arXiv:0709.3151v2 [astro-ph] 17 Apr 2009

PASJ: Publ. Astron. Soc. Japan , 1–??, © 2024. Astronomical Society of Japan.

Suzaku Observation of the RCW 86 Northeastern Shell

Hiroya Yamaguchi and Katsuji Koyama Department of Physics, Kyoto University, Kitashirakawa-oiwake-cho, Sakyo-ku, Kyoto 606-8502 hiroya@cr.scphys.kyoto-u.ac.jp Hiroshi Nakajima Department of Earth and Space Science, Osaka University, 1-1 Machikaneyama, Toyonaka, Osaka 560-0043 Aya Bamba Institute of Space and Astronautical Science, JAXA, 3-1-1 Yoshinodai, Sagamihara, Kanagawa 229-8510 Ryo Yamazaki Department of Physics, Hiroshima University, Higashi-Hiroshima, Hiroshima 739-8526 Jacco Vink Astronomical Institute, University Utrecht, P.O. Box 80000, 3508TA Utrecht, Netherlands and Akiko Kawachi Department of Physics, Tokai University, Kitakaname 1117, Hiratsuka, Kanagawa 259-1292

(Received 2007 August 24; accepted 2007 September 19)

Abstract

This paper reports on Suzaku results concerning the northeast shell of RCW 86. With both spatial and spectral analyses, we separated the X-rays into three distinct components: low (kT_e ∼0.3 keV) and high (kT_e ∼1.8 keV) temperature plasmas and a non-thermal component, and discovered that their spatial distributions are different from each other. The low-temperature plasma is dominated at the east rim, whereas the non-thermal emission is brightest at the northeast rim, which is spatially connected from the east. The high-temperature plasma, found to contain the ∼6.42 keV line (Kα of low-ionized iron), is enhanced at the inward region with respect to the east rim, and has no spatial correlation with the non-thermal X-ray (the northeast). This result suggests that the Fe-Kα line originates from Fe-rich ejecta heated by reverse shock. A possible scenario to explain these morphologies and spectra is that a fast-moving blast wave in a thin cavity collided with a dense interstellar medium at the east region very recently. As a result, the reverse shock in this interior decelerated, and arrived at the Fe-rich region of the ejecta and heated it. In the northeast rim, on the other hand, the blast wave is still moving fast, and is accelerating electrons causing them to emit strong synchrotron X-rays.

Key words: ISM: individual (RCW 86) — supernova remnants — X-Rays: spectra

1. Introduction

RCW 86 (G315.4–2.3) is one of the historical Galactic supernova remnants (SNRs), a possible remnant of supernova in AD 185 (Stephenson & Green 2002). The distance to RCW 86 was determined to be 2.8 kpc by optical observations (Rosado et al. 1996); we assume this value here. The ASCA observations discovered synchrotron Xrays from the southwest (SW) and northeast (NE) shells of RCW 86 (Bamba et al. 2000; Borkowski et al. 2001), which indicates that the energy of the electrons reaches up to ∼100 TeV by shock acceleration, similar to the mechanism in SN 1006 (Koyama et al. 1995).

Another remarkable discovery with ASCA is the ∼6.4 keV line in the spectra of the SW (Vink et al. 1997) and NE rims (Tomida et al. 1999) of RCW 86. Since the center energy of the line is consistent with Kα from neutral Fe, a fluorescent origin had often been proposed (Vink et al. 1997; Tomida et al. 1999). However, Bamba et al. (2000) and Borkowski et al. (2001) showed that the Xray spectrum of the SW shell was could be represented by a three-component model; two thin-thermal plasmas with low (∼0.3–0.8 keV) and high (>5 keV) temperatures, and a non-thermal component. The Fe-Kα line was explained by the high-temperature plasma with an extremely low ionization parameter (τ = n_et) of ∼ 10^9 cm^{−3} s.

