic effective interaction, V_{en}(D), between two brushes at surface-to-surface distance D has been derived, reading [11]:

βV_{en}(D) = N_{trap} { D + 2R_c 2RK ln^2 ( D + 2R_c 2R )

+2R_c [ 2 RK − 1 L_0 ] ln ( R_c R ) + ln ( 2L_0 RK )} , (1)

where K = 1 − 2R_c/R + x(1 − ln x), x ≡ (D + 2R_c)/2R. Further, β = (k_BT )^{−1} is the inverse temperature, N_{trap} represents the number of spherically trapped ions, L_0 is the equilibrium brush height and R = R_c + L_0. The entropic force is given as F_{en}(D) = −∂V_{en}(D)/∂D.

The basic assumption underlying the derivation of

Eq. (1) above is that of no interdigitation between the two brushes: as the surface-to-surface distance D becomes smaller than 2L_0, the chains of each brush retract to the half-space in which the respective colloidal core lies. The experimental data at hand, however, cannot be described by the force derived from the entropic contribution of Eq. (1), because the resulting forces have a completely different D-dependence than the experimental ones (see, e.g., Fig. 4). This is a clear indication that a different physical mechanism is at play for the system at hand. The rather small grafting density of the brushes brings about a different possibility, namely the mutual interdigitation of the brushes up to a surface-to-surface separation L_0 and the subsequent compression of the chains opposite to the hard colloidal core for smaller distances. This mechanism has been clearly identified and quantitatively analyzed in Ref. [15], in which interactions of star-branched polyelectrolytes with hard, planar surfaces have been discussed. Taking into account that chains from both brushes get compressed against the core of the opposite brush, the expression for the compression contribution to the effective brush-brush interaction reads for d ≪ D ≤ L_0 as

βV_c(D) =

(Z_{eff} N)^2 λ_B D × { 2 ln ( D d ) + ( D L_0

)_3 [ ln ( L_0 d ) − 1 ]} . (2)

Here, the Bjerrum length λ_B = βe^2/ϵ denotes the distance at which the electrostatic energy equals the thermal energy and has the value λ_B = 7.18 Å for water at 300 K. Further, d is the typical diameter of individual arms of the two interacting brushes, having for DNA the value d = 18 Å [16, 17]. Again, the compression contribution to the force is given as F_c(D) = −∂V_c(D)/∂D and it can be easily checked that F_c(D) vanishes at D = L_0. Contrary to the entropic contribution, which sets in when the coronae overlap, i.e., at D = 2L_0, the compression contribution requires that the grafted chains of one brush touch the core colloid of the other and thus it is nonvanishing in the range D ≤ L_0.

The brush height L_0 used in the theoretical calculation of the forces is read off from experiment and it is thus no free fit parameter. The ‘effective ion valency’ Z_{eff} appearing in Eq. (2) is treated as a fit parameter to the experimental data; nevertheless, it is constrained by certain physical considerations based on known facts on the propensity of DNA strands to adsorb and strongly condense counterions on their grooves. Indeed, as it has been shown experimentally [18, 19], DNA can strongly condense about 90% of counterions, which already sets a rough upper limit of 0.1 for this effective valency; additional factors, such as weak adsorption of salt counterions inside the brush, are expected to push Z_{eff} to even lower values. All parameter combinations for the various

FIG. 3: Double-logarithmic plot of the interaction length for a force F = 2 pN versus the ionic strength of the added salt. Here, the molecular weight of the grafted DNA is N = 1000. Different types of symbols correspond to different salt valencies. The dashed line of slope −1/3 indicates theoretical scaling law predictions for comparison.

FIG. 4: Effective force-distance curves for DNA-grafted colloids at different grafting densities σ, fixed molecular weight N = 1000 bp and no added salt. Symbols: experiment; lines: theory. For the lowest σ, the solid line also includes an entropic contribution to force, derived from Eq. (1), which is illustrated by the dashed line.

DNA-grafted colloids are shown in Table I.

The experimental forces shown in Figs. 1 and 2 are very well described by the compression force; there are still ‘tails’ for D > L_0 that can be discerned, and which correspond to small contributions from the entropic force, Eq. (1). The purpose of this work lies in the understanding of the compression-induced forces, thus we have not attempted a detailed description of the tails, especially since the magnitudes of the resulting forces there lie at the limit of experimental accuracy. We show nevertheless for the lowest grafting density in Fig. 4 a typical example of the combination of compression and entropic contributions that results into an excellent description of the forces. Here, a number of N_{trap} = 1100 spherically trapped counterions was employed, which is in good agreement with the simulation results of Ref. [20]. There, planar PE-brushes were simulated and for a grafting density very close to the lowest one in Fig. 4, it was found that about 10% of the counterions are outside the brush.

TABLE I: The physical parameters of the employed DNAgrafted colloids and the effective valency Z_{eff} employed in the theoretical modeling of each system.

