arXiv:0709.1383v1 [cond-mat.mes-hall] 10 Sep 2007

Decoherence induced by an interacting spin environment in the transition from integrability to chaos

A. Relaño,^∗ J. Dukelsky,^† and R. A. Molina^‡ Instituto de Estructura de la Materia, CSIC, Serrano 123, E-28006 Madrid, Spain (Dated: January 12, 2022)

Abstract

We investigate the decoherence properties of a central system composed of two spins 1/2 in contact with a spin bath. The dynamical regime of the bath ranges from a fully integrable integrable limit to complete chaoticity. We show that the dynamical regime of the bath determines the efficiency of the decoherence process. For perturbative regimes, the integrable limit provides stronger decoherence, while in the strong coupling regime the chaotic limit becomes more efficient. We also show that the decoherence time behaves in a similar way. On the contrary, the rate of decay of magnitudes like linear entropy or fidelity does not depend on the dynamical regime of the bath. We interpret the latter results as due to a comparable complexity of the Hamiltonian for both the integrable and the fully chaotic limits.

PACS numbers: 05.45.Mt, 03.65.Yz, 02.30.Ik, 75.10.Jm

∗Electronic address: armando@iem.cfmac.csic.es †Electronic address: dukelsky@iem.cfmac.csic.es ‡Electronic address: molina@iem.cfmac.csic.es

I. INTRODUCTION

Real quantum systems always interact with their environment. This interaction entails that the system, initially in a pure state, becomes entangled with the environment and decays into an incoherent mixture of several states. This phenomenon, called decoherence, is an essential feature of quantum mechanical systems.

From a fundamental point of view, decoherence provides a theoretical basis for the quantum-classical transition [1], emerging as a possible explanation of the quantum origin of the classical world. From a practical point of view, it is a major obstacle for building a quantum computer [2] since it can produce the loss of the quantum character of the computer. Therefore, a complete characterization of the decoherence process and its relation with the physical properties of the system and the environment, such as the strength of the system-bath interaction, characteristic times of the bath, or the presence of quantum phase transitions or quantum chaos, is needed for both fundamental and practical purposes.

Connections between decoherence and quantum chaos have been previously studied. However, a universal theory has not yet been found. One line of argument establishes a link between the decoherence process and the Loschmidt echo [3], claiming that for a quantum system with a classically chaotic Hamiltonian the rate at which the environment degrades information on the initial state becomes independent of the system-environment coupling strength [4]. Another point of view, in some way contrary to the former, but generally accepted, states that a chaotic bath leads to faster and stronger decoherence than an integrable one [5, 6, 7]. One significative manifestation of this phenomenon is the dependence of the decoherence time, i. e. the time for which the initial correlations in the central system are lost due to decoherence, with the system-bath coupling strength λ. Some authors have found that for regular baths decoherence rate is proportional to λ^2, while chaotic or unstable ones display a considerable weaker dependence on λ [6, 7]. A numerical study over a quantum walker with a complex coin has shown that, though a chaotic and a regular environments may not be distinguishable in the short-time evolution, the chaotic one continues to be effective over exponentially longer time scales, whereas the regular bath saturates much sooner [8]. A similar study on the Dicke model at weak coupling shows that the entanglement is smaller if the system is initially in a regular orbit than if it is in an irregular one [9]. However, exceptions for this general behavior are well known [10]. It is also argued that, when the system-bath interaction becomes extremely small, so that the perturbation theory is applicable, the regular bath leads to a faster decoherence than the chaotic one [11]. Numerical studies of many-spin system show that a chaotic bath generates stronger and faster decoherence than an integrable one for strong enough coupling. However, the result is opposite in the perturbative regime [12].

In this paper we study the connection between decoherence and quantum chaos in a many-body spin systems. We follow the methodology proposed in [12] in order to test if the conclusions obtained there are applicable to a broader class of spin systems and, thus, can be postulated as generic. We use a Hamiltonian for the bath that depends on many arbitrary, real and independent parameters, and whose dynamical regime is independent of the specific values of these parameters. The integrable limit is defined as a random realization of the XYZ Gaudin magnet [13], characterized by the existence of as many integrals of motion as quantum degrees of freedom. The transition to a chaotic regime is modelled by a single control parameter interpolating between the integrable Hamiltonian and a fully chaotic one. In both limits, and along the whole transition, the complexity of the Hamiltonian, understood as the number of different relevant terms, remains comparable, contrary to most of the previously studied systems, for which the regular limit is represented by a simplified Hamiltonian. For example, in [8] the integrable limit is characterized by an independent evolution of each spin of the bath, and in [12] it is reached when the Hamiltonian of the bath reduces to a site-dependent magnetic field, with a negligible interaction between different spins.