Rho et al. (2002) observed the SW shell with Chandra, and spatially resolved the low-temperature plasma and non-thermal emission. Since the low-temperature plasma is spatially correlated with optical Hα emission, they concluded the origin to be a blast wave. On the other hand, the non-thermal emission is localized at the inner region of the low-temperature plasma; hence, the origin was suggested to be reverse shock. They found, furthermore, that the Fe-Kα correlated with the non-thermal emission, and suggested that the Fe-Kα line originates from a high-temperature plasma of Fe-rich ejecta heated by the synchrotron-emitting reverse shock. However, the morphology of the Fe-Kα emitting region could not be determined.

Recently, the SW region of RCW 86 was observed with the X-ray Spectrometers (XIS; Koyama et al. 2007)

Fig. 1. 0.5–1.0 keV (left) and 3.0–6.0 keV (right) intensity contours overlaid on the Fe-K map (gray scale) smoothed with a Gaussian kernel of σ = 1.1 arcmin. The coordinates (RA and Dec) refer to epoch J2000.0. The Field of view of the XIS is indicated by the black squares, where the data from the four XIS are combined, but that of the four corners, irradiated by the^{55}Fe calibration sources, are removed. The scales of contours and gray scale are linear, and these ranges are from 0 to 6.3 × 10^{−2} counts s^{−1} arcmin^{−2} (red contour), to 1.6 × 10^{−2} counts s^{−1} arcmin^{−2} (blue contour), and to 2.0 × 10^{−3} counts s^{−1} arcmin^{−2} (gray scale). The green ellipses and the triangles are the source and background regions, respectively. The blue rectangle indicates the region where the projection profiles are extracted (see figure 2).

aboard the new X-ray satellite Suzaku (Mitsuda et al. 2007). Utilizing the good sensitivity and spectroscopic performances of the XIS in the energy band of Fe-K lines for diffuse sources, Ueno et al. (2007) determined the center energy of the Fe-Kα line to be 6404 (6400–6407) eV, which indicates the emission is from low-ionized iron less than Si-like (Fe XIII). Furthermore, they revealed the Fe- K line morphology for the first time and discovered its distribution is spatially different from that of the nonthermal emission. They thus confirmed that the origin of the Fe-Kα is not fluorescence caused by supra-thermal electrons, nor non-thermal X-rays, and concluded that a more likely origin is a high-temperature ejecta in extremely ionization non-equilibrium.

The NE region of RCW 86 also exhibits Fe K-shell emission (albeit the flux is less than that of SW) as well as soft thermal and non-thermal X-rays (ASCA: Tomida et al. 1999). Therefore, this region would be another good place to solve the puzzle concerning the origin of Fe-Kα related to the thermal and non-thermal emission in RCW 86. Chandra and XMM-Newton revealed that the soft-thermal and non-thermal emission filaments join smoothly along the outer shell (Vink et al. 2006). They, however, failed to detect Fe-Kα from this region, possibly due to the limited sensitivity and high background level near the Fe K-shell energy. We therefore observed the NE shell with Suzaku to see if the Fe-Kα is really present or not. If present, we will study its morphology and spectra to reveal the origin.

2. Observations and Data Reduction

The Suzaku observation of the NE region of RCW 86 was made on 2006 August 12 (Observation ID = 501037010), using the four XIS placed on the focal plane of an X-Ray Telescope (XRT; Serlemitsos et al. 2007). The XIS consists of three Front-Illuminated (FI) CCDs and one Back-Illuminated (BI) CCD. The advantages of the former are high detection efficiency and low background level in the energy band above ∼5 keV, while the latter has significantly superior sensitivity in the energy band of < ∼1 keV with moderate energy resolution. All four XRTs are co-aligned to image the same region of the sky. The XIS were operated in the normal full-frame clocking with the 3 × 3 or 5 × 5 editing mode. We employed cleaned revision 1.2 data, and used the HEADAS software version 6.0.4 and XSPEC version 11.3.2 for the data reduction and analysis. After screening, the effective exposure time was obtained to be ∼53 ksec. The response matrix files (RMF) and ancillary response files (ARF) were made using xisrmfgen and xissimarfgen (Ishisaki et al. 2007) version 2006-10-17.