Figure σ [nm^{−2}] Base pairs I [mM] L0 [nm] Z_{eff}

1 8.2 · 10^{−5} 250 0.0 100 0.227^a 500 130 0.115 750 180 0.104 1000 280 0.091^b

2(a) 8.2 · 10^{−5} 1000

0.0 280 0.081^c 0.1 150 0.088 3.3 110 0.078 10.0 90 0.061 100.0 40 0.018

2(b) 8.2 · 10^{−5} 1000

0.03 180 0.079 0.3 130 0.077 3.0 100 0.050 9.9 70 0.045 30.0 40 0.036

2(c) 8.2 · 10^{−5} 1000

0.0 280 0.078^c 0.6 190 0.068 6.0 70 0.067 4 1.8 · 10^{−4} 1000 0.0

400 0.073 5.9 · 10^{−5} 310 0.056 2.0 · 10^{−5} 180 0.011

aExcept for this value for Z_{eff} , which is still of the order 0.1, all other lie below the threshold 0.1 mentioned in the text. Note, however, that here L_0 deviates from linear scaling with N, as mentioned before, and this fact may affect the precise Z_{eff} -value. bHere, different colloids were used than in the cases marked with the superscript^c below, which explains the deviation between the corresponding experimental results and the concomitant difference in the Z_{eff} -values.

cIn these two cases, the same colloids were used, yet the measured forces show minimal differences set by experimental accuracy. The theoretical values of Z_{eff} are then slightly different between these two cases.

As the vast majority of the remaining 90% is Manningcondensed on the rods, a very small relative number of about 1000 spherically condensed ones, results, in agreement with the value of N_{trap} mentioned above. For the higher grafting densities shown in Fig. 4, the entropic contribution seems to be negligible.

Summarizing the results shown in Figs. 1, 2, and 4, it can be surmised that the compression force resulting from Eq. (2) yields a very good description of a large variety of experimental data. The effective valency Z_{eff} from Table I always lies in the physically expected region and shows the expected dependence on salinity, decreasing with ionic strength I. Note that already the fact that the resulting forces from theory lie at the pN-domain is a nontrivial feature, in view of the fact that quantities of vastly different order of magnitude in SI (Bjerrum length, Boltzmann constant, brush height and DNA-diameter) are involved in determining its numerical value.

We have measured and theoretically described the forces between spherical DNA-brushes with low grafting density. The physical system at hand provides a convincing verification of the importance of the PE-compression mechanism [15], in sharp contrast to most hitherto studied systems, which were dominated by counterion entropy. Therefore, it has been demonstrated that the present systems are colloids whose effective interaction is short-range, i.e., tunable in terms of its extension and strength by changing the number of base pairs involved, the ionic strength and grafting density. The quantitative characteristics of the resulting effective force are unique: whereas for neutral, densely grafted brushes the force scales as F (D) ∼ D^{−1} for D ≪ L_0 [21, 22], here a dependence F (D) ∼ D^{−2} ln(D/d) for d ≪ D ≪ L_0 results. On the other hand, for D <∼ L_0, we obtain F (D) ∼ |D − L_0|. Future work should focus on the study of concentrated solutions of such brushes, including crystal- and glass formation, and the analysis of these in terms of the effective interaction derived in this work.

We thank Dr. Arben Jusufi (Princeton) for helpful discussions. This work has been supported by the DFG. C.N.L. wishes to thank the ESI (Vienna), where parts of this work have been carried out, for its hospitality.

[1] P. Bolhuis and D. Frenkel, Phys. Rev. Lett. 72, 2211 (1994).

[2] E. A. Jagla, J. Chem. Phys. 110, 451 (1999). [3] Y. Norizoe and T. Kawakatsu, Europhys. Lett. 72, 583 (2005).

[4] M. A. Glaser et al., Europhys. Lett. 78, 46004 (2007). [5] Z. Yan et al., Phys. Rev. E 73, 051204 (2006). [6] P. Kumar et al., Phys. Rev. E 72, 021501 (2005). [7] J. Largo, P. Tartaglia, and F. Sciortino, Phys. Rev. E 76, 011402 (2007).

[8] P. Pincus, Macromolecules 24, 2177 (1991). [9] O. V. Borisov and E. B. Zhulina, Eur. Phys. J. 4, 205 (1998).

[10] Y. Mei et al., Phys. Rev. Lett. 97, 158301 (2006). [11] A. Jusufi, C. N. Likos, and M. Ballauff, Colloid Polym.

Sci. 282, 910 (2004).

[12] A. Jusufi, C. N. Likos, and H. Löwen, Phys. Rev. Lett.

88, 018301 (2002); J. Chem. Phys. 116, 11011 (2002). [13] K. Kegler, M. Salomo, and F. Kremer, Phys. Rev. Lett.

98, 058304 (2007).

[14] Y. Rabin, G. H. Frederickson, and P. Pincus, Langmuir 7, 2428 (1991).

[15] M. Konieczny and C. N. Likos, J. Chem. Phys. 124, 214904 (2006).

[16] H. M. Harreis et al., Phys. Rev. Lett. 89, 018303 (2002). [17] A. A. Kornyshev et al., Rev. Mod. Phys. 79, 943 (2007). [18] V. A. Bloomfield, Curr. Opin. Struct. Biol. 6, 334 (1996). [19] A. A. Kornyshev and S. Leikin, Phys. Rev. Lett. 82, 4138 (1999).

[20] H. Fazli et al., Europhys. Lett. 73, 429 (2006). [21] S. T. Milner, T. A. Witten, and M. E. Cates, Macromolecules 21, 2610 (1988).

[22] J. Mewis et al., AIChE. J. 35, 415 (1989).