In this work, we show that, for a wide class of spin Hamiltonians, the integrable limit generates decoherence more efficiently if the system-bath coupling strength is small, while the chaotic limit becomes more efficient when the coupling is larger. We also show that this conclusion can be extended to the decoherence time. Nevertheless, the transition from integrability to chaos in terms of magnitudes related to decoherence is not so smooth as it is on spectral statistics. Moreover, the rate of decay of the fidelity and the linear entropy does not depend on the dynamical regime of the bath, contrary to what it is usually claimed.

The paper is organized as follows. In Sec. II, we describe the model and analyze its dynamical regime by means of spectral statistics. In Sec. III, we study the efficiency of the decoherence process, illustrating the connection between the dynamical regime of the bath and some characteristic measures of decoherence, like the non-diagonal elements of the system reduced density matrix and the linear entropy. In Sec. IV we study a quantitative characterization of the chaoticity of the bath in a perturbative regime using the linear entropy and the Loschmidt echo. We also study the relation between the onset of chaos and the decoherence time. Finally, in Sec. V we summarize our results.

II. THE MODEL

We will consider a central system composed by two interacting spins 1/2, S_1 and S_2, and a bath composed of a large number of 1/2 spins I_k [14]. The central system and the bath evolve with the following Hamiltonian:

H = H_S + H_{SB} + H_B , (1)

where H_S is the self-Hamiltonian of the system, H_{SB} the interaction between the system and the bath, and H_B the Hamiltonian of the bath. For H_S and H_{SB} we use the Hamiltonians

H_S = JS_1 · S_2, (2) and H_{SB} = S_1 · ∑ k a_kI_k. (3)

The interaction between the central system and the bath is carried out by a single spin of the system S_1; the other spin, S_2, is affected by the bath indirectly, through its interaction with S_1, governed by H_S . These kind of models are useful to describe, for example, the destruction of Kondo effect by decoherence [15].

For the bath Hamiltonian H_B we use an XYZ model with long range interactions

H_B = ∑ j ϵ_j H_j, (4)

where H_j = N∑ k=1≠j A_{jk}I^x_j I^x_k + B_{jk}I^y_j I^y_k + C_{jk}I^z_j I^z_j , (5)

and {ϵ_j} are free parameters.

With this generic Hamiltonian we will describe a complete transition from integrability to chaos, depending on the properties of matrices A, B and C. The integrable limit is obtained when the Hamiltonians (5) fulfilled the conditions of the XYZ Gaudin integrable model. In this limit the N × N matrices A, B y C are defined in terms set of N arbitrary parameters {z_j}, according to the following identities: A_{jk} = 1 + κ sn^2(z_j − z_k) sn(z_j − z_k) , B_{jk} = 1 − κ sn^2(z_j − z_k) sn(z_j − z_k)

, (6) C_{jk} = cn(z_j − z_k) dn(z_j − z_k) sn(z_j − z_k) , where sn(u) ≡ sn(u, κ) is the Jacobi elliptic function of modulus κ, 0 ≤ κ ≤ 1, and cn(u) and dn(u) are related to sn(u) by d sn(u)/du = cn(u) dn(u). The XYZ Gaudin model can be solved exactly by Bethe ansatz [13]. There as many independent Hamiltonians (5) as quantum degrees of freedom and, with the definition (6) they commute among themselves, [H_i, H_j] ∀i, j = 1, . . . , N for arbitrary values of the parameters {z_j }. Therefore, they constitute a complete set of integrals of motion [16].

The transition from integrability to the fully chaotic limit is performed by a singleparametric perturbation of the matrices defined above. If the amplitude of the perturbation is small, the resulting Hamiltonian is close to integrability; for increasing values of the parameter, the Hamiltonian approaches the fully chaotic limit. Such a perturbation can be achieved with the following identities

A^′_{jk} = (cos α) A_{jk} + (sin α) R^1_{jk}, B^′_{jk} = (cos α) B_{jk} + (sin α) R^2_{jk}, (7) C^′_{jk} = (cos α) C_{jk} + (sin α) R^3_{jk},

where R^1_{jk}, R^2_{jk} and R^3_{jk} are random antisymmetric matrices, and 0 ≤ α ≤ π/2. Therefore, for α > 0 the algebraic structure of the integrable system is lost, in a similar way as the geometric structure of a classical integrable system is broken when it is perturbed (see [18] for a complete discussion about this definition of quantum integrability and its connection with spectral statistics). Note, however, that H_B conserves its complexity, remaining a truly XYZ model along the whole transition; none of the X, Y and Z terms becomes negligible in the integrable limit. In consequence, this model allows to study the influence of the dynamical regime of the bath in decoherence process independently of its complexity.