The errors quoted in the text and tables are at the 90% confidence level, and the 1σ confidence level in the figures, unless otherwise stated.

3. Analysis and Results

3.1. XIS Image

We show the Fe-Kα intensity map in figure 1 in gray scale. This map was made from the 6.3–6.5 keV (the Fe-

Table 1. Best-fit parameters of 3–10 keV fittings.

Component Parameter East NE Power-law Γ 3.18 (3.02–3.31) 2.96 (2.88–3.05) Flux^∗ 1.10 (1.07–1.14) ×10^{−4} 2.44 (2.39–2.48) ×10^{−4} Surface brightness^∗ 2.68 (2.61–2.78) ×10^{−6} 1.36 (1.33–1.38) ×10^{−5} Gaussian Center (eV) 6424 (6404–6444) 6424 (fixed) Width^† (eV) <90 0 (fixed) Flux^‡ 7.1 (5.8–8.3) ×10^{−6} <8.1 ×10^{−7} Surface brightness^‡ 1.7 (1.4–2.0) ×10^{−7} <4.8 ×10^{−8} χ^2/d.o.f. 146/192 = 0.76 204/234 = 0.87 ∗ Photon flux (photons cm^{−2} s^{−1}) and surface brightness (photons cm^{−2} s^{−1} arcmin^{−2}) in the 3–10 keV band. † One standard deviation (1σ).

‡ Total flux (photons cm^{−2} s^{−1}) and surface brightness (photons cm^{−2} s^{−1} arcmin^{−2}) in the line.

Kα band) image by subtracting the continuum level in this band, which was estimated with a power-law model (with photon index of 3) fitting for the 5.0–6.2 keV continuum spectrum. For comparisons with the soft and hard X-ray fluxes, we overlaid intensity contours of the 0.5– 1.0 keV band (figure 1 left) and the 3.0–6.0 keV band (figure 1 right). No spatial correlation between the Fe- Kα and the hard X-ray emission was found. Moreover, the soft X-ray emission is systematically shifted outward with respect to the Fe-Kα emission. As we show in subsection 3.3, the 0.5–1.0 keV emission is dominated by an optically thin thermal plasma with an electron temperature of ∼0.3 keV, and the Ne IX-Kα line is the major emission of this component. We then made projection profiles of the Ne IX-Kα line band (0.87–0.94 keV), and the Fe- Kα band (6.3–6.5 keV), in the position given in figure 1 left. The result is shown in figure 2. We can see that the peak of Fe-Kα is significantly shifted to the inner region from the soft emission (Ne IX-Kα). With the fitting of a Gaussian-plus-constant model, the peak positions (right

Fig. 2. Projection profiles (along Right ascension) of the Ne IX-Kα band (cross; 0.87–0.94 keV) and the Fe-Kα band (circle; 6.3–6.5 keV) for the blue rectangular region given in figure 1 left. The bin-size of the former corresponds to ∼0.^′28, while that of the latter is ∼0.^′69.

ascensions) of the soft plasma and Fe-Kα are found to be separated by 2 arcmin.

3.2. Spectrum in the Hard X-Ray Band

For a quantitative study, we extracted the representative XIS spectra from two elliptical regions: the East and NE (see figure 1), where the soft X-ray and Fe-Kα, and the hard X-ray flux are the brightest. We did not divide the former two diffuse emissions because the separation between them is comparable to the angular resolution of the XRT (∼2^′: Serlemitsos et al. 2007), and they are overlapping each other. The solid angles of these ellipses are π ×4.^′2 ×3.^′1 = 41 arcmin^2 and π ×3.^′5 ×1.^′6 = 18 arcmin^2, respectively. The background data were taken from the outside of the remnant (the solid triangles in figure 1). For the background spectra, we excluded point-like sources at (14^h46^m03^s,−62^∘22^′30^{′′}) and (14^h46^m03^s,−62^∘19^′01^{′′}), and the CCD corners, which contain the^{55}Fe calibration source.