A. Spectral statistics of the bath

The concept of quantum chaos still lacks a clear definition. Usually, a quantum system is said to be regular or chaotic depending on the statistical properties of its spectrum. Using a semiclassical approximation, Berry and Tabor showed than the statistical properties of the spectrum of a generic quantum integrable system are well described by an uncorrelated Poisson distribution [19]. On the other hand, Bohigas et al. conjectured that the statistical properties of the spectrum of a generic quantum chaotic system coincide with those of Random Matrix Theory [20]. Therefore, the statistical properties of the spectrum of a quantum system are considered as a main signature of chaos in quantum mechanics (for a recent review see [21]).

For a general quantum system, the level density ρ(E) can be separated into a smooth part ρ(E) and a fluctuating part ~ρ(E). The former depends on the specific properties of the Hamiltonian, while the latter is universal depending only on the dynamical regime of the system [21]. Therefore, in order to determine whether a quantum system is regular or chaotic from the statistical properties of its spectrum, it is necessary to extract the fluctuating part of the density. This is due by means of a procedure called unfolding, which maps every energy level E_i to a dimensionless magnitude ζ_i,

ζ_i = N(E_i), (8)

where N(E) is the accumulated level density N(E) = ∫_E −∞ dxρ(x). (9) This map can be done analytically in a few simple systems, like quantum billiards or Random Matrix Ensembles, but in general it is a difficult task. In this paper, we have performed the unfolding by approximating N(E) with a set of Chebyshev polynomials by means of a least-squares fit.

The most simple and widely used spectral statistic is the nearest-neighbor spacing distribution P (s), i.e. the probability distribution of the nearest-neighbor spacing sequence s_i = ζ_{i+1} − ζ_i. For a regular quantum system the distribution follows a Poisson P (s) = exp(−s), while for a quantum chaotic system it follows a Wigner distribution P (s) = (π/2) s exp (−πs^2/4). Note that in both cases ⟨s⟩ = 1.

FIG. 1: P(s) distributions for regular α = 0 (upper panel), and chaotic α = π/2 (lower panel) limits of H_B. In both cases there are N = 13 spins, and the histogram is built by collecting 50 different cases, characterized by different sets of parameters {ϵ_j }. The dashed line corresponds to the Poisson distribution, while the dotted line represents the Wigner distribution.

In Fig. 1 we show the P (s) distribution for a set of 50 different realizations of the regular (α = 0) and fully chaotic (α = π/2) limits of bath Hamiltonian H_B with N = 13 spins. The random matrices R^1, R^2 and R^3 are defined in terms of Gaussian random variables with zero mean, and variance equal to

σ(R^1) = σ(R^2) = σ(R^3) = σ(A) + σ(B) + σ(C) 3 . (10)

Each realization is obtained by choosing an independent set of {ϵ_j} parameters, by means of Gaussian random variables with zero mean and σ = 1. For all realizations the set of {z_j } parameters is fixed to z_j = 3.71 √ j/N, in order to cover the whole period of the Jacobi elliptic functions, and the modulus of the Jacobi elliptic functions is fixed to κ = 0.5. As can be seen in Fig. 1 the regular limit clearly follows the Poisson distribution, while the chaotic limit is perfectly described by the Wigner distribution.

In order to quantify the degree of chaoticity of the bath as function of the parameter α

FIG. 2: Parameter η in function of α for N = 9 (squares), N = 11 (circles) and N = 13 (triangles).

it is useful to calculate the following quantity

η = ∫_{s0} 0 ds (P (s) − P_{W igner}(s)) ∫_{s0} 0 ds (P_{P oisson}(s) − P_{W igner}(s)) , (11)

where s_0 = 0.472913 determines the first intersection of Poisson and Wigner distributions. This parameter transits from η = 1 to η = 0 when the system moves from integrability to chaos. Therefore, the curve η(α) shows how fast or slow is this transition. In Fig. 2 we show the value of η as a function of α for three different sizes of the bath, N = 9, N = 11 and N = 13. For the three cases the system very fast approaches to chaos for small values of α. The transition is increasingly faster for the larger bath sizes.

The P (s) distribution describes short-range correlations, since it measures the fluctuations in distances between consecutive levels. To properly determine the chaoticity of a quantum system, it is also necessary to study the long-range spectral correlations. There are several statistics to measure this long-range correlations. The most commonly used are Σ_2(L) and Δ_3(L) statistics [21]. In this paper, we will use instead the δ_n statistic, defined from the unfolded energies as [22]

δ_n = ζ_{n+1} − ζ_1 − n. (12)

This statistic measures the fluctuations of the unfolded energy levels {ζ_i} from their average value. In particular, we are interested in its power spectrum

P^δ_k = 1 N | | | | | N∑ n=1 δ_n exp(−2πink/N) | | | | | 2 , (13)

FIG. 3: Power spectrum of δ_n statistic for α = 0 (upper left panel), α = π/10 (upper right panel), α = π/5 (lower left panel), and α = π/2 (lower right panel). Squares correspond to N = 9; circles correspond to N = 11; and triangles correspond to N = 13. The theoretical value for integrable system is plotted with a dashed line, and the theoretical value for chaotic systems, with a solid line.

which is proportional to 1/k^2 for regular systems, and 1/k for chaotic systems [22]. This statistic is simple to compute, and it is more sensitive to the dynamical regime of the system than the P (s) statistic (see [23] for a detailed discussion of this point).