We first determined the Fe-Kα line parameters. The background-subtracted spectra in the 3–10 keV band in

Fig. 3. XIS 3–10 keV spectra extracted from the East region. Black and gray represent FI (sum of the three sensors) and BI, respectively. The best-fit power-law and Gaussian models are shown by solid lines.

Table 2. Best-fit parameters of full-band model fittings.

Component Parameter East NE Absorption N_H (cm^{−2}) 4.1 (3.8–4.4) ×10^{21} 4.4 (4.2–4.5) ×10^{21} VPSHOCK 1 kT_e (keV) 0.33 (0.30–0.37) 1.2 (0.89–1.6) C, N, O 0.15 (0.11–0.24) 0.15 (fixed) Ne 0.33 (0.26–0.50) 0.33 (fixed) Mg 0.31 (0.28–0.48) 0.31 (fixed) Si, S 0.31 (0.19–0.43) 0.31 (fixed) Ca, Fe, Ni 0.23 (0.17–0.36) 0.23 (fixed) τ (cm^{−3} s) 7.7 (5.5–11) ×10^{10} 6.7 (5.9–7.7) ×10^9 n_en_HV (cm^{−3}) 3.7 (2.4–5.8) ×10^{57} 2.4 (2.0–2.9) ×10^{56} VPSHOCK 2 kT_e (keV) 1.8 (1.4–2.3) – Fe 32 (14–90) – τ (cm^{−3} s) 2.3 (1.8–2.9) ×10^9 – n_en_HV (cm^{−3}) 2.0 (1.1–2.6) ×10^{56} – Power-law Γ 2.89 (2.45–3.28) 2.78 (2.74–2.82) Norm^∗ 1.1 (0.72–1.9) ×10^{−3} 3.3 (3.2–3.5) ×10^{−3} Gain (FI) Offset (eV) –3.2 –3.2 Gain (BI) Offset (eV) –5.4 –5.4 χ^2/d.o.f. 1093/1050 = 1.04 1138/1084 = 1.05 ∗ The differential flux (photons cm^{−2} s^{−1}) at 1 keV.

the East region is shown in figure 3. Since the data from the three FIs are nearly identical, we merged the individual spectrum to improve the photon statistics.

We detected a clear Fe-Kα line in the spectra. We then fitted the spectra with a power-law (for the continuum) and a Gaussian (for the emission line). The best-fit parameters are given in table 1. The centroid energy of the Fe-Kα line is slightly higher than that of the emission line from neutral iron (6400 eV). Although the absolute energy calibration error is reported to be as accurate as ±0.2%, above 1 keV (Koyama et al. 2007), we checked the energy scale of each XIS sensor using the^{55}Fe calibration sources. We then confirmed that the peak energies of Mn-Kα lines were consistent with the laboratory value of 5895 eV within the statistical errors for all of the XIS sensors. We therefore conclude that the energy scale error in the Fe-K line band is less than the statistical error. The best-fit energy of 6424 (6404–6444) eV constrains the Fe ionization state to be approximately between Ar-like and Ne-like.

For a comparison, we extracted the spectra from the NE region in the same way as that of the East, and fitted the spectra with a power-law plus a Gaussian. Since we could see no clear the Fe-Kα line, we fixed the center of the Gaussian to be 6424 eV, and determined the upper limit of the line flux. The result is given in table 1. The surface brightness of the Fe-Kα and the power-law component in the NE are at least ∼3-times smaller and ∼5-times higher than those in the East region.