We show in Fig. 3 the power spectrum of δ_n statistic for α = 0, α = π/10, α = π/5 and α = π/2 in a double logarithmic scale. The x axis is plotted in function of ω_k = 2πk/N, which ranges from ω = 0 to ω = π independently of the size of the spectrum, and therefore allows to look for finite size effects quite easily. Both, the regular and the chaotic limit, closely follow the theoretical lines, except in the low frequency region. This region is spoiled by the unfolding procedure (see, for example, [24] for a complete discussion about the misleading effects due to the unfolding). Note also than the smallest frequency available is ω_1 = 2π/N, and thus larger systems cover a wider range of frequencies. For intermediate values of α, the result is similar to the obtained with the η parameter, i.e. the transition to chaos is fast, and for a fixed value of α larger sizes are more chaotic. However, it is also seen that the transition for the power spectrum of δ_n statistic appears to be slower than the description given in terms of the parameter η. In Fig. 2, the parameter η identifies the system as almost chaotic for α = π/10 and N = 13, whereas in Fig. 3 (upper right panel) it is clearly seen that the P^δ_k statistic is still far from the chaotic limit (lower right panel). These differences can also be seen for α = π/5, but they might be due to the spurious effects of the unfolding procedure.

In conclusion, the bath Hamiltonian as defined in the previous subsection develops a complete transition from integrability to chaos, manifested in both short-range and longrange spectral statistics. Moreover, this transition is smooth and monotonous with the parameter α. The transition is faster for larger systems sizes and therefore a normalization α(N) is required for the results to be independent of the size of the bath. Hence, H_B is a good candidate to study the connection between decoherence and quantum chaos in finite size spin bathes. In the thermodynamic limit, the transition from integrability to chaos may be sharp for α ≳ 0.

B. Density of states of the bath

Prior to the analysis of the connection between chaos and decoherence using the bath Hamiltonian defined above, it is important to check that the parameter α modifies the chaotic properties of the system without altering in a significant way the density of states of the bath. Changes in the density of states may have an important influence on decoherence processes [25]. In Fig. 4 we show the density of states of H_B for three different values of α, corresponding to the regular limit, the fully chaotic limit and an intermediate case. For these calculations, the set of parameters {ϵ_j} has not been chosen randomly, but according to ϵ_j = cos (√ 2j ) . It can be seen that there are no important differences between the three cases under study. Similar results are obtained for other values of α (not shown). Therefore, we can conclude that α determines the degree of chaoticity of the spin bath, without altering significantly the density of states of the spin bath. However, it is important to note that the density of states of the bath is quite sensitive to the parameters of the model Hamiltonian

FIG. 4: Density of states of H_B with α = 0 (squares), α = π/10 (circles) and α = π/2 (triangles).

H_B, specially to the set {z_j}. The use of these kind of Hamiltonians to study the transition from integrability to chaos requires a careful definition of the parameters.

III. DECOHERENCE AND CHAOS: LONG TIME EVOLUTION AND DECO- HERENCE EFFICIENCY

A. General description of time evolution

We will study the time evolution of the system from an initial product state:

|Ψ_0⟩ = |ψ_0⟩ ⊗ |χ_0⟩ . (14)

|ψ_0⟩ is the initial state of the central system, for which we chose the singlet state

|ψ_0⟩ = (|↑↓⟩ − |↓↑⟩) √ 2 . (15)

|χ_0⟩ is the initial state of the bath, for which we chose a statistical superposition of all basis states with random coefficients.

Depending on the size of the bath we can compute the time evolution either by means of a numerical diagonalization of the whole Hamiltonian H, or by a Chebyshev’s polynomial expansion of the time evolution operator [6]. In the former case we can treat up to N = 11 spins in the bath finding the exact evolution of the system. For larger systems we will resort to the approximation of the time evolution operator in a controlled way. In this section we will treat up to N = 11 spins, which is large enough for our purposes. In the next section we will enlarge the bath up to N = 15 spins using the Chebyshev expansion method.

To obtain a quantitative measure of decoherence, we calculate the reduced density matrix of the system ρ(t) = Tr_B |Ψ(t)⟩ ⟨Ψ(t)| , (16) where the subindex B indicates a trace over all degrees of freedom of the bath. In particular, we will analyze the diagonal elements of the density matrix and the non-diagonal term ⟨↑↓| ρ(t) |↓↑⟩. At t = 0, ⟨↑↓| ρ(t) |↑↓⟩ = ⟨↓↑| ρ(t) |↑↓⟩ = 1/2, ⟨↑↑| ρ(t) |↑↑⟩ = ⟨↓↓| ρ(t) |↓↓⟩ = 0, and ⟨↑↓| ρ(t) |↓↑⟩ = ⟨↓↑| ρ(t) |↑↓⟩ = −1/2. The time evolution shows how the entanglement between the system and the bath destroys the initial correlations of the system.

Another useful quantity to measure the decoherence is the lineal entropy Ω = Trρ^2. The initial state of the system is a pure state and the density matrix is idempotent (ρ^2 = ρ), thus Ω = 1. The decoherence induced by the bath transforms state of system into mixed state with Ω(t) < 1. Lower values of Ω imply greater efficiency of the decoherence process.

B. Long time evolution of system density matrix

In Fig. 5 we show the time evolution for ρ_{12} ≡ ⟨↑↓| ρ |↓↑⟩, ⟨↑↓| ρ |↑↓⟩ and ⟨↓↓| ρ |↓↓⟩, as a function of the parameter α and the system-bath coupling strength a, for very long times (note that the time axis is displayed in logarithmic scale). In all the cases we have chosen a_k = a ∀k, and N = 11 spins for the bath. We can see three main interesting features. First of all, for very long times the elements of the density matrix of the system relax to equilibrium states, called pointer states, which are relatively unaffected by the interaction with the environment and thus survive to the decoherence process. Second, as expected, the larger the value of the coupling strength constant the greater the efficiency of the decoherence process. And third, for small values of a, the regular system seems to give rise to a more efficient decoherence than the chaotic one, whereas for a ≈ 1, this behavior is reversed.

In order to better understand how chaoticity determines the efficency of the bath we calculate the pointer states elements of the system density-matrix of the previous calculation. The results are shown in Fig. 6. The elements of the system density-matrix in the pointer states, were obtained by averaging the results for t > 10^6, i. e. ρ_{point} = ⟨ρ(t)⟩_{t>10}6 . We can see that in the three cases the regular limit gives rise to a more efficent decoherence for shorter values of the system-bath coupling strength, whereas this behavior is reversed for greater values of a. In the case of the non-diagonal ρ_{12} elements, a ≈ 1 is enough to totally

FIG. 5: Time evolution for different elements of the system density matrix: ⟨↑↓| ρ |↓↑⟩ (upper panel), ⟨↑↓| ρ |↑↓⟩ (middle panel), and ⟨↓↓| ρ |↓↓⟩ (lower panel), for regular α = 0 (black line; blue online) and chaotic α = π/2 (grey line; red online) limits, as a function of the system-bath coupling strength a.

destroy the initial correlations between |↑↓⟩ and |↓↑⟩, characteristics of the initial state ψ_0. For the diagonal elements, however, a ≈ 1 seems to produce the most efficent decoherence, since for a > 1 the values of the system density-matrix in the pointer state come back to the initial value. In this last two cases, the change in the relation between decoherence and chaos is clearly seen: for a < 1, the regular limit gives rise to stronger decoherence, while for a > 1 the chaotic limit becomes a more efficient.

FIG. 6: Matrix elements of pointer states of the system density matrix: ⟨↑↓| ρ |↓↑⟩ (upper panel), ⟨↑↓| ρ |↑↓⟩ (middle panel), and ⟨↓↓| ρ |↓↓⟩ (lower panel), for regular α = 0 (squares) and chaotic α = π/2 (triangles) limits, and for an intermediate value α = π/10 (circles), as a function of the system-bath coupling strength a.

Similar results are obtained for the linear entropy Ω. Fig. 7 shows the pointer state values of Ω for α = 0, α = π/10 and α = π/2. It is clearly seen that for a < 1, the regular bath produces a stronger decoherence, whereas for a > 1 this behavior is reversed. We can conclude that the dynamical regime of the bath determines the efficiency of the decoherence process. Moreover, the system-bath coupling strength determines whether integrability or

FIG. 7: Pointer states values of the system linear entropy, for regular α = 0 (squares) and chaotic α = π/2 (triangles) limits, and for an intermediate value α = π/10 (squares), as a function of the system-bath coupling strength a.

chaos give rise to more efficient decoherence.