3.3. Full Band Spectrum

Figure 4 shows the 0.4–10 keV spectra from the regions of East and NE. The data reduction is the same as described in subsection 3.2. We can clearly see several emission lines below ∼2 keV in the East spectra. This suggests that the soft X-rays are dominantly from an optically thin thermal plasma. Therefore, we fitted the spectra from the East region with a thin-thermal plasma model and a power-law component. For the thermal plasma component, we used a VPSHOCK (variable abundance planeparallel shock) model with the NEIvers 1.1 code (since the NEIvers 2.0 code does not include K-shell emission lines from low ionized Fe, we do not use this new version). We treated the abundances relative to solar (Anders and Grevesse 1989) to be free parameters, with the following elements in the parenthesis fixed to be the same: (C, N, and O), (Si and S), and (Ca, Fe, and Ni). The data in the 1.83–1.85 keV band were ignored because of the current calibration errors of the XIS; there is a small energy gap (∼10 eV) at the Si K-edge that is not implemented in the current response function. Since the absolute gain of the XIS has an uncertainty (especially for low-energy X-rays), we allowed a small offset in the energy scale, independently between the FI and BI.

This 2-component model gives nice fits to the soft Xray band including all the emission lines and the hard continuum emission with a best-fit kT_e value of the thermal component of 0.38 keV and a power-law index of 2.9. However it cannot reproduce the Fe-K line flux, with the unacceptable χ^2/d.o.f. of 1222/1054. As given in subsection 3.2, the center energy of the Fe-K line is higher than that of Fe I, which suggests that the origin of the Fe-K line is due to a low ionized thin-thermal plasma, but is not the fluorescence of neutral Fe. We hence added another thin-thermal component with a higher temperature and a low ionized parameter. The abundances in this plasma were fixed to solar, except for Fe. Then, the best-fit χ^2/d.o.f. was significantly reduced to be 1093/1050. The best-fit parameters and models are respectively shown in table 2, and in figure 4 with solid and dotted lines.

Fig. 4. Top: 0.4–10 keV spectra of the FI (a) and BI (b) for the East. The components of the best-fit model are shown with the solid lines [low-temperature plasma (VPSHOCK 1 in table 2) and power-law] and dotted line (high-temperature plasma [VPSHOCK 2 in table 2)]. Bottom: The spectra of the FI (c) and BI (d) for the NE. Since these spectra have no significant Fe-K line, the high-temperature plasma component did not be added.

We next fitted the spectra of the NE region. We can see emission lines in the soft X-ray band in these spectra. This suggests that the NE also includes a low-temperature plasma. However, the line profiles are too weak to obtain a reasonable fit with many free parameters of the lowtemperature plasma. We therefore fixed the soft plasma parameters as those of the East region. Since no Fe-Kα was found (see subsection 3.2), we did not include the thermal component with higher temperature. Thus, normalizations of the low-temperature plasma and power-law component are free parameters. To obtain the best-fit, we also fine-tuned a temperature and an ionization parameter in the low-temperature plasma and the photon index in the power-law component. The best-fit χ^2/d.o.f. is an acceptable value of 1138/1084. The best-fit parameters and spectra are given in table 2 and figure 4.

The thermal plasma parameters derived for the NE differ from the values reported by Vink et al. (2006); we find a higher τ and a lower kT_e. Indeed, kT_e and τ are correlated in the sense that both a higher kT_e or a higher τ give a higher ionization. Note that Vink et al. (2006) used a different spectral fitting code (SPEX). Both fits agree about the ionization state of the plasma, but differ concerning the relative contributions of kT_e and τ. For the NE region, the exact value for kT_e is difficult to determine, since most of the continuum has a non-thermal origin.

4. Discussion

From morphology and spectral analyses, the X-rays in the northeastern quadrant of RCW 86 can be separated into three distinct components: the low temperature (VPSHOCK 1) and high temperature (VPSHOCK 2) thermal components both in ionization non-equilibrium, and the power-law component. We separately discuss the origin of these components, and finally try to give a unified picture about them.

4.1. Low-Temperature Plasma

As shown in figures 1 and 2, the soft X-rays are dominated in the outer shell of the East region. The spectrum is well represented by a thin-thermal plasma with a low temperature of kT_e ∼ 0.3 keV. Since the Hα filament was reported to be localized near at the East region (Smith 1997), the low-temperature plasma (VPSHOCK 1) is likely to be due to the interstellar medium (ISM) heated by a blast wave.