IV. DECOHERENCE TIME AND SHORT TIME EVOLUTION OF SYSTEM DENSITY MATRIX IN PERTURBATIVE REGIME

Having established the relation between the efficiency of decoherence and the dynamical regime of the bath for different values of the system-bath coupling strength, we now focus on the quantitative analysis of how quantum chaos affects the decoherence process. Our aim is to determine whether a smooth transition from integrability to chaos in the bath can be detected from quantities directly related to decoherence. For this purpose, we select a small value for the system-bath coupling strength, for which the integrable limit produces a stronger decoherence than the chaotic one. This choice allows us to follow the central system decoherence by its fidelity F (t), analogous to the Loschmidt echo, which measures the sensitivity of the system to external perturbations. The fidelity is defined as

F (t) = Tr_S [ρ^′(t)ρ(t)] , (17)

where ρ^′(t) is the system density matrix for an ideal evolution in which the system and the bath do not interact, i. e. H_{SB} = 0. The subindex S denotes a trace over the states of the central system. This quantity behaves in a similar way as the linear entropy Ω.

In what follows, we will consider a bath composed of N = 15 spins. The evolution is approximated by means a Chebyshev expansion of the evolution operator. We have checked

FIG. 8: Fidelity F (t) for the central system perturbed by a bath composed by N = 15 spins with a_k =

√_{15} 11 10^{−2} ∀k, for different values of parameter α: solid black (blue online) corresponds to α = 0; dashed black (green online) corresponds to α = π/20; dotted grey (cyan online) corresponds to α = π/10; dotted black (black online) corresponds to α = π/5; dashed grey (magenta online) corresponds to α = 3π/10; and solid grey (orange online) corresponds to α = π/2.

that the size of the bath does not change qualitatively the decoherence process, but the fluctuations around the pointer states (see Fig 5) are decreased. The system-bath coupling strength is set to a_k =

√_{15} 11 10^{−2} ∀k. This particular value was chosen because the coupling behaves as b = √∑_N k=1 a^2_k [12], therefore the set of {a_k} has to be scaled with the bath size.

In Fig. 8 we show the fidelity F (t) for different values of parameter α. Several interesting facts emerge from the figure. First of all, the shape of all the curves is very similar. The main differences between them are related to the pointer states, i. e. the values reached after a long time evolution. We can also see that these pointer values of the fidelity do not increase monotonically with parameter α, as it is expected since the integrable limit gives rise to a stronger decoherence than the chaotic one for this value of the system-bath coupling strength. The numerical results show that when α is close to zero and, thus, the bath is close to integrability, the decoherence is more efficient than when α is close to π/2, that is, when the bath is close to the fully chaotic limit. However, this efficiency does not decrease monotonically for increasing α. In fact, the curves in the figure show that for α = π/20, the fidelity is smaller than for α = 0, and for α = 3π/10, it is larger than for α = π/2. Secondly, the transition from the values characterizing integrability to those corresponding to chaos is slower than the transition from integrability to chaos determined by the spectral statistics. For example, for α = π/10, the fidelity is close to the integrable limit α = 0, whereas the α p β T_s 0 0.6200 0.8781 127.1 π/20 0.6118 0.9146 121.0 π/10 0.6306 0.9036 121.0 π/5 0.6817 0.8691 134.9 3π/10 0.7088 0.8402 148.2 π/2 0.6797 0.8589 135.0

TABLE I: Parameters of eq. (18) for different values of α.

spectral statistics are closer to the chaotic limit. In particular, the parameter η indicates an almost chaotic behavior for α = π/10 (note that from the results shown in Fig. 2 we can conclude that an increase of the size of the bath accelerates this transition, and therefore we may expect that for N = 15 and α ≈ π/20 the bath is almost chaotic). The power spectrum of δ_n statistic is also close to the theoretical value for the fully chaotic limit, but it reveals that such limit is not yet reached.

Another important quantity related to the decoherence process is the decoherence time, that is, the characteristic time for the loss of coherence of the central system due to the coupling with the bath. One way to estimate this time is by means of the decay that the bath induces in F (t). We can fit the shape of F (t) to the following expression

F (t) = p + (1 − p) exp ( −t^β /T^β_d ) , (18)

where p is the pointer value for F (t), and β and T_d are free parameters, the last one corresponding to the decay time of the system. The results for this fit are shown in table I. We can see that the decoherence time is slightly larger for a chaotic bath, and that there is a clear correlation between the pointer value p and the decay time T_d. Moreover, table I also displays a surprising result: contrary to what is expected, F (t) decays roughly in an exponential way for all the values of α. Therefore, it seems that the dynamical regime of the bath does not affect the decay ratio of the Fidelity.