The metal abundances that we obtained are significantly lower than the solar values. A sub-solar abundance is also reported in the rim region of the Cygnus Loop (e.g., Miyata et al. 2007), where an ISM component is dominant. Therefore, shocked ISM spectra may generally show such low abundances. In the case of RCW 86, Bocchino et al. (2000) found the thermal spectra of the southeast and north rim show lower metal abundances than the solar values, and claimed that this result is due to metal depletion behind the shock. Since the abundances of our result are almost consistent with those of Bocchino et al. (2000), the same interpretation would be accepted. However, we should note that the complexity of our three-component model makes it difficult to determine the absolute values of the abundances. Indeed, if we fix the Ne abundance to be solar, and fit the full band spectra of the East region, the best-fit can be obtained with an acceptable χ^2/d.o.f. (1103/1051), and almost the same relative abundances to those of table 2. An exact separation of the low and high-temperature components and the power-law component is necessary for a certain determination of the absolute metal abundances.

The solid angle of the East ellipse in figure 1 (= 41 arcmin^2) corresponds to 2.5×10^{38} cm^2 at 2.8 kpc. Assuming the depth of the emitting region to be 8.5 pc, about half of the radius of the remnant, the emission volume is estimated to be V = 6.6 × 10^{57} cm^3. Therefore, the emission measure (EM = n_en_HV ) of the VPSHOCK 1 in this region corresponds to a proton density of n_H = 0.68 f^{−0.5}_{E1} cm^{−3}, where f_{E1} is the filling factor for this component. Since the soft thermal emission concentrates at the outer thin rim in the East ellipse (see figure 1), the density of the low-temperature plasma is likely to be much larger than 0.68 cm^{−3}.

Similarly, the density of the VPSHOCK 1 in the NE region is estimated to be n_H = 0.26 f^{−0.5}_{N1} cm^{−3}, where f_{N1} is the filling factor for the VPSHOCK 1 in the NE. Although several uncertainties remain (e.g., the filling factors, the temperature difference between the East and NE), the density of the swept-up ISM may be larger at the East rim than at the NE rim. The variation of the ionization parameter is consistent with this result, namely τ(= n_et) in the East is larger than that of the NE.

4.2. Fe-K Line and High-Temperature Plasma

By imaging (subsection 3.1) and spectral (subsection 3.2) analyses, we proved that the Fe-Kα emission has no correlation with the hard X-ray continuum. Therefore, the origin of the Fe-Kα line is not due to fluorescence caused by supra-thermal electrons, nor non-thermal Xrays. It is located behind the blast wave (VPSHOCK 1) and is over-abundant in Fe. We hence propose that the origin of a high-temperature plasma (VPSHOCK 2) is a Fe-rich ejecta heated by a reverse shock.

The ionization parameter in VPSHOCK 2, determined from the center energy of Fe-Kα, is extremely low, τ ∼ 2.3 × 10^9 cm^{−3} s. The electron density of the ejecta component is estimated to be n_e = 0.19 f^{−0.5}_{E2} cm^{−3}, where f_{E2} is the filling factor for the VPSHOCK 2 in the East region.

We then estimate the elapsed time since the ejecta was heated by the reverse shock: t = τ/n_e = 1.2 × 10^{10}f^{0.5}_{E2} sec < ∼ 380 yr. This is much less than the age of ∼1800 yr (from the historical record), and hence the ejecta must have been heated very recently.