The close connection between the fidelity F (t) and the linear entropy Ω(t) can be seen in Fig. 9. The shape of the curves for linear entropy and fidelity are almost identical. The only appreciable difference between these two quantities is their pointer value. Moreover, the transition from integrability to chaos follows the same trend: it is non-monotonic with

FIG. 9: Linear entropy Ω(t) for the central system perturbed by a bath composed by N = 15 spins with a_k =

√_{15} 11 10^{−2} ∀k, for different values of parameter α: solid black (blue online) corresponds to α = 0; dashed black (green online) corresponds to α = π/20; dotted grey (cyan online) corresponds to α = π/10; dotted black (black online) corresponds to α = π/5; dashed grey (magenta online) corresponds to α = 3π/10; and solid grey (orange online) corresponds to α = π/2.

α p β T_s 0 0.4522 0.8801 112.5 π/20 0.4459 0.9078 106.5 π/10 0.4655 0.8994 107.7 π/5 0.5228 0.8796 125.0 3π/10 0.5515 0.8599 140.6 π/2 0.5138 0.8700 130.2 TABLE II: Parameters of eq. (18) applied to lineal entropy Ω(t) for different values of α.

α, and slower than the corresponding transition in the spectral statistics.

A characteristic time of decoherence can be also defined from Ω(t) fitting the numerical results to an expression similar to (18). We show the results in table II. They are very similar to those obtained with the fidelity: for values of α closer to the integrable limit, decoherence takes place faster than for values closer to the fully chaotic regime. There is also a strong correlation between the pointer value and the decoherence time. We also remark that the transition is not monotonous with α.

From all these results we can conclude that the dynamical regime of the bath influences the pointers states of the central system in a non-strictly monotonic way. The modifications of the pointer states are not smooth nor monotonic when the bath change from integrability to chaos. We have also shown that the decoherence time is influenced by the dynamical regime of the bath in a very similar way: from the decay of both Loschmidt echo and linear entropy, a trend from integrability to chaos can be identified in the decoherence time. However, it is also important to note that the rate of this decay is not affected by the dynamical regime of the bath, since it is roughly exponential along the whole transition. A possible explanation of this surprising feature is that the complexity of the Hamiltonian remains more or less the same along the whole transition from integrability to chaos, because it always consists on a XYZ model in which none of the terms is negligible.

V. CONCLUSIONS

We have studied the decoherence of a two-spin central system interacting with a bath whose dynamical regime can transit from integrability to chaos. Unlike previous studies the integrable regime is described by an XYZ Gaudin magnet with random parameters, with a complexity similar as the corresponding to the fully chaotic regime. We have calculated time evolution by numerical technics, and we have analyzed several quantities related to the reduced density matrix of the central system ρ(t).

From our results, we conclude that at t −→ ∞ the reduced density matrix of the system ρ has an observable dependence on the dynamical regime of the bath. For small values of the system-bath coupling strength, the asymptotic value of ⟨↑↓| ρ |↓↑⟩ is larger in the regular limit than in the chaotic limit. However, this difference tends to decrease as the systembath coupling strength is increased. For the diagonal elements ⟨↑↓| ρ |↑↓⟩ and ⟨↓↓| ρ |↓↓⟩, the relation between the dynamical regime of the bath and the pointer states changes at a ≈ 1. Below this value, the regular limit gives rise to a stronger decoherence; above it, the efficiency of the decoherence process is larger when the bath is chaotic. For both diagonal elements a ≈ 1 gives rise to the larger decoherence. These results show that the onset of chaos affects the decoherence process of the central system in a non simple way, since its influence depends on how strong is the coupling with the bath. These conclusions are consistent with those obtained in [12].

The connection between the properties of the reduced density matrix of the system and the dynamical regime of the bath allows to analyze the transition form integrability to chaos in terms of decoherence. We have done so with a small value of the system-bath couplingstrength, that is, in the perturbative regime. Our results show that this transition is not so smooth and monotonous as described by the spectral statistics analysis, in spite of the fact that the regular and chaotic limits are clearly distinguished. Beyond this non-monotonic behavior, we have also shown that the transition from integrability to chaos in the central system reduced density matrix is slower that than the transition in the nearest neighbor spacing distribution by means of η parameter, and it is a bit closer to the behavior of the power spectrum of δ_n statistic. Therefore, long-range correlations in spectral fluctuations seem to be involved in the bath efficiency to produce decoherence.

We have also performed a similar analysis with the decoherence time, that is, the time at which the central system losses its original correlations. For a perturbative regime, the integrable limit produces stronger decoherence in shorter times as compared with the fully chaotic regime. Nevertheless, in contradiction with the results of reference [12], the decay rate of the fidelity and the linear entropy does not depend on the dynamical regime of the bath. The main difference between both treatments is the modelling of the integrable regime; while our integrable limit contains all the complexity of the chaotic regime, reference [12] uses a simple integrable limit with large degeneracies. Therefore, we conclude that the decay of the fidelity and the linear entropy is related to the complexity of the bath and not to its dynamical regime. Further work is needed to clarify this result.