The estimated mass of Fe is ∼ 0.07f^{0.5}_{E2} M_⊙, which is reasonable as a portion of the ejecta, and some of the Fe-ejecta may still remain in the interior of the remnant, which has not yet been heated by the reverse shock. However, we have to note the uncertainty in the mass determination. Although we show in subsection 3.3 that the spectrum of the East region is well reproduced by the three-component model, we cannot conclude this model is unique. We therefore, estimated the systematic error on the Fe mass by fitting the 3–10 keV spectrum with (1) only one VPSHOCK model (without a power-law), or (2) a pure Fe plasma and a power-law. In both cases, we fixed the values of kT_e and τ to 1.8 keV and 2.3 × 10^9 cm^{−3} s, the best-fit parameters given in table 2. Then, the Fe mass was obtained to be 0.06f^{0.5}_{E2} M_⊙ and 0.6f^{0.5}_{E2} M_⊙ for cases of (1) and (2), respectively. These values can be regarded as the lower and upper limits of the Fe mass in the East region. Thus, there is an uncertainty of one order of magnitude.

4.3. Non-Thermal Emission

Since the non-thermal X-rays are well represented by a power-law with photon indices of ∼ 2.8, synchrotron radiation is the most plausible origin. The synchrotron filament of the NE rim is spatially connected from the soft thermal rim (the East) along the outer shell of RCW 86 (also see figure 1 of Vink et al. 2006). Therefore, this filament may be produced by the blast wave.

In the case of the SW rim of RCW 86, Rho et al. (2002) and Ueno et al. (2007) suggested that the non-thermal filament is not a blast wave, but reverse shock, because the non-thermal filament is inside the soft thermal emission on the SNR shell. Also the blast-wave velocity at the SW shell (∼800 km s^{−1}: Rosado et al. 1996; ∼600 km s^{−1}: Ghavamian et al. 2001) is too slow to accelerate electrons by the standard diffusive shock acceleration theory, and to emit intense synchrotron X-rays. Since the gas density of the NE shell is ∼10-times lower than that of the SW shell (Pisarski et al. 1984), it is possible that the velocity of the NE blast wave is much higher than that of the present SW shell. Vink et al. (2006) interpreted that the velocity of the NE non-thermal filament should be ∼2700 km s^{−1}. This high speed can accelerate electrons to more than TeV energy to produce synchrotron X-rays in the blast wave shock.

4.4. Unified Picture for All of the Components

We propose a unified picture to explain all of the results in figure 5. A few hundred years ago, blast waves in the East and NE rims would be expanding with the same high velocity. However the blast wave in the East collided with a dense medium very recently, and the forward shock decelerated rapidly. At that same time, the reverse shock behind the East rim began to move inward to the

Fig. 5. Schematic view of the interpreted structure of the RCW 86 northeast region.

interior of the remnant, and it heated the Fe-rich ejecta. Since RCW 86 may be a remnant in the OB association (Westerlund 1969), a candidate for the “dense medium” is either a cavity wall surrounding the remnant, as suggested by Vink et al. (1997), or a molecular cloud. We found in the NANTEN results (Matsunaga et al. 2001) evidence of a cloud just at the position of the East rim of RCW 86 (l=315.7, b=–2.4). We strongly propose a deeper radio observation to reveal whether the shell of the remnant is truly interacting with the cloud.

The forward shock in the NE rim, on the other hand, is still expanding in a tenuous region, and hence keeps a high shock velocity. The reverse shock behind the NE may also expand with high velocity, and hence has not yet reached the Fe-rich ejecta layers. This may explain the absence of Fe-K emission behind the NE region.

5. Summary

We have analyzed Suzaku/XIS data obtained from the northeast quadrant of RCW 86. The results and interpretations are summarized as follows:

1. The Fe-Kα emission is enhanced at the inner region from the soft thermal rim (the East region), and has no correlation with the hard X-ray non-thermal filament (the NE region).

2. The centroid of the Fe-Kα line (6404–6444 eV) and the lack of Fe-L lines constrain the Fe ionization state to be approximately between Ar-like (Fe IX) and Ne-like (Fe XVII).

3. The spectra extracted from the soft X-rays and Fe- Kα enhanced region (the East) are well fitted with two thin-thermal plasmas, which have different temperature of kT_e ∼ 0.3 keV and ∼ 1.8 keV and one power-law with a photon index of Γ ∼ 2.9.

4. The spectra extracted from the hard X-ray filament (the NE) can be represented by a lower temperature plasma and a power-law.

5. The lower temperature plasma has sub-solar metal abundances. The origin of this component would be a blast-shocked ISM.

6. The higher temperature plasma includes an oversolar abundant iron, and has an extremely low plasma age of τ ∼ 2.3 × 10^9 cm^{−3} s. Hence it produces nearly 6.4 keV Kα lines. This component may be Fe-rich ejecta heated by reverse shock very recently.

7. The power-law component, which is the brightest in the NE region, can be regarded as synchrotron emission.

8. The shock front at the East rim would recently have collided with dense ISM, after which the blast wave decelerated rapidly, and the reverse shock began to move toward the center of the remnant.

9. The blast wave at the NE rim may still be expanding in a tenuous region. Therefore, it keeps a high shock velocity for efficient particle acceleration.

The authors thank all members of the Suzaku team. H. Y., H. N., and A. B. are supported by JSPS Research Fellowship for Young Scientists. This work is supported by the Grant-in-Aid for the 21st Century COE ”Center for Diversity and Universality in Physics” from the Ministry of Education, Culture, Sports, Science and Technology (MEXT) of Japan, and by Grants-in-Aid for Scientific Research of the Japanese Ministry of Education, Culture, Sports, Science, and Technology (K. K., R. Y., and A. K.).

References

Anders, E., & Grevesse, N. 1989, Geochim. Cosmochim. Acta, 53, 197 Bamba, A., Koyama, K., & Tomida, H. 2000, PASJ, 52, 1157 Bocchino, F., Vink, J., Favata, F., Maggio, A., & Sciortino, S.

2000, A&A, 360, 671 Borkowski, K. J., Rho, J., Reynolds, S. P., & Dyer, K. K. 2001, ApJ, 550, 334 Ghavamian, P., Raymond, J., Smith, R. C., & Hartigan, P.

2001, ApJ, 547, 995 Ishisaki, Y., et al. 2007, PASJ, 59, S113 Koyama, K., Petre, R., Gotthelf, E. V., Hwang, U., Matsuura, M., Ozaki, M., & Holt, S. S. 1995, Nature, 378, 255 Koyama, K., et al. 2007, PASJ, 59, S23 Matsunaga, K., Mizuno, N., Moriguchi, Y., Onishi, T., Mizuno, A., & Fukui, Y. 2001, PASJ, 53, 1003 Mitsuda, K., et al. 2007, PASJ, 59, S1 Miyata, E., Katsuda, S., Tsunemi, H., Hughes, J. P., Kokubun, M., & Porter, F. S. 2007, PASJ, 59, S163 Pisarski, R. L., Helfand, D. J., & Kahn, S. M. 1984, ApJ, 277, 710 Rho, J., Dyer, K. K., Borkowski, K. J., & Reynolds, S. P. 2002, ApJ, 581, 1116 Rosado, M., Ambrocio-Cruz, P., Le Coarer, E., & Marcelin, M. 1996, A&A, 315, 243 Serlemitsos, P. J., et al. 2007, PASJ, 59, S9

8 H. Yamaguchi et al. [Vol. ,

Smith, R. C. 1997, AJ, 114, 2664 Stephenson, F. R., & Green, D. A. 2002, Historical Supernovae

and their Remnants (Oxford: Oxford University Press) Tomida, H., Koyama, K., & Yamauchi, S. 1999, Astron. Nachr.

320, 342 Ueno, M., et al. 2007, PASJ, 59, S171 Vink, J., Kaastra, J. S., & Bleeker, J. A. M. 1997, A&A, 328, 628 Vink, J., Bleeker, J., van der Heyden, K., Bykov, A., Bamba,

A., & Yamazaki, R. 2006, ApJ, 648, L33 Westerlund, B. E. 1969, AJ, 74, 879