Aknowledgments

This work was supported by grants FIS2006-12783-C03-01 from Ministerio de Educación y Ciencia of Spain, and 200650M012 from Comunidad de Madrid and CSIC. A.R. is supported by the Spanish program ”Juan de la Cierva”. R.A.M. is supported by the I3P program funded by the European Social Fund.

[1] W. H. Zurek, Rev. Mod. Phys. 75, 715 (2003).

[2] M. Nielsen and I. Chuang, Quantum Computation and Quantum Information (Cambridge University Press, Cambridge, UK, 2000).

[3] F. M. Cucchietti, D. A. R. Dalvit, J. P. Paz, and W. H. Zurek, Phys. Rev. Lett. 91, 210403 (2003).

[4] W. H. Zurek and J. P. Paz, Phys. Rev. Lett. 72, 2508 (1994); P. A. Miller and S. Sarkar, Phys.

Rev. E 58, 4217 (1998); ibid 60, 1542 (1999); A. K. Pattanayak, Phys. Rev. Lett. 83, 4526 (1999); D. Monteoliva and J. P. Paz, Phys. Rev. Lett. 85, 3373; ibid Phys. Rev. E 64 056238 (2001); R. A. Jalabert and H. M. Pastawski Phys. Rev. Let. 86 2490 (2001); P. Bianucci, J. P. Paz, and M. Saraceno, Phys. Rev. E 65 046226 (2002).

[5] W. Zurek, Nature (London) 412, 712 (2001).

[6] V. V. Dobrovitski and H. A. De Raedt. Phys. Rev. E 67, 056702 (2003). [7] R. Blume-Kohout and W. Zurek, Phys. Rev. A 68, 032104 (2003); F. C. Lombardo and P. I.

Villar, Phys. Rev. A 72 034103 (2005).

[8] L. Ermann, J. P. Paz, and M. Saraceno, Phys. Rev. A 73, 012302 (2006). [9] X.-W. Hou and B. Hu, Phys. Rev. A 69 042110 (2004).

[10] A. Tanaka, J. Phys. A 29, 5475 (1996); R. M. Angelo, K. Furuya, M. C. Nemes, and G. Q.

Pellegrino, Phys. Rev. E 60, 5407 (1999).

[11] T. Prosen and M. Znidaric, J. Phys. A 35, 1455 (2002).

[12] J. Lages, V. V. Dobrovitski, M. I. Katsnelson, H. A. De Raedt, and B. N. Harmon, Phys. Rev.

E 72, 026225 (2005).

[13] M. K. Gould, Y.-Z. Zhang, and S.-Y. Zhao, Nucl. Phys. B, 492 (2002). [14] We use different notation for the central spins, S_i, and for bath spins, I_k, just to distinguish them more easily. Both central and bath are identical 1/2 spins.

[15] M. I. Katsnelson, V. V. Dobrovitski, H. A. De Raedt, and B. N. Harmon, Phys. Lett. A 318, 445 (2003).

[16] We are implicitly considering the following definition of integrability: a quantum system is said to be integrable if a set of as many conmuting Hermitian operators as quantum degrees of freedom can be explicitly given, and the Hamiltonian can be expressed as a function of these operators [17].

[17] S. Weigert and G. Muller, Chaos, Solitons and Fractals, 5, 1419 (1995). [18] A. Relaño, J. Dukelsky, J. M. G. Gómez, and J. Retamosa, Phys. Rev. E 70, 026208 (2004). [19] M. V. Berry and M. Tabor, Proc. R. Soc. London, Ser. A 356, 375 (1977). [20] O. Bohigas, M. J. Giannoni, and C. Schmit, Phys. Rev. Lett. 52, 1 (1984).

[21] F. Haake, Quantum Signatures of Chaos (Springer-Verlag, Berlin, 2001). [22] A. Relaño, J. M. G. Gómez, R. A. Molina, J. Retamosa, and E. Faleiro, Phys. Rev. Lett.

89, 244102 (2002); E. Faleiro, J. M. G. Gómez, R. A. Molina, L. Muñoz, A. Relaño, and J. Retamosa, Phys. Rev. Lett. 93 244101 (2004).

[23] J. M. G. Gómez, A. Relaño, J. Retamosa, E. Faleiro, L. Salasnich, M. Vranicar, and M.

Robnik, Phys. Rev. Lett. 94 084101 (2005).

[24] J. M. G. Gómez, R. A. Molina, A. Relaño, and J. Retamosa, Phys. Rev. E 66, 036209 (2002). [25] F. Marquardt in Advances in Solid State Physics, Vol. 46, ed. R. Haug, Springer 2